Federal Bureau of Investigation FOIA Documents - Unidentified Flying Objects
Date: 2008-06-05T00:00:00+00:00
Keywords: Unidentified flying objects

The Project Gutenberg eBook of Federal Bureau of Investigation FOIA Documents - Unidentified Flying Objects

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Federal Bureau of Investigation FOIA Documents - Unidentified Flying Objects

Author: United States. Federal Bureau of Investigation

Release date: June 5, 2008 [eBook #25706]
Most recently updated: January 3, 2021

Language: English

Other information and formats: www.gutenberg.org/ebooks/25706

Credits: Produced by Robin Monks and the Online Distributed
Proofreading Team at https://www.pgdp.net

*** START OF THE PROJECT GUTENBERG EBOOK FEDERAL BUREAU OF INVESTIGATION FOIA DOCUMENTS - UNIDENTIFIED FLYING OBJECTS ***

Transcriber's Note:
The interchanging use of "disc" and "disk" has been retained. Words that were censored are indicated by underscores. Handwritten comments and various stamps used on the documents are noted at the end of each document.

UFO

SECTION 1

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATIONS SECTION

AUG 11 1947

TELETYPE

FBI PORTLAND | 8-11-47 | 1-17 PM PST | KAM

DIRECTOR          U R G E N T

FLYING DISCS. SECURITY MATTER DASH X. ONE ____ FORMER NAVY PILOT AND PRESENTLY ____ MYRTLE CREEK, ____ OREGON, REPORTS SEEING A MYSTERIOUS OBJECT ON TWO OCCASIONS THE EVENING OF AUGUST SIXTH WHILE FLYING AT ABOUT FIVE THOUSAND FEET ABOVE MYRTLE CREEK. HATFIELD TO BE INTERVIEWED.

BOBBITT

END

5-18 PM OK FBI WASH DC GAR

Stamped:

RECORDED & INDEXED

30 OCT 1947

EX-60

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | DIRECTOR, FBI | DATE: August 12, 1947
FROM | : | SAC, MILWAUKEE
SUBJECT | : | FLYING DISCS
| | SABOTAGE

Reference is made to Bureau Bulletin No. 42, Series 1947, dated July 30, 1947, Section (B), which advises that all reports concerning flying discs should be investigated by field offices.

Prior to the receipt of these instructions, two instances were called to the attention of this office concerning flying discs. One report was received July 7, 1947, the details of which are set forth in Milwaukee letter to the Bureau dated July 8, 1947, entitled, "Flying Discs or Saucers, Miscellaneous, Telephone Call from Mr. Fletcher at the Bureau at 8:30 a.m., 7-7-47." No investigation was conducted concerning this report.

The second report was received by this office at 1:20 p.m. July 11, 1947, from ____ who is in charge of the Civil Air Patrol of Wisconsin, an auxiliary of the Army Air Forces. On that occasion ____ calling from Black River Falls, Wisconsin, telephonically advised this office that an object in the shape of a disc, nineteen inches in diameter had been found July 10, 1947, by one ____ city electrician on the Jackson County fairgrounds, near Black River Falls, Wisconsin, about 3:30 p.m. The disc might be made of a substance such as cardboard covered by a silver airplane dope material. The contraption has a small wooden tail like a rudder in the back and inside of the disc is what appears to be an RCA photo-electric cell or tube. Also inside the disc is a little electric motor with a shaft running to the center of the disc. At one end of the shaft is a very small propeller. In ____ opinion that contraption might possibly have been made by some juvenile. ____ stated that he desired to return the contraption to Milwaukee and eventually turn it over to the Army Air Forces, but that the finder, ____ apparently wanted to get some publicity on his find and wanted it returned to him.

This information was telephonically called to the attention of Assistant Director D. M. LADD of the Bureau on July 11, 1947.

Subsequently, SAC H. K. JOHNSON telephoned Colonel ____ in charge of Counter Intelligence, Fifth Army, Chicago AC of S G-2 Headquarters Fifth Army, East Hyde Park Avenue, Chicago, Illinois, who stated he would contact ____ of Black River Falls, Wisconsin.

No further investigation was conducted in this matter.

The above constitutes the only two instances in which this office was contacted concerning flying discs. Unless contrary instructions are received from the Bureau, this office does not contemplate taking any further action in connection with the above two cases, but will fully investigate all future reports concerning flying discs.

JGF/ddc
98-0

Stamped:

COPIES DESTROYED
270 NOV 18 1964

August 5, 1947

____
____
Omaha, Nebraska

Dear ____

I wish to acknowledge receipt of your letter postmarked July 10, 1947, together with its enclosure.

Inasmuch as the information which you furnished is of interest to the War Department I have taken the liberty of furnishing it to that agency for their consideration.

Sincerely yours,

John Edgar Hoover
Director

WVC:mjp:rb
62-83894

Stamped:

RECORDED & INDEXED

EX-8

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | D. M. Ladd | DATE: August 1, 1947
FROM | : | J. P. Coyno
SUBJECT | : | MRS. ____
| | INFORMANT

There is attached hereto a letter received from the captioned individual postmarked July 12, 1947, concerning "flying saucers."

There is also attached a letter of acknowledgement to ____ ____ together with a letter to the War Department for approval.

It is recommended that the letter to the War Department be forwarded to the Liaison Section for transmittal to that agency.

Attachments

WVC:mjp

Handwritten:

handled separately

Stamped:

RECORDED & INDEXED

F.B.I. TELETYPE

D E C O D E D   C O P Y

WASH FROM SFRAN | S2 | 8-9-47 | 2-50 PM | KC

DIRECTOR FBI AND SACS, SEATTLE AND PORTLAND         URGENT

FLYING DISKS, SECURITY MATTER-X. LT. COL. ____ OF G2, SAN FRANCISCO, ADVISED TODAY HE HAS NO FURTHER INFORMATION AND THAT OUR SEATTLE OFFICE IS IN POSSESSION OF ALL INFORMATION KNOWN BY HIM AND IS HANDLING THE MATTER AT TACOMA, WASHINGTON.

KIMBALL

RECEIVED     8-9-47
8:15 PM EDST

SACS SEATTLE AND PORTLAND ADVISED

If the intelligence contained in the above message is to be disseminated outside the Bureau, it is suggested that it be suitably paraphrased in order to protect the Bureau's coding systems.

Stamped:

G.I.R.-9

RECORDED

EX-45

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | Director, FBI | DATE: August 8, 1947
FROM | : | SAC, Norfolk
SUBJECT | : | FLYING DISCS

Re Bureau Bulletin No. 42, dated July 30, 1947, Series 1947, wherein information is set forth pertaining to flying discs.

There is enclosed with this letter a newspaper clipping from the "Norfolk Ledger-Dispatch", dated July 9, 1947. The photograph appearing on this clipping is alleged to represent a flying disc which was observed by BILLY TURRENTINE, a Norfolk school boy, who was successful in photographing the object with his small camera.

BILLY was interviewed on August 8, 1947 by Special Agent (A) ____ at which time BILLY informed that the original negative was given by him to a Mr. BROWN of the Photo Craftsman Service, who in turn furnished the negative to the International News Service. BILLY advised that he has an agreement with Mr. BROWN whereby the latter will share equally in any profits derived from the use of the negative by commercial firms or newspapers. As of August 8, 1947 BILLY has not received any remuneration for the use of this negative.

He informed that he was sitting on the front porch of his apartment which is located on the third floor at 410 West 14th Street, Norfolk, Virginia, around noontime on July 8, 1947. He had read numerous newspaper articles pertaining to flying discs and decided to sit on his front porch in the hopes of seeing one and attempting to photograph it. On July 8, 1947 BILLY observed a large, black object moving rapidly through space proceeding from the southwest to a northeast direction. He said the black object was followed by two smaller objects which also proceeded in the same direction. BILLY explained that the objects were moving at a very fast speed which appeared to him to be much faster than the speed of an airplane, and further, that the objects appeared to be extremely high. He said that they were much higher than the average plane travels in the City of Norfolk and appeared to be above the clouds, and that a white mist followed each of the three objects. BILLY was unable to state what the black objects represented, but admitted that they could have been large balloons. He indicated that he has observed small, toy balloons flying through the air, but that definitely these were not the toy type balloons. He said that when he first observed the objects they were at such a great distance from him that it was not necessary that he raise his head in order to see them from his porch on the third floor of the apartment building. He immediately turned around to obtain his camera and estimated it took him approximately twenty to thirty seconds, at which time the discs were almost directly over his apartment and it was necessary that he stoop and look up almost perpendicular in order to obtain the photograph, which accounts for the porch railing being shown in the newspaper clipping. BILLY pointed out that the day on which he took the picture, the weather was hazy and somewhat cloudy and there was a slight breeze blowing from the southwest in the general direction of the northeast, which is the same direction traveled by the black image which he photographed.

Inasmuch as the Army authorities in the Tidewater Area of Virginia are cognizant of the above information, no further investigation will be conducted by this office in this matter.

Enclosure.

TJC:lab
62-182

Stamped:

RECORDED & INDEXED

COPIES DESTROYED
270 NOV 18 1964

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATIONS SECTION

AUG 4 1947

TELETYPE

WASHINGTON FROM NEWARK | 8-4-47 | 5-36 PM EDST | JFG

DIRECTOR          U R G E N T

FLYING DISC REPORTED AT HACKENSACK, NJ AUGUST THREE, NINETEEN FORTY-SEVEN, MISC. INFORMATION RECEIVED THAT ____ AGE ____ ____ AGE TWENTY, ____ HACKENSACK AND ____ ____ FT. DIX, NJ ON LATE AFTERNOON AUGUST THIRD LAST SIGHTED FROM GROUND OBJECT DESCRIBED AS FLYING DISC. ____ CLAIMED IT WAS TWO HUNDRED ____ YDS, IN AIR, REVOLVING SLOWLY, MOVING RAPIDLY, AND NEITHER A KITE NOR A BALLOON. ____ TELEPHONED INFORMATION TO HACKENSACK PD. INQUIRY BEING MADE, BUREAU WILL BE KEPT ADVISED.

MC KEE

RECORDED 62-83844-49

END ACK PLS
NK R 1

Handwritten:

Info. brought to the attention of ____ 8/6/47

Stamped:

RECORDED

EX-46

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATIONS SECTION

AUG 6 1947

TELETYPE

FBI PORTLAND | 8-5-47 | 8-50 PM | HHS

DIRECTOR AND SACS SEATTLE AND SAN FRANCISCO          U R G E N T

FLYING DISCS, SM DASH X. RE TELEPHONE CALL FROM MR. LADD, ONE PM TODAY REQUESTING TELETYPE SUMMARY CONCERNING NEWSPAPER REPORTS OF RECENT REPORTED FLYING DISCS IN PORTLAND AREA AND A REPORTED CONFERENCE OF ARMY OFFICIALS IN PORTLAND CONCERNING FLYING DISCS.____ ____ THE OREGONIAN, ADVISED THAT A CAPTAIN WILLIAM L. DAVIDSON AND LT. FRANK M. BROWN OF FOURTH AAF HEADQUARTERS SAN FRANCISCO WERE IN PORTLAND JULY TWENTY SEVEN LAST AND INTERVIEWED ____ AN EXPERIENCED PILOT, WHO HAD REPORTED JUNE FOURTEEN LAST SEEING A FORMATION OF TEN FLYING DISCS OVER BAKERSFIELD, CALIF. ACCORDING TO ____ THEY HAD ALSO INTERVIEWED FOLLOWING FOUR EXPERIENCED PILOTS WHO WERE AMONG FIRST WHO REPORTED SEEING DISCS—____ TO ASCERTAIN THE PURPOSE OF THE INTERVIEWS ____ CONTACTED MAJOR GENERAL TWINING OF WRIGHT FIELD, OHIO BY PHONE AT ALBUQUERQUE, NM, AND FROM HIM GAINED THE IMPRESSION THAT THE AAF INSTITUTED THIS INVESTIGATION TO WASH OUT THE DISC REPORTS, SINCE THEY ARE DEFINITELY NOT OF AAF ORIGIN. ON FRIDAY, AUGUST FIRST, THE PLANE IN WHICH AAF INVESTIGATORS CAPTAIN DAVIDSON AND LT. BROWN WERE RIDING, CRASHED AT KELSO, WASH. AND BOTH WERE KILLED. THE WRECKAGE WAS SCREENED BY AAF INTELLIGENCE FROM MCCHORD FIELD. THE TACOMA NEWS TRIBUNE AND THROUGH THEM THE UNITED PRESS PUT OUT A STORY THE PLANE WAS CARRYING PARTS OF A DISC WHICH HAD STRUCK A BOAT OWNED BY HAROLD DAHL AND FRED CRISMAN, TACOMA, WN. ____ ADVISED THAT TODAY'S ISSUE OF THE OREGONIAN CARRIES A UP STORY STATING THAT DAHL DENIES SAYING THE METAL FRAGMENTS HE FURNISHED WERE FROM A DISC, AND ANALYSIS OF THE FRAGMENTS SHOWS THEM TO BE FROM A TACOMA SLAG MILL. NO AAF INTELLIGENCE PERSONNEL AVAILABLE PORTLAND. NO RECENT SUBSTANTIVE REPORTS OF FLYING DISCS IN THE PORTLAND AREA. SEATTLE VERIFY AT MCCHORD FIELD AND SAN FRANCISCO VERIFY AT AAF HDQRTS. SF, SUBMITTING TELETYPE SUMMARIES TO THE BUREAU. NO FURTHER INVESTIGATION PORTLAND.

BOBBITT

END AND ACK
WA 0157AM OK FBI WA DW
SE
S OK FBI SE KLS
SF OK FBI SF NCW
DVIMSC

Handwritten:

b7C
8/6/47
cc Mr. Ladd.

Stamped:

67C

RECORDED & INDEXED

EX-30

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | D. M. LADD | DATE: August 6, 1947
FROM | : | ____
SUBJECT | : | FLYING SAUCERS

Special Agent ____ of the Liaison Section contacted Lieutenant Colonel ____, Army Air Forces Intelligence, inquiring about an article which appeared in the West Coast newspapers recently stating in substance that an airplane carrying recovered flying saucers crashed in route from Portland, Oregon, to Los Angeles, California.

____ advised ____ that the only information that has been received by Headquarters of the Army Air Forces is that a CIC Agent of the 4th Air Forces Headquarters, Hamilton Field, San Francisco, was killed in an airplane crash. The Headquarters of the Air Forces have been advised that he was on a top secret mission. ____ indicated that he was under the impression that the CIC Agent was either on route to or from an interview with ____ who is one of the individuals who first saw one of the flying saucers.

____ stated that the Air Forces have no additional information and will receive none until the report is received from the 4th Air Forces. ____ suggested that the San Francisco Field Office contact Colonel ____ Headquarters 4th Air Forces, Hamilton Field, San Francisco, who undoubtedly would be able to furnish the details regarding this matter which are at this time unknown by the Headquarters of the Air Forces. ____ pointed out to ____, however, that it was his belief that no flying saucers have been recovered but that it was merely an attempt to reinterview an individual who previously had reported seeing one of the flying saucers.

SWR:rnr

Stamped:

RECORDED

EX-25

Date: | August 5, 1947
To: | Director of Intelligence | CONFIDENTIAL
| War Department General Staff | BY SPECIAL MESSENGER
| The Pentagon
| Washington 25, D.C.
Attention: | Colonel ____
From: | John Edgar Hoover
| Director, Federal Bureau of Investigation
Subject: | ____

There are attached hereto copies of a letter received from the above-captioned individual concerning "flying discs."

____ letter has been acknowledged and he has been advised that copies of his letter have been furnished to you for your consideration.

Attachment

WVC:mjp:rb

Handwritten:

declassified
2040
8/31/87
HM

Stamped:

RECORDED

COMMUNICATIONS SECTION
MAILED 10 P.M.
AUG 7 1947
FEDERAK BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

L-26

Invoice of Contents from
FEDERAL BUREAU OF INVESTIGATION
WASHINGTON, D.C.

Date | 9-10-47 | Case References | Flying Saucer
Consigned to | —— | |
| Estill, South Carolina | |

List of Contents

Powered Soap Stone.

SPECIAL INSTRUCTION [illegible] Room, place date of shipment and registry number; Shipping Room, above date of this invoice; then return it to person whose name is checked in column at right. After this checked name has been initialled, invoice should be placed in administrative file.

Stamped:

COMMUNICATIONS SECTION
MAILED 7 P.M.
SEP 13 1947
FEDERAK BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

REGISTERED

FEDERAL BUREAU OF INVESTIGATION
UNITED STATES DEPARTMENT OF JUSTICE

To: COMMUNICATIONS SECTION. |
| AUGUST 7, 1947
Transmit the following message to: |
| SAC, DETROIT        "URGENT"

UNSUBS, ____ INFORMANTS, FLYING DISC, MISC. REURTEL AUGUST 5 MATERIAL SHOULD NOT BE FORWARDED TO FBI LABORATORY FOR EXAMINATION BUT SHOULD BE TURNED OVER TO THE ARMY AIRFORCE INTELLIGENCE.

HOOVER

RGF:mae

Stamped:

RECORDED & INDEXED

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATION SECTION AUG 7 1947

TELETYPE

COPIES DESTROYED
270 NOV 18 1964

Date | : | August 1, 1947 | PERSONAL AND CONFIDENTIAL
To | : | Director of Intelligence
| | War Department General Staff
| | The Pentagon
| | Washington 25, D.C.
| | Attention | : | ____
From | : | John Edgar Hoover,
| | Director—Federal Bureau of Investigation
Subject | : | ____

There are attached hereto copies of a letter received from the above-captioned individual concerning "flying saucers."

____ letter has been acknowledged and she has been advised that copies of her letter have been furnished to you for your consideration.

Attachment

WVC:mjp

Handwritten:

declassified
2040
8/31/77
HM

Stamped:

RECEIVED & INDEXED

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | DIRECTOR, FBI | DATE: July 22, 1947
FROM | : | SAC, EL PASO
SUBJECT | : | ____
| | FLYING OBJECTS IN AIR

____ has come to the resident agency at Santa Fe, New Mexico on several occasions to report that she has received information concerning flying objects passing through the air. Some of the reports that she has received concern light objects seen at night which have allegedly been followed by explosions. She advised that one of such objects was reported by ____ ____ who works near Canjilon, New Mexico. She claims that others were seen near Park View and Tierra Amarilla, New Mexico.

____ called attention to clippings from various newspapers concerning "disc-like" objects seen in New Mexico and other parts of the country.

____ claims to be a student of radio waves and ray forms, and contends that the above mentioned objects may be missiles similar to those appearing over Sweden some time ago.

____ has discussed the above with officials of the Atomic Energy Commission, and has written the Secretary of War and other government officials concerning her theories. ____ for the A.E.C., has advised that officials at Los Alamos consider ____ ____ unreliable and possibly not well balanced mentally. She has mentioned to agents of this office that she was struck by lightning when a child.

On July 15, ____ came to the Santa Fe resident agency and advised that she had written to WALTER WINCHELL, promising him a story in connection with the "flying discs."

The foregoing information is being submitted to the Bureau, inasmuch as ____ has written to several government officials and Mr. WINCHELL.

62-0-3594c
FTM:GH

Stamped:

RECORDED & INDEXED

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | D. M. LADD | DATE: 7/24/47
FROM | : | E. G. Fitch
SUBJECT | : | FLYING DISCS

Reference is made to my memorandum to you in the above captioned matter dated July 10, 1947, indicating that Brigadier General George F. Schulgen of the Army Air Corps Intelligence had requested that the Bureau cooperate with the Army Air Corps intelligence in connection with the above captioned matter. The Director noted on the referenced memorandum, "I would do it but before agreeing to it we must insist upon full access to discs recovered. For instance in the La. case the Army grabbed it and would not let us have it for cursory examination."

This is to advise that Special Agent ____ has recontacted General Schulgen and advised him in connection with the Director's notation. General Schulgen indicated to ____ that he desired to assure Mr. Hoover of complete cooperation in this matter and stated that he would issue instructions to the field directing that all cooperation be furnished to the FBI and that all discs recovered be made available for the examination by the FBI Agents. General Schulgen pointed out to ____ that he will from time to time make the results of the studies of his scientists available to the Bureau for the assistance of the FBI Field Offices. General Schulgen indicated to ____ that there has been a decrease in the reported sightings of the discs which might be because of the fact that it has lost much of its publicity value. He indicated, however, that he believed it necessary to follow this matter through to determine as near as possible if discs were in fact seen and to determine their origin.

General Schulgen inquired of ____ the method by which the Bureau would make the information obtained from the Bureau's inquiries, known to the Air Corps, in the Field as well as at the War Department level. Mr. ____ pointed out to General Schulgen that the best procedure appeared to be through the regular established channels. It was pointed out to General Schulgen that the Bureau Field Offices maintain close liaison with the Intelligence Divisions of the various Armies as well as close liaison with the Intelligence Division of the War Department. General Schulgen indicated that he would be satisfied to receive information through this means.

General Schulgen indicated to ____ that he believed that there was a possibility that this entire matter might have been started by subversive individuals for the purpose of creating a mass hysteria. He suggested that the Bureau keep this in mind in any interviews conducted regarding reported sightings. General Schulgen stated to ____ that he would make available to the Bureau all information in the possession of the Air Corps regarding the sightings which were first reported so that the Bureau could conduct some investigation regarding these individuals to ascertain their motives for reporting that they had observed flying discs. When General Schulgen makes the information available regarding these individuals, it will be promptly brought to your attention.

SWR:rnr

Stamped:

Copies Destroyed
270 nov 18 1964

50 SEP 30 1947

RECORDED

EX-43

7/23/47

MEMORANDUM FOR D. M. LADD

RECOMMENDATION

There is attached a Bureau Bulletin to the Field for their assistance in handling this matter.

Attachment

July 30, 1947

____
____
Brooklyn 27, New York

Dear ____:

I desire to acknowledge receipt of your letter dated July 14, 1947, and to express my appreciation to you for bringing this matter to my attention.

The information set forth in your letter has been carefully reviewed and is being maintained in this Bureau as a matter of record.

Sincerely yours,

John Edgar Hoover
Director

NOTE: ____ has been a previous correspondent with the Bu file ____. No record could be located in the Crime Records Section indication that the correspondent might be a mental case.

Stamped:

RECORDED

COMMUNICATIONS SECTION
MAILED 10 P.M.
JUL 31 1947
FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | D. M. LADD | DATE: 7/10/47
FROM | : | E. G. Fitch
SUBJECT | : | FLYING DISKS

At request of Brigadier General George F. Schulgen, Chief of the Requirements Intelligence Branch of Army Air Corps Intelligence, Special Agent ____ discussed the above captioned matter with him on July 9, 1947. General Schulgen indicated to ____ that the Air Corps has taken the attitude that every effort must be undertaken in order to run down and ascertain whether or not the flying disks are a fact and, if so, to learn all about them. According to General Schulgen, the Air Corps Intelligence are utilizing all of their scientists in order to ascertain whether or not such a phenomenon could in fact occur. He stated that this research is being conducted with the thought that the flying objects might be a celestial phenomenon and with the view that they might be a foreign body mechanically devised and controlled.

General Schulgen also indicated to ____ that all Air Corps installations have been alerted to run out each reported sighting to obtain all possible data to assist in this research project. In passing, General Schulgen stated that an Air Corps pilot who believed that he saw one of these objects was thoroughly interrogated by General Schulgen and scientists, as well as a psychologist, and the pilot was adamant in his claim that he saw a flying disk.

General Schulgen advised ____ that the possibility exists that the first reported sightings of the so-called flying disks were fallacious and prompted by individuals seeking personal publicity, or were reported for political reasons. He stated that if this was so, subsequent sightings might be the result of a mass hysteria. He pointed out that the thought exists that the first reported sightings might have been by individuals of Communist sympathies with the view to causing hysteria and fear of a secret Russian weapon.

General Schulgen indicated to ____ that he is desirous of having all the angles covered in this matter. He stated that reports of his scientists and findings of the various Air Corps installations will be available in his office. He advised that to complete the picture he desired the assistance of the Federal Bureau of Investigation in locating and questioning the individuals who first sighted the so-called flying disks in order to ascertain whether or not they are sincere in their statements that they saw these disks, or whether their statements were prompted by personal desire for publicity or political reasons. General Schulgen assured ____ that there are no War Department or Navy Department research projects presently being conducted which could in any way be tied up with the flying disks. General Schulgen indicated to ____ that if the Bureau would cooperate with him in this matter, he would offer all the facilities of his office as to results obtained in the effort to identify and run down this matter.

____ advised General Schulgen that his request would be made known to the Bureau and an answer made available to him as soon as possible.

____ also discussed this matter with ____ of ____ ____ indicated that it was his attitude that inasmuch as it has been established that the flying disks are not the result of any Army or Navy experiments, the matter is of interest to the FBI. He stated that he was of the opinion that the Bureau, if at all possible, should accede to General Schulgen's request.

SWR:AJB

ADDENDUM

I would recommend that we advise the Army that the Bureau does not believe it should go into these investigations, it being noted that a great bulk of those alleged discs reported found have been pranks. It is not believed that the Bureau would accomplish anything by going into these investigations.

DML

First Handwritten Note:

I think we should do this.

7-15

Second Handwritten Note:

I would do it but before agreeing to it we must insist upon full access to discs recovered. For instance in the La. case the Army grabbed it & would not let us have it for cursory examination.

H.

Stamped:

RECORDED

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATIONS SECTION

AUG 14 1947

TELETYPE

FBI SEATTLE | 8-14-47 | 5-15 PM | FB
DIRECTOR | ROUTINE | |
FLYING DISCS SIGHTED BY ____, TACOMA. | | |

WASHINGTON, SM X. REURTEL INSTANT DATE. PLEASE BE ADVISED THAT ____ DID NOT ADMIT TO ____ THAT HIS STORY WAS A HOAX BUT ONLY STATED THAT IF QUESTIONED BY AUTHORITIES HE WAS GOING TO SAY IT WAS A HOAX BECAUSE HE DID NOT WANT ANY FURTHER TROUBLE OVER THE MATTER. COMPLETE REPORT NOW EN ROUTE TO BUREAU AMSD, WHICH INDICATES PROBABLY ____ MADE THE ANONYMOUS PHONE CALL IN THE HOPE OF BUILDING UP THEIR STORY THROUGH PUBLICITY TO A POINT WHERE THEY COULD MAKE A PROFITABLE DEAL WITH FANTASY MAGAZINE, CHICAGO ILLINOIS. ____ WILL NOT BE REINTERVIEWED UNLESS ADVISED TO THE CONTRARY BY THE BUREAU.

WILCOX
A AND HOLD PLS
9-16 PM OK FBI WASH DC GAR

Stamped:

18 Aug 26 1947.

RECORDED & INDEXED

G.I.R.
EX-67

(B) FLYING DISCS—The Bureau, at the request of the Army Air Forces Intelligence, has agreed to cooperate in the investigation of flying discs. The Air Forces have confidentially advised that it is possible to release three or more discs in odd numbers, attached together by a wire, from an airplane in high altitudes and that these discs would obtain tremendous speed in their descent and would descend to the earth in an arc. The Army Air Forces Intelligence has also indicated some concern that the reported sightings might have been made by subversive individuals for the purpose of creating a mass hysteria.

_______________________________
7-30-47
BUREAU BULLETIN No. 42
Series 1947

You should investigate each instance which is brought to your attention of a sighting of a flying disc in order to ascertain whether or not it is a bona fide sighting, an imaginary one or a prank. You should also bear in mind that individuals might report seeing flying discs for various reasons. It is conceivable that an individual might be desirous of seeking personal publicity, causing hysteria, or playing a prank.

The Bureau should be notified immediately by teletype of all reported sightings and the results of your inquiries. In instances where the report appears to have merit, the teletype should be followed by a letter to the Bureau containing in detail the results of your inquiries. The Army Air Forces have assured the Bureau complete cooperating in these matters and in any instances where they fail to make information available to you or make the recovered discs available for your examination, it should promptly be brought to the attention of the Bureau.

Any information you develop in connection with these discs should be promptly brought to the attention of the Army through your usual liaison channels.

Stamped:

RECORDED 78 AUG 4, 1947

252 AUG 18 1947

July 10, 1947

____
____
Darlington, South Carolina

Dear ____

I wish to acknowledge receipt of your Western Union telegram dated July 6, 1947. Your interest in bringing this information to my attention is greatly appreciated.

Inasmuch as the contents of your telegram appear to be of interest to the War Department only, I have taken the liberty of turning this information over to that Department.

Sincerely yours,

John Edgar Hoover
Director
cc—Savannah
NOTE: The telegram referred to "flying-discs."

Stamped:

COMMUNICATIONS SECTION
MAILED 2 P.M.
JUL 14 1947
FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

RECORDED & INDEXED

July 10, 1947

____
____
San Marcos, Texas

Dear ____

I wish to acknowledge receipt of your Western Union telegram dated July 7, 1947. Your interest in making this information available to me is greatly appreciated.

Inasmuch as the contents of your telegram appear to be of interest to the War Department only, I have taken the liberty of making the information furnished by you available to that Department.

Sincerely yours,

John Edgar Hoover
Director
cc—San Antonio
NOTE: The telegram referred to "flying discs."

Stamped:

COMMUNICATIONS SECTION
MAILED 2 P.M.
JUL 14 1947
FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

RECORDED & INDEXED

EX-64

July 23, 1947

____
____
Westport, Connecticut

Dear ____

Your letter dated July 27, 1947, together with enclosures, has been received and I want to thank you for submitting the letter you mentioned to me.

Sincerely yours,

John Edgar Hoover
Director

BHI:pib

Stamped:

COMMUNICATIONS SECTION
MAILED 2 P.M.
JUL 23 1947
FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

RECORDED & INDEXED

EX-57

FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE
COMMUNICATIONS SECTION

JUL 18 1947

TELETYPE

WASHINGTON FROM BOSTON 3 | 18

DIRECTOR

METAL FRAGMENTS OBSERVED AT WEST RINDGE, N.H., JULY SEVEN, FORTY SEVEN, SECURITY MATTER-X. ____, SECURITY OFFICER, M.I.T., CAMBRIDGE, MASS., ADVISED THAT TODAY HE WAS IN CONTACT WITH ONE ____ ____ OF WEST RINDGE, N.H., A RETIRED ____ OF THE NEW ENGLAND TEL. AND TEL. CO. ____ ADVISED THAT AT APPROXIMATELY THREE PM ON JULY SEVEN LAST SEVERAL PEOPLE SITTING ON A PORCH OBSERVED ON THE LAWN OF ____ ROUTE ____ WEST RINDGE, N.H., LITTLE CUP OF SMOKE, WHICH ON INSPECTION DISCLOSED SMALL BURNED ____ SPOTS ABOUT ONE AND ONE HALF INCHES IN DIAMETER ON THE GREEN LAWN. ALSO IN THE LONG DRY GRASS ON BOTH SIDES OF ROAD IN A CIRCLE APPROXIMATELY TWO HUNDRED FEET IN DIAMETER SEVERAL LITTLE BLAZES HAD STARTED AND THE FIRE ____ DEPT. WAS CALLED. FIRES WERE APPARENTLY CAUSED BY METALLIC FRAGMENTATION WHICH WERE TURNED OVER TO ____ OF MIT BY A ____ ____ OF THE TELEPHONE COMPANY. ____ HAS ADVISED ____ THAT THEIR GENERAL ____ APPEARANCE ARE SIMILAR TO THE LINING OF V DASH TWO BOMBS, WHICH HE HAD OBSERVED AT NEW MEXICO. ____ PROFESSOR ____ AN OUTSTANDING METALLURGIST AT MIT, STATED THAT THEY ARE POSSIBLY THE LINING FROM A JET TURBO PLANE. AT PRESENT TIME HE IS IN PROCESS OF ANALYZING TWO OF THESE PIECES. THESE SCIENTISTS IN ROUGHLY RECONSTRUCTING THE METALLIC OBJECT STATE IT WAS APPROXIMATELY FOURTEEN INCHES IN DIAMETER, THREE SIXTEENTH OF AN INCH THICK, AND MACHINE TOOLED, AND SOME FRAGMENTS INDICATED THEY WERE BURNED AND ____ APPEARED TO HAVE BEEN SUBJECTED TO TERRIFIC HEAT. THESE SCIENTISTS ARE TREATING THIS MATTER AS CLASSIFIED INFORMATION. MR. ____ ____ AT WEST RINDGE, N.H. IS ALSO ENDEAVORING TO COLLECT ADDITIONAL FRAGMENTS AND HAS STATED THAT THE FIRE CHIEF AT WEST RINDGE HAS ALSO SEVERAL FRAGMENTS IN HIS POSSESSION. ____ INDICATED THAT THE ____ RESIDENCE IS SEVEN TO EIGHT HUNDRED FEET EAST OF THE RAILROAD TRACKS. ____STATED HE WILL MAKE THE RESULTS OF MIT RESEARCH AVAILABLE IF SIGNIFICANT. OPINIONS OF SCIENTISTS AS SET FORTH ABOVE SUGGEST POSSIBLE MILITARY INTEREST. MILITARY AUTHORITIES AT BOSTON HAVE NOT BEEN NOTIFIED.

SOUCY

HOLD

Stamped:

COPIES DESTROYED
270 NOV 18 1964

RECORDED & INDEXED

EX-64

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | DIRECTOR, FBI | DATE: July 18, 1947
FROM | : | SAC, NEW HAVEN
SUBJECT | : | "FLYING SAUCERS"
| | EDWIN M. BAILEY, JR.
| | STAMFORD, CONNECTICUT, INFORMANT
| | ATOMIC ENERGY ACT

For the information of the Bureau this is to advise that on July 7, 1947, ____ Stamford, Connecticut, appeared at the Stamford Resident Agent's office and furnished the following information:—

____ prefaced his remarks by stating that he is a scientist by occupation and is currently employed at the American Cyanamid Research Laboratories on West Main Street in Stamford, Connecticut, in the Physics Division. ____ further indicated that during the war he was employed at MIT, Cambridge, Massachusetts, in the Radiation Laboratory which Laboratory is connected with the Manhattan Project. ____ advised that he is thirty years of age and is a graduate of the University of Arizona.

____ stated that the topic of "flying saucers" had caused considerable comment and concern to the present day scientists and indicated that he himself had a personal theory concerning the "flying saucers". Prior to advancing his own theory, ____remarked that immediately after the conclusion of World War II, a friend of his, ____ allegedly observed the "flying saucers" from an observatory in Milan and Bologna, Italy. He stated that apparently at that time the "flying saucers" had caused a little comment in Italy but that after some little publicity they immediately died out as public interest. ____ stated that it is quite possible that actually the "flying saucers" could be radio controlled germ bombs or atom bombs which are circling the orbit of the earth and which could be controlled by radio and directed to land on any designated target at the specific desire of the agency or country operating the bombs. He stated that one of the items of interest which he personally has observed is the fact that the saucers have been observed in Mexico City, New Orleans, Philadelphia, New York, Boston, Halifax, Newfoundland, Paris, Milan, Bologna and Yugoslavia as well as Albania. By placing a string around the globe of the earth it would be noticed that all of the above-mentioned cities form a direct orbit or circle around the earth and would be more or less in line of any path in which the saucers could be circling.

____ further stated that he had recently talked with ____ ____, one of the owners of ____ in Glenbrook, Connecticut, and had been informed by ____ that his company is making a large powerful telescope to be used in searching the stratosphere for atom bombs.

FXM/clb 117-0

Stamped:

RECORDED & INDEXED

EX-36

G.I.R.-6

COPIES DESTROYED
270 NOV 18 1964

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | Director, FBI | DATE: July 3, 1947
FROM | : | SAC, Butte
SUBJECT | : | FLYING DISCS

Mr. ____ of the Idaho Daily Statesman, Boise, Idaho, telephonically contacted the Butte Office and asked if the FBI was checking on the flying discs reported to have been seen by many citizens. He advised that so many had reported having seen them that it undoubtedly was not a figment of the imagination. He said that these discs had been seen on July 1, 1947, in the vicinity of Trail Creek near Sun Valley, Idaho, by reputable citizens.

The writer informed ____ that this office was not making an investigation and inquired as to whether he had contacted Army and Navy officials. He said that he was inquiring of these agencies.

WGB:LB

AIR MAIL

Stamped:

RECORDED & INDEXED

EX-46

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | Director, FBI | DATE: July 17, 1947
FROM | : | SAC, Los Angeles
SUBJECT | : | RECOVERY OF "FLYING DISC"
| | NORTH HOLLYWOOD, CALIFORNIA,
| | JULY 9, 1947

On the evening of July 9, 1947, a report was received at the Los Angeles Office that a so-called "flying disc" had landed in the vicinity of Radford and Magnolia Streets in North Hollywood, California, the contraption being briefly described as approximately 30 inches in diameter, all metal, disc shaped, and having a radio antenna. It was reported to have burst into flames upon landing. At the time of the report the disc was being held at the Valley Fire Department in Van Nuys, California.

SA ____ went to the fire department immediately at which time it was found that a number of people had gathered including newspaper reporters and photographers who were taking pictures of the disc. Battalion Fire Chief ____ advised Agent that at approximately 10:30 P.M. an unknown woman called on the telephone and excitedly reported that the disc had dropped into her garden where it began to flame, her residence being located at 11858 Magnolia Boulevard, North Hollywood. A fire department truck was sent there and put out the flaming object with the fire hose, after which the object was taken to the fire station. SA ____ thereafter arranged to transport the disc to the office.

The device is briefly described as consisting of two convex steel discs approximately 2 feet in diameter, fused together at the outer edge and fastened together in the center by a hollow cylindrical connection. A vertical galvanized iron fin was screwed to the top of the disc, and a short length of pipe closed at one and ran from the outer circumference into the interior of the contraption. What appeared to be a radio tube was installed in the center of the top side. The contraption had a total weight of approximately 20 pounds.

At the Bureau Office a series of photographs were taken of the device from various positions, and a set of these photographs are being forwarded herewith for the Bureau's inspection and information.

The "flying disc" was thereafter turned over to Major ____ ____ A.C., G-2, Fort MacArthur, San Pedro, California, who subsequently reported that the object was definitely a hoax and under no circumstances could have flown under its own power.

Stamped:

RECORDED & INDEXED

EX-64

COPIES DESTROYED
270 NOV 18 1964

Director, FBI | July 17, 1947

Re: | RECOVERY OF "FLYING DISC",
| NORTH HOLLYWOOD, CALIFORNIA,
| JULY 9. 1947

On the following day, July 10, 1947, one ____ ____ North Hollywood, reported that on this morning he was at the North Hollywood Service Station eating at which time there was considerable talk about the flying disc having been found in the vicinity. A number of what appeared to be young high school students were present and were having quite a laugh about the excitement caused by the finding of the disc. ____ stated that he received a definite impression that these young students either had themselves or knew of someone who had been working for the past two weeks making this "flying disc". ____ was unable to furnish the names of any of these young men but identified one of them who was making the statements as being employed in a Chevron Service Station at the corner of Victory Boulevard and Whitsett Street. He described the youngster as about sixteen years of age.

The above information was also furnished to the G-2 Office at San Pedro, California.

MMB:MGM
100-9099
ENC. (3)

STANDARD FORM NO. 64

Office Memorandum  ·  UNITED STATES GOVERNMENT

TO | : | MR. LADD | DATE: July 10, 1947
FROM | : | ____
SUBJECT | : | FLYING SAUCERS (DISCS)
| | INFORMATION CONCERNING

At 6.45 AM this date, SAC Hood telephonically contacted the Bureau and advised at approximately 11:30 PM, July 9, 1947, the office in Los Angeles had received information from the Resident Agent at Burbank, California, that a "flying disc" had landed in or near Burbank and had been seen to burst into flame when it landed. Further, that it had been the cause of a fire in some woods, this fire either in Burbank or possibly in the city limits of Los Angeles, which Mr. Hood could not be certain. The fire chief at Burbank had called the resident agent at Burbank and told him he would hold the disc for him.

Coincident with the information received from Burbank, the Los Angeles Office received calls from the newspapers requesting information. The newspapers stating they had called the Army Air Force Intelligence who had stated "we are not interested". According to Mr. Hood, this comment had aroused the newspapers and they stated they intended to publish this quotation and belabor same in their first issues, Mr. Hood stated that he had refrained from making any statement to the press other than to admit possession of an object and that it was being turned over to military authorities in the morning (this AM), it being Mr. Hood's opinion that he did not want any quotes in the press and certainly not one to the effect that we were not interested.

As described to him, Mr. Hood stated that the object was an aluminum disc about 2' in diameter weighing about ten pounds, painted with aluminum paint and having some sort of a radio tube in the center of the disc. This object was in possession of the resident agent at Burbank and would be turned over to military authorities (G-2) in Los Angeles this morning.

Mr. Hood's purpose in calling was to place the Bureau on notice regarding the above described object and any further information would be transmitted to the Bureau at once.

Action: None indicated.

PEW:da

Stamped:

RECORDED

July 18, 1947

____
____
Chicago, Illinois

Dear ____

I wish to acknowledge receipt of your letter postmarked July 7, 1947. The information contained therein has been carefully reviewed and is being made a matter of permanent record in the files of this Bureau. Your interest in writing as you did is indeed appreciated.

In the future should you have information which you feel might be of interest to this Bureau you might find it convenient to contact the Special Agent in Charge of our Chicago Office, which is located at 1900 Bankers' Building, Chicago 3, Illinois.

Sincerely yours,

John Edgar Hoover
Director

cc—Chicago

(With incoming. There is no identifiable information in the Bureau's files concerning the writer of this letter. Despite the fact that this letter refers to "flying discs", it is not believed that the information furnished is sufficiently important to refer to Army authorities.)

WVC:WMJ

Stamped:

COMMUNICATIONS SECTION
MAILED 10 P.M.
JUL 18 1947
FEDERAL BUREAU OF INVESTIGATION
U.S. DEPARTMENT OF JUSTICE

*** END OF THE PROJECT GUTENBERG EBOOK FEDERAL BUREAU OF INVESTIGATION FOIA DOCUMENTS - UNIDENTIFIED FLYING OBJECTS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG™ LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg electronic works

1.A. By reading or using any part of this Project Gutenberg electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg mission of promoting free access to electronic works by freely sharing Project Gutenberg works in compliance with the terms of this agreement for keeping the Project Gutenberg name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg License must appear prominently whenever any copy of a Project Gutenberg work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg™ License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg work, (b) alteration, modification, or additions or deletions to any Project Gutenberg work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg

Project Gutenberg is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg’s goals and ensuring that the Project Gutenberg collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 41 Watchung Plaza #516, Montclair NJ 07042, USA, +1 (862) 621-9288. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg eBooks with only a loose network of volunteer support.

Project Gutenberg eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- UFO SECTION 1

- THE FULL PROJECT GUTENBERG™ LICENSE