The Princess Nobody: A Tale of Fairyland
Date: 2016-07-10T00:00:00+00:00
Keywords: Fairy tales; Fantasy fiction; Quests (Expeditions) -- Juvenile fiction; Fairies -- Juvenile fiction; Princesses -- Juvenile fiction; Courtship -- Juvenile fiction; Courts and courtiers -- Juvenile fiction; Dwarfs -- Juvenile fiction; Promises -- Juvenile fiction

The Project Gutenberg eBook of The Princess Nobody: A Tale of Fairyland

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: The Princess Nobody: A Tale of Fairyland

Author: Andrew Lang

Illustrator: Richard Doyle

Edmund Evans

Release date: July 10, 2016 [eBook #52545]
Most recently updated: October 23, 2024

Language: English

Other information and formats: www.gutenberg.org/ebooks/52545

Credits: Produced by David Edwards, Chuck Greif and the Online
Distributed Proofreading Team at http://www.pgdp.net (This
book was produced from scanned images of public domain
material from the Google Books project and by scans courtesy
of the Department of Special Collections, Memorial Library,
University of Wisconsin-Madison.)

*** START OF THE PROJECT GUTENBERG EBOOK THE PRINCESS NOBODY: A TALE OF FAIRYLAND ***

etext transcriber's note: In certain versions of this etext [in certain browsers] clicking on the image, will bring up a larger version.

THE   PRINCESS   NOBODY.

THE

PRINCESS NOBODY

A

TALE   OF   FAIRY   LAND

BY
ANDREW   LANG

AFTER   THE   DRAWINGS   BY   RICHARD DOYLE

PRINTED IN COLOURS BY EDMUND EVANS

LONDON
LONGMANS,   GREEN   AND   CO.

An Evening Ride.

BALLADE OF DEDICATION.

o all you babes at Branxholm Park,
This book I dedicate;
A book for winter evenings dark,
Too dark to ride or skate.
I made it up out of my pate,
And wasted midnight oil,
Interpreting each cut and plate—
The works of Dicky Doyle!

When weary winter comes, and hark!
The Teviot roars in “spate”;
When half you think you’ll need the Ark,
The flood’s so fierce and great;
Think of the Prince and of his mate,
Their triumph and their toil,
And mark them drawn in all their state—
The works of Dicky Doyle!

Now, if my nonsense hits the mark—
If Wynnie, Pop, and Kate,
Think tales of Fays and Giants stark,
Not wholly out of date—
Another time, perchance, I’ll prate,
And keep a merry coil,
Though ne’er I’ll match the drawings great—
The works of Dicky Doyle!

ENVOY.

Girls, may you ne’er know fear nor hate;
Boys, field like Mr. Royle!
And, please, don’t say I desecrate
The works of Dicky Doyle!

Taming a Butterfly.

THE PRINCESS NOBODY

CHAPTER I.

THE PRINCESS NOBODY.

ONCE upon a time, when Fairies were much more common than they are now, there lived a King and a Queen. Their country was close to Fairy Land, and very often the little Elves would cross over the border, and come into the King’s fields and gardens. The girl-fairies would swing out of the bells of the fuschias, and loll on the leaves, and drink the little drops of dew that fell down the stems. Here you may see all the Fairies making themselves merry at a picnic on a fuschia, and an ugly little Dwarf is climbing up the stalk.

Here’s the King, in mournful mood,
They’d amuse him, if they could!

Now the King and Queen of the country next to Fairy Land were very rich, and very fond of each other; but one thing made them unhappy. They had no child, neither boy nor girl, to sit on the Throne when they were dead and gone. Often the Queen said she wished she had a child, even if it were no bigger than her thumb; and she hoped the Fairies might hear her and help her. But they never took any notice. One day, when the King had been counting out his money all day (the day when the tributes were paid in), he grew very tired. He took off his crown, and went into his garden. Then he looked all round his kingdom, and said, “Ah! I would give it all for a BABY!”

No sooner had the King said this, than he heard a little squeaking voice near his foot: “You shall have a lovely Baby, if you will give me what I ask.”

The King looked down, and there was the funniest little Dwarf that ever was seen. He had a high red cap like a flower. He had a big moustache, and a short beard that curled outwards. His cloak was red, like his cap, and his coat was green, and he rode on a green Frog. Many people would have been frightened, but the King was used to Fairies.

“You shall have a beautiful Baby, if you will give me what I ask,” said the Dwarf again.

“I’ll give you anything you like,” said the King.

“Then promise to give me NIENTE,” said the Dwarf.

“Certainly,” said the King (who had not an idea what NIENTE meant). “How will you take it?”

“I will take it,” said the Dwarf, “in my own way, on my own day.”

But the children were as jolly as ever, except one naughty baby, and even he was petted, as you see!

Here you see a Fairy host,
Fit to fight with Dwarf or Ghost.

With that he set spurs to his Frog, which cleared the garden path at one bound, and he was soon lost among the flowers.

Well, next day, a dreadful war broke out between the Ghosts and the Giants, and the King had to set forth and fight on the side of his friends the Giants.

A long, long time he was away; nearly a year. At last he came back to his own country, and he heard all the church bells ringing merrily. “What can be the matter?” said the King, and hurried to his Palace, where all the Courtiers rushed out and told him the Queen had got a BABY.

“Girl or a boy?” says the King.

“A Princess, your Majesty,” says the Nurse, with a low curtsey, correcting him.

Well, you may fancy how glad the King was, though he would have preferred a boy.

Here are little Birds in plenty,
Singing to their Queen, Niente!

“What have you called her?” he asked.

“Till your Majesty’s return, we thought it better not to christen the Princess,” said the Nurse, “so we have called her by the Italian name for Nothing: Niente; the Princess Niente, your Majesty.”

When the King heard that, and remembered that he had promised to give NIENTE to the Dwarf, he hid his face in his hands and groaned. Nobody knew what he meant, or why he was sad, so he thought it best to keep it to himself. He went in and kissed the Queen, and comforted her, and looked at the BABY. Never was there a BABY so beautiful; she was like a Fairy’s child, and so light, she could sit on a flower and not crush it. She had little wings on her back; and all the birds were fond of her. The peasants and common

people (who said they “could not see why the first Royal baby should be called ‘Ninety’ ”) always spoke of her as the Princess Nobody. Only the Courtiers called her Niente. The Water Fairy was her Godmother, but (for a Fairy reason) they concealed her real name, and of course, she was not christened Niente. Here you may see her sitting teaching the little Birds to sing. They are all round her in a circle, each of them singing his very best. Great fun she and all her little companions had with the Birds; here they are, riding on them, and tumbling off when the Bird kicks. And here, again, you may observe the baby Princess riding a Parrot, while one of her Maids of Honour teases an Owl. Never was there such a happy country; all Birds and Babies, playing together, singing, and as merry as the day was long.

Well, this joyful life went on till the Princess Niente was growing quite a big girl; she was nearly fourteen. Then, one day, came a tremendous knock at the Palace gates. Out rushed the Porter, and saw a little Dwarf, in a red cap, and a red cloak, riding a green Frog.

What a Baby: how absurd
To be bullied by a Bird!

“Tell the King he is wanted,” said the Dwarf.

The Porter carried this rude message, and the King went trembling to the door.

“I have come to claim your promise; you give me NIENTE,” said the Dwarf, in his froggy voice.

Now the King had spoken long ago about his foolish promise, to the Queen of the Water Fairies, a very powerful person, and Godmother of his child.

“The Dwarf must be one of my people, if he rides a Frog,” the Queen of the Water Fairies had said. “Just send him to me, if he is troublesome.”

The King remembered this when he saw the Dwarf, so he put a bold face on it.

“That’s you, is it?” said the King to the Dwarf. “Just you go to the Queen of the Water Fairies; she will have a word to say to you.”

When the Dwarf heard that, it was his turn to tremble. He shook his little fist at the King; he half-drew his sword.

“I’ll have NIENTE yet,” he said, and he set spurs to his Frog, and bounded off to see the Queen of the Water Fairies.

It was night by the time the Dwarf reached the stream where the Queen lived, among the long flags and rushes and reeds of the river.

Here you see him by the river; how tired his Frog looks! He is talking to the Water Fairy. Well, he and the Water Fairy had a long talk, and the end of it was that the Fairy found only one way of saving the Princess. She flew to the King, and said, “I can only help you by making the Princess vanish clean away. I have a bird here on whose back she can fly away in safety. The Dwarf will not get her, but you will never see her again, unless a brave Prince can find her where she is hidden, and guarded by my Water Fairies.”

Then the poor mother and father cried dreadfully, but they saw there was no hope. It was better that the Princess should vanish away, than that she should be married to a horrid rude Dwarf, who rode on a Frog. So they sent for the Princess, and kissed her, and embraced her, and wept over her, and (gradually she faded out of their very arms, and vanished clean away) then she flew away on the bird’s back.

Here’s a Dwarf upon a Snail,
Take him off at once to jail!

CHAPTER II.

IN MUSHROOM LAND.

NOW all the Kingdom next Fairy Land was miserable, and All the people were murmuring, and the King and Queen were nearly melted in tears. They thought of all ways to recover their dear daughter, and at last the Queen hit on a plan.

“My dear,” she said to the King, “let us offer to give our daughter for a wife, to any Prince who will only find her and bring her home.”

“Who will want to marry a girl he can’t see?” said the King. “If they have not married pretty girls they can see, they won’t care for poor Niente.”

“Never mind; we can only try,” said the Queen. So she sent out messengers into all the world, and sent the picture of the Princess everywhere, and proclaimed that the beautiful Princess Niente, and no less than three-quarters of the Kingdom would be given to the Prince that could find the Princess and bring her home. And there was to be a great tournament, or sham fight, at the Palace, to amuse all the Princes before they went on the search. So many Princes gathered together, all full of hope; and they rode against each other with spears and swords, and knocked each other about, and afterwards dined, and danced, and made merry. Some Fairy Knights, too, came over the border, and they fought with spears, riding Beetles and Grasshoppers, instead of horses. Here is a picture of a “joust,” or tournament, between two sets of Fairy Knights. By all these warlike exercises, they increased their courage till they felt brave enough to fight all the Ghosts, and all the Giants, if only they could save the beautiful Princess.

Well, the tournaments were over, and off all the Princes went into Fairy Land. What funny sights they saw in Fairy Land! They saw a great Snail race, the Snails running so fast, that some of the Fairy jockeys fell off on the grass. They saw a Fairy boy dancing with a Squirrel, and they found all the birds, and all the beasts, quite friendly and kind, and able to talk like other people. This was the way in old times, but now no beasts talk, and no birds, except Parrots only.

Now among all this gallant army of Princes, one was ugly, and he looked old, and odd, and the rest laughed at him, and called him the Prince Comical. But he had a kind heart. One day, when he was out walking alone, and thinking what he could do to find the Princess, he saw three bad little boys teasing a big Daddy Long Legs. They had got hold of one of his legs, and were pulling at it with all their might. When the Prince Comical saw this, he ran up and drove the bad boys away, and rubbed the limb of the Daddy Long Legs, till he gave up groaning and crying. Then the Daddy Long Legs sat up, and said in a weak voice, “You have been very kind to me; what can I do for you?”

“Oh, help me,” said the Prince, “to find the Princess Niente! You fly everywhere; don’t you know where she is?”

“I don’t know,” said the Daddy Long Legs, mournfully. “I have never flown so far. But I know that you are all in a very dangerous part of Fairy Land. And I will take you to an aged Black Beetle, who can give you the best advice.”

So saying, the Daddy Long Legs walked off with the Prince till they came to the Black Beetle.

“Can you tell this Prince,” said the Daddy Long Legs, “where the Princess Niente is hidden?”

“I know it is in Mushroom Land,” said the Beetle; “but he will want a guide.”

“Will you be my guide?” asked the Prince.

“Yes,” said the Beetle; “but what about your friends, the other Princes?”

“Oh, they must come too; it would not be fair to leave them behind,” said the Prince Comical.

He was the soul of honour; and though the others laughed at him, he would not take advantage of his luck, and run away from them.

“Well, you are a true Knight,” said the Black Beetle; “but before we go into the depths of Mushroom Land, just you come here with me.”

Then the Black Beetle pointed out to the Prince a great smooth round red thing, a long way off.

“That is the first Mushroom in Mushroom Land,” said the Beetle. “Now come with me, and you shall see, what you shall see.”

So the Prince followed the Beetle, till they came to the Mushroom.

“Climb up and look over,” said the Beetle.

So the Prince climbed up, and looked over. There he saw a crowned King, sound asleep.

Here is the Prince Comical (you see he is not very handsome!); and here is the King so sound asleep.

“Try to waken him,” said the Beetle; “just try.”

So the Prince tried to waken the King, but it was of no use.

“Now, take warning by that,” said the Black Beetle, “and never go to sleep under a Mushroom in Mushroom country. You will never wake, if you do, till the Princess Niente is found again.”

Well, the Prince Comical said he would remember that, and he and the Beetle went off and found the other Princes. They were disposed to laugh at being led by a Black Beetle; but one of them, who was very learned, reminded them that armies had been led before by Woodpeckers, and Wolves, and Humming Birds.

So they all moved on, and at night they were very tired.

Now there were no houses, and not many trees, in Mushroom Land, and when night came all the Princes wanted to lie down under a very big Mushroom.

It was in vain that the Black Beetle and Prince Comical warned them to beware.

As they marched through Mushroom Land the twilight came upon them, and the Elves began to come out for their dance, for Elves only dance at dusk, and they could not help joining them, which was very imprudent, as they had plenty to do the next day, and it would have been wiser if they had gone to sleep.

The Elves went on with their play till midnight, and exactly at midnight the Elves stopped their play, and undressed, and got up into the boughs of a big tree and went to sleep. You may wonder how the Elves know when it is midnight, as there are no clocks in Mushroom Land, of course. But they cannot really help knowing, as it is exactly at twelve that the Mushrooms begin to grow, and the little Mushrooms come up.

Now the Elves covered every branch of the tree, as you see in the picture, and the Fairies did not know where to lie down. At last they decided to lie down under a very big Mushroom.

“Nonsense,” they said. “You may sleep out in the open air, if you like; we mean to make ourselves comfortable here.”

So they all lay down under the shelter of the Mushroom, and Prince Comical slept in the open air. In the morning he wakened, feeling very well and hungry, and off he set to call his friends. But he might as well have called the Mushroom itself. There they all lay under its shade; and though some of them had their eyes open, not one of them could move. The Prince shook them, dragged them, shouted at them, and pulled their hair. But the more he shouted and dragged, the louder they snored; and the worst of it was, that he could not pull them out of the shadow of the Magic Mushroom. So there he had to leave them, sound asleep.

The Prince thought the Elves could help him perhaps, so he went and asked them how to waken his friends. They were all awake, and the Fairies were dressing the baby-Elves. But they only said, “Oh! its their fault for sleeping under a Mushroom. Anybody would know that is a stupid thing to do. Besides, we have no time to attend to them, as the sun will be up soon, and we must get these Babies dressed and be off before then.”

“Why, where are you going to?” said the Prince.

“Ah! nobody knows where we go to in the day time,” said the Elves.

And nobody does.

“Well, what am I to do now?” said the Prince to the Black Beetle.

“I don’t know where the Princess is,” said the Beetle; “but the Blue Bird is very wise, and he may know. Now your best plan will be to steal two of the Blue Bird’s eggs, and not give them back till he tells you all he can.”

So off they set for the Blue Bird’s nest; and, to make a long story short, the Prince stole two of the eggs, and would not give them back, till the Bird promised to tell him all it knew. And the end of it was, that the Bird carried him to the Court of the Queen of Mushroom Land. She was sitting, in her Crown, on a Mushroom, and she looked very funny and mischievous.

Here you see the Prince, with his hat off, kissing the Queen’s hair, and asking for the Princess.

“Oh, she’s quite safe,” said the Queen of Mushroom Land; “but what a funny boy you are. You are not half handsome enough for the Princess Niente.”

The poor Prince blushed. “They call me Prince Comical,” said he; “I know I’m not half good enough!”

“You are good enough for anything,” said the Queen of Mushroom Land; “but you might be prettier.”

Then she touched him with her wand, and he became as handsome a Prince as ever was seen, in a beautiful red silk doublet, slashed with white, and a long gold-coloured robe.

“Now you will do for my Princess Niente,” said the Queen of Mushroom Land. “Blue Bird” (and she whispered in the Bird’s ear), “take him away to the Princess Niente.”

So they flew, and they flew, all day and all night, and next day they came to a green bower, all full of Fairies, and Butterflies, and funny little people. And there, with all her long yellow hair round her, there sat the Princess Niente. And the Prince Charming laid his Crown at her feet, and knelt on one knee, and asked the Princess to be his love and his lady. And she did not refuse him, so they were married in the Church of the Elves, and the Glowworm sent his torches, and all the bells of all the flowers made a merry peal. And soon they were to travel home, to the King and the Queen.

Here’s the Water Fairy’s Court,
Nymphs and Nixies making sport!

CHAPTER III.

LOST AND FOUND.

NOW the Prince had found the Princess, and you might think that they had nothing to do but go home again. The father and mother of the Princess were wearying very much to hear about her. Every day they climbed to the bartizan of the Castle, and looked across the plain, hoping to see dust on the road, and some brave Prince riding back with their daughter. But she never came, and their hair grew grey with sorrow and time. The parents of the other Princes, too, who were all asleep under the Mushroom, were alarmed about their sons, and feared that they had all been taken prisoners, or perhaps eaten up by some Giant. But Princess Niente and Prince Charming were lingering in the enchanted land, too happy to leave the flowers, the brooks, and the Fairies.

The faithful Black Beetle often whispered to the Prince that it was time to turn homewards, but the Prince paid no more attention to his ally than if he had been an Ear-wig. So there, in the Valley Magical, the Prince and Princess might be wandering to this day but for a very sad accident. The night they were married, the Princess had said to the Prince, “Now you may call me Niente, or any pet name you like; but never call me by my own name.”

“But I don’t know it,” said the Prince. “Do tell me what it is?”

“Never,” said the Princess; “you must never seek to know it.”

“Why not?” said the Prince.

“Something dreadful will happen,” said the Princess, “if ever you find out my name, and call me by it.”

And she looked quite as if she could be very angry.

Now ever after this, the Prince kept wondering what his wife’s real name could be, till he made himself quite unhappy.

“Is it Margaret?” he would say, when he thought the Princess was off her guard; or, “is it Joan?” “Is it Dorothy?” “It can’t be Sybil, can it?”

But she would never tell him.

Now, one morning, the Princess awoke very early, but she felt so happy that she could not sleep. She lay awake and listened to the Birds singing, and then she watched a Fairy-boy teasing a Bird, which sang (so the boy said) out of tune, and another Fairy-baby riding on a Fly.

At last the Princess, who thought the Prince was sound asleep, began to croon softly a little song she had made about him and her. She had never told him about the song, partly because she was shy, and partly for another reason. So she crooned and hummed to herself,

Oh, hand in hand with Gwendoline,
While yet our locks are gold,
He’ll fare among the forests green,
And through the gardens old;
And when, like leaves that lose their green,
Our gold has turned to grey,
Then, hand in hand with Gwendoline,
He’ll fade and pass away!

“Oh, Gwendoline is your name, is it?” said the Prince, who had been wide awake, and listening to her song. And he began to laugh at having found out her secret, and tried to kiss her.

But the Princess turned very, very cold, and white like marble, so that the Prince began to shiver, and he sat down on a fallen Mushroom, and hid his face in his hands, and, in a moment, all his beautiful hair vanished, and his splendid clothes, and his gold train, and his Crown. He wore a red cap, and common clothes, and was Prince Comical once more. But the Princess arose, and she vanished swiftly away.

Opposite you see the poor Prince crying, and the Princess vanishing away. Thus he was punished for being curious and prying. It is natural, you will say, that a man should like to call his wife by her name. But the Fairies would not allow it, and, what is more, there are still some nations who will not allow a woman to mention the name of her husband.

Well, here was a sad state of things! The Princess was lost as much as ever, and Prince Charming was changed back into Prince Comical. The Black Beetle sighed day and night, and mingled his tears with those of the Prince. But neither of them knew what to do. They wandered about the Valley Magical, and though it was just as pretty as ever, it seemed quite ugly and stupid to them. The worst of it was, that the Prince felt so foolish. After winning the greatest good fortune, and the dearest bride in the world, he had thrown everything away. He walked about crying, “Oh, Gwen—I mean oh, Niente! dear Niente! return to your own Prince Comical, and all will be forgiven!”

It is impossible to say what would have happened; and probably the Prince would have died of sorrow and hunger (for he ate nothing), if the Black Beetle had not one day met a Bat, which was the favourite charger of Puck. Now Puck, as all the world knows, is the Jester at the Court of Fairy Land. He can make Oberon and Titania—the King and Queen—laugh at the tricks he plays, and therefore they love him so much that there is nothing they would not do for him. So the Black Beetle began to talk about his master, the Prince, to the Bat Puck commonly rode; and the Bat, a good-natured creature, told the whole story to Puck. Now Puck was also in a good humour, so he jumped at once on his Bat’s back, and rode off to consult the King and Queen of Fairy Land. Well, they were sorry for the Prince—he had only broken one little Fairy law after all—and they sent Puck back to tell him what he was to do. This was to find the Blue Bird again, and get the Blue Bird to guide him to the home of the Water Fairy, the Godmother of the Princess.

Long and far the Prince wandered, but at last he found the Blue Bird once more. And the Bird (very good-naturedly) promised to fly in front of him till he led him to the beautiful stream, where the Water Fairy held her court. So they reached it at last, and then the Blue Bird harnessed himself to the chariot of the Water Fairy, and the chariot was the white cup of a Water Lily. Then he pulled, and pulled at the chariot (here he is dragging along the Water Fairy), till he brought her where the Prince was waiting. At first, when she saw him, she was rather angry. “Why did you find out my God-daughter’s name?” she said; and the Prince had no excuse to make. He only turned red, and sighed. This rather pleased the Water Fairy.

“Do you love the Princess very much?” said she.

“Oh, more than all the world,” said the Prince.

“Then back you go, to Mushroom Land, and you will find her in the old place. But perhaps she will not be pleased to forgive you at first.”

The Prince thought he would chance that, but he did not say so. He only bowed very low, and thanked the Water Fairy. Then off he set, with the Blue Bird to guide him, in search of Mushroom Land. At long and at last he reached it, and glad he was to see the little sentinel on the border of the country.

All up and down Mushroom Land the Prince searched, and at last he saw his own Princess, and he rushed up, and knelt at her feet, and held out his hands to ask pardon for having disobeyed the Fairy law.

But she was still rather cross, and down she jumped, and ran round the Mushroom, and he ran after her.

So he chased her for a minute or two, and at last she laughed, and popped up her head over the Mushroom, and pursed up her lips into a cherry. And he kissed her across the Mushroom, and knew he had won back his own dear Princess, and they felt even happier than if they had never been parted.

“Journeys end in lovers meeting,” and so do Stories. The Prince has his Princess once again, and I can tell you they did not wait long, this time, in the Valley Magical. Off they went, straight home, and the Black Beetle guided them, flying in a bee-line. Just on the further border of Mushroom Land, they came to all the Princes fast asleep. But when the Princess drew near, they all wakened, and jumped up, and they slapped the fortunate Prince on the back, and wished him luck, and cried, “Hullo, Comical, old chap; we hardly knew you! Why, you’ve grown quite handsome!” And so he had; he was changed into Prince Charming again, but he was so happy he never noticed it, for he was not conceited. But the Princess noticed it, and she loved him all the better. Then they all made a procession, with the Black Beetle marching at the head; indeed, they called him “Black Rod” now, and he was quite a Courtier.

So with flags flying, and music playing, they returned to the home of the Princess. And the King and Queen met them at the park gates, and fell on the neck of the Prince and Princess, and kissed

them, and laughed, and cried for joy, and kissed them again. You may be sure the old Nurse was out among the foremost, her face quite shining with pleasure, and using longer words than the noblest there. And she admired the Prince very much, and was delighted that “her girl,” as she called the Princess, had got such a good husband. So here we leave them, and that country remained always happy, and so it has neither history nor geography. Therefore you won’t find it on any map, nor can you read about it in any book but this book. Lastly, here is a picture of the Prince and Princess at home, sitting on a beautiful Rose, as a Fairy’s God-child can do if she pleases.

As to the Black Beetle, he was appointed to a place about the Court, but he never married, he had no children, and there are no other Black Beetles, consequently, in the country where the Prince and Princess became King and Queen.

ERANT OLIM REX QUIDAM ET REGINA.

Apuleius.

Au Temps jadis! as Perrault says,
In half-forgotten Fairy days,—
“There lived a King once, and a Queen,
As few there are, as more have been,”—
Ah, still we love the well-worn phrase,
Still love to tread the ancient ways,
To break the fence, to thread the maze,
To see the beauty we have seen,
Au Temps jadis!

Here’s luck to every child that strays
In Fairy Land among the Fays;
That follows through the forest green
Prince Comical and Gwendoline;
That reads the tales we used to praise,
Au Temps jadis!

*** END OF THE PROJECT GUTENBERG EBOOK THE PRINCESS NOBODY: A TALE OF FAIRYLAND ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG™ LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg electronic works

1.A. By reading or using any part of this Project Gutenberg electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg mission of promoting free access to electronic works by freely sharing Project Gutenberg works in compliance with the terms of this agreement for keeping the Project Gutenberg name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg License must appear prominently whenever any copy of a Project Gutenberg work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg™ License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg work, (b) alteration, modification, or additions or deletions to any Project Gutenberg work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg

Project Gutenberg is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg’s goals and ensuring that the Project Gutenberg collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 41 Watchung Plaza #516, Montclair NJ 07042, USA, +1 (862) 621-9288. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg eBooks with only a loose network of volunteer support.

Project Gutenberg eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

back

Table of Contents

- THE PRINCESS NOBODY

- BALLADE OF DEDICATION.

- ENVOY.

- THE PRINCESS NOBODY CHAPTER I. THE PRINCESS NOBODY.

- CHAPTER II. IN MUSHROOM LAND.

- CHAPTER III. LOST AND FOUND.

- ERANT OLIM REX QUIDAM ET REGINA.

- THE FULL PROJECT GUTENBERG™ LICENSE