Elements of Trench Warfare: Bayonet Training
Date: 2018-12-02T00:00:00+00:00
Keywords: Bayonets

The Project Gutenberg eBook of Elements of Trench Warfare: Bayonet Training

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Elements of Trench Warfare: Bayonet Training

Author: William H. Waldron

Release date: December 2, 2018 [eBook #58396]

Language: English

Other information and formats: www.gutenberg.org/ebooks/58396

Credits: Produced by Brian Coe, Graeme Mackreth and the Online
Distributed Proofreading Team at http://www.pgdp.net (This
file was produced from images generously made available
by The Internet Archive)

*** START OF THE PROJECT GUTENBERG EBOOK ELEMENTS OF TRENCH WARFARE: BAYONET TRAINING ***

Elements of
Trench Warfare

Waldron

Elements of Trench Warfare

Bayonet Training

By

Lieut. Colonel William H. Waldron

29th U.S. Infantry

DISTINGUISHED GRADUATE INFANTRY AND
CAVALRY SCHOOL, 1905
GRADUATE ARMY STAFF COLLEGE, 1906
GRADUATE ARMY WAR COLLEGE, 1911
ASSISTANT DIRECTOR ARMY WAR
COLLEGE COURSE, 1911-12

Author of

"Scouting and Patrolling"
"Tactical Walks"

PUBLISHED BY

EDWIN N. APPLETON

1 Broadway, New York

1917

Price 75 Cents, postage paid

Copyright, 1917, by
William H. Waldron

First Edition, 5,000, March 1st, 1917.
Second Edition, 10,000, August 1st, 1917.
Third Edition 30,000, September 25th, 1917.

PRESS OF ISAAC GOLDMANN COMPANY, NEW YORK

NOTICE

There is a wealth of material in this little book that will interest the soldier. From the illustrations alone he will be able to obtain a good general idea of the subject.

It is essentially a soldier's book, written in language that he can understand. The price has been kept within the limits of his pocketbook.

With a view to securing a wide distribution of the book I desire to secure a representative in every organization in the Army. I have an attractive proposition to make to competent parties.

A letter will bring particulars. My address will be found in the Army List and Directory. If this is not available, a letter addressed as follows will be forwarded to me:

Captain W.H. Waldron,
29th Infantry,
Care of "Infantry Journal,"
Washington, D.C.

(Signed) W.H. Waldron.

CONTENTS

| Page

Chapter I.—The Organization of a Section of the Position

9

Chapter II.—Obstacles: Construction, repair. Wire entanglements, barricades, land mines, inundation

13

Chapter III.—Lookout and Listening Posts: Types. Construction, service

27

Chapter IV.—Field Trenches: Traversed trenches. Types of trenches. Drainage. Communication trenches. Dugouts. Penetration of projectiles. Communication. Trench mortar positions. Machine guns. Supporting points

33

Chapter V.—Use and Improvement of Natural Cover

60

Chapter VI.—Revetments: Sandbags. Fascines. Hurdles. Gabions

74

Chapter VII.—Working Parties: Details of organization. Laying out tasks. Operations

90

Chapter VIII.—Grenade Warfare: Organization and tactics of grenadiers. Offensive operations. Clearing fire trenches. Clearing communication trenches. Night operations. Grenade patrols. Notes on grenade warfare

97

Chapter IX.—Gas Warfare: Methods of dissemination of gas. Gas helmets, care and use of Sprayers

118

Chapter X.—Service in the Trenches: Preparations for entering. Inspection of trenches. Tactical dispositions. Going into the trenches. Information routine. Observation field glasses. Snipers. What to fire at. Use of rifle grenades. Scouting and patrolling. Care of arms. Care of trenches. Latrines. Maps. Frost bite. The trench soldier's creed

128

Chapter XI.—The Attack in Trench Warfare

162

BAYONET TRAINING
Features of the Bayonet | 175

Method of Carrying out Bayonet Training and
Hints to Instruction

177

BAYONET LESSONS
Formation—Technique of Instruction | 180
Lesson No. 1—
Position of "Guard" | 181
"     "         "Rest" | 184
"     "         "High Port" | 184
"     "         "Long Point" | 184
The "Withdrawal" After a Long Point | 189
PROGRESSION
Vulnerable Parts of the Body | 190
Lesson No. 2—"The Parries" | 192
PRACTICE | 194
Lesson No. 3—"The Short Point" | 193
Lesson No. 4—"The Jab or Upward Point" | 197
METHOD OF INJURING AN OPPONENT
Butt Strike I. | 200
"     "       II. | 200
"     "     III. | 200
"     "     IV. | 202
Practice | 202
TACTICAL APPLICATION OF THE BAYONET | 203
THE BAYONET ASSAULT | 203
METHOD OF CARRYING THE RIFLE WITH BAYONET FIXED | 205
TEAMWORK | 206
THE ADVANCE | 206
THE CHARGE | 206
ASSAULT PRACTICE | 208
FINAL ASSAULT PRACTICE | 209
ACCESSORIES | 211
TARGETS | 215
CONSTRUCTION OF GALLOWS | 216
"     "       DUMMIES | 217
"     "       "TURK'S HEAD" | 218
"     "       PARRYING DUMMY TARGET | 218
DISCS ON TARGETS | 218
EXERCISES
Exercise 1 | 221
The Run | 222
Exercise 2 | 223

INTRODUCTION

This little book has been prepared with a view to placing before the soldier a store of information on the subject of Trench Warfare as it has been developed on the battle fronts of Europe, and giving him some idea of the nature of the service that he will be called upon to perform when the time arrives for him to do his "bit."

The illustrations have been carefully prepared and arranged to the end that the soldier may gain a fair knowledge of the subject from them alone. The text is intended to treat the subject in a purely elementary manner that the soldier may be able to understand.

The size of the book is such that it may be conveniently carried in the pocket and referred to as occasion requires. The price has been kept down to the point where it is available to the soldier.

If the book assists in his preparation for the front and, by reason of the knowledge that he has gained from it, helps to make him more efficient when he gets there, it will have served its purpose.

The Author.

Chapter I

ORGANIZATION

The normal organization of an intrenched position includes the following elements from front to rear:

1. In front of the position and at a variable distance from the first line fire trench there is a line of wire entanglements. (See Obstacles, p. 13).

2. Close up to the wire entanglements there is an intrenched post known as the "listening post," which is connected with the first line fire trench by a zigzag communicating trench. (See Listening Posts, p. 27).

3. Then comes the first line fire trench with attached machine-gun emplacements at convenient points. (See Fire Trench and Machine-Gun Emplacements, pp. 33 and 54).

4. The fire trench is so narrow that lateral communication along it is effected only with difficulty. In order to provide a passageway a communication or supervision trench is provided a few yards in rear of the fire trench. Passageways lead from this communication trench to the fire trench and to the dugouts located along it.

5. At a variable distance in rear of the fire trench (100 to 200 yards) the emplacements for bomb-throwing apparatus and trench mortars are located. These are connected up laterally by a communication trench which joins with the main communication trench running from front to rear through the position. (See Emplacements for Trench Mortars, p. 51).

6. From 100 to 400 yards to the rear of the first line fire trench, and generally parallel to it, is the supporting trench or cover for the supports. This trench is invariably provided with strong overhead cover and a system of dugouts for the protection of the troops. (See Cover for Supports, p. 53).

7. This whole arrangement of trenches is connected throughout from front to rear, and laterally, by a system of zigzag communication trenches.

PLATE 1.
PLAN OF THE ORGANIZATION OF AN INTRENCHED POSITION

Take this brief description together with Plate 1, the drawing that accompanies this volume, and study the two until you get the entire system fixed firmly in your mind; that is, until you get a mental picture of all the elements included in the system.

Organization of a Sector of the Battle Front occupied by a Field Army of Two Divisions.
Plate 2.

After you have done this, study on through the book in order that you may know the purpose of each of these elements and how one links up with the other.

This is the typical system now in use in the European war theaters. Circumstances at certain places may render some variations necessary, and it must not be inferred that the trace of the works is the same throughout. As a rule the types of trenches (altered when necessary to meet local conditions) illustrated herein are the ones in actual use on the war fronts.

All of these trenches and their accessories constitute what is known as the first line. At a distance of from 2,000 to 5,000 yards in rear of this first line a second line, organized in a similar manner, is to be found.

At intervals of from 800 to 1,500 yards along the first line-centers of resistance, or what we know as "supporting points," are located. These consist of fortified villages, or a network (labyrinth) of trenches, provided with every defensive device known to modern warfare. The object of these supporting points is to bring a flanking fire to bear on the intervals between them, with the idea that an attacking force cannot advance beyond them without capturing them.

Plate 2 shows the general scheme of the occupation of a sector of the line by a field army of two divisions.

Chapter II

OBSTACLES

The element of the defensive line nearest the enemy is a line or series of lines of obstacles which are designed for the purpose of:

1. Protecting the lines from surprise.

2. Reducing the momentum of the attack, by breaking up the unity of action and cohesion.

3. Holding the enemy under the effective fire of the defenders.

The conditions that obstacles should fulfil are as follows. They must—

1. Be close to the defender's position. As a rule on the western front they are not more than from 50 to 100 yards distant. If they are too close it may be possible to throw hand grenades from the far edge of them into the defender's trenches.

2. As far as practicable, be sheltered and screened from the enemy. Shell fire is the most effective method of destroying obstacles. If they are not concealed they may furnish aiming points for the enemy's fire against the first line fire trench by his being able to estimate its location with reference to the obstacle.

3. Afford no cover or screen to the enemy.

4. Be so placed that the enemy will come upon them as a surprise.

5. Be so constructed as to be difficult of removal under fire and impracticable to negotiate while still reasonably intact.

6. Be arranged so as not to interfere with a counter attack. The obstacles may have occasional gaps left in them which may be mined.

The different classes of obstacles are: Abatis, low wire entanglements, high wire entanglements, barricades, mines, fougasses, crows feet, military pits with wire entanglements, inundations, etc.

Plate 3.—Abatis.

Abatis (pronounced abatee) consists of branches of trees lying parallel to each other, butts pointing to the rear, and the branches interlaced with barbed wire. All leaves and small twigs should be removed and the stiff ends of branches pointed. The butts are staked or tied down or anchored by covering them with earth. When more than one row is used the branches overlap the butts of those in front so as to make the abatis about 5 feet high. An abatis formed by felling trees towards the enemy, leaving the butt hanging to the stump, is called slashing.

Plate 4.—Slashing.

Wire Entanglements

Barbed wire is the material most employed in the construction of obstacles. It may be used in the following manner:

1. As a simple trip, for giving the alarm. It is stretched just above the ground and attached to some object that will cause a noise to be made if molested.

2. A simple wire fence, to cause delay and confusion to the enemy in his advance.

3. As an adjunct to tree and brushwood entanglement.

4. As a wire entanglement.

5. As a covering for portable cylinders.

The advantages of the barbed-wire entanglement are:

1. It is easily and quickly made.

2. It is difficult to destroy.

3. It is difficult to get through.

4. It offers no obstruction to the view and fire of the defense.

The low wire entanglement is constructed as follows:

1. Drive stakes in the ground until they project about 18 inches. The stakes should be about 6 feet apart, those in each row being opposite the intervals in adjacent rows.

2. The wire is then passed loosely from the head of one stake to another, wound around each and stapled.

3. Where two or more wires cross they should be tied together.

A more useful and efficient modification of the low wire entanglement is made by stapling the wire down the sides of the stakes, allowing five or more feet of slack wire between stakes. Drive the stakes in the ground until the top is flush. This results in a loose network of tangled wires difficult to get through, easily concealed and difficult to remove.

The high wire entanglement is made by driving stakes so that they protrude from 4 to 6 feet above the ground. They are placed at irregular intervals 5 to 8 feet apart. The head of each stake is connected with the foot of adjoining stakes with the wire loosely drawn, wound around the stakes and stapled fast. Each center post should be stayed by four wires. There should be a trip wire about 9 inches from the ground all the way across the front and another about a foot from the top of the center posts. Barbed wire may then be hung in festoons throughout the entanglement, with no fixed pattern. To increase the entanglement wire may be stapled to the foot of the posts, as indicated in the paragraph above, before they are driven. Large nails should be driven in the tops of the posts with half their length protruding. A number of the wires in the entanglement should be fastened together where they cross. The wire should be passed through paint, if practicable, to take away the bright color. The post should be painted the color of the surrounding country. Under the conditions encountered on the western front this work has to be done hastily. It is best, therefore, to limit the first stage of construction to just so many strands as will form a nucleus for the whole entanglement, in order that the area may be covered by an obstacle before interruption occurs.

Plate 4a.—Plan of wire entanglement.

Plate 5.—High wire entanglement.

Tight wires help the enemy's advance by forming supports for hurdles. It must be constantly borne in mind that the wires must not be stretched taut.

Plate 5a.—Alarm trap.

A portable wire entanglement is constructed by stretching wire loosely around a wooden framework, either circular or square or made on a knife rest, and rolling it into position to close up gaps that may have been made in the entanglement. The illustration shows the wooden framework.

The ordinary repairs to entanglements are made under cover of darkness by working parties detailed for the purpose. Iron posts that can be quickly placed in position are advantageous, their disadvantage being that they may retard bullets that would go through the ordinary wooden posts, thus furnishing just that much cover and protection to attacking parties.

Plate 6.—Portable entanglement. Constructed in the trenches and rolled into position.

In the construction and repair of entanglements care must be taken to see that they are firmly fastened into the ground with numerous stay posts or "deadmen." This is to prevent the enemy from pulling them to pieces with grappling hooks connected to ropes that lead to his trenches and are attached to powerful windlasses or capstans.

Barricades

Barricades are employed for the defense of streets, roads, bridges, etc. They may be made out of any available material such as furniture, vehicles (overturned or with wheels removed), carts filled with stones, bales of goods, etc.

Plate 7.—Plan of barricade for blocking a road.

Where trees grow along the roadside they may be felled across the road. If necessary, barbed wire may be run through the branches to make the passage more difficult.

Barricades should not as a rule close the road entirely to traffic. Passages are required to allow the defenders to pass through when it is necessary to do so. Hence they should be made in two parts, one overlapping the other, as shown in the illustration.

A fougass is a mine so arranged that upon explosion a large mass of stones is projected against the enemy. An excavation is made in the shape of a frustrom of a cone, inclining the axis in the direction of the enemy so as to make an angle with the horizon of about 45 degrees. The sides splay outward slightly. A box of powder is placed in a recess at the bottom. This is covered with a platform of wood several inches thick, on which the stones are piled.

The fuse is placed in a groove cut at the back of the excavation, or the mine may be exploded by means of electricity.

The line of least resistance for the charge must be arranged so that the powder will act in the direction of the axis and not vertically. This is accomplished by throwing the excavated earth on the crest towards the defender's side and ramming it well.

To ascertain the powder charge for any fougass, divide the number of pounds of stone in the charge by 150. This gives the number of pounds of powder in the powder charge. Thus a fougass charged with about 70 pounds of powder will throw about 5 tons of stone over a surface about 160 yards long and 120 yards wide.

Plate 8.—Fougass.

Plate 9.—Vertical fougass.

When broken up a cubic foot of stone weighs about 100 pounds.

A vertical type of fougass is also shown. A charge of 25 pounds of powder should scatter a cubic yard of stones over an area about 200 by 100 yards.

Small Land Mines

Land mines are placed in the line of the advance of the enemy and exploded either by electricity or fuse from the defense. They are made by digging holes from 2 to 3 yards deep, either by excavation or by boring. In the former case the charge is placed in a recess which extends into the solid earth at the side of the hole, which is then refilled and tamped. In the latter case the charge is placed in the bottom of the hole, which is then refilled and solidly tamped. In common earth the powder charge for a 2-yard hole is 25 pounds. That for a 3-yard hole is 80 pounds. The diameter of the crater formed will be about twice the depth of the charge.

The mines may be arranged in one or more rows. The intervals between mines should be such that the craters will nearly but not quite join. The position of the mines should be concealed as much as possible and further sophisticated by disturbing the ground slightly at points where there are no mines and so situated as to suggest a systematic arrangement.

n: Plate 9a.—Land mine.
F, Line from powder charge to battery.
P, Powder charge.

Inundation

Backing up the water of a stream so that it overflows a considerable area forms a good obstacle, even though of fordable depth. If shallow, the difficulty of fording may be increased by irregular holes or ditches dug before the water comes up, or by constructing wire entanglements in the water. It may be employed with advantage when the drainage of a considerable area passes through a restricted opening, as a natural gorge, culvert or bridge.

Open cribs filled with stones, or tighter ones filled with gravel, may form the basis of the obstruction to the flow of the water. The usual method of tightening spaces or cracks between cribs is by throwing in earth or alternate layers of straw, hay, grass, earth, or sacks of clay. A continuous construction, as shown in the illustration, may be employed. The ends of the dam must be carried well into the solid earth to prevent the water from cutting around them. This type of dam is easily destroyed by artillery fire, and cannot be depended upon.

Plate 10.—Dam construction.

Chapter III

LOOKOUT AND LISTENING POSTS

Except when the garrison are actually required to man the parapet, they will be kept under cover, with the exception of a few lookouts, whose duty it is to give timely warning of the movements of the enemy.

When the opposing forces are in close proximity to each other mining operations are generally resorted to by both sides to compass the destruction of the opposing works and open the way for an attack.

Lookout and listening posts serve the double purpose of having a few men at the most advantageous places for observation at the front and flanks and providing points at some distance to the front of the first line fire trenches from which listeners may be able to discover the location and direction of enemy mining operations before they really menace the fire trench.

In the normal case there will be some natural cover available. Such, however, is not always the case, and specially constructed observation stations have to be provided.

The posts should be placed in advance of the first line trench, the distance depending upon circumstances which have to be determined in each particular instance. They must be fully protected from reverse fire so that there will be no chance of the observer masking the fire of his comrades manning the fire trench.

Unless the ground is very favorable it will be found difficult to provide for observation above ground. Where there are natural features such as embankments, mounds, hedgerows, ruins of buildings, etc., it may be possible to make provision for observation even by day.

Where a loophole is used, the type having the narrower end outward should be provided.

In the open type of post the observation directly to the front may be greatly facilitated by the use of the periscope. (Plate 11.)

A good, strong parapet thrown up and chopped off at the corners will enable the observer to cover areas from an oblique direction from the post and protect him from fire from the front.

In the covered type the observer is provided loopholes having the splay towards him. These may also be constructed to the oblique rather than to the front. When this is done, provision must be made to cover the entire front of the position from the several posts. (Plate 12.)

The post may be connected with the first line fire trench by a narrow zigzag trench or by an underground passage. If the former, it must be thoroughly concealed and have no excavated earth visible. If it can be located along a hedge or some other natural feature its location may remain unknown to the enemy for a considerable length of time. Where a communication gallery is constructed the roof and walls must be suitably shored up by casing and supports.

The sentinel in the listening post carries no accouterments. It has been found that the creaking noise made by equipment when the sentinel moves has been taken for mining operations of the enemy by his comrades.

Plate 11.—Open type of listening post.

Plate 12.—Covered type of listening post.

Listening galleries should never be left without a sentinel. There should be a depot of arms and hand grenades near the entrance to the gallery in case men are attacked while on duty from either above or below ground.

Plate 13.—A listening and observation post.

Listening will be conducted at specified times, or on some prearranged signal, and for a definite period. During this time all within the listening area, including the trenches, must remain absolutely motionless.

Infantry manning a trench can assist listening by digging a small pit, 6 feet deep below the trench, and running a bore-hole out 20 feet or more.

The enemy is always listening for indications of the direction and position of gallery heads. Work must therefore be carried on with a minimum of noise. Shouting down the shafts of galleries is absolutely forbidden.

When the mining operations of the enemy are detected a report should be made at once to the officer in charge of that section of the trench.

Chapter IV

FIELD TRENCHES

The next element of the defensive position is the first line fire trenches. These are located so as to have a good field of fire to the front for several hundred yards and so constructed as to give the greatest cover and protection from the fire of the enemy.

An unbroken, continuous trench would be exposed to enfilade fire. A shell, shrapnel or grenade bursting therein would have widespread effect. To overcome these elements the trench is constructed in short lengths, with traverses between them, and technically known as the traverse type.

Better defilade is thus secured and the material effect of any burst is confined to narrow limits.

The trench interval between the traverses is known as the "bay," which should not ordinarily be longer than 18 feet. Longer bays invite heavy casualties in case the trench is enfiladed or a high explosive shell finds its mark.

The illustration, Plate 14, shows a trace of the traversed type of fire trench.

PLAN OF TRAVERSED TYPE OF FIRE TRENCH
PLATE 14.
1. Length of bay, 18 feet.
2. Width of traverse, 5 feet.
3. Length of traverse, 5 feet.
4. Overlap of traverse, 3 feet.
5. Height of traverse depends upon defilade required and practicability of concealment.

Type of Trench

Formerly, protection from the enemy's fire was obtained by thickness of parapet. In the trench warfare of today it is obtained by completely concealing the riflemen in a deep, narrow trench with a very low parapet.

The height over which the average man can fire is about 5 feet or about five-sixths of his own height. This factor determines the height of the parapet above the firing banquet of the trench or the height of bottom of loophole above the same point, when the latter is employed.

Plate 15.—Simple standing trench. 1. Width at top, 3 feet 4 inches. 2. Width at bottom, over all, 2 feet 8 inches. 3. Width of firing banquet, 1 foot 4 inches. 4. Height of parapet above firing banquet, 5 feet. 5. Height of parapet above bottom of trench, 6 feet 4 inches.

PLATE 15a.
Type of INSTRUCTION FIRE TRENCH AT VALCARTIER CANADA.

Used in the instruction of Canadian Troops.

The type of trench in general use today is the simple standing trench shown in Plate 15.

Drainage

If a trench is to be occupied for any length of time, especially if much ground or falling water is to be encountered, drainage becomes of prime importance. Many years ago a celebrated military authority asserted that "nothing so saps the courage of a soldier as to wet the seat of his breeches." This may be accepted as a true maxim, especially in cold weather. The trench should therefore be made as dry as possible. The floor of the trench should be given a sufficient slope to the rear where an intercepting drain should carry the water to prepared sumps or to a point from which it can be disposed of by drainage. Provision should also be made to exclude surface drainage from the trenches.

A scheme for trench drainage is shown in the illustrations (Plates 16, 17 and 18).

Overhead cover may be provided as shown in Plates 19 and 20.

Loopholes are made wherever head cover is provided. Where the enemy's trenches are close, there is considerable danger in using them. Collective firing takes place over the parapet. When loopholes are used they should face half-right or half-left and not directly to the front.

Plate 16.—Method of draining trench.

Plate 17.—Details of trench drainage.

Plate 18.—Detail of trench drainage.

Plate 19.—Overhead cover.

Plate 19a.—Overhead cover.

Plate 20.—Overhead cover.

Plate 20a.—Overhead cover.

The disadvantages of loopholes are:

1. The difficulty of concealing firing points. Loopholes give the enemy's snipers an easy mark.

2. They lessen the number of rifles that can be used at a given point.

3. The necessary head cover makes it difficult to get out of the trench quickly.

4. Damaged head cover often spoils a good firing point.

The three types of loopholes are:

1. Narrowest point of the opening nearest the marksman. This type is most difficult to conceal, much of the parapet thickness is cut away and, if of hard material, tends to deflect the bullets into the firer's face. This defect may be remedied somewhat by stepping the surface of the loophole.

2. Narrowest point to the front. Easiest to conceal but gives a limited field of view.

3. Narrowest point midway between the front and rear. A compromise between the first two types.

The following general remarks on the construction of loopholes are taken from a work based upon the experience gained during the war in Europe:

1. The angle of splay is usually 60 degrees. The thicker the parapet the smaller must be the angle of splay.

Plate 21.—Types of loopholes.

2. The marksman holds his rifle in a line connecting the right shoulder, the eye and the object, hence most of the body lies to the left of the rifle. The loophole should be made to the right, with a niche in the wall of the parapet from the hip to the armpit, to bring the left shoulder well forward. It will be found that this permits the right elbow to be placed on the edge of the parapet.

Plate 22.—Methods of constructing loopholes with sandbags.

3. Box loopholes with screens or blindage may be used, but should be placed by a skilled marksman. The great disadvantage is that the enemy notes these parapet alterations. Steel loophole plates are now provided for this type of loophole. As the Germans sometimes use a steel bullet with great penetrating power, it is advisable to place two plates together to insure protection.

4. With every precaution that may be taken it is difficult to conceal a loophole. A good plan is to deceive the enemy by using painted sandbags and preparing plenty of dummy loopholes.

5. The minimum width of loopholes should be 2½ inches. If narrower than this, it is impossible to use both eyes to judge distances correctly.

6. The parapet should be so sloped that there is a maximum grazing fire when the rifle is fired as it lies on the parapet.

To insure that the bullet will not graze the parapet, although the sights are clear, look through the barrel with the bolt removed.

Communication Trench

In the first line fire trenches there are so many crooks and turns and the trench itself is so narrow that passage along the same is very difficult. To provide for this lateral communication a trench known as the communication or supervision trench is dug. It runs generally parallel to and a short distance in rear of the fire trench and is connected therewith by zigzag approaches. The factor that determines the distance between the fire trench and the communication trench is that it should be at such a distance that a shell bursting in one of the bays would not destroy the communication trench.

Plate 23.—Type of communication trench.

The location of the communication trench with respect to the fire trench and the arrangements of the approaches is shown in detail in Plate 1.

The profile of the ordinary communication trench is shown in Plate 23.

Dugouts

During the artillery bombardment few men are left in the fire trenches. The remainder of the garrison is held under cover a short distance to the rear. This cover is provided by a system of dugouts connected with the fire trench through underground passageways that lead to the communication trench. This arrangement is shown in Plate 1.

A profile of the latest type of dugout is shown in Plate 24.

The solid earth cover is from 12 to 18 feet thick, which gives protection from all but the very largest caliber shells.

Plate 24.—Type of dugout.

Effective resistance is supplied by roofing materials as follows:

1. From shrapnel bullets: 2-inch planks covered with 12 inches of earth.

2. From 3-inch shells: 4-inch planks supporting 4 feet of earth with a top layer of heavy stones to cause an early shell burst.

3. From howitzers of less than 6 inches caliber: 12-inch beams or logs covered with 8 feet of earth.

4. From the largest caliber guns: 15 to 25 feet of earth.

The following table shows the penetration of the German S bullet at a range of 200 yards:

| Inches
Steel plate | 3/8
Broken stone | 6
Brickwork, cement and mortar | 9
Brickwork, lime and mortar | 14
Sandbags | 24
Sand, loose | 30
Hardwood, oak, etc. | 38
Earth | 50
Soft wood, poplar, etc. | 58
Clay | 60
Dry turf | 80

In addition to the regular "dugouts" for the supports, the latest type trenches have squad dugouts just in rear of the bays of the fire trench. These provide shelter during bombardment for the members of the squad not actually required on duty in the trench bay.

Plate 24a.—Section of traversed type of fire trench showing entrance to squad dugout.

Communications

The fire trench is connected with the cover for supports by a system of zigzag trenches having the profile shown in Plate 23. The arrangement is shown in Plate 1.

Plate 25.—Profile of trench mortar emplacement.

Trench Mortar Positions

Somewhere between the first line fire trench and the cover for the supports is a line of emplacements for the trench mortars. Plate 25 shows a profile of the emplacement.

The arrangement of the position is shown in Plate 1.

Plate 25a.—Trench mortar.

These trench mortars are used to hurl charges of high explosives varying from 25 to 100 pounds into the enemy's lines. They have a range of from 300 to 1,800 yards.

Plate 25b.—Improvised catapult.

Cover for Supports

At a variable distance to the rear of the first line fire trench is located the cover for supports, which is organized much in the same manner as the first line system of trenches and affords a second position in the system to fall back to in case of necessity. These trenches are provided with overhead cover and numerous dugouts for the protection of the men.

Machine Guns

At every available place throughout the defensive position machine guns are located, typical positions of which are shown in Plate 1.

The typical types of cover are shown in Plates 26 and 27.

Machine guns are a very potent factor in trench warfare. They are now being employed to a far greater extent than ever before, and the number is increasing on all the battle fronts as fast as they can be manufactured. The machine-gun positions are carefully concealed from the enemy, and fire is not opened until it is certain that it will be effective.

Plate 26.—Profile of type of cover for machine gun.

Plate 27.—Type of cover for machine guns.

The selection of the sites for the emplacements should be made with a view to bringing a powerful enfilade or oblique fire on the attacking enemy at effective range, to provide a flanking fire for supporting troops, and to sweep gaps in the line of obstacles.

Their fire should come as a surprise to the attacking party.

In the construction of cover for machine guns the following points should be observed:

1. They must have a platform for the gun and gunner. This may be provided for in the construction of the emplacement or built up with sandbags. The platform should be 3 feet wide and 6½ feet in length.

2. If head cover is provided, it should not differ in appearance from that constructed elsewhere in the trenches. The loopholes must be blinded with gunny sacks.

3. The front of the emplacement should be cut under to receive the leg of the tripod, thus bringing the gun up closer to the parapet and furnishing more cover for the gunner.

4. Splinter-proof shelters should be provided near at hand for the members of the gun detachment.

5. Where the enemy's trenches are near, the position for the emplacement should be selected by day and the actual work done under cover of darkness.

6. The guns should be located so that they support each other by their fire. Alternate positions should be constructed.

7. When located to enfilade straight lines of trenches, special capioniers should be constructed.

Supporting Points

At intervals from 800 to 1,500 yards along the first line, supporting points are established. They may consist of a fortified village or a specially prepared position having a "labyrinth" of trenches and rendered well-nigh impregnable to infantry assault by every defensive device known to modern warfare. They are designed to bring a flanking fire to bear upon the intervening intervals with the idea that troops cannot pass beyond them until they are reduced.

Village Defense

The following was the actual scheme employed for the defense of a French village and exemplifies the thoroughness with which defenses must be organized.

The village was about 700 yards in rear of the front line, and had three keeps surrounded with wire entanglements and independent of each other, but with an elaborate system of communication trenches. Water and four days' rations were stored in each keep, and wells dug. Each of the keeps held about one company. The communication trenches were about 6 feet deep, used as far as possible as fire trenches, and well traversed. Firing platforms were revetted with brushwood, and shelters made all over the village. In addition to keeps, a series of lines existed in the rear of the front line, intercommunicating and provided with barbed wire. A small wood on one point of the front was defended by a network of low wire entanglements and a line of high wire netting.

Every officer had to know all about his section and its communications with right and left. Telephone wires were laid low down in communication trenches and fastened a few inches from ground with wooden pickets.

Machine guns were placed so as to flank salients. A 65-mm. field gun was placed in the front line to sweep the village, and an observation station placed in a tree. The observer wore a green mask and green sheet.

Great use was made of brushwood and undergrowth to revet steps of firing platform.

All work was carried out by regimental officers and men without help from the engineers, who were fully employed in mining. The garrison of the village and the front line trenches in the vicinity was about one battalion, but the fire trenches were sufficient for three battalions.

Chapter V[1]

USE AND IMPROVEMENT OF NATURAL COVER

A screen or mask consists of hedges, crops, underbrush, etc., which hide the rifleman without, however, protecting him from fire.

Cover or shelter consists of walls, earthworks, etc., which protect the rifleman from fire.

On the battlefield, natural features that screen and shelter should be utilized as much as possible, as they possess the following advantages over artificial works:

(a) Their organization demands less work.

(b) Concealment is easier.

(c) From their nature, it is difficult for the enemy to estimate, for a given length, the number of men sheltered.

They possess, however, certain disadvantages:

(a) The protection is sometimes so excellent that, morally as well as materially, it becomes difficult to leave the shelter. Example: quarries with obstructed exits. Therefore, good judgment must be exercised in the selection.

(b) Some of them are too visible. Example: large hedges. In this case their range can be easily found.

As a general rule, do not occupy them uniformly and do not change the appearance of the organized parts.

Organization of the cover:

To organize the cover which protects troops from fire, construct suitable positions for firing and resting. To utilize the screens which merely hide the troops without protecting them from fire, dig trenches behind these screens in the following manner:

(a) Choose the points which give the best field of fire.

(b) Construct cover for firing.

(c) Construct a shelter.

The constructions are usually "individual" in the first period of work; afterwards, they are organized "collectively." The covers are: (1) for riflemen lying down, (2) for riflemen sitting down, and (3) for riflemen standing up.

Plate 27a.—Use of the cover without improvement.

Plate 27b.—First period.

Plate 27c.—Second period.
Progressive improvement of the cover.

Individual Organization of Natural Cover

Examples of hasty individual cover behind trees, bushes, or branches:

(a) Fallen tree (logs or branches), the height of which is at a maximum of 1 foot above the ground:

(b) Fallen tree, the top of which is more than 1 foot above the ground.

Plate 27d.—First period.

Plate 27e.—Second period

Plate 27f.—Third period.

Wood which does not afford sufficient protection against bullets must be reinforced by earth at the right and against the cover 1 foot behind. Plates 27d, 27e, and 27f show the progressive improvement of the cover.

Plate 27g.—Sharp ridges, furrows, or top of a crest at the end of a gentle slope.

Examples of hasty individual covers behind a furrow, a crest, a heap of sand or earth:

Dig the ground as near as possible to crest A of the furrow in the manner indicated for the cover installed behind a fallen tree more than 1 foot high.

Plate 27h.—Narrow furrows.

Use the earth excavated between furrows A and B to build up the earth between furrows B and C and fill up furrow C; continue afterwards as for the sharp ridge.

Plate 27i.—Low wall of earth, or earth and sand heaps, more than 2 feet high (two methods, A or B).

(A) Lower the height about 8 inches; throw the earth forward. Dig a trench as indicated in the figure.

(B) Make a loophole in the pile of earth, showing oneself as little as possible. Improve the firing position by making a place for the right leg and an elbow rest.

Examples of hasty shelters (individual) arranged behind a large stone or heap of stones.

A heap of stones, the top of which is 1 foot at a maximum above the ground:

Plate 27j.—First period.

Plate 27k.—Second period.

General Organization of Natural Cover

This consists in connecting up and coordinating the individual work under the direction of the squad commander. The work should be carried out on the lines adopted for the individual work and the rules prescribed for the construction of artificial cover (profiles, depths, various shelters) should be followed as far as possible. In arranging the cover, the squads should utilize the natural features of the terrain.

Plate 27l.—Arrangement for a mound of earth.

Plate 27m.—Arrangement for a dry ditch.

Plate 27n.—Arrangement for a sunken road defended on the side towards the enemy.

Plate 27o.—Arrangement for a sunken road defended from the rear.

Ditches full of water, drains, streams:

Plate 27p.—Arrangement of a large ditch.

Plate 27q.—Arrangement of a ditch full of water.

Ordinary roads, road and railroad embankments, and sunken roads:

Plate 27r.—Arrangement of an ordinary road defended on the side toward the enemy.

Plate 27s.—Same defended from the rear.

Plate 27t.—Road embankment, defended from the rear.

Plate 27u.—Arrangement of a railroad embankment.

Plate 27v.—Arrangement of a sunken road.

Hedges and woods:

Dig a trench behind the hedge and throw the earth against it; make openings in the hedge to facilitate view and fire . If the hedge is low, deepen the trench, but make the parapet lower than the hedge which masks it.

Plate 27w.—Arrangement of a hedge.

Plate 27x.—Arrangement of the edge of a wood.

Avoid destroying the natural appearance of the wood; do not cut the trees and brush on a certain depth, but cut off branches where necessary to obtain a field of fire. Behind this strip cut the brush and small trees so as to make a path 3 to 4 yards wide. Construct a trench behind the mask of trees. The parapet can be raised up to 2 or even 3 feet. Construct abatis on the parts of the border of the wood, where it will not interfere with the fire.

Walls:

Plate 27y.—Arrangement of a wall 2 feet 8 inches high.

Plate 27z.—Arrangement of a wall 8 feet high.

Plate 28.—Arrangement of a wall more than 8 feet high without making loopholes.

Plate 28a.—Arrangement of an iron fence built on a low wall.

FOOTNOTES:

[1] This chapter reprinted from Infantry Journal.

Chapter VI

REVETMENTS

A revetment is a covering or facing placed upon an earth slope to enable it to stand at an inclination greater than it would naturally assume. Some revetments also increase the tenacity of slopes and diminish the injury by fire. The upper parts of revetments that may be struck by projectiles which penetrate the cover of earth must not be made of materials of large units which will splinter when struck. The upper part of the revetments is technically known as crowning.

Sandbags

Sandbags are made of coarse canvas or burlap. They are 33 inches long and 14 inches wide. They are filled loosely with earth or sand about ½ cubic foot to a bag. Having been placed in position they are pounded down with a shovel to a rectangular form when they will fill a space about 20 by 13 by 5 inches.

The sandbag revetment is constructed by laying alternate rows of headers and stretchers, breaking joints. The tied ends of the headers and seams of the stretchers are put into the parapet. Men working in pairs lay the bags and set them firmly in place with a spade or mallet.

The advantages are:

1. The portability of the empty bags. Only 62 pounds per one hundred bags.

2. They may be filled with any kind of soil.

3. They are rapidly filled and easily placed in position.

4. They are invaluable in making repairs.

5. They will not splinter.

The only disadvantage is that they are not durable. The cloth soon goes to decay and the filling material crumbles away.

Plate 29 shows the appearance of a sandbag revetment as seen from the front and from the end.

Plate 29.—Sandbag revetment.

A squad of six men with two shovels and one pick should fill 150 bags in an hour. One man uses the pick, two shovel the dirt into the bag, one holds the bag open and two men tie the bags. Having the filled bags ready to hand ten men will lay 75 square feet of revetment in an hour. Four men lay the bags and flatten them out while six carry them.

Brush

Brush is used in many forms for revetting. Almost any kind will serve the purpose. For weaving, it must be live and is most pliable when not in leaf. It should not be more than 1 inch in diameter at the butt. When cut it should be assorted in sizes for the different class of revetments. Poles 2½ inches in diameter are cut for the supports.

Fascines

A fascine is a cylindrical bundle of brushwood tightly bound. The usual length is 18 feet, the diameter 9 inches, and the weight normally about 140 pounds. Lengths of 6 and 9 feet, which are sometimes used, are most conveniently obtained by sawing a standard fascine into two or three pieces.

Plate 29a.—Fascine.

Fascines are made in a cradle which consists of five trestles, the outer ones being 16 feet apart. The trestle is made by driving two sticks about 6½ feet long and 3 inches in diameter in the ground and lashed at the intersection as shown in Plate 29a. In making the cradle, plant the two end trestles first. Stretch a line from one to the other over the intersection. Place the others 4 feet apart and lash them so that each intersection comes fairly to the line.

To build a fascine, straight pieces of brush, 1 or 2 inches at the butt, are laid on, the butts projecting at the end 1 foot beyond the trestle. Leaves should be stripped and unruly branches cut off, or partially cut through, so that they will lie close. The larger, straighter brush should be laid on the outside, butts alternating in direction, and smaller stuff in the center. The general object is to so dispose the brush as to make the fascine of uniform size, strength and stiffness from end to end.

When the cradle is nearly filled, the fascine is compressed or choked by the fascine choker (Plate 30), which consists of two bars, 4 feet long, joined 18 inches from the ends by a chain 4 feet long. The chain is marked at 14 inches each way from the middle by inserting a ring or special link. To use, two men standing on opposite sides pass the chain under the brush, place the short ends of the handles on top and pass the bars, short end first, across to each other. They then bear down on the long ends until the marks on the chain come together. Chokers may be improvised from sticks and rope or wire.

Plate 30.—Method of using the fascine choker.

Binding will be done with a double turn of wire or tarred rope. It should be done in twelve places 18 inches apart, the end binders 3 inches outside the end trestles. To bind a fascine will require 66 feet of wire.

Improvised binders may be made from rods of live brush; hickory or hazel is the best. Place the butt under the foot and twist the rod to partially separate the fibers and make it flexible. A rod so prepared is called a withe. To use a withe, make a half-turn and twist at the smaller end. Pass the withe around the brush and the large end through the eye. Draw taut and double the large end back, taking two half-hitches over its own standing part.

Plate 31.—Fascine revetment.

A fascine revetment is made by placing the fascines as shown in Plate 31. The use of headers and anchors is absolutely necessary in loose soils only, but they greatly strengthen the revetment in any case. A fascine revetment must always be crowned with sod or bags.

In all brush weaving the following terms have been adopted and are convenient to use:

Randing.—Weaving a single rod in and out between pickets.

Slewing.—Weaving two or more rods together in the same way.

Pairing.—Carrying two rods together, crossing each other in and out at each picket.

Wattling.—A general term applied to the woven part of brush construction.

A hurdle is a basket work made of brushwood. If made in pieces the usual size is 2 feet 9 inches by 6 feet, though the width may be varied so that it will cover the desired height of slope.

A hurdle is made by describing on the ground an arc of a circle of 8-foot radius and on the arc driving ten pickets, 8 inches apart, covering 6 feet out to out. Brush is then woven in and out and well compacted. The concave side of a hurdle should be placed next the earth. It warps less than if made flat.

Plate 32.—Method of laying out hurdle.

Plate 33.—Hurdle.

In weaving the hurdle, begin randing at the middle space at the bottom. Reaching the end, twist the rod as described for a withe but at one point only, bend it around the end picket and work back. Start a second rod before the first one is quite out, slewing the two for a short distance. Hammer the wattling down snug on the pickets with a block of wood and continue until the top is reached. It improves the hurdle to finish the edges with two selected rods paired. A pairing may be introduced in the middle, if desired, to give the hurdle extra endurance if it is to be used as a pavement or floor. If the hurdle is not to be used at once, or if it is to be transported, it must be sewed. The sewing is done with wire, twine or withes at each end and in the middle, with stitches about 6 inches long, as shown in Plate 33. About 40 feet of wire is required to sew one hurdle. No. 14 is about the right size, and a coil of 100 pounds will sew forty hurdles. Three men should make a hurdle in two hours, two wattling and the third preparing the rods.

Continuous Hurdle.—If conditions permit the revetment to be built in place, the hurdle is made continuous for considerable lengths. The pickets may be larger; they are driven further apart, 12 or 18 inches, and the brush may be heavier. The construction is more rapid. The pickets are driven with a little more slant than is intended and must be anchored to the parapet. A line of poles, with wire attached at intervals of two or three pickets, will answer. The wires should be made fast to the pickets after the wattling is done. They will interfere with the weaving if fastened sooner. Two men should make 4 yards of continuous hurdling of ordinary height in one hour.

Brush Revetment.—Pickets may be set as above described and the brush laid inside them without weaving, being held in place by bringing the earth up with it. In this case the anchors must be fastened before the brush laying begins. The wires are not much in the way in this operation.

Gabion Making.—A gabion is a cylindrical basket with open ends, made of brush woven on pickets or stakes as described for hurdles. The usual size is 2 feet outside diameter and 2 feet 9 inches height of wattling. On account of the sharp curvature somewhat better brush is required for gabions than will do for hurdles. The gabion form is made of wood, 21 inches diameter, with equidistant notches around the circumference, equal in number to the number of pickets to be used, usually eight to fourteen; less if the brush is large and stiff, more if small and pliable. The notches should be of such depth that the pickets will project 1 inch outside the circle. The pickets should be 1½ to 2 inches in diameter, 3 feet 6 inches long, sharpened, half at the small and half at the large end.

Plate 34.—Gabion.

Plate 35.

To Make a Gabion.—The form is placed on the ground. The pickets are driven vertically in the ground, large and small ends down, alternately. The form is then raised a foot and held by placing a lashing around outside the pickets, tightened with a rack stick. (See Plate 36.)

Plate 36.—Forming the gabion supports.

The wattling is randed or slewed from the form up. The form is then dropped down, the gabion inverted, and the wattling completed. If the brush is small, uniform, and pliable, pairing will make a better wattling than randing. If not for immediate use, the gabion must be sewed as described for hurdles, the same quantity of wire being required.

The gabion, when wattled and sewed, is completed by cutting off the tops of the pickets, 1 inch from the web, the bottom 3 inches. The latter are sharpened after cutting and driving a pairing picket through the middle of its length and a little to one side of the axis. Three men should make a gabion in an hour.

Gabions may be made without the forms, but the work is slower and not so good. The circle is struck on the ground and the pickets driven at the proper points. The weaving is done from the ground up. The entire time of one man is required to keep the pickets in their proper positions.

If brush is scarce, gabions may be made with 6 inches of wattling at each end, the middle being left open. In filling, the open parts may be lined with straw, grass, brush, or grain sacks to keep the earth from running out.

Gabion Revetment.—The use of gabions in revetment is illustrated in Plate 37. If more than two tiers are used, the separating fascines should be anchored back. Gabion revetment should be crowned with sod or sandbag.

Plate 37.—Methods of use of gabion.

The advantages of gabion revetment are very great. It can be put in place without extra labor, faster and with less exposure than any other. It is self-supporting and gives cover from view and partial cover from fire quicker than any other form. Several forms of gabions made of material other than brush have been used. Some of them are sheet iron, empty barrels and hoops. The disadvantages of iron are that it splinters badly, is heavy, and has not given satisfaction. If any special materials are supplied, the methods of using them will, in view of the foregoing explanation, be obvious.

Timber or Pole Revetment.—Poles too large for use in any other way may be cut to length and stood on end to form a revetment. The lower end should be in a small trench and have a waling piece in front of them. There must also be a waling piece or cap at or near the top, anchored back. Plate 38 shows this form.

Miscellaneous Revetments.—Any receptacles for earth which will make a staple, compact pile, such as boxes, baskets, cans, etc., may be used for a revetment. Canvas or burlap stretched behind pickets is being used to a great extent on the battle fronts of Europe. If the soil will make adobe, an excellent revetment may be made of them, but it will not stand wet weather.

Plate 38.—Timber revetment.

Chapter VII

WORKING PARTIES

The infantryman will always be called upon to construct the trench which he is to occupy. Each company is provided with portable tools, which the men carry, and each infantry regiment is provided with tools for the purpose. The digging tools consist of picks and shovels.

When it has been decided to locate fire trenches along a certain line officers will lay out the cutting lines and mark them with tape or otherwise. A company will be assigned for the construction of a definite section of the trench.

Let us work out the procedure, assuming that the work may go on unmolested by the enemy. Such, however, is not usually the case. The enemy will do anything in his power to prevent construction work. If, however, we are familiar with the details of the work and know how to go about it in an orderly and systematic manner under conditions of noninterference by the enemy, we will be able to carry out these details of organization and procedure under more or less trying conditions when the time comes.

Officers have established the trace of the trench and marked the cutting lines. It is the ordinary traversed type, 18 feet bays with traverses 5 feet wide and 5 feet deep, as shown in Plate 14.

The company is composed of, say, twelve squads organized into three platoons of four squads each. Six bays of the trench have been assigned to the organization for construction. This gives a task to each platoon of two bays, including one complete traverse and a half traverse on each flank.

Tools have been issued to the first and third squads of each platoon, the front rank men carrying picks and the rear rank men shovels.

The company is marched in column of squads to the site of the trench, approaching it from the rear, and halted with the head of the column fifteen paces in rear of and opposite the right of the section assigned; that is, in rear of the first bay of the section. The second platoon is then conducted by the platoon commander and halted with its head opposite the third bay. The third platoon is in like manner conducted to the rear of the fifth bay. Each platoon commander then has the two rear squads of his platoon, conducted to a point behind the bay on his left, i.e., the second, fourth and sixth respectively. This allows two squads for the work in each bay, the leading squad furnishing the first relief and the rear squad the second.

The leading squad of each column is then marched to a point two paces in rear of the rear cutting line of the trench, where they take off their packs and lay their rifles on them. The corporal and his rear rank man fall out. The corporal assigns tasks, number ones to the first 2-yard section, number twos to the second and number threes the third.

The tasks are shown in Plate 39. The corporal superintends the work. Number 4 rear rank marks out the cutting lines with his shovel around the traverses and starts work on them.

Experience has shown that the best method of dividing up the work is to group the men in pairs, one man with a pick and one with a shovel and to prescribe that they relieve each other.

PLATE 39.
ORGANIZATION OF A WORKING PARTY

The leading squads assigned to each bay work at top speed for 30 minutes. At the end of the twenty-eighth minute the corporal of the rear squad brings his men up and deploys them. At a signal from the platoon commander the men of the first and third squads drop their tools, get out of the trench, and proceed to the rear, where they rest. The men of the second and fourth squads jump into the trench and take up the task. At the end of another 30 minutes this procedure is again carried out.

This scheme of assigning tasks and procedure was given an exhaustive test in 1915 in the course of testing out various types of intrenching tools. It worked to perfection.

The bays are first completed, after which the traverses begun by No. 4 rear rank are finished up. Great care should be taken to make the dimensions of the trench as accurate as possible. The squad leader is held responsible for this. He should provide himself with two sticks. On one the following lengths are laid off: 1 foot, width of berms, and height of parapet; 1 foot 4 inches, width of firing banquet, height of firing banquet above bottom of trench, and width of bottom of trench. The other stick has the following lengths measured on it: 4 feet, depth of trench from ground surface to the top of firing banquet; 5 feet 4 inches, depth of trench from ground surface to bottom of trench. (See Plate 15 for dimensions of standing trench.)

When the circumstances are such that the work of trench construction is interfered with by the enemy, a modification of the system outlined here will have to be made, but the details should be adhered to as closely as possible.

When night work is necessary the trace should be staked out before complete darkness sets in. If the trace can only be made after dark, visible reference points needed with white paper, white tape or screened flashlights may be utilized. Stick to the details of the deployment, the laying out of tasks and the procedure as indicated for day work as closely as possible. Avoid making any more noise than is absolutely necessary; allow no smoking and require such conversation as is necessary to be made in whispers. Protect the workers by a system of patrols to the front.

Non-commissioned officers are held responsible for a systematic and orderly execution of the work being performed by their units. The captain cannot be everywhere along the line. He has to depend upon the platoon and squad leaders in the work. That is why you should study it and know about it so as to be able to make good when the time comes.

Chapter VIII

GRENADE WARFARE

The use of hand grenades as an implement of warfare dates back many centuries. History records their use as far back as 1536. Up to the close of the eighteenth century soldiers were trained in the throwing of hand grenades, and for this reason were called "grenadiers." At first there were a few in each regiment, later entire companies were formed, and finally each infantry unit that corresponds to our battalion of today had its own grenadier unit.

Then there was a period of time when more open formations were adopted, when there was less opportunity for the employment of grenades and their use was practically eliminated from the battlefield and confined to sieges, where they have been used more or less since the dawn of military history.

With the advent of the Russo-Japanese War came the extensive use of trenches on the battlefield, and with the trenches came the hand grenades which were used in large quantities by both sides. This was especially the case when the fighting lines came to close quarters and in the assaults against the forts at Port Arthur.

When the European war resolved itself into trench warfare, such as it is today, the use of hand-thrown projectiles assumed an importance heretofore never attained, and today we find ourselves employing hand grenades in every phase of the conflict.

Employment of Grenadiers

Grenadiers are employed on both the offensive and defensive. They accompany the attacking lines in the advance on the enemy's position, they clear the fire trenches and communication trenches after parts of the enemy's lines have been taken, and on the defense they assist the riflemen in repelling attack and engage the enemy whenever he has obtained a lodgment in the trenches.

Organization

While every infantryman receives a certain amount of instruction in grenade throwing, there should be a grenadier squad in each platoon specially instructed and trained in this most effective auxiliary method of trench warfare. Not all men possess the temperament and qualifications necessary to make efficient grenadiers. Hence the personnel of the grenadier squad should be carefully selected. Strong physique, personal courage and steadiness in emergencies are the qualifications that count. Men fond of outdoor sports, other things being equal, will be found the best.

PLATE 40.

The grenadier squad is organized as follows:

Front Rank.

No. 1. First bayonet man.
No. 2. Second bayonet man.
No. 3. Grenade thrower.
No. 4. Squad leader, observer and director.

Rear Rank.

No. 1. First carrier.
No. 2. Second carrier.
No. 3. Barricader.
No. 4. Barricader.

Duties

The duties of the several members of the squad vary under different circumstances of their tactical employment which will be fully explained below. In general they are as follows:

Bayonet Men.—The bayonet men move in advance of the grenade throwers. When the grenade thrower has thrown his grenades into the objective trench the bayonet men must be ready to take instant advantage of the temporary demoralization of the enemy caused by the explosions and clear the way for a repetition of the operation.

Grenade Thrower.—The grenade thrower must be ready and able to throw a grenade at once whenever the bayonet men or squad leader may direct.

Squad Leader.—The squad leader directs the operations of the squad. He goes wherever his presence is necessary. He keeps a close watch to the flanks. He replaces casualties and attends to the forwarding of grenades to the thrower. He acts as a grenade thrower whenever he can assist the operations in that capacity.

Carriers.—The carriers carry as many grenades as possible, and when their supply is exhausted they go to the reserve depots and replenish. They are responsible for a continuous supply of grenades to the throwers.

Barricaders.—The barricaders are charged with the construction of barricades. They carry sandbags and tools for filling them. In addition they carry as many grenades as possible. They hold themselves in readiness to go forward and construct a barricade or cover at any point designated by the squad leader.

PLATE 41
Combat in a Communicating Trench

General.—All the men of the squad must be trained and prepared to take over the duties of any other member. Before undertaking any operation each man of the squad should thoroughly understand the part he is to play in it.

Formation.—The formation for the several classes of tactical employment will be explained when each is considered below.

Offensive Operations

When it has been decided to attack a certain sector of the enemy's position a detailed reconnaissance is made with a view to locating and developing every element of the position, detailed plans are made and imparted to all concerned. (See Chapter XI.)

The phases of the attack consist of: (1) The artillery preparation; (2) the infantry assault; (3) the occupation and organization of the captured position, and preparation to meet a counter attack.

During the course of the artillery preparation grenadier squads work their way across "no man's land" and establish themselves sufficiently close to throw grenades into the fire trenches. Failing in this they accompany the assaulting troops.

When they are able to work up close they cover the advance of the infantry assaulting lines by showering grenades into the enemy's fire trenches after the curtain of artillery fire has been extended back into his position to prevent the supports and reserves from coming up to the front.

All men of the squad carry as many grenades as possible and such number as the squad leader may designate act as throwers, while the others act as carriers and prepare the grenades for throwing. Accurate throwing, properly observed and distributed, will greatly assist in preparing for a successful assault.

Clearing Fire Trenches

No matter how well the infantry assault on the enemy's fire trenches may be conducted, it rarely succeeds in occupying the hostile position throughout its entire length. Casualties, loss of direction, and unexpected obstacles encountered are bound to break up the assaulting line more or less, thereby leaving gaps in the captured position. Furthermore the attack on a line of trenches takes place on a relatively small front by a large number of men. When the trenches are finally reached and a lodgment effected there will be great overcrowding. Provision must be made immediately for extending the line, otherwise the casualties at these points will be exceedingly heavy.

It is the particular duty of the grenadier squads to clear these "gaps" of the enemy as quickly as possible. For this purpose an efficient and well-organized storming party must be immediately available.

Let us say that, after careful artillery preparation, the assault has reached the enemy's fire trench. There is much overcrowding at the points where lodgments have been effected. There is a gap in the line between two adjacent elements. How is this cleared of the enemy?

The grenadier squad immediately forms for action. Two bayonet men are in the lead, followed by the grenade thrower, who is in turn followed by the two carriers. Further to the rear are the two barricaders, who carry a reserve supply of grenades in addition to their sandbags and shovels. The squad leader is where he can best direct the operations.

The grenadier squad is formed as shown in the first position, Plate 40.

1. The grenade thrower puts grenades: (1) into bay 1, at A; (2) into bay 2, at D; (3) into bay 1, at B; (4) into the traverse leg at C.

2. When the four grenades have exploded the bayonet men rush into bay 1, the leader advancing into the first leg of the traverse trench below B, while his mate remains in the bay for a moment.

3. The squad leader rushes around the traverse to A, followed by the grenade thrower.

4. When the bay and the next traverse passages are all cleared of the enemy the word "O.K." is passed back to the squad leader by the bayonet men. The bayonet men get into their proper positions and the remainder of the squad rush into the cleared bay 1 and prepare for the further clearing of succeeding bays in the same manner as described above.

Take the diagram on Plate 40. Study it out in connection with the text and you will see how this system works out.

The men work in pairs, the two bayonet men together; the two carriers behind the thrower; the two barricaders sufficiently far to the rear to be protected by a corner of solid earth. The squad leader must of necessity go where his presence is necessary. Usually he stays as near the grenade thrower as possible.

When the enemy's grenadier parties are also very active in the sector, the distances between pairs are extended so that no more than two men are exposed in any one bay or traverse leg.

The formation of the squad must be preserved as long as possible. You will appreciate that when losses occur the squad leader will have to replace men and the formation will have to be modified to meet the changed conditions. This makes it absolutely necessary that every member of the squad be competent to take over the duties of any other member.

When the squad has reached the limit of its advance the barricaders will come forward and construct a barricade in such position that it is well in view from a corner some distance behind.

No passing of bombs forward from man to man is permitted. When the first carrier's supply is exhausted he returns to the rear to secure a fresh supply from the reserve grenade carriers who are following the grenade squad, and who have by now advanced to a point where their supply is available. As soon as his supply is replenished he returns to his proper position in the formation. Should the second carrier run out of grenades the squad leader may cause one of the barricaders to take all the grenades in the possession of the two and replace him while he goes to the rear to secure a fresh supply.

In the meantime other grenadier squads are clearing out the communication and supervision trenches, blocking up the exits to dugouts and destroying machine-gun detachments that have thus far escaped. The assaulting troops have passed on towards the second line, covered by the curtain of fire of the artillery.

Clearing Communication Trenches

The clearing of communication trenches is effected much in the same manner as explained for the fire trench. The grenadier squad is organized and formed in the same manner. The squad works its way into the communication trench by bombing each leg until they arrive at a point where the formation, as illustrated in Plate 41, can be assumed. The grenade thrower throws grenades into the trench at B and then at C. As soon as these have exploded the bayonet men take advantage of the confusion to advance into the leg A-B under cover of the shoulder b, the squad leader and thrower advance to A, the carriers to the point formerly occupied by the squad leader, and the barricaders to the point formerly occupied by the carriers. The thrower then puts grenades into the trench at C and then at D, after which the whole squad advances another notch as formerly explained.

Where island traverses are encountered the thrower puts a grenade on each side of the traverse and one in the rear of it. The bayonet men, one on a side, assault around the traverse and meet on the far side, and the operation proceeds as heretofore explained.

Night Operations

The grenadier squads may be called upon at night, to perform any of the services that are theirs by day, and in addition may be called upon to make night reconnaissances. For this work the men must be able to organize and reorganize the squad quickly and noiselessly. The throwers must be particularly efficient. There must be the highest order of team work.

Grenadier Patrols

Grenadier patrols are sent out at night to make reconnaissances of the enemy's lines with a view to getting information which may include:

1. Location and organization of line.

2. The length of line occupied.

3. Numbers and disposition of occupying troops.

4. To get an accurate description of the ground.

5. To locate observation and listening posts or any other advanced positions.

6. To locate machine guns.

These patrols may consist of from two men to the entire grenadier squad. In a patrol of six or eight men two of them carry rifles and belts, bayonets fixed. The remaining members of the patrol carry no equipment except a haversack filled with grenades. The grenades are used only in case of emergency. It is a reconnoitering patrol charged with gaining information and therefore does not enter into an encounter with the enemy except as a last resort.

The men move or crawl without noise and take advantage of all cover that the ground affords. If they suspect they are observed, they should "freeze" to the ground and remain absolutely motionless. On dark nights it is easy to lose the direction and for the men to lose one another. Every device or scheme to lessen risks in this respect must be employed. The men may tie themselves lightly together so they will not proceed in a bunch and at the same time retain connection with each other.

Notes on Grenade Warfare

The first step in the training of a grenadier is to overcome his fear of the grenade itself. This is accomplished by first having him practice fuse lighting with dummy grenades having live fuses. The men will be impressed with the fact that the grenades are dangerous weapons and that familiarity in handling them must not be permitted to degenerate into carelessness.

The next step towards efficiency is the development of accuracy of throwing. For short distances it may be lobbed from the shoulder by a motion similar to "putting the shot." Stick grenades may be thrown for a short distance like throwing a dart. In the trenches the grenade should be thrown with an overhand motion like the bowler of a cricket ball, as there is danger of exploding them by knocking the hand against the back of the trench.

The men should be taught to throw from all positions—standing, sitting, kneeling and prone.

Should the grenade with a time fuse be dropped in the act of throwing, there is time to pick it up and throw it out of the trench before it explodes. Under no circumstances must it be allowed to explode in the trench.

Communication throughout the squad in action should be maintained at all times. System is required to insure the throwers having a supply of grenades on hand all the time and that casualties are promptly replaced.

Quick action is essential to success. Crawling and stalking give the enemy what he is waiting for.

Arrangements to assist a storming party by rifle and machine-gun fire are of the utmost value and should be provided whenever possible. Care must be taken to provide a signal which will mark the progress of the storming party through the trenches. A helmet held up on a bayonet will do this.

All grenadiers must be especially trained in the filling of sandbags and making sandbag barricades.

The work of the observer is difficult and requires much practice. He must give his directions to the thrower in no uncertain terms. When the thrower has missed his objective the observer will give positive directions for the next throw. Instead of saying "A yard too much to the left," he will say, "Throw a yard to the right." Positive directions, even if only half heard, are of some use; negative directions are certain to be both confused and confusing. The observer should be expert in the use of the periscope.

Hand Grenades and Petards

The hand grenade used by our allies on the western front is the bracelet grenade with automatic firing mechanism and consists of a ball of cast iron filled with an explosive and of a leather bracelet which is fastened to the wrist. To the bracelet is attached a piece of rope about 30 centimeters long, having an iron hook at its end.

Just before the grenade is thrown, the hook is engaged in the ring of the roughened wire of the friction primer placed inside the fuse plug which closes the cast iron ball. When the grenade is thrown, the ring with the primer wire, held back by the hook of the bracelet, is wrenched off by a sudden movement of withdrawal from the wrist and the fuse is fired. The explosion takes place four or five seconds later.

This grenade is supplied to the fighting zone ready for use. It is quite complicated. It can be thrown about 25 meters.

The German grenade is composite; it can be thrown by hand or fired from a rifle. As a hand missile, it is used at short distances, 15 to 20 meters. It is composed of a copper rod to the extremity of which is fixed a cast iron cylinder, grooved to facilitate its breaking into small pieces at the moment of explosion. The explosive is placed inside this cylinder. A copper tube, also containing some explosive, is placed in the interior. It is surmounted by a complicated system for closing the grenade and for automatic ignition by percussion, which results in at least 50 per cent. of misfires.

Plate 41b.—British hand grenade No. 1.

a. Removable cap.
b. Detonator holder.
c. Detonator.
d. Explosive charge.
e. Wood block.
f. Handle.
g. Safety pin.
h. Firing pin.
i. Cast iron ring.
j. Streamer.

Used with the rifle, this grenade has a maximum range of 400 meters. At the extremity opposite the grenade, the copper rod ends in a copper stem about 3 centimeters in length, movable about the axis of the rod. This stem is covered with a copper sleeve of slight thickness, which is attached to it only at the extremity fastened to the rod. The diameter of the exterior of the sleeve must be such that it can be pushed into the gun barrel without pressure. To fire the grenade, a blank cartridge is placed in the chamber of the rifle; the quantity of powder left in the cartridge is regulated according to the distance at which the missile is to be thrown. At the moment of firing, the explosive gases penetrate between the sleeve and the stem and jam the sleeve against the grooves of the barrel. The sleeve and the stem, which is attached to it, take a movement of rotation in the grooves of the barrel, which insures the direction of the missile and the maximum efficiency of the explosive gases of the cartridge.

Plate 41c.—The latest type British hand grenade.

a. Percussion cap.
b. Firing pin.
c. Safety pin. When in place prevents firing pin from striking primer. It is removed just before throwing the grenade.
d. Primer.
e. Chamber filled with high explosive.
f. Cast iron shell, serrated.
g. Wooden handle.
h. Streamers, to keep the grenade head-on.

The bracelet grenade and the German grenade just described have to be made in a factory. Attempts have been made to construct similar missiles with the explosives which are at hand at the front, cheddite and melinite. Several kinds have been made: a primed cartridge and a primed hand petard, fitted on a wooden paddle, a preserved meat tin can filled with explosive, etc.

The Germans have hand petards similar to those of the Allies but with different explosives. These missiles are primed by a detonator and a slow match and can be thrown about 30 meters. The discharge takes place either automatically or by tinder. They are made on the spot and very rapidly. The assaulting troops carry them in baskets or strung on a circle of wire carried on the shoulder.

Plate 41d.—Throwing hand grenades.

Grenades and petards constitute a terrible weapon. The projectiles exert considerable moral effect owing to the violence of their explosion and the awful wounds they occasion, and they make it possible to reach the enemy at points where it is impossible to use the rifle and bayonet.

Chapter IX

GAS WARFARE

Germany first made use of poisonous and asphyxiating gases on the field of battle. It has become an accepted element in the present war. Every soldier should, therefore, have a knowledge of the various ways in which gas is employed in the attack, as well as the measures to be taken to counteract its effect in the defense.

The two methods of disseminating the gas over the battlefield are by emanation and grenades charged with it.

Emanation

This method has for its object to create a poisonous or irritant atmosphere. This is accomplished by means of the arsenic and phosphorous gas being forced through tubes in the direction of the enemy or by means of liquefied chlorine, bromide, phosgene and sulphuretted hydrogen gas stored in cylinders under high pressure. To be successful the gas attack must be attended by the following conditions:

1. The weather must be comparatively calm with a wind blowing in the direction of the enemy at about 5 miles an hour. If the wind is too strong the gas will be carried over the enemy's trenches so rapidly that it will not settle in them. If the wind be too light the gas will be carried up into the air and disseminate or may even be blown back into our own trenches, in which case chloride of lime scattered about freely will disperse them.

2. There must be no rain, for that would quickly disseminate the gas and negative the effect.

3. The attack must come as a surprise. If the elements of surprise are missing and the enemy has time to take protective measures, the effect is lost. If the surprise is complete, the enemy trenches should be emptied very quickly.

4. The gas used must be heavier than the air, so that it will sift into the enemy's trenches as it passes them. It is impracticable to decide upon any definite hour for launching the gas attack. Everything depends upon the direction and velocity of the wind. If an hour has been tentatively designated and the wind changes, the attack will have to be postponed.

When an assault follows the gas attack the men should wear the smoke helmets for at least 30 minutes after the dissemination has ceased; in fact they must not be removed until the order to do so is given by the officer commanding the attack. You will appreciate that the enemy's machine gunners may have better protection than the men in the bays of the trenches.

Shell and Grenade Method

In this method the gas dissemination is effected by means of shells or bombs being fired into the enemy's trenches containing the desired substances which are released and give off irritant fumes on explosion. The grenades used weigh about 1 pound. They are similar in appearance to the ordinary tin can grenade. Their effect in a trench will continue for 20 to 30 minutes. In the attack a large number should be concentrated in a particular area to produce a large volume of gas. They are thrown by hand, trench mortar or catapult.

Defense

Surprise must be guarded against in every possible way. The direction of the wind must be continually watched, and when its velocity and direction are specially favorable the protective measures must be kept ready for instant use and special observers posted. Previous to an attack the enemy may remain comparatively quiet for several days. Noises like the moving of sheet iron may be heard. Preparations may be observed along the position. When the attack starts a hissing noise is heard; this latter is one of the indications that may be evident at night.

Helmets

Each man on duty in the trenches is provided with two smoke helmets, specially devised and constructed so as to absorb the gas and neutralize its effect, and which if properly cared for and used will provide complete protection from any substance likely to be used by the enemy. They are fitted with a valve tube through which to breathe and with goggles to see through. There are certain rules prescribed for their care and use.

1. They must not be removed from the protective covering except for actual use against an attack.

2. When the helmet has been used once it should be replaced by a new one.

Dummy Helmets

Dummy gas helmets will be provided in each organization by which the men may be practiced in putting them on. The men must be thoroughly drilled in the methods to be employed.

Plate 40a.—Gas helmet.

The following directions accompany the helmets issued to the British Army. When our helmets are issued it is probable that each will be accompanied by a complete set of rules for its use and full instructions for the method of getting into it and for its care and preservation.

Direction for Use and Care of Tube Helmets

Description

These helmets are the same as the smoke helmet already issued, except that stronger chemicals are added and a tube valve provided through which to breathe out. The tube valve makes the helmet cooler and saves chemicals from being affected by the breath. The wearer cannot breathe in through the tube valve; this is intended for breathing out only.

Directions for Use

Remove paper cap from mouthpiece of tube valve. Remove service cap. Pull helmet over head. Adjust so that goggles are over eyes. Tuck in skirt of helmet under coat collar and button coat so as to close in skirt of helmet. Hold the tube lightly in lips or teeth like stem of pipe, so as to be able to breathe in past it and out through it.

Breathe in through mouth and nose, using the air inside the helmet. Breathe out through tube only.

Directions for Care of Tube Helmet

1. Do not remove the helmet from its waterproof case except to use for protection against gas.

2. Never use your tube helmet for practice or drill. Special helmets are kept in each company for instruction only.

Should the goggles become misty during use they can be cleared by rubbing them gently against the forehead.

When lacrimatory gases are used goggles affording mechanical protection may be worn, as these gases are not likely to irritate the lungs, though they sometimes produce sickness.

Improvised Methods

If a soldier does not possess one of the official pattern respirators, the following measures will be found useful:

1. Wet and wring out any woolen article, such as a stocking or muffler, so as to form a thick pad large enough to cover the nose and mouth, and press firmly over both.

2. Place in a scarf, stocking or handkerchief, a pad of about three handfuls of earth, preferably damp, and tie it firmly over the mouth and nose.

3. A wet cloth pulled down over the eyes will be found useful as additional protection, especially against certain gases other than chlorine or when the gas is too strong for the ordinary respirator.

4. A stocking, wetted with water and soda solution or tea, folded into eight folds and firmly held or tied over the nose.

5. A sock folded fourfold similarly wetted and held or tied. If the sock or comforter has been soaked in soda solution it will still act efficiently when dry, though if possible, it should be moist. The spare tapes from puttees may be used for tying on the sock.

6. Any loose fabric, such as a sock, sandbag, woolen scarf or comforter, soaked in urine, then wrung out to allow of free breathing and tied tightly over the nose and mouth.

In the absence of any other cloths, the flannel waistbands issued for winter use could be used for this purpose.

Knapsack Sprayers

Knapsack sprayers are issued for use to clear gases out of the trenches after the cloud has blown over. A man with the sprayer on his back (and wearing his smoke helmet) slowly traverses the trench, working the spray. If this is not done the heavy poisonous gas may linger in the trench for days and be a source of great danger.

If supports or reinforcements enter a trench charged with gas, they should be preceded by a man using a sprayer.

Sprayers are charged with sodium thiosulphate—more commonly known as "hypo"—6 pounds being dissolved in a bucket of water and a handful of ordinary washing soda added.

Garden syringes and buckets may be used if sprayers are not available, but these are not so effective. Sprayers should be charged before they are taken up to the trenches, and should be kept ready for immediate use.

Every officer defending a trench against an enemy gas attack should endeavor to collect information whenever possible, to be sent to headquarters through the usual channels. Particularly valuable is the capture of apparatus used by the enemy either for disseminating gas or for protection against it. If a shell attack is made, unexploded shells or portions of them should be sent through to headquarters at once. The time of day, duration of attack, color, taste or smell of gas used, effect on the eyes, breathing, and all other symptoms should be noted. New gases may be used at any time, and speedy information greatly forwards the adoption of preventive measures.

Chapter X

SERVICE IN THE TRENCHES

Preparations for Entering Trenches

Preparing to enter upon a period of service in the trenches the company commander makes a complete inspection of the company which includes:

1. Inspection of rifles and ammunition.

2. Inspection of equipment, contents of packs, intrenching tools, field glasses, wire cutters, first-aid packets, emergency rations, gas helmets, identification tags, canteens, clothing, etc.

3. Canteens to be filled with water.

4. Test bayonets, fix and unfix.

5. Have company fill magazines.

Inspection of Section

The company commander precedes the company into the trenches and makes a tour and inspection of the section assigned, which includes:

1. Layout of the trenches: fire trench, supervision trench, communication trenches, machine-gun positions, snipers' positions, listening and observation trenches, dugouts, latrines, etc.

2. Locate telephones, reserve ammunition and munitions depots, water supply, gas alarms, tools and any trench accessories and utilities that may be included in the section.

3. Get any information of the enemy that may be of value from the outgoing company commander.

Tactical Disposition

The company commander will then make his tactical dispositions. In occupying the trenches a certain section of the line is assigned to each company. This section contains so many bays of the trench. The following dispositions are suggested as meeting the requirements under our organization:

1. The company is organized into four platoons of four squads each.

2. The section of the line assigned to the company contains eight bays.

3. Support No. 1 consists of the first and second platoons.

4. Support No. 2 consists of the third and fourth platoons.

5. From Support No. 1: Two squads of the first platoon occupy bays 1 and 2; two squads of the second platoon occupy bays 3 and 4.

PLATE 41a.
TACTICAL DISPOSITIONS ONE COMPANY OF INFANTRY.

6. From Support No. 2: Two squads of the third platoon occupy bays 5 and 6; two squads of the fourth platoon occupy bays 7 and 8.

7. Each squad establishes a double sentinel post in the bay assigned to it and the remaining members go into the squad shelters just in rear of the bays. This gives three reliefs for a double sentinel post and allows one extra man to be utilized as "runner," etc.

8. The remainder of the company is established in the company dugouts.

9. Depending upon the length of the tours of duty of the company in the first line trenches, the squads are changed according to a system that will have to be varied to suit the occasion, the squads in support taking their place in the fire trench and those in the fire trench returning to the support.

Going Into the Trenches

Platoons enter by not more than two squads at one time, thus minimizing the danger from shell fire. The platoon commander will explain to his squad leaders the extent of trench to be taken over and the action to be taken in case they are caught under shell fire or rapid fire while going up to the trenches. A second in command in each squad will be designated, so that if casualties occur among the squad leaders the relief will proceed as previously arranged.

The operation will proceed in silence. Rifles must be carried so that they do not show over the parapet. On reaching the fire trench the men of the first relief are posted to relieve the old detail and each man finds out any points that may be useful from his predecessor on that post.

Information to be Obtained

The platoon commander confers with the commander of the outgoing party and secures all the information possible about the position which includes:

1. Behavior of enemy during period preceding relief, and any point in their line requiring special information, e.g., enemy may have cut wire as though preparing to attack.

Plate 42.

2. Machine-gun emplacement may be suspected at some particular point.

3. Anything ascertained by patrols about ground between firing lines, thus avoiding unnnecessary reconnaissance.

4. Any standing arrangements for patrols at night, including point at which wire can best be passed, ground to be patrolled, or place where they can lie under cover.

5. Any parts of trench from which it is not safe to fire. Such positions are apt to occur in winding trenches, and are not always recognizable in the dark.

6. Special features of trench, recent improvements, work not completed, dangerous points (on which machine guns are trained at night), useful loopholes for observation.

7. Places from which food and water can be safely obtained.

8. Amount of ammunition, number of picks, shovels and empty sandbags in that section of the line.

Information on these points cannot always be given properly by word of mouth. Written notes and plans should therefore be handed over to a platoon commander taking over for the first time.

Every man is required to see that he has a good firing position for all directions. Commanders must satisfy themselves that men have done this, and report. The whole line "Stands to Arms" during the hour before dawn.

After dark, unless the moon is bright, rifles should be left in firing position on the parapet. All men not on sentry should keep rifles, with bayonets fixed, in the trench.

Routine

1. Double sentinel posts are established in each bay. They are on post one hour at a time.

2. When the enemy's trench-mortar detachments are active, special sentinels will be posted to give notice of coming bombs.

3. Every man in the platoon is to know:

(a) The location of the platoon reserve ammunition and munitions.

(b) The location of latrines.

(c) The topography of the trenches in the platoon section and the adjoining sections, including the approaches. The location of the accessory defenses, listening and observation posts, machine-gun positions, snipers' positions, trench-mortar positions, etc.

(d) The tactical disposition in the sector and the general disposition of the company.

(e) The location of loopholes.

(f) The places of especial danger in order that he may stay away from them.

4. Rifles are inspected twice daily. Every precaution is taken to keep the rifle and ammunition free from mud.

5. There is a gas helmet parade daily.

6. Accurate sketches are made of the trench and any addition or alteration entered on them.

7. Loopholes are inspected at dusk.

8. Wire entanglements are inspected and repaired under cover of darkness.

9. A log of events hour by hour should be kept which shows every item of enemy activity and the measures taken during the tour in the trenches. This will be a valuable reference when turning the trench over and will make a record of the habits of the enemy that may be most valuable as a guide for making plans to circumvent him.

10. The police and sanitation of the trenches will be carefully looked after.

11. Platoon commanders may divide the tour of supervision of the platoon sector with the squad leaders.

12. The whole company stands to arms during the hour before dawn.

Observation

Plate 43.

Observation of the enemy's line should be continuous. The observation and firing system will be arranged so that all parts of the enemy's line will be under observation and fire at all times.

Plate 42 shows the arrangement in general. The appliances for carrying it out are shown in Plates 43, 44 and 45.

Plate 44.—Observation loophole and rifle firing rack.

The observation is conducted through a small loophole made by a stick through the parapet or an iron tube run through and directed toward the point to be observed. To conceal the exit a few tufts of earth and grass are placed there in an irregular manner. Steel loopholes may also be employed for observation and firing purposes. They may be arranged a yard or two apart, so that one man observing through one can direct his mate using the rifle at the other so that he may bring fire to bear upon any member of the enemy's force that exposes himself at the point under observation.

The loopholes, both observation and firing, are arranged slantwise in the parapet so that the observer does not look straight to his front nor does the firer fire in that direction.

An aiming rack constructed so as to resist the recoil of the rifle and not derange its aim on firing may be arranged near the observation loophole. When the enemy exposes himself all that is necessary is a press on the trigger and the bullet goes straight to its mark. Such an aiming rack may be easily constructed, as shown in Plate 44.

Observation of the enemy trenches may also be effected by use of the periscope or, in the absence of one of these, by a looking glass in a slanted position fastened to a stick planted at the rear wall of the trench and protruding over the parapet, to reflect his trenches. (See Plate 45.)

Field Glasses

The enemy's trench usually appears completely deserted, but on observing it through field glasses you are astonished by the details revealed. You will see, from time to time, the eye of the enemy observer who shows himself at the loophole, or any other activity that it is capable of being observed from the outside. The observer watching through the field glasses will soon become so familiar with the appearance of the opposing trenches that he will be able to detect immediately any alteration in the obstacles, or changes that may be made, such as the establishment of new listening or observation posts, new sap heads, machine-gun emplacements, etc.

Observers are charged especially with detecting the location of machine-gun emplacements. The examination should be so complete and detailed as to prevent their existence without their location being accurately known.

Any observations of enemy activities, of any nature whatever, are reported immediately so that they may be passed on to the commander whose unit is manning the trenches directly opposite the same.

Loopholes should be screened at the rear by a sandbag split and hung over them. They should be carefully concealed to prevent their location being discovered by the enemy. There must be no alteration in the parapet where they are located.

Plate 45.—Looking-glass periscope.

Plate 45a.—Trench showing wire overhead cover and wire trapdoor obstacle. Machacoulis gallery in background.

Snipers

The enemy's sojourn in the trenches should be made as disagreeable to him as possible. He must be kept continually on the alert. Our operations must be made a constant menace to him. It is in this way that casualties are effected and he is gradually worn out. One of the best methods of accomplishing all of the above is the employment of snipers, who are specially selected and trained in this branch of trench warfare.

The snipers are on duty all day, but they have their nights in bed. They conduct their operations in pairs and are given a definite post to occupy and in exceptional cases may be given a roving commission. The advantage of having the same men regularly on the same post is that they learn thoroughly the appearance of every square foot of the ground included in their area of observation and are able immediately to note any change that may take place. They soon learn where to look for the enemy and in fact learn the habits, etc., of the enemy occupying their sphere of observation.

The sniper must be an expert in:

1. The construction of loopholes by day and by night.

2. The use of telescopic sights, field glasses, periscopes and all optical contrivances designed for observation purposes.

3. The selection of good positions for sniping.

4. Judging distances and estimating or measuring ranges.

5. Rifle firing. He should be an expert rifleman in order that full advantage may be taken of the opportunities to inflict losses on the enemy.

6. In trench warfare each pair of snipers will be required to report each evening to the company commander the result of their day's operations.

What to Fire At

When the enemy makes his attack you will generally fire at those who appear in the sector that has been allotted to you to cover. You may, however, abandon your target on your own initiative under the following circumstances and fire:

1. On officers and non-commissioned officers. These can be recognized by their gestures. They are generally in the center of groups and get up and start first. They should be disabled, as this is the surest way of breaking up the attack.

2. At a group on the move. Fire should be concentrated on an advancing group. The time when the group is preparing to start its rush may be indicated by rifles being raised and the movements that take place along the line. After a rush has started, look out for the late comers trying to rejoin their comrades. They make good targets.

3. When the enemy attempts to build up his line to the front by a process of infiltration, that is, by having single men crawl from one point to the other, each man should be fired on during his advance.

4. Fire will be immediately concentrated on any machine gun that comes into action. With the German gun prolonged firing heats the water in the jacket to the boiling point and puffs of steam are given off. Do not be deceived into thinking that this necessarily gives away the position of the gun, for this steam has been piped to a distant place and allowed to escape so as to draw fire that otherwise might be directed on the real position of the gun.

5. On signallers or runners. These are carrying information that will probably be of benefit to the enemy's commander. You will appreciate the necessity of preventing this.

6. On an enemy showing a flank. No opportunity must be lost to fire upon an enemy that exposes his flank. The fire of a single rifleman down the flank may cause a whole line to retreat.

Use of Rifle Grenades

Rifle grenades are capable of causing more losses to the enemy than bombardment. The rifle grenade arrives at its destination unexpectedly without any noise; it explodes before one has even time to get out of the way. As it does not arrive at fixed hours like the bombardment, the enemy cannot continually avoid it by taking refuge in his dugouts and shelters; when he is moving about a trench which is subject to rifle grenading he must be continually on the alert. This perpetual menace, hour in and hour out, day in and day out, renders his sojourn in the trenches extremely disagreeable.

Before rifle grenades are thrown careful observation of the opposing trench must have been made to determine the point where the grenade is likely to do the greatest damage.

Rifles are placed in the aiming racks and the grenades fired from time to time, day and night, at moments when it seems propitious. In this way a sentinel may be taken by surprise; a non-commissioned officer or officer may be caught unawares.

It should be remembered that we will probably be able to throw twenty grenades to the enemy's one. Advantage should always be taken of this munitions superiority. Every man of the enemy we can put out of action is one less to kill us in the advance which will eventually come. Sometimes the enemy will try to reply. Here is where our munitions superiority comes in again. We can fairly shower him with grenades and make him take to his shelters.

It may be advisable to execute a sudden burst of grenade fire. This is started by a volley and followed by fire at will.

When the artillery has destroyed parts of the enemy's trenches or makes breaches in his obstacles by day he will endeavor to repair them at night. He may be considerably annoyed and losses inflicted upon him by a well-directed shower of rifle grenades arriving at points where his working parties are located. To make this effective the rifle racks should be placed in position and secured during the day after trial shots have demonstrated conclusively the direction and angle for them.

Shelling

You will be impressed by the shells, especially the big ones. The din and blast of the explosions are, to say the least, terrifying. But you will soon come to know that the shell often makes more noise than it does harm and that, after a terrific bombardment, by no means is everybody destroyed.

HOW TO PROTECT YOURSELF FROM SHELLS

The big shell, which is so appalling, is only really dangerous if it falls on the place where a man is standing, because the splinters rise in the air. Fall down flat when the shell bursts. Even if you are quite close, there is comparatively little risk. Get up immediately after the explosion, especially if you are 200 to 300 yards away from the place where it burst. The splinters do not fall for some time after the explosion.

The steel helmets and the infantry pack will furnish considerable protection from shrapnel fragments and balls.

During the Combat

The safest place to avoid the enemy's shell fire when the attack has been launched is close up to the enemy's position, where the artillery fire has to cease for fear of placing shells indiscriminately in his own troops and ours. Some men, completely distracted, lie down with their face to the ground. They will be crushed where they lie. Artillery fire, when it is violent, tends to throw the ranks into confusion and disorder. You have only ears for the roar of the approaching shell. You slow down and attempt to seek cover where there is no cover. The unit breaks up, and runs wild or stops altogether. Disorder and confusion means massacre.

March strictly in place. To the front is your safest haven of refuge. Get hold of the frightened ones and keep them in place. You will need them to help you when you reach the goal.

In the Trenches

Dugouts with strong overhead cover are provided for your protection when not actually required to man the trench. In some places it may be possible to dig shelter caves and shore up the roofs.

Scouting and Patrolling

To the Reader: You will find a wealth of information on the methods to be employed by scouts and patrols in a little book similar to this one in size, entitled "Scouting and Patrolling," by the author of this volume. Published and for sale by the United States Infantry Association, Washington, D.C. Price 50 cents, by mail, postpaid. Get your copy now and prepare yourself for these important duties.

Scouting and patrolling to the front is of greatest importance. It is kept up both day and night. The units occupying the first line send out patrols whenever necessary. They are frequently able to obtain valuable information and at the same time serve to counteract the enemy's efforts in this direction.

The patrols generally consist of a junior officer or non-commissioned officer and from four to six selected men. Their operations are conducted in accordance with the situation and the mission they are sent on.

Hand grenades are frequently carried for both offensive and defensive operations. Grenade patrols always carry them. The operations of patrols may include:

1. Reconnaissance of sectors of the enemy's position with a view to determining his dispositions and arrangement of obstacles.

2. Making sketches of positions.

3. Capturing prisoners.

4. Opposing enemy patrols.

5. Harrassing the enemy.

When the patrol goes out every man in the sector of the firing line must be informed of such fact and the possibility of its returning through his post. It is not sufficient to simply notify the men on post at the time the patrol goes out, as a man cannot always be trusted to pass the information on to his relief. Word should be quietly taken along the line by the non-commissioned officer in charge of the relief in person. When the patrol is out, special instructions have to be given with respect to firing. To cease firing altogether is very undesirable. It arouses the enemy's suspicions. A few trustworthy riflemen are directed to fire high at intervals. No lights are sent up while the patrol is out.

If the patrol is to remain stationary, similar to the outguard of an outpost, communication may be maintained by means of a string, spelling out the messages by Morse code, two jerks meaning a dash and one jerk meaning a dot.

Where night patrols have to remain out under trying conditions special dugouts should be reserved where they can rest upon their return.

Care of Arms

The infantryman's rifle is his best friend. The personal care that he gives to it is indicative of his soldierness and discipline. Your rifle must be kept in prime condition, otherwise it may fail you at a critical moment. A canvas breech cover that will protect the bolt and magazine mechanism will be found a great advantage when the rifle is not in use. Care must be taken to exclude mud and dirt from the bolt mechanism. Do not put mud-covered cartridges into the magazine. Wipe them off first. Arrange a proper receptacle near your post for the storage of your reserve ammunition. Be careful that you do not clog the muzzle of the rifle with mud and dirt. If fired in this condition it will ruin the rifle. Be careful not to clog up the sight cover with mud. Oil the rifle frequently with good sperm oil. Half of the oilers in the squad should be filled with oil and the other half with Hoppe's No. 9 Powder Solvent.

Rifles must be carefully inspected daily by platoon commanders and the men required to work on them during the periods off post.

Care of Trenches

Repairs will have to be made daily. The widening of trenches in the making of repairs should be strictly forbidden. Under no circumstances must they be altered in any manner except on the order of the company commander.

Platoon commanders will go over every part of the trench several times daily with the squad leaders of the various sections and decide upon the repairs and improvements to be made. A complete and thorough police will be made prior to being relieved. All refuse will be removed. Fired cartridges will be disposed of, as they might get imbedded in the trench floor and hinder subsequent digging.

Each squad leader will be held strictly responsible for the state of police of the section of trench occupied by his squad.

Latrines

Latrines are located at convenient points in the trenches. For the men on duty in the first line they are generally dug to the flank of a connecting trench and connected therewith by a passageway. Their location is plainly marked.

The rules of sanitation are even more strictly observed in trenches than they are in soldier camps. The trenches and passageways must not under any circumstances be defiled. Latrines should be kept clean and sanitary. They will be carefully protected from flies. The free use of chloride of lime daily is an absolute necessity.

Maps

A complete detailed plan of our own trenches and as much as is known of those of the enemy opposite should be made, and be available for study and to refer to in making reports. Every bay of the trench should be numbered, every traverse lettered. All junction points of fire and communicating trenches, all dugouts, all posts, mortar positions, machine-guns positions, observation posts, and any points that it may be necessary to refer to in reports should be designated by numbers.

Frost Bite; Chilled Feet

The causes are:

1. Prolonged standing in cold water or liquid mud.

2. Tight boots and leggings, that interfere with the blood circulation.

Prevention

1. Before going into the trenches wash the feet and legs and dry them thoroughly. The British Army has an issue of an anti-freeze mixture which will probably be issued to our troops also. The feet and legs should be rubbed with it. Put on perfectly dry socks. An extra pair of dry socks should be carried.

2. During the period of service in the trenches the feet should be treated in this manner from time to time.

3. When the feet are cold, hot water will not be used for washing nor will they be held close to a fire.

4. Rubber boots must be worn only in the trenches. On no account must they be worn while on reserve.

Trench Soldiers' Creed

To be of the greatest effectiveness in the trench every soldier, personally and collectively, must be able to adopt the following creed and live up to it:

1. We are here for two purposes, to do as much damage as possible to the enemy and to hold our section of the line against all attacks. We are doing everything in our power to accomplish these missions. We realize that every man of the enemy confronting us that is not placed hors de combat will be there ready to shoot us down when the assault takes place. We realize also that if the enemy makes a lodgment on our section of the line that it endangers others and a costly counter attack may be necessary. We will hold on.

2. With the means at hand and those we are able to devise we will make the enemy's stay in his trenches as uncomfortable and disagreeable as possible. All of our utilities are being utilized to the fullest extent and our various detachments are organized and their tactical operations are conducted with this object in view.

3. We have done everything possible to strengthen our line.

4. If, despite all the precautions we can take and the hardest fight we are able to make, the enemy succeeds in effecting a lodgment on our section of the line, we will meet him with the bayonet and fight to the last drop of our blood.

5. We are all familiar with the tactical dispositions in our section of the line. Those of us on the flanks connect up with the platoons to our right and left. We know the route to company and battalion headquarters and know where the nearest support is located. We know the position of our machine guns and the sector they cover. We are in constant communication with the observing posts that cover our front, and our observing posts covering the other platoons are in constant communication with them.

6. We know the firing position assigned to us and are familiar with the use to be made of the accessories furnished us. We can fire over the parapet at the foot of our wire entanglements to repel night attack.

7. We will at all times be careful about needlessly exposing ourselves. We appreciate the fact that it is absolutely stupid to get killed or wounded in the trench through negligence. By so doing one has served no purpose and a soldier cannot be replaced. Our leaders have warned us of the especially dangerous places. We know where they are and avoid them except when our presence there is necessary as a matter of duty.

8. The sections of the enemy's line that we are to cover with our fire have all been pointed out and each of us is familiar with same. We have located the enemy's loopholes and are doing our best to keep them under fire.

9. We know our way and move noiselessly about the trenches. When we enter and leave it is with absolute silence.

10. We are doing our utmost to collect information about the enemy, his defenses, his activity, his movements, and especially his night operations. All of this information we transmit immediately to the platoon leader.

11. We know the best way to get over our parapet to reach the enemy.

12. Our appliances for protection from gas attacks are complete and ready for instant use. We have our helmets on our persons ready to put on. We are familiar with their use and have confidence in their effectiveness. We will wait for the signal to don our gas helmets (signal is usually made by beating a gong, and care must be taken to follow exactly the directions for putting on the gas helmets; carelessness may mean your disablement).

13. Our trenches are drained and every precaution is being taken to keep the drains and sump holes in condition to perform their functions.

14. We have rendered the parapets and shelters throughout our sector bullet-proof, and effective measures are being taken to prevent them from caving in.

15. We are keeping our trenches sanitary and clean; our reserve munitions are carefully stored in their proper places ready for instant use. Refuse is always placed in receptacles when it can be carried away. We do not under any circumstances litter up our trench floor. Our empty shells are collected and sent to the rear.

16. Our rifles are our best friends. We keep them clean, well oiled, and in readiness for instant use. Our bayonets we have with us at all times ready to be placed on the rifle. We protect our rifle ammunition from the mud, as we realize that muddy cartridges will clog the breech mechanism and cause mal-function.

17. We are taking every precaution to prevent "trench feet;" when practicable we take off our shoes and rub our feet for 15 minutes each day. We do not wear tight shoes and leggings that tend to interfere with blood circulation. We each have a pair of dry socks to put on. We do not wear rubber boots except when it is absolutely necessary.

18. We observe the orders regarding the wearing of equipment.

19. We do not drink any water except that from authorized sources. We replenish our canteens whenever practicable.

In addition to the above the platoon commander must be able to adopt the following and live up to them:

1. My sentries are posted in the proper places. They are posted by non-commissioned officers. They have the proper orders. No man is ever on duty more than one hour at a time. I visit them at frequent intervals.

2. I have a runner ready to carry a message to company headquarters. I realize that any information of the enemy that I may secure may be of great importance at regimental and other headquarters. I will therefore send it back with the utmost dispatch.

3. I am familiar with the methods of communicating with the artillery, of giving them information and of asking them for support.

4. My patrols operating to the front at night have been properly instructed and are doing their duty effectively. All sentries in the trench have been notified when they are out and cautioned to look out for their return.

5. I have given complete and detailed instruction covering what to do in case of gas attacks and the sending out of the S.O.S. signal. I have gas and attack messages already prepared and ready to send after inserting the time and place in them.

6. I know the name of every man in my platoon and they all know me.

7. I am here to inflict as much damage as possible on the enemy and to hold my part of the line. I will do it!

Chapter XI

THE ATTACK IN TRENCH WARFARE

Objectives

The objectives which must be dealt with in the attack of an intrenched position such as will be found on the western front are:

1. The trenches of the first line.

2. The supporting points.

3. The trenches of the second line.

By a study of the text preceding this you must realize that in the defense of these objectives there will be employed artillery, rifles, grenades and machine guns.

Artillery Preparation

The first phase of the attack is the artillery preparation. In order that the infantry may make the attack with a minimum of losses, the artillery must have destroyed the wire entanglements and obstacles that obstruct the advance, or at least have sufficiently breached them to permit their being negotiated. The destruction of these obstacles is never complete. It would require too great an expenditure of ammunition. The infantry occupying the hostile trenches must be simply overwhelmed with artillery fire so that they will be unable to man the parapets when the assault is launched. During the artillery preparation the hostile infantry does not occupy their firing positions in the trenches but remain in their dugouts, which are fully protected from all but the heaviest shells. Only a few observers are left in the trenches.

When the bombardment against this particular part of the line ceases the infantry leave their dugouts and man the firing positions. To prevent this is one of the most important as well as most difficult tasks of the artillery. This may be effected by a well-directed fire on the exits to the dugouts with a view to caving them in and thus preventing the egress of the occupants. The enemy may sometimes be induced to leave his shelter prematurely by the following ruse:

1. Cease the artillery fire.

2. Open a heavy rifle fire; this causes the enemy to believe that the assault has begun and he will man his parapets in strength.

3. After waiting for several minutes open the artillery again with even increased vigor.

The hostile infantry may be forced out of his dugouts by the use of shells and grenades containing suffocating gases which penetrate the shelters and make them untenable.

The artillery is also charged with putting the enemy's artillery out of action to prevent them from firing upon the attacking infantry.

If the enemy artillery is left free, it will shell our trenches and approaches, causing casualties and confusion and thus interfering with the formation for the attack. The location of hostile batteries is effected by aerial reconnaissance.

Another task of the artillery is to prevent the hostile reserves from coming up to reinforce their firing lines. These reserves will be located back in the second line until their presence is required at the front. As long as the artillery preparation continues they remain in the shelters, but as soon as it ceases they man the trenches. The artillery must therefore extend its fire to the second line and continue it while the first line is being rushed. Back of the second position the enemy holds strong reserves. The entrance of these into action must be prevented. This is accomplished by extending the curtain of fire still further to the rear. The supporting points must receive a lion's share of attention for, bristling with machine guns and trench mortars, they are the really dangerous elements to the infantry attack after it passes the first line trenches.

The weapon which inflicts the greatest losses on the assaulting infantry is the machine gun, which appears suddenly out of the ground and lays low whole units. By a careful reconnaissance these machine-gun positions are ferreted out and every possible means are taken to effect their destruction.

The effectiveness of the artillery preparation depends simply upon superiority of guns and munitions. In this respect we now possess a great advantage, for the state of our munition supply is such that our artillery may fire several shells to one of the enemy. This is what established the superiority.

Organization of Infantry Attack

The organization of the attacking infantry corresponds in a general way to the organization of the position being attacked. A first line of assault is organized. Its mission is the capture of the enemy's first line trenches. A second line follows, having for its mission the assault and capture of the second line trenches. A separate organization of these two lines is necessary for the reason that the first attacking line is generally so disorganized in the fighting that it no longer possesses the cohesion necessary to carry it through to the second line. It has been found necessary to launch a comparatively fresh and intact force against it.

As the first position is organized into several separate lines of defense, so also is the first attacking line organized and launched in two or more waves, those in rear being in the nature of reinforcements to those in front.

Objectives

Each unit of the attacking line is assigned a distinct objective. Certain units are given the mission of attacking the supporting points to prevent their enfilading the units advancing through the intervals between them.

The main efforts are made along the lines between the supporting points, as to assault the latter would entail a casualty list not commensurate with the results. The effort against them is made with a view to neutralizing their effect. If the attack is successful in the intervals, the supporting points will fall as a result.

The waves of the first line are directed against the first position, the second against the second position. The reserves held under the orders of the division commander are employed where the development of the situation dictates.

Further to the rear, and under orders of the supreme commander, large bodies of reinforcements are held ready to be moved rapidly to points where progress has been made to such an extent that maneuver operations are practicable.

Preparation for the Assault

Preparatory to the assault, numerous saps (trenches) are run out to the front from the main firing trenches. The night before the attack, a parallel is broken out connecting the sap heads. This parallel is amply supplied with short ladders and is occupied by the companies composing the first wave of the attack. The saps and the main trenches are also filled with men assigned to the following waves, who will move into the parallel as soon as the first wave leaves it. As the artillery preparation ceases, the first waves rush up the ladders in succession and move out to the assault.

The First Wave

As the artillery preparation against the first line is completed and the curtain of fire shifted far into the enemy's position, the infantry of the first wave emerges from the parallel and moves out. The formation and gait depend upon the distance to the hostile trench. If the artillery preparation has been effective and the distance is not more than 100 yards, it is expected that the wave will be able to reach the fire trench without firing, except possibly when the wire is reached. If the distance is much greater than 100 yards, it is necessary to cover the advance with rifle fire. This is accomplished by a line of skirmishers deployed at extended intervals, which precedes the wave at about 50 yards. The wave starts out at a walk, carefully aligned. It afterwards takes up the double time and advances by rushes until the wire entanglements are reached.

From this moment the period of the charge and individual combat begins. The men can no longer be kept from firing. Each tries to protect himself with his rifle. Each man locates his opening in the wire through which he is to go and makes for it. The line reforms on the other side. With rifles at the high charge (a position to our old head parry, but slanting slightly upward from right to left) the line rushes upon the enemy. Each man runs straight towards the part of the trench in front of him and jumps upon the parapet. By rifle shots and bayonet thrusts he destroys everything in his way. Men selected in advance take charge of the prisoners. The line is reformed, lying down just beyond the fire trench, and fire is opened against the second line. Men are positively forbidden to enter the communication trenches. They are most inviting for cover, but a man rarely gets out of them.

The grenadier squad proceed to their work of clearing the fire and communication trenches.

The Second Wave

The second wave of the first line starts forward at the moment the first wave reaches the hostile trenches. If it starts sooner, it will unite with the first at the entanglement and become involved in the fight for the fire trench. It will be broken up prematurely and will be unable to take advantage of the developments of the fight of the first wave. The reinforcement by the second wave and the disorganization produced by the assault lead to a mixture of units in the trenches of the first position. Before starting out to the assault of the next trench it is necessary that order be restored. When this is accomplished the attack is launched against the second line. In front of the supporting points the combat rages. The men are barely able to hold on the outer edges. In the interval the advance has reached high tide and has expanded like a wave and stopped. This is the limit that can be expected of the first line.

Hasty cover is prepared and advantage taken of such cover as may exist. All elements of the attack open fire on the second position.

The Second Line

Under the cover of these operations the second line has come up in a series of three lines, where it is built up compact at the position of the stopped first line. From this point its attack against the enemy's second line is launched. The lines are worked up to a point from which the assault is to be made, and when the time comes the first wave dashes out to the attack, followed by the second wave in the same manner as the assault against the first position was made.

The action of the two lines of attack may be expected to overwhelm the greater part of the two main hostile positions. At certain points, however, the resistance will hold out, and, if not overcome, will constitute points of support to which the enemy may bring up reinforcements and even turn the tide of battle by a counter attack.

To deal with these points that hold out, as well as with hostile reinforcements which may arrive, the reserve is launched into action, which brings the attack into the open ground beyond the second line of defense, and maneuver operations are begun. The mobile units are rapidly thrown into action, and large forces from the general reserve are hurried to the point where the lines of defense are broken through.

From what has gone before we may deduce that the following conditions must prevail to attain success in an attack on a prepared position:

1. The attack must be planned down to the most minute detail.

2. There must be a greatly superior force of artillery concentrated at the point of attack, and the artillery preparation must be thorough.

3. The infantry must be sufficient in number, training and morale to perform the tasks that will be demanded of them.

4. The arrangements for the supply of ammunition to the firing line must be planned and carried out in all its details.

5. Plans for meeting counter attacks must be thorough and complete. The capture of a position is often less difficult than its retention.

6. Finally, every officer and man must know exactly what he is to do.

Bayonet Training

Waldron

The system of Bayonet Training stated herein is taken from the provisional Manual of Bayonet Training of the British Army. In the vernacular of the day, it is the "real dope."

Every battalion should have a bayonet assault practice course constructed along the lines indicated and the work of training should be systematically conducted. The non-commissioned officers should be taken out on a "Tactical Walk" on the course and all the features of the exercises explained. This is followed by their practical training over the course and this in turn is followed by the instruction of the privates of the organization.

Features of the Bayonet

To attack with the bayonet effectively requires good direction, strength and quickness, during a state of wild excitement and probable physical exhaustion. The limit of the range of a bayonet is about 5 feet (measured from the opponent's eyes) but more often the killing is at close quarters, at a range of 2 feet or less, when troops are struggling hand to hand in trenches or darkness.

The bayonet is essentially an offensive weapon—go straight at an opponent with the point threatening his throat and deliver the point wherever an opening presents itself. If no opening is obvious, one must be created by beating off the opponents weapon or making a "feint point" in order to make him uncover himself.

Hand to hand fighting with the bayonet is individual, which means that a man must think and act for himself and rely on his own resources and skill; but, as in all games, he must play for his side and not only for himself. In a bayonet assault all ranks go forward to kill or be killed, and only those who have developed skill and strength by constant training will be able to kill.

The spirit of the bayonet must be inculcated into all ranks so that they go forward with that aggressive determination and confidence of superiority born of continual practice, without which a bayonet assault will not be effective.

The technical points of bayonet fighting are extremely few and simple. The essence of bayonet training is continuity of practice.

Method of Carrying out Bayonet Training and Hints to Instructors

An important point to be kept in mind in Bayonet Training is the development of the individual by teaching him to think and act for himself. The simplest means of attaining this end is to make men use their brains and eyes to the fullest extent by carrying out the practices so far as possible, without words of command, i.e., to point at a shifting target as soon as it is stationary, to parry sticks, etc. The class should, whenever possible, work in pairs and act on the principle of "master and teacher." This procedure in itself, develops individuality and confidence. Sharp jerky words of command which tend to make men act mechanically, should be omitted. Rapidity of movement and alertness are taught by competition in fixing and unfixing the bayonet and by other such quickening movements.

As the technique of bayonet fighting is so simple, long detail is quite unnecessary and makes the work monotonous. All instructions should be carried out on common-sense lines. It should seldom be necessary to give the details of a "point" or "parry" more than two or three times, after which the class should acquire the correct positions by practice. For this reason a lesson or daily practice should rarely last more than half an hour. Remember that nothing kills interest so easily as monotony.

The spirit of the bayonet is to be inculcated by describing the special features of bayonet and hand to hand fighting. The men must learn to practice bayonet fighting in the spirit and with the enthusiasm that animates them when training for their games, and to look upon their instructor as a trainer and helper. Interest in the work is to be created by explaining the reasons for the various positions, the method of handling the rifle and bayonet and the uses of the points. Questions should be put to the men to find out if they understand these reasons. When men realize the object of their work they naturally take a greater interest in it.

Progression in bayonet training is regulated by obtaining first correct position and good direction, then quickness. Strength is the outcome of continual practice.

In order to encourage dash and gradually strengthen the leg muscles from the commencement of the training, classes should be frequently practiced in charging short distances over the bayonet practice courses.

All company officers and non-commissioned officers should be taught how to instruct in bayonet training in order that they may be able to teach their squads and platoons this very important part of a soldier's training, which must be regularly practiced during the whole of his service at home, and during his periods of rest behind the firing-lines.

The greatest care should be taken that the object representing the opponent and its support should be incapable of injuring the bayonet or butt. Only light sticks are to be used for parrying practice.

The chief causes of injury to the bayonet are insufficient instruction, in the bayonet training lessons, failure to withdraw the bayonet clear of the dummy, and placing the dummies on hard, unprepared ground.

BAYONET LESSONS

Formation.—Intervals or distances are taken as prescribed in paragraphs 109 and 111 I.D.R. Bayonets are fixed, paragraph 95, I.D.R.

Technique of Instruction.—Before requiring the soldier to take a position or execute a movement for the first time, the instructor should show him the position or how to execute the movement, stating the essential elements and explaining the purpose that they serve.

Illustrate the position or movement a second time, requiring careful observation so that the men will be taught to use their eyes and brains right from the beginning.

Now, require the men to assume the position or execute the movement under consideration. Accuracy and expertness will be developed by practice.

Fatigue and exhaustion should be carefully guarded against. They prevent proper interest being taken in the exercises and delay the progress of the instruction.

The training consists of five lessons and the Final Assault practice.

Lesson No. 1

The First lesson is divided into:

1. The position of Guard, from which the various bayonet attacks are made.

2. The position of High Port, which is assumed when advancing.

3. The Long Point, which is the normal method of bayonet attack.

4. The Withdrawal, which follows the attack.

The Position of GUARD

Being at the Order Arms: Raise the piece with the right hand, throw it to the front. Grasp with both hands, the left at a convenient place above the rear sight so that the left arm is only slightly bent; right hand at the small of the stock and held just in front of the navel. The rifle is held naturally and easily, without constraint, barrel inclined slightly to the left. At the same time the left foot is carried forward to a point in a natural position such as a man walking might adopt on meeting with resistance. The left knee is slightly bent, right leg straight and braced. The right foot is flat on the ground with the toe inclined to the right front.

THE LONG POINT

The common faults that will be noted in assuming the position are:

1. The body will be leaned back from the hips, which causes unsteadiness and does not permit quick and aggressive action.

2. The left arm is bent too much, which raises the point of the bayonet too high and produces a certain amount of constraint. The left hand should grasp the piece at such a point that will avoid this defect. A little practice will show the exact place to hold the hand to obtain the maximum effect.

3. The right hand may be held too low and too far back, which has the effect of raising the point of the bayonet and giving a faulty position to the left arm and hand.

4. The rifle may be grasped too tightly with the hands, which produces rigidity and restrains freedom of movement. The left hand merely guides the bayonet in the attack, the right furnishes the power behind the thrust, hence great care should be taken to see that the left arm is not deprived of its freedom of action by gripping the rifle too hard with the left hand.

The Position of "REST"

The feet are retained at the position of Guard. The piece is lowered and held in the easiest and most comfortable position.

The Position of HIGH PORT

Being at the position of Guard. Without changing the position of the hands on the piece, carry the rifle so that the left wrist is level with and directly in front of the left shoulder. The right hand is level with the belt.

Practice will be had at the position of High Port with the right hand quitting the piece, it being held approximately in position with the left hand alone. This will be found advantageous when jumping ditches, climbing out of trenches, surmounting obstacles, etc., leaving the right hand free.

The Position of LONG POINT

Being at the position of Guard. Thrust the point of the bayonet vigorously towards the point of the objective, to the full extent of the left arm, the stock running along side of and kept close to the right inner fore arm. The body is inclined forward; left knee well bent; right leg braced, and weight of body pressed well forward with the sole of the right foot, heel raised. The chief power in the Point is derived from the right arm with the weight of the body behind it, the left arm and hand being employed to direct the point of the bayonet at the objective.

The eyes must be fixed on the objective. In making the point other than straight to the front the left foot will be moved laterally in the direction to which the point is made. After progress has been made in the execution of the simple point as indicated above, practice should include stepping forward with the rear foot when the assault is delivered.

The common faults in the execution of the Long Point will be noted as follows:

1. The rifle is drawn back slightly before delivering the point, which makes for a momentary loss of time that may give an opponent the advantage and should be assiduously guarded against.

2. The stock of the piece is held too high, which makes the guiding of the point of the bayonet with the left hand more difficult, and reduces accuracy in delivering the point at the exact spot intended.

POSITION OF GUARD

3. The eyes are not directed on the point of the attack. This is an error. One that may cause a man to miss his mark. The soldier must realize what this means in hand to hand fighting. The opponent will get him.

4. The left knee is not sufficiently bent, which does not allow the point to be made with the force intended.

5. The body is not thrust sufficiently forward, which reduces just that much the force of the attack.

6. The point is started at too great a distance from the objective to make a hit. Practice must be conducted in making the point until the soldier knows the exact distance at which he will have to start to produce the maximum effect. This distance is between four and five feet.

During the later stages of the instruction the men should also be taught to step forward with the rear foot when delivering the point.

The WITHDRAWAL After a Long Point

THE WITHDRAWAL

Being at the position of Long Point. To withdraw the bayonet. Draw the piece straight back until the right hand is well behind the hip. Immediately assume the position of Guard. If the leverage or proximity of the object transfixed with the bayonet renders it necessary, prior to the withdrawal, the left hand is slipped up close to the stacking swivel.

In the preliminary instruction all Points will be immediately followed by a withdrawal, prior to assuming the position of guard.

PROGRESSION

After the several positions hereinbefore described have been learned, the Points should be made at a definite place on a target, such as the throat, the stomach, the head, etc.

As progress is made, the pause between the point and the withdrawal is shortened until the soldier comes directly to the position of Guard from the point. Proficiency will finally be attained in making a "feint point" at one part of the target and the real point at another, for example: Feint at the head and point at the right thigh; feint at the stomach and point at the neck, etc.

Attacks at a retreating foe should be made against the kidneys, the position of which should be shown to the soldier.

Vulnerable Parts of the Body

If possible, the point of the bayonet should be directed against the opponents throat, especially in hand to hand fighting. The point of the bayonet will easily enter and make a fatal wound on penetrating a few inches. Other and more or less exposed parts are the face, chest, lower abdomen, thighs and the region of the kidneys when the back is turned. Four to six inches penetration is sufficient to incapacitate and allow for a quick withdrawal, whereas if a bayonet is driven home too far it is often impossible to withdraw it.

As soon as the nomenclature of the positions and movements are learned the men should work in pairs. They should be practiced in pointing in various directions. 1. At the opposite man's hand, which he places in various positions on and off the body. 2. At thrusting rings tied on the end of a stick.

This practice is conducted without word of command, so that the eyes and brain may be trained.

It is not sufficient that a dummy be merely transfixed. Some particular spot on the dummy should constitute the target. Discs or numbers should be placed on the dummy and the men required to point at a distance of about five feet from it and later as they become more proficient, to point after advancing several paces. The advance must be made in a practical manner and the point delivered with either foot to the front.

The rifle must never be drawn back when making a Long Point in a forward movement. The impetus of the body and the forward stretching of the arms supply sufficient force.

The bayonet must be withdrawn immediately after the Point has been delivered, and a forward threatening attitude assumed by the side of or beyond the dummy.

To guard against accidents the men must be at least five feet apart and the bayonet scabbard should be on the bayonet.

The principles of this practice should be observed when pointing at dummies in trenches, standing upright on the ground or suspended from gallows. They should be applied at first slowly and deliberately. No attempt must be made to carry out the Final Assault Practice until the men have been carefully instructed in and have thoroughly mastered the preliminary lessons.

Lesson No. 2

The Parries

Being at the position of Guard: The right or left parry is executed by vigorously straightening the left arm, without bending the wrist or twisting the rifle in the hand, and forcing the piece to the right or left far enough to fend off the adversary's weapon. The eyes must be kept on the weapon that is being parried and not on the eyes of the opponent as indicated in our bayonet combat training.

The common faults in the execution of the parries consist of:

1. Making a wide, sweeping parry, with no forward movement of the bayonet or body in it.

2. The eyes are taken off the weapon that is being parried.

The men should be taught to regard the parry as a part of an offensive movement, namely of the Point, which would immediately follow it in actual combat. For this reason, as soon as the movements of the parries have been learned they should always be accompanied by a slight forward movement of the body.

Parries will be practiced with the right as well as with the left foot forward, preparatory to the practice of parrying when advancing.

Practice

Men when learning the parries should be required to observe the movements of the rifle carefully, and should not be kept longer at this practice than is necessary for them to understand what is required, that is vigorous, yet controlled action.

The men work in pairs with scabbards on the bayonets, one man pointing with the stick and the other parrying it. The position of guard is resumed after each parry. At first this practice must be slow and deliberate, without being allowed to become mechanical, and will be progressively increased in rapidity and vigor.

Later a point at that part of the body indicated by the opposite man's hand should immediately follow the parry, and, finally sticks long enough to represent the opponents weapon at the position of guard should be attached to dummies and parried before delivering the point. (See Targets.)

The men must be taught to parry points made at them:

1. By an enemy in a trench when they are themselves on the parapet.

2. By an enemy on the parapet when they are on the trench.

3. When both are fighting on the same level at close quarters in a deep trench.

Lesson No. 3

The Short Point

Being at the position of Guard: Shift the left hand quickly towards the muzzle and draw the rifle back to the full extent of the right arm, the butt either upwards or downwards, according as a low point or high point is to be made. Deliver the point vigorously to the full extent of the left arm.

The short point is used at a range of about three feet. In close fighting it is the natural point to make when the bayonet has just been withdrawn after a long point. If a strong withdrawal is necessary the right hand should be slipped above the back sight after the short point has been made.

THE SHORT POINT

By placing two discs on a dummy the short point should be taught in conjunction with the long point, the first disc being transfixed with the latter and the second with the former. On delivery of the long point if the left foot is forward, the short point would take place with the right foot forward and vice versa.

The parries should be practiced from the position of the short point.

Lesson No. 4

The Jab or Upward Point

Being at the position of Short Point: Shift the right hand up the rifle and grasp it above the balance, at the same time bringing the piece to an almost vertical position close to the body. From this position, bend the knees and jab the point of the bayonet upwards into the throat or under the chin of the opponent.

The common faults in this movement are:

1. The rifle is drawn backward and not held sufficiently upright.

2. The rifle is grasped too low with the right hand.

From the position of Jab, the men will be practiced in fending off an attack made on any part of their body by an opponent.

THE JAB

When making a Jab from the position of guard, the right, being the thrusting hand, will be brought up first.

The Jab can be employed successfully in close quarter fighting in narrow trenches or when embraced by an enemy.

METHODS OF INJURING AN OPPONENT

It should be impressed upon the soldier that, although a man's point has missed, or has been parried or his bayonet has been broken, he can, as attacker, still maintain his advantage by injuring his opponent in one of the following ways:

Butt Strike I. Swing the butt up at the opponent's crotch, ribs, forearm, etc., using a half arm blow and advancing the rear foot.

This is essentially a half arm blow from the shoulder, keeping the elbow rigid. It can be executed only when the rifle is grasped at the small of the stock.

Butt Strike II. If the opponent jumps back so that the first butt strike misses, the rifle will come into a horizontal position over the left shoulder, butt to the front. The attacker will then step in with the rear foot and dash the butt into his opponent's face.

Butt Strike III. If the opponent retires still further out of distance, the attacker again closes up and slashes his bayonet down on his opponent's head or neck.

Butt Strike IV. If the point is beaten or brought down, the butt can be used effectively by crashing it down on the opponent's head with an over-arm blow, advancing the rear foot. When the opponent is out of distance Butt Strike III can again be used.

In individual fighting the butt can also be used horizontally against the opponent's ribs, forearm, etc. This method is impossible in trench fighting or in an attack, owing to the horizontal sweep of the bayonet to the attacker's left.

The men must be impressed with the fact that the butt must never be used when it is possible to use the point of the bayonet effectively.

Butt Strikes can be used only under certain conditions and in certain positions. If the soldier acquires absolute control of his weapon under these conditions he will be able to adapt himself to all other phases of close in fighting. For example, when a man is gripped by an opponent, so that neither the point nor the butt can be used, the knee brought up against the crotch or the heel stamped on the instep may momentarily disable him and make him release his hold. When wrestling the opponent may be tripped by forcing his weight on to one leg and then kicking that leg from under him. These methods will only temporarily disable an enemy, who must be killed with the bayonet.

Practice

When the men have been shown the methods of using the butt and the knee, they should be practiced by affixing several discs on a dummy and executing combination exercises at them. For example, point at one disc, use the knee on another fixed low down, jab at a third, etc. For practice with the Butt, light dummies should be used to prevent injury to the piece.

TACTICAL APPLICATION OF THE BAYONET

A bayonet assault should preferably be made under cover of fire, or darkness or as a surprise. Under these circumstances the prospect of success is greatest, for a bayonet is useless at any range except in hand to hand fighting.

The bayonet is essentially a weapon of offense to be used with skill and vigor. To await an opportunity for using the bayonet entails defeat. An approaching enemy will simply stand out of bayonet range and shoot down the defenders.

In an assault the enemy should be killed with the bayonet. Firing should be avoided. A bullet passing through an opponent's body may kill a friend who happens to be in the line of fire.

The Bayonet Assault

Training in the final assault is conducted only after the soldier has received a thorough course of instruction in the preliminary lessons and has acquired complete control over his weapons. This training must approximate as nearly as possible the conditions of actual fighting. Instructors should endeavor by every means in their power to arouse the interest and imagination of the men. Each problem should be carefully explained beforehand so that every man may have a complete knowledge of just exactly what is being attempted. Each target must be regarded as an armed opponent and each line of targets as an enemy line, attacking, defending or retiring, to be disposed of accordingly.

Any tendency towards carelessness and slackness must be corrected at once and all the men must be impressed with the fact that a practice assault that is not carried out with quickness, vigor and determination is worse than useless.

Lack of imagination or lack of understanding of what is being attempted, leading to a violation of the principles of tactics in practice assaults against dummy targets, can only lead to disaster in a real assault against the enemy.

Nervous tension, due to the anticipation of an attack, the advance across the open and the final dash at the enemy all combine to tire an assaulting party. It is only by their physical fitness and superior skill with the bayonet that they can overcome a comparatively fresh foe.

Accuracy in directing the bayonet when moving rapidly or surmounting obstacles; a thrust of sufficient force to penetrate clothing and equipment; a clean withdrawal, which requires no small effort, especially when the bayonet is fixed by a bone; are all of the greatest importance.

Method of Carrying the Rifle with Bayonet Fixed

1. A quick, short advance. Carry the rifle at the position of "High Port." This position is suitable for close formations. It minimizes risks of accidents when surmounting obstacles. It can be maintained with the left hand alone, allowing a free use of the right when necessary.

2. Long advance, in close formation. Carry the rifle slung over the left shoulder, barrel perpendicular, sling to the front. This allows the free use of both hands.

3. Long advance, in open order. Carry the rifle at the "Trail."

Teamwork

The importance of teamwork, discipline, and organized control throughout the conduct of the bayonet assault cannot be too strongly impressed upon the men. In this, as well as in all other tactical operations, success can only be achieved through the closest cooperation of all concerned. While individual initiative is to be encouraged, it must be strictly subordinated to the will of the leader of the assaulting party. The failure of an enterprize can usually be traced to the lack of this close cooperation.

The Advance

1. All members of the attacking party must "go over the top," that is, leave the trench, or rise from cover simultaneously.

2. The first stage, especially of a long advance, is slow and steady—not faster than the pace of the slowest man.

Such an advance has a decided moral effect on the enemy. It will produce the maximum shock at the moment of impact. It allows the attacking force to reach its objective without undue exhaustion. On the other hand, if the assault is allowed to develop without control and in a haphazard fashion, the moral effect of the steady advance of a resistless wall of men is lost and the defenders will be given time to dispose of their opponents in detail.

The Charge

The actual charge will not be delivered over a greater distance than 20 paces. Within the last ten paces the piece will be brought to the position of guard. The alignment will be maintained as far as possible until actual contact is gained.

As soon as a position is carried and prior to any further advance or any other operation whatsoever, the line must be reformed and every precaution taken against a counter attack. In Trench Warfare, the indiscriminate pursuit with the bayonet must never be permitted unless orders to that effect have been given by the leaders of the assaulting party. The attacking troops are not so fresh as the enemy and experience has shown that unorganized pursuit is exposed to ambuscades and machine gun fire. In most cases the work of immediate pursuit is better accomplished by the supporting artillery assisted by the rapid fire of the infantry on the retreating enemy.

Assault Practice

Throughout the period of training the men, the men should be constantly practiced in:

1. The recognized method of carrying the rifle with the bayonet fixed.

2. The rapid advance out of deep trenches.

3. Teamwork and control of advancing line. Fire discipline, direction and control.

4. The art of using the bayonet with effect in the cramped space of communication and fire trenches.

5. Reforming and opening fire after an assault.

6. Acting as leaders of an attacking party.

FINAL ASSAULT PRACTICE

One of the best methods of training a command in the final assault is to construct a section of trench, forming a course, over which the training may be conducted. The edges of the trenches should be protected by logs anchored back in the parapets or solid ground. Constant use will soon wear them down if this precaution is not taken. Cinders placed on the course are a great advantage, for they prevent the men from slipping.

When dummy targets are laid on the ground or on parapets, care should be taken to see that the earth under them is free from stones, otherwise bayonets will be injured when the thrust penetrates clear through the dummy and into the ground.

For this practice work it will be well to select the bayonets of the company that are most worn and use them exclusively.

Most interesting and practical problems in the tactics of trench warfare can be solved by combining the assault practice with other forms of training such as the operations of grenadier squads in clearing fire trenches and communication trenches; throwing hand grenades, to cover the assault; barricading with sandbags and the construction of trenches.

The illustration herein shows a type of Final Assault Practice course, that may be prepared with a minimum expenditure of labor and material. It occupies a space of about 100 feet in width and may be of varying depth according to the elements that it is desired to introduce. A platoon of four squads with the squad leaders taken out of the line and placed in rear to direct their squads, may be run over the course with safety after the men have had sufficient preliminary training. The elements of this course are:

1. A line of traversed type of fire trench. There being four bays, 18 feet long with 6 foot traverses. This trench is the simple type of standing trench shown in the profile.

2. A supervision trench located parallel to and about 50 feet in rear of the fire trench. Profile shown.

3. Communication zigzags from the supervision trench to the fire trench.

4. Two communication zigzags of three legs each running to the rear from the supervision trench.

5. The location of squad dugouts in rear of the bays of the fire trench and platoon dugouts just in rear of the supervision trench are indicated. It is not necessary for the purposes to excavate these. The location of the entrances in the trenches should be indicated.

The starting line is 40 feet in front of the traversed fire trench. This may be a deep trench or merely a line as desired. The trench gives good practice for the men in getting out of a fire trench, quickly and forming a line beyond. The whole system of trenches should be constructed on ground that can be easily drained.

Accessories

1. Portable gallows for the suspension of from one to four targets are constructed and located at such points as may be desired in the area between the fire trench and the supervision trench and that to the rear of the latter.

Gallows with Dummy.

2. Shell craters may be excavated in the open spaces mentioned above in which dummy targets may be placed.

3. Portable Turk's Head may be constructed and placed at such points as may be desired in the trenches or in the open spaces above ground.

4. Dummy targets may be placed where-ever desired.

TURK'S HEAD.

Dummies in Trenches.

Types of Dummies.

Targets

Target A. Consists of a portable gallows having one dummy target.

Target B. Consists of a portable gallows having two or more dummy targets.

Target C. Consists of a portable gallows the same as Target A, having a dummy target with the stick protruding to the front to represent the opponent's bayonet.

Target D. Consists of a dummy target to lie on the ground or rest against the side wall of the trench.

Target E. Is a Turk's Head.

Construction of Gallows

The gallows for targets A, B, and C is constructed as shown in the plate. Two standards are made as indicated and joined together by pieces of 2×4 of the desired length at A and B. For Target A this length should be about 6 feet; for Target B at least 5 feet should be allowed for each dummy. Where more than two targets are hung the top cross piece had better be a 4×4 instead of a 2×4.

Plan for Gallows for Dummies.

Construction of Dummies

The dummy may consist of a gunny sack filled with straw and packed tightly. It may be an old uniform stuffed with straw. A more elaborate form that tends to hold the bayonet when it is thrust into it may be made as follows:

1. Split a sack along the side and across the end forming a manta. Lay it on the ground.

2. Place a layer of straw about 20 inches wide and nearly the length of the sack, allowing a few inches at the top and bottom for folding over. Now place a layer of good stiff sod on the straw. Follow this with another layer of straw. Follow this of sod and straw until the dummy is 8 or 10 inches thick. Then put a one-quarter board with the grain up and down on top of the whole.

3. Fold in the sides and top tight and sew them together with a strong twine and a baling needle.

4. Run a strong rope around the outside edges, turning it at each corner to make a loop by which the dummy may be hanged to the gallows.

For those dummies that are to sit on the ground a piece of 2-inch plank placed across the bottom before the sacking is folded and sewed will form a good base. On these the rope will be omitted.

Construction of "Turk's Head"

On the end of a pole about six feet long place a ball of straw about 9 inches in diameter, packed tightly in gunny sacking. Sharpen the other end of the pole so that it may be stuck in the ground.

Construction of Parrying Dummy Target

Take one of the ordinary dummies. Put a Turk's Head on a stick about 4 feet long and nail some canvas or gunny sacking to the other end so that the edges will spread out. Sew the canvas to a point on the dummy about two-thirds of the way down the front and suspend it from the top with strong ropes attached to the upper corners of the dummy.

Discs on Target

With a view to attaining accuracy in the points, cardboard discs about 3 inches in diameter should be placed on the front of the dummies. The soldier should not merely try to hit the dummy with his bayonet, but he should endeavor to make hits on the discs.

EACH DUMMY MUST BE REGARDED AS AN ACTUAL ARMED OPPONENT

EXERCISES

The exercises that may be devised with this equipment are of an infinite variety, ranging from practice runs of one man to each bay of the trench, merely going into and out of the trenches, to an entire squad assaulting each bay with targets placed all along the course.

The following are suggested exercises:

Exercise 1

Number of men to make the run: Four, one at each bay.

Targets: No. 1. One Target D, half exposed on parapet at the left corner of Bay 4 to represent a man firing over the parapet.

No. 2. One Target D, resting against the rear wall of the fire trench of Bay 4, at the opening of the dugout, to represent a man just emerging from the squad dugout.

No. 3. One Target A, midway between the fire trench and the supervision trench.

No. 4. One Target E, in supervision trench.

No. 5. One Target D, in supervision trench at the entrance to the communication trench.

No. 6. One Target D, on the ground to the rear of the supervision trench. Note. Targets for the man making the run against Bay 4 are stated. Those for the other men making the run are similarly located.

The Run

The method of making the run will be explained for the man making the run at Bay 4. The other men proceed in a similar manner.

Being in the prone position at the starting point the soldier rises quickly to his feet and advances at the double time (not running) towards Target No. 1, the piece being carried at the "High Port." When within about 8 paces of Target No. 1 the piece is brought to the position of guard and when at the proper distance the target is attacked with a vigorous "Long Point." This is followed by a clean withdrawal.

The soldier then jumps into the fire trench and attacks Target No. 2 or attacks from over the fire trench as is desired. He then climbs out of the fire trench and continues his advance attacking Target No. 3 with a Long Point; No. 4 with a Long Point; No. 5 with a Short Point and No. 6 with a Long Point, each being followed by a clean withdrawal of the bayonet.

Exercise 2

Number of men to make run: Two squads, one at Bays 1 and 2, and the other at Bays 3 and 4.

Targets: The targets are given only for the four men making the run against Bay 4. Those for the other three bays are similarly arranged.

No. 1. Four Targets D, half exposed on parapet of bay to represent men firing over the parapet.

No. 2. Four Targets D, lying on ground or in shell crater a few feet in rear of the bay.

No. 3. Four Targets A or C, in the open area about midway between the fire trench and the supervision trench.

No. 4. Four Targets D in the bottom of the supervision trench.

No. 5. Four Targets E, a few yards in rear of the supervision trench.

The run is conducted in the same manner as explained for Exercise 1. Additional precautions will have to be taken to prevent the men from injuring one another with their bayonets.

The line attacks Target No. 1. The men jump over the fire trench landing on the parados and immediately attack Target No. 2. The line passes on towards Target No. 3, jumping all trenches encountered and attack Target No. 3 with a parry and a point if Target C is used and with a point if Target A is used. The line then goes into the supervision trench and attacks Target No. 4, climbing out immediately and advancing on Target No. 5 which is attacked by a "Jab."

In order to save time a second line may be started from the starting line when the first has passed beyond the fire trench and towards the supervision trench.

After the men have been taken through a thorough course of training in the individual instruction, problems should be devised in which a squad assaults a section of the trench system under the direction of the squad leader. This is followed by exercises conducted by the platoon leader, the strength of the platoon being as many squads as can be employed at one time on the front of the section of trench system available.

END

ADVERTISEMENTS

EDWIN N. APPLETON

PUBLISHER OF

MILITARY BOOKS

1 Broadway, New York

Eastern Distributers for

"THE MOSS PUBLICATIONS"

(Colonel Jas. A. Moss)

COLONEL M.B. STEWART

"THE BANTA PUBLICATIONS"

and

COLONEL W.H. WALDRON

Any Military or Naval Book desired

"What Sammy's Doing"

BY

Colonel JAMES A. MOSS

Colonel WILLIAM H. WALDRON

United States Army

Being a Pictorial Sketch of the Soldier's Life

The mission of this book is to tell and show the folks back home what you, Jack, their boy, are doing at the big training camps throughout the country.

Telling them in a simple text that they can readily understand, and by pictures true to life what you are doing this morning, this afternoon, this evening

Order Your Copy To-day

——Price 75 Cents, postage paid——

FOR SALE BY
EDWIN N. APPLETON
No. 1 Broadway, New York City

THE WALDRON BOOKS

The Infantry Soldier's Hand Book

An illustrated text-book covering the training of the Infantry soldier for war. Every soldier in the army should have a copy. Postpaid, $1.00.

Company Admimstration

A reference book that no Company Commander, First Sergeant or Company Clerk can afford to be without.

The most complete and practical treatment of the subject that has been produced. Postpaid, $1.25.

FOR SALE BY
EDWIN N. APPLETON
1 Broadway New York

THE WALDRON BOOKS

Scouting and Patrolling

Cloth Bound. Fits the Pocket.

WHAT TO DO—HOW TO DO IT

Covers the duties of the individual scout and the operation of the Patrol in "No Man's Land." Postpaid, 50c.

Tactical Walks

A system of instruction for Officers and Non-commissioned Officers for the duties that will devolve upon them in actual service.

No glittering generalities—a book of detail—just what to do, written so you can understand it. Postpaid, $1.50.

Elements of Trench Warfare

Including Bayonet Training

Cloth Bound Fits the Pocket

Compiled from the latest information of how they are going about it on the Western front. Profusely illustrated. Postpaid, 75c.

FOR SALE BY

EDWIN N. APPLETON
1 Broadway New York

Military Sketching and Map Reading

BY

JOHN B. BARNES

Major Fifth U.S. Infantry, Graduate of Army Service School, Graduate of Army Staff College, Instructor Plattsburg Instruction Camp, 1916, Instructor Plattsburg Officers' Training Camp, 1917.

Major Barnes' book is based on an expert knowledge of the subject as taught by the Service Schools, Fort Leavenworth, and an appreciation of the needs of beginners through his wide experience as an instructor of National Guard Officers, and at Officers' Training Camps.

Written with a view of self-instruction, with new and original illustrations that explain simply and graphically the points that are usually found troublesome by beginners.

The new and important subject of Landscape Sketching is thoroughly explained and illustrated.

Map Reading is explained in a few pages. Scales are already constructed. Postpaid, 75c.

EDWIN N. APPLETON
1 Broadway, New York

EDWIN N. APPLETON

Military Text Books Exclusively

WHOLESALE—RETAIL

NO. 1 BROADWAY NEW YORK CITY

EASTERN DISTRIBUTER for

COLONEL JAS. A. MOSS
LT.-COLONEL MERCH B. STEWART
LT.-COLONEL WILLIAM H. WALDRON
LT.-COLONEL FRANK H. LAWTON
LT.-COLONEL D.T. MERRILL
MAJOR RALPH M. PARKER
MAJOR LINCOLN C. ANDREWS
MAJOR O.O. ELLIS
MAJOR E.B. GAREY
MAJOR JOHN B. BARNES

Any Military Publication not listed herein will gladly be obtained for you.

*** END OF THE PROJECT GUTENBERG EBOOK ELEMENTS OF TRENCH WARFARE: BAYONET TRAINING ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG™ LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg electronic works

1.A. By reading or using any part of this Project Gutenberg electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg mission of promoting free access to electronic works by freely sharing Project Gutenberg works in compliance with the terms of this agreement for keeping the Project Gutenberg name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg License must appear prominently whenever any copy of a Project Gutenberg work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg™ License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg work, (b) alteration, modification, or additions or deletions to any Project Gutenberg work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg

Project Gutenberg is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg’s goals and ensuring that the Project Gutenberg collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 41 Watchung Plaza #516, Montclair NJ 07042, USA, +1 (862) 621-9288. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg eBooks with only a loose network of volunteer support.

Project Gutenberg eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

[Pg 5]
[Pg 6]
[Pg 7]
[Pg 8]
[Pg 9]
[Pg 10]
[Pg 11]
[Pg 12]
[Pg 13]
[Pg 14]
[Pg 15]
[Pg 16]
[Pg 17]
[Pg 18]
[Pg 20]
[Pg 21]
[Pg 22]
[Pg 23]
[Pg 24]
[Pg 25]
[Pg 26]
[Pg 27]
[Pg 28]
[Pg 29]
[Pg 30][Pg 31][Pg 32]
[Pg 33]
[Pg 34]
[Pg 35]
[Pg 36]
[Pg 37]
[Pg 41]
[Pg 42]
[Pg 44]
[Pg 45]
[Pg 46]
[Pg 47][Pg 48]
[Pg 49]
[Pg 50]
[Pg 51]
[Pg 53]
[Pg 55]
[Pg 56]
[Pg 57]
[Pg 58]
[Pg 59]
[Pg 60]
[Pg 61]
[Pg 62]
[Pg 63]
[Pg 64]
[Pg 65]
[Pg 66]
[Pg 67]
[Pg 68]
[Pg 69]
[Pg 70]
[Pg 71]
[Pg 72]
[Pg 73]
[Pg 74]
[Pg 75]
[Pg 76]
[Pg 78]
[Pg 79]
[Pg 80]
[Pg 81]
[Pg 82]
[Pg 83]
[Pg 84]
[Pg 85]
[Pg 86]
[Pg 87]
[Pg 88]
[Pg 89]
[Pg 90]
[Pg 91]
[Pg 92]
[Pg 94]
[Pg 95]
[Pg 96]
[Pg 97]
[Pg 98]
[Pg 99]
[Pg 100]
[Pg 101]
[Pg 102]
[Pg 103]
[Pg 104]
[Pg 105]
[Pg 106]
[Pg 107]
[Pg 108]
[Pg 109]
[Pg 110]
[Pg 111]
[Pg 112]
[Pg 113]
[Pg 115]
[Pg 116]
[Pg 117]
[Pg 118]
[Pg 119]
[Pg 120]
[Pg 121]
[Pg 122]
[Pg 123]
[Pg 124]
[Pg 125]
[Pg 126]
[Pg 127]
[Pg 128]
[Pg 129]
[Pg 131]
[Pg 132]
[Pg 133]
[Pg 134]
[Pg 135]
[Pg 136]
[Pg 137]
[Pg 138]
[Pg 139]
[Pg 140]
[Pg 141]
[Pg 142]
[Pg 143]
[Pg 144]
[Pg 145]
[Pg 146]
[Pg 147]
[Pg 148]
[Pg 149]
[Pg 150]
[Pg 151]
[Pg 152]
[Pg 153]
[Pg 154]
[Pg 155]
[Pg 156]
[Pg 157]
[Pg 158]
[Pg 159]
[Pg 160]
[Pg 161]
[Pg 162]
[Pg 163]
[Pg 164]
[Pg 165]
[Pg 166]
[Pg 167]
[Pg 168]
[Pg 169]
[Pg 170]
[Pg 171]
[Pg 172]
[Pg 173]
[Pg 175]
[Pg 176]
[Pg 177]
[Pg 178]
[Pg 179]
[Pg 180]
[Pg 181]
[Pg 182]
[Pg 183]
[Pg 184]
[Pg 185]
[Pg 187]
[Pg 188]
[Pg 189]
[Pg 190]
[Pg 191]
[Pg 192]
[Pg 193]
[Pg 194]
[Pg 195]
[Pg 197]
[Pg 198]
[Pg 199]
[Pg 200]
[Pg 201]
[Pg 202]
[Pg 203]
[Pg 204]
[Pg 205]
[Pg 206]
[Pg 207]
[Pg 208]
[Pg 209]
[Pg 210]
[Pg 211]
[Pg 212]
[Pg 213]
[Pg 214]
[Pg 216]
[Pg 217]
[Pg 218]
[Pg 219]
[Pg 220]
[Pg 221]
[Pg 222]
[Pg 223]
[Pg 224]
[Pg 225]
THE FULL PROJECT GUTENBERG™ LICENSE