Sewage and Garbage Disposal on the Farm
Author: J. W. Rockey; Joseph Winslow Simons
Date: 2020-07-10T00:00:00+00:00
Keywords: Sewage disposal; Rural; Sanitation

The Project Gutenberg eBook of Sewage and Garbage Disposal on the Farm

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Sewage and Garbage Disposal on the Farm

Author: J. W. Rockey

Joseph Winslow Simons

Release date: July 10, 2020 [eBook #62605]
Most recently updated: October 18, 2024

Language: English

Other information and formats: www.gutenberg.org/ebooks/62605

Credits: Produced by Tom Cosmas

*** START OF THE PROJECT GUTENBERG EBOOK SEWAGE AND GARBAGE DISPOSAL ON THE FARM ***

SEWAGE and
GARBAGE
DISPOSAL
on the
FARM

FARMERS' BULLETIN No. 1950
U.S. DEPARTMENT OF AGRICULTURE

T

THIS Bulletin is a guide to up to-date methods for the sanitary disposal of sewage and other household and farm wastes. It tells how to construct satisfactory sanitary facilities and how to maintain them and gives special attention to the questions on sanitation asked most frequently by farm people.

Solutions to all problems cannot be given here, and often advice must be sought from local sanitary officials. Many county and State health departments furnish advice and copies of local regulations and sometimes provide inspection service. Where there are no specific local requirements, this bulletin may be accepted as a guide to safe practice.

| Issued March 1944
Washington, D. C. | Revised June 1946

SEWAGE AND GARBAGE DISPOSAL
ON THE FARM

By J. W. Rockey, assistant agricultural engineer,[1] and J. W. Simons, associate agricultural engineer, Division of Farm Buildings and Rural Housing, Bureau of Plant Industry, Soils, and Agricultural Engineering, Agricultural Research Administration

[1] The senior author prepared the preliminary draft, and the junior author completed the bulletin.

Contents

| Page
Characteristics of sewage | 1
Protection of water sources from household wastes | 2
Septic-tank systems | 2
Operation of a septic tank system | 2
Selecting the site | 4
The house sewer | 4
The septic tank | 8
Building a concrete tank | 11
The effluent sewer | 13
The disposal field | 13
Disposal methods in tight or wet soils | 14
Care and maintenance of septic tanks | 17
Effect of drain solvents and other materials | 17
Protection against freezing | 17
Septic-tank troubles | 18
Grease traps | 18
Disposal of drainage from fixtures other than toilets | 19
Cesspools | 20
Privies | 21
Care, and maintenance | 22
Chemical closets | 24
Disposal of garbage and trash | 25

TO INSURE healthful living, domestic wastes must be disposed of. Primitive wanderers and too often present-day tourists deposit their wastes promiscuously and move on when the surroundings become foul. This is impractical in built-up communities. Therefore, in most cities and in some rural areas sanitary codes regulate the disposal of wastes.

CHARACTERISTICS OF SEWAGE

Household sewage ordinarily consists principally of human excrement, toilet paper, garbage, dish water, and other wash water from the various plumbing fixtures and floor drains.

Many kinds of bacteria, at times disease-producing ones, are contained in the discharges from the human body. Epidemics of typhoid fever, dysentery, diarrhea, cholera, and other water-borne diseases may result from the pollution of the water supply with sewage. Pollution is carried by water moving underground, as well as by water flowing on the surface. This is especially true in limestone regions, where underground channels and rock crevices permit water to flow for considerable distances with little filtering action. Sewage used for fertilizing or irrigating crops[2] may contaminate vegetables or the udders of cows and thus spread disease. Anthrax, cholera, and parasitic worms may be present in the surface drainage from fields and barn lots. It is wise to regard all sewage as dangerous and to dispose of it promptly in a sanitary manner, so that disease germs will not pollute the water supplies or be spread by flies, animals, or man.

[2] This subject is discussed at length in Technical Bulletin 675, Sewage Irrigation as Practiced in the Western States.

PROTECTION OF WATER SOURCES FROM HOUSEHOLD WASTES

Under most farm conditions a safe place for the disposal of wastes is in the upper 3-foot layer of soil, where the action of bacteria tends to render it harmless. Tile disposal fields, such as are used with septic tanks, and earth-pit privies accomplish this if the water table remains several feet below the surface and if the location is remote from water supplies. Cesspools and other types of pits do not ordinarily confine contamination to their immediate vicinity and are not recommended except for special conditions.

Sewage or other wastes discharged into abandoned wells or other pits that reach to the water table or below it are almost certain to contaminate the ground water.

It is generally poor practice, and often illegal, to discharge wastes into surface streams. Streams do not necessarily purify themselves in 50 feet, 100 feet, or some other stated distance, as is commonly believed. They do tend to purify themselves over long distances through the action of sunlight, aeration, and other factors but may not be safe for domestic use for many miles below the source of pollution. Clear, sparkling water is not always safe drinking water. Streams in agricultural communities are subject to many sources of pollution and they are likely to become more contaminated as they merge into larger streams.

SEPTIC-TANK SYSTEMS

Septic-tank systems, if installed and maintained properly, provide the most sanitary method of sewage disposal for farmhouses equipped with running water.

Ground water or rock close to the surface, lack of sufficient fall for the sewage to flow by gravity, and too small an absorption area for the effluent limit the satisfactory operation of a septic tank. When these conditions exist, special advice should be sought from a competent local sanitary authority. Adverse soil conditions can be overcome if sufficient fall and space are available.

The five essential parts (fig. 1) of a septic-tank system are (1) the house sewer; (2) the septic tank; (3) the effluent sewer; (4) the distribution box; and (5) the disposal field. In special cases a grease trap (see fig. 11, p. 19) is added. To facilitate inspection and repairs it is good practice to keep in the house a chart showing the location of the tank and other parts of the system.

A septic tank does not necessarily purify the sewage, eliminate odor, or destroy all solid matter. Its purpose is to condition the sewage or domestic waste by bacterial action, so that it can be disposed of in a more satisfactory manner.

Figure 1.—A septic-tank system.

OPERATION OF A SEPTIC-TANK SYSTEM

In a septic-tank system the sewage flows by gravity from the farmhouse through the sewer into the tank, where it should remain at least 24 hours. While passing through the tank the solids are acted upon by anaerobic bacteria, which work only in the dark and where there is little air. The heavy particles settle to the bottom as sludge, the lighter particles float as scum, and the remainder passes out of the tank through the effluent sewer to the disposal field. The gas released in the process escapes through a vent provided either in the T to the house sewer or the effluent sewer.

A tank that is too small may fill up with solids in a short while, because sufficient time is not allowed for breaking them down by fermentation, or the sewage may be pushed right through into the disposal field and clog it.

The effluent may contain even more disease germs than the original sewage, and though it may be as clear as spring water it is far from pure and may cause foul odors if discharged or allowed to pool on the surface of the ground.

The final disposition of the effluent into the upper layer of the soil exposes it to the action of aerobic bacteria. These bacteria, unlike those in the tank, need air and cannot work in saturated soil or live much more than 3 feet below the surface of the ground. The "living earth," or upper stratum, teems with these bacteria, which convert the dangerous sewage and disease germs into harmless matter and thus tend to purify the effluent if it remains long enough in the top layers of soil before seeping into the subsoil and thence to the ground water. Effluent discharged deep in the soil does not receive the benefit of this purifying action.

Several types of septic tanks are in common use. The one described in this bulletin is the single-chamber type, which can be built with or without siphon. This should meet all average farm needs where there are not more than 16 members in the household. It would be advisable to consult the authorities of the State agricultural college or local health department as to their recommendations because frequently local conditions and larger establishments require special installations.

SELECTING THE SITE

First install the tile disposal field where there will be least danger of polluting water supplies, at least 100 feet from water sources if possible and always at a lower surface elevation. This is of greatest importance. Even though selecting a more distant location would result in greater initial cost, it would be a good investment as protection against diseases that might result from pollution of water sources. The site should slope away from the house and away from the source of water. Gentle unshaded slopes free of trees or shrubbery are best. Root-free locations are important because the open-jointed tile cannot be "rootproofed." Porous, well-drained, gravelly, or sandy soil allows greater purification. Do not have the disposal field in vegetable gardens, under roadways, in swampy land, in muck soils, or in areas having rock substrata sloping toward the water supply. Allow sufficient area, where available, to enlarge the field later if needed.

The septic tank may be close to the house, but a more distant site would reduce the likelihood of odors if leakage occurs. The tank should also be kept 50 feet or more from any source of water supply and at a lower elevation. It should not be placed under driveways, pavements, or flower beds, as these would make it not readily accessible for periodic inspection. Care should be taken to insure that surface drainage from the area around the tank will not reach the vicinity of the water supply.

THE HOUSE SEWER

Material

Vitrified salt-glazed clay or well-made concrete sewer pipe and cast-iron soil pipe are the standard materials for house sewers on farms. Asphalt-impregnated fiber pipe, of a type designed especially for house sewers, appears to be satisfactory for this purpose. Cast-iron soil pipe with leaded joints should be used when the sewer is within 50 feet of a well or suction line from a well, within 10 feet of any drinking-water supply line under pressure, within 5 feet of basement foundations, or when laid beneath driveways with less than 3 feet of earth covering the pipes. When within 15 feet of large trees or shrubs, the sewers should have root-tight joints.

Size

For house sewers, 4- and 6-inch pipes are generally used. Where a 4-inch pipe is used, cast-iron is commonly recommended. Grades with little fall require larger pipes. The large sizes are also less liable to become clogged. Clay pipe is made in pieces 2 or 2^1/2 feet long, whereas fiber-pipe sections are 4 feet long and cast-iron pipe 5 feet long, so that there are fewer joints. The minimum number of joints is desirable, as there is less danger of stoppage.

Alinement

Run the house sewer in a straight line and avoid bends whenever possible. Slight changes in direction may be made with one-sixteenth or one-eighth bend fittings. For sharper changes of direction a manhole or distribution box may be used. Changes in direction of more than 45 are not recommended unless a manhole is provided. Clean-outs are desirable within 5 feet of the septic tank where tanks are placed more than 20 feet from the building and the sewer line is not buried deeper than 4 feet.

Establishing Line and Grade

The trench for laying the sewer is usually dug after the septic-tank excavation has been completed and the elevation of the tank inlet determined. A simple method of setting guides for the excavation is illustrated in figure 2.

Digging the Trench

Start digging the trench at the tank end, so that rain or seepage will have an outlet. Rounding the bottom of the trench to the shape of the pipe and hollowing out basins for the "bell" ends allows the pipe to rest firmly throughout its full length, permits full calking of joints, and relieves the strain on them.

Laying the Pipe

Begin laying the pipe at the tank with the bell end uphill. Joints in clay-tile pipe are commonly made with portland cement mortar or grout. Where root-proof joints are essential, sulfur-sand compounds may be used or copper rings provided and used with cement-mortar joints. Asphalt-mastic compounds, however, are more satisfactory. For cast-iron soil pipe, lead is the standard joint material.

After the hub is pushed into the bell, oakum (or old hemp rope) is packed with a calking iron or a piece of wood (fig. 3, A.) solidly and evenly in the joint to a depth of about half an inch to center the hub end in the bell and to keep the joint filler from getting inside the pipe. Oil, grease, or dirt on the joint surfaces should be removed, as it will prevent joint material from sticking. Figure 3 shows the different jointing methods.

Figure 2.—Establishing grade for sewer. A, 2- by 4-inch stakes are set each side of the trench at convenient distances a, b, c, and d. Then a board is nailed horizontally on the stakes at d at a convenient height above the bottom of the trench, that is, the bottom of the sewer leaving the house. A board is nailed likewise to the stakes at a the same height above the inlet to the tank that d is above the bottom of the trench. Similarly, boards are set at b and c by sighting from a to d so the tops of the intermediate boards will be in line. B, The exact grade of the sewer is obtained by measuring from the grade cord with the 1- by 1-inch stick, shown in detail. The length of the stick must equal the height of the board above sewer at d.

Bituminous, sulfur-sand, lead, and other commercial joint compounds are poured while hot into the joint from a ladle (fig. 3, F), and when the work is well done they form a joint that is practically root-proof. They are more expensive than cement mortar.

For molding hot compounds, a clay dike, or funnel, built about 3 inches high around the triangular opening at the top of the jointer greatly aids in the rapid and complete filling of the joint space. A hot joint must be poured continuously, otherwise a seam may develop between successive pourings.

Bituminous compounds make a slightly elastic joint. A joint in 4-inch pipe requires about 3/8 to 1/2 pound of compound and in 6-inch pipe about 1 to 1^1/2 pounds.

Sulfur-sand joints are hard and inelastic. The compound is made by mixing together equal volumes of ordinary powdered sulfur and very fine clean sand, preferably the finest quicksand, and then heating the mixture until the sulfur melts. A 4-inch joint takes about 3/4 pound and a 6-inch joint about 1^7/8 pounds of the mixture. Commercial sulfur-joint compounds also are available.

Figure 3.—Jointing sewer pipe. A, Using calking iron to force packing into joint. B, Making joint with 1:2 portland cement mortar. Use only enough water to dampen the mix. Recalk after half an hour, to close shrinkage cracks. C, The completed joint. Wrap finished joint with cloth and keep dampened, to aid curing. D, Joint made by pouring 1:1 Portland cement grout of creamy consistency into a form. This type of joint is not feasible unless the metal forms shown are available. E, Use of asbestos runner clamped around pipe, for pouring hot joint. F, Clay roll used in place of asbestos runner. G, A completed bituminous joint. H, Use of swab, to remove any joint material forced through to inside of pipe.

Soft pig lead or old scrap lead is suitable for lead joints on cast-iron pipe. About 3/4 pound per inch of pipe diameter is generally required for each joint. The lead is hot enough to pour when it begins to char the paddle used to skim off the impurities. When it cools it must be calked tightly to take up shrinkage. The calking should be uniform around the entire joint and should stop when the lead is tight. Heavy pounding or continued calking may crack the bell of the pipe.

It is easier to get good, joints when the pipe is in a vertical position. Therefore, two lengths of pipe are frequently joined and are then laid as a single unit in the trench. In using terra cotta pipe, this procedure may be followed only when the joint is made with a mastic compound. Cement-mortar joints cannot be used in such cases.

Before filling the trench, the sewer should be tested to detect possible leaks. Earth free from rubbish and large stones should then be tamped around and about 1 foot above the pipe.

THE SEPTIC TANK

Flow Through the Tank

Slow, undisturbed flow through the tank is necessary for the separation of solids and liquids and for bacterial action. Submerged inlets and outlets or baffle boards reduce disturbance. A submerged outlet prevents scum from passing out with the effluent.

The single-chamber tank without a siphon, shown in figure 4, is easy to build, inexpensive, and entirely satisfactory in most instances. In very tight soils or for large installations a siphon and sometimes two chambers are advisable.

Size

The tank should be large enough to retain the sewage at least 24 hours. The size should be determined by the largest number of persons that may live in the house, rather than by the number actually living there at the time the tank is built. The additional cost of a large tank over a small one is relatively little. If there is any question as to which of two sizes should be built, it is wise to choose the larger. The dimensions recommended in the table in figure 4 are based on an average production of 50 gallons of sewage per person per day.

Unusually large quantities of sewage call for a tank of large capacity. In village and suburban homes where there is less food preparation than on farms and where the number of persons is more or less fixed, slightly smaller sizes will serve. In no case should the capacity of the tank below the flow line be less than 500 gallons. A tank length of two to three times the width should be maintained, and it is advisable to provide a depth of at least 4 feet below the flow line.

Allow about 1 foot of "freeboard," or air space, above the flow line for the accumulation of gases. This space is generally vented through the soil stack of the house.

A siphon (fig. 5) with a dosing chamber is not considered necessary for a farm septic tank except for large installations (1,000 gallons or more), for those in tight soils, and where the disposal field is limited.

CAPACITIES, DIMENSIONS, AND CONCRETE MATERIALS
FOR SEPTIC TANKS SERVING INDIVIDUAL DWELLINGS

Maximum number of persons served | Liquid capacity of tank in gallons | Recommended inside dimensions | Materials for concrete 1:2^1/2:4 mix
Width | Length | Liquid depth | Total depth | Cement sacks | Sand cubic yards | Gravel cubic yards
4 or less | 500 | 3'-0" | 6'-0" | 4'-0" | 5'-0" | 16 | 1^1/2 | 2^1/2
6 | 600 | 3'-0" | 7'-0" | 4'-0" | 5'-0" | 17 | 1^3/4 | 2^3/4
8 | 750 | 3'-6" | 7'-6" | 4'-0" | 5'-0" | 19 | 2 | 3
10 | 900 | 3'-6" | 8'-6" | 4'-0" | 5'-0" | 21 | 2^1/4 | 3^1/4
12 | 1100 | 4'-0" | 5'-6" | 4'-6" | 5'-6" | 24 | 2^1/4 | 3^1/2
14 | 1200 | 4'-0" | 5'-0" | 4'-6" | 5'-6" | 25 | 2^1/2 | 3^3/4
16 | 1500 | 4'-6" | 10'-0" | 4'-6" | 5'-6" | 28 | 2^3/4 | 4^1/4

Figure 4.—Single-chamber septic tank. Note alternate use of baffle boards where sanitary tees are omitted at inlet and outlet.

The siphon provides intermittent discharge of effluent, which allows time for the disposal area to rest and aerate between discharges. This is more important where the discharge is nearly continuous than in small installations.

The frequency and volume of the discharge into the tile field are controlled by the sizes of the siphon and the dosage chamber. The dealer should be informed of the size of the tank and the number of persons in the household, in order that he may furnish the proper unit. A 3- or 4-inch siphon will be adequate for almost any farmhouse installation.

Construction

Most septic tanks are built of concrete cast in place, since in this way there is a minimum possibility of cracks developing. Concrete blocks, however (not cinder blocks), stone, brick, or structural tile are sometimes used. Prefabricated commercial tanks of concrete and various other materials also are available.

SIPHON
Diameter of siphon | A - 3" or 4" | Clearance under bell | E - 2"
Diameter of bell | B - 10"or 12" | Distance across U-trap | F - 10" or 12"

Bottom of outlet to discharge line

C - 20^1/2" to 25^3/4"

Bottom of outlet to
bottom of U-trap>

G - 12" or 13"

Drawing depth | D - 13" to 17" | Height above floor | H - 7^1/4"to 11^3/4"
DIMENSIONS OF DOSING CHAMBER

Number of
persons served

Depth below
discharge line[3]

Width[4]

Length

4 or less | 16^1/4" to 20^1/4" | 3'-0" | 6'-0"
6 | " | 3'-0" | 7'-0"
8 | " | 3'-6" | 7'-6"
10 | " | 3'-6" | 8'-6"
12 | " | 4'-0" | 8'-6"
14 | " | 4'-0" | 9'-0"
16 | " | 4'-6" | 10'-0"

[3] Depending upon depth C of siphon.

[4] Same as single chamber tank fig. 4.

Figure 5.—Typical design for a concrete septic tank with a dosing chamber and a siphon.

Masonry units should be laid in full beds of 1:3 cement mortar and the walls and floor plastered with at least a 1/2-inch coat of 1:2 mortar. Cells of concrete blocks and tile must be filled with concrete. Masonry walls are generally 8 inches thick, and care must be taken to follow inside dimensions given for concrete tanks. Directions for laying structural tile, brick, and concrete blocks can be obtained from dealers or trade associations.

Commercial tanks are suitable if they embody the essential features given in this bulletin. Capacities should be as recommended in figure 4 for concrete tanks. Proper installation and periodic servicing also are essential. Tanks badly damaged in handling should not be used. Rapid corrosion of steel tanks will result if the asphalt coating is impaired. Minor defects in precast masonry tanks may often be overcome by plastering the interior with cement mortar.

BUILDING A CONCRETE TANK[5]

[5] For information on making and placing concrete, see Farmers' Bulletin 1772, Use of Concrete on the Farm.

A convenient method of assuring correct location of the tank is to build a frame as shown in figure 6. Care is necessary to aline it with the center line of the inlet and outlet and to level it so that the distance from the bottom of the 2 by 4's on the form to the lower edge of the inlet hole in the form will permit it to be set at the grade of the house sewer. This frame is used to support the form for the tank. To avoid caving the edges, drive the stakes supporting the frame before beginning the excavation. The lumber in the frame can be used later to make part of the tank baffles.

Figure 6.—Method of outlining a septic-tank excavation on the ground surface.

Figure 7 shows how an inside form can be built and hung in place. The inlet and outlet tees should be carefully set and tied in place before the concrete is poured. A single length of pipe should be joined to the tee, so that the two can be set in the form as one unit. In most cases the earth walls of the excavations will serve as the outside forms unless the soil is sandy or gravelly and the excavation is deeper than 5 feet. If outside forms are used, space must also be provided for them. Forms should be constructed before the excavation is made and the tank built as soon as practical, to avoid warping of forms and caving of earth walls.

Figure 7.—Inside form hung in place for single-chamber septic tank, also a form for casting concrete-slab cover in sections.

County agricultural agents, local health departments, building-material dealers, and other agencies often have forms that may be borrowed or rented.

THE EFFLUENT SEWER

The effluent sewer should be constructed in similar manner and of the same materials as the house sewer and on a slope of 1/8 inch to 1 foot. This line, however, may be laid of terra-cotta pipe, as cast-iron is not considered necessary except in unusual cases. This line should always terminate in a distribution box from which the tile lines of the disposal field lead away. For steep slopes the arrangement shown in figure 9 (p. 15) is practical. Joints must be of root-tight construction if the sewer is in the vicinity of trees or shrubs. The length of the sewer depends upon the distance from the tank to a safe site for the disposal field.

THE DISPOSAL FIELD

Correct installation of the disposal field is of great importance for proper functioning of the septic tank. Therefore, the width, depth, and spacing of the tile trenches must be carefully selected. Line of 4-inch, open- jointed, agricultural drain tile laid in shallow trenches are ordinarily used. Perforated fiber drain pipes also may be used and are obtainable in 4-foot lengths.

A distribution box with an inlet for the effluent sewer and an outlet for each individual run of disposal tile is the best means of dividing the flow. The outlet serving a large or double disposal field may be alternately opened and closed by means of a sewage switch that permits half the disposal field to work and rest alternately several weeks. A switch is especially helpful in tight soils but should not be provided unless proper maintenance is assured, so that a portion of the disposal field will not be left to handle the entire load of the system for an indefinite period. There are many variations of boxes, but figure 8 shows a practical type.

Figure 8.—Typical distribution box.

Shallow Tile Lines

The disposal tile should not be more than 18 to 24 inches below the surface, and where the ground-water level rises to the bottom of the trench special underdrains, described on page 16, are necessary. Special provisions must also be made where tight soils are encountered. These methods are described in the section entitled "Disposal methods in tight or wet soils."

The table in figure 9, together with the information given in table 1, below, may be used for estimating the number of tiles needed in any particular soil type. If there is any doubt about this requirement, a percolation test should be made in the disposal field, as follows:

Dig a hole 1-foot square and to the depth at which the tile is to be laid. This depth in most instances will be about 24 inches and should not exceed 36 inches. Fill the hole with water to a depth of 6 inches and observe the time required for the water to seep away; divide by 6 to get the average time for the water to fall 1 inch. The test should be repeated at three or four different points in the disposal field and the average time noted for all tests used. The data in table 1 can then be used to determine the number of tiles needed. Where 1 hour is required for the water to fall 1 inch the soil is totally unsuitable, and another site should be selected. Soil conditions at the time of the test may vary from year-round average conditions, and this factor must be taken into account. If the soil appears exceptionally dry, greater depths of water may be used or the test repeated in the same hole. In no case should tests be made in filled or frozen ground. Where fissured rock formations are encountered, advice should be sought from sanitation specialists.

Table 1.—Determining tile-disposal field requirements from percolation tests[6]

Minutes required for water to fall 1 inch | Effective absorption area required, per person, in bottom of disposal trenches | Minutes required for water to fall 1 inch | Effective absorption area required, per person, in bottom of disposal trenches
| Square feet | | Square feet
2 or less | 26 | 10 | 52
3 | 30 | 15 | 63
4 | 36 | 30 | 90
5 | 40 | 60[7] | 120

[6] A minimum of 150 square feet should be provided, equal to 100 feet of 18-inch trench.

[7] If more than 60 minutes, use special design with seepage pits or sand-filter trenches.

Figure 9 suggests methods of arranging the tiles in disposal fields under varying conditions and the length of tiles needed.

DISPOSAL-TILE TRENCH

Disposal-tile lines—Maximum length for each line 100 feet. All lines to be equal in length.
Disposal-tile lines to slope 2" to 4" per 100 feet, not over 6". Sewer-tile lines to slope 1/8" to 1/4" per foot.

SIZE AND MINIMUM SPACING REQUIREMENTS
FOR DISPOSAL TRENCHES

TRENCH WIDTH-W IN INCHES | TRENCH DEPTH-D IN INCHES | EFFECTIVE ABSORPTION AREA IN SQUARE FEET PER LINEAL FOOT | TILE LINES SPACING-S IN FEET
18 | 18 to 30 | 1.5 | 6.0
24 | 18 to 30 | 2.0 | 6.0
30 | 18 to 36 | 2.5 | 7.5
36 | 24 to 36 | 3.0 | 9.0

Wider spacing of the lines desirable where
available area permits

Figure 9.—Arrangements for tile-disposal fields, method of laying tile, and length of tiles needed.

DISPOSAL METHODS IN TIGHT OR WET SOILS

If the soil is heavy clay or has tight formation, yet shows some porosity from percolation tests, the efficiency of the field may be increased by placing below the tile lines 12 to 15 inches of additional filter material (washed gravel, crushed stone, slag, clean cinders, or clean bank-run gravel 3/4 to 2^1/2 inches in size). When the surface soil is tight and is underlain by porous soil, sufficient drainage is sometimes obtained for the smaller installations by omitting the tile field and providing a dry well at the end of the effluent sewer, provided the water table will not be contaminated. Larger systems under such soil conditions should have a tile field, and absorption can be increased by boring 6- or 8-inch holes down to the porous stratum and filling them with gravel or sand; the holes should be 4 to 6 feet apart. Another and perhaps the best practice is to excavate the tile trenches 4 to 6 feet and install a lower tile line, as shown in figure 10. This latter method is especially desirable if the upper tight stratum is especially thick, or if there is no porous lower stratum, or if in irrigated regions and where the disposal field is limited in area.

Where the underdrain tile is not used, the absorption capacity of the field can be increased by providing a rock-filled trench across the lower end of the tiles for the full width of the field. The depth should be not less than 5 feet and the width not less than 3 feet.

On account of the beneficial action of bacteria in the upper soil layers it is highly desirable to confine the effluent near the surface rather than to use underdrains. Purification becomes slower and less effective, the deeper the drains.

In situations where the soil contains considerable moisture or is even saturated, the field may be improved by partially encircling it with a tile line laid to serve as a drain. Such a line should be on the high side and have surface outlets for removing the water from the soil. It should not be laid so close to a disposal tile line that it will drain the sewage effluent from the disposal field onto the surface of the ground.

Slope of disposal tile 2 to 4 inches per 100 feet.
Slope of underdrain tile not less than above.
Plug upper end of underdrain tile lines, lower end
to discharge into rock-filled seepage pit or into
other approved outlet.

Figure 10.—Filter trench with underdrains.

When the tile field is underlain by stratified rock or where under-drainage is necessary, advice should be sought from the public health authorities, as regulations in some States may not permit the use of certain methods.

CARE AND MAINTENANCE OF SEPTIC TANKS

A septic tank when first used does not need starters, such as yeast, to promote bacterial action. A good septic tank normally requires no maintenance other than a yearly inspection and an occasional cleaning. Frequency of cleaning depends on the capacity of the tank and the quantity and composition of the sewage. Tanks of the size recommended in this bulletin may require cleaning at intervals of 3 to 5 years.

The tank should be cleaned when 18 to 20 inches of sludge and scum has accumulated. If a drain has not been provided, sludge may be removed by bailing or by pumping with a sludge or bilge pump. It is not necessary to remove the entire liquid contents. Burial in a shallow pit or trench with at least 18 to 24 inches of earth cover at a point remote from water sources is the most practical method for disposing of these wastes.

A septic tank is intended to handle sewage only. Coffee grounds and ground garbage may be included if there is an ample supply of water for flushing and the tank is cleaned more frequently than would otherwise be done. The size of the tank should be increased at least 25 percent if these materials are included in the sewage.

Do not use matches or an open flame to inspect a septic tank, as the gasses produced by decomposing sewage may explode and cause serious injury.

EFFECT OF DRAIN SOLVENTS AND OTHER MATERIALS

Soap, drain solvents, and other mild cleaning or disinfecting solutions used for normal household purposes cause no trouble in the tank. Constant use in large quantities, however, and disinfected wastes from the sickroom may prove harmful.

Wastes from milk rooms, strong chemicals used in sterilizing equipment or in photographic work, and the wastes from filters or water softeners not only reduce bacterial action but also cause abnormally rapid accumulations of sludge and clogging of the tile lines.

PROTECTION AGAINST FREEZING

Septic-tank systems seldom freeze when in constant use. Warm water and the decomposition of the sewage usually maintain above-freezing temperatures. In cold regions there is trouble from freezing if various parts of the system are not covered adequately. If the system is to be out of service for a period of time or if exposure is severe, it may be advisable to mound over the poorly protected parts of the system with earth, hay, straw, brush, leaves, manure, snow, or the like.

In cold regions it is not advisable to install the entire system below frost depth, as this will remove the effluent from the action of the aerobic bacteria in the upper layers of the soil and make the system generally less accessible.

New systems put into operation during very cold weather may freeze unless large quantities of hot water are discharged during the first few weeks.

SEPTIC-TANK TROUBLES

In sewage disposal, clogging of the disposal field is the most common trouble. This may be caused (1) by a tank too small for the volume of sewage, (2) by failure to clean the tank regularly, (3) by interior arrangement that does not provide slow flow through the tank or that allows scum or sludge to pass out with the effluent, or (4) by a disposal field that is too small or is incorrectly built.

The remedy for a clogged disposal field is to dig up and clean the tiles and re-lay them 3 or 4 feet to one side or the other of their former position. Sometimes a tile line can be cleaned by opening up the line at each end and flushing it thoroughly with a hose. With this method provision must be made to drain off and safely dispose of the water used for flushing.

Tile lines laid with improper slope allow the effluent to collect in a limited area and saturate the soil, causing odors. Bacteria cannot work in such areas, where the soil becomes sour, or "sewage-sick." These lines must be relaid on the correct slope. Odors or a water-logged soil may also indicate that the disposal field is too small.

House sewers frequently clog. This is due, in most cases, to roots and less frequently to trash, garbage, or other foreign materials discharged with the sewage. Greases in the sewer may cause trouble, especially when the slope is insufficient to give the sewage a cleansing velocity. Drain solvents will sometimes remove the obstruction, but more often it is necessary to clean the sewer by rodding. In some cases it may be necessary to dig up the line to reach the obstruction or, at least, to open the line so that it can be rodded from two directions. When it has been cleaned, a manhole could be built for use in case of future trouble. If stoppage is due to roots it may be necessary to re-lay the sewer with root-tight joints, or to move either the sewer or the vegetation so that roots cannot reach the line.

GREASE TRAPS

Figure 11.—Typical grease trap.

Grease traps (fig. 11) are not recommended for the average farm, because they clog easily and require frequent cleaning, but they are desirable for boarding houses and tourist camps where large quantities of grease are produced. The septic tank if of proper design and size will take care of the normal grease from most farm kitchens.

The traps must be several times larger than the quantity of greasy water discharged into them at any one time, in order to allow the greases to rise, but they should not be of less than 30 gallons' capacity.

The trap is best located in an accessible place in the basement or under the house close to the source of grease and safe from frost. Outdoor locations at shallow depths require a covering for insulation against freezing. Grease traps should be connected to the kitchen sink only and not to laundry, shower, or water-closet wastes. They must be cleaned periodically for satisfactory operation, and the outlet should be properly trapped.

DISPOSAL OF DRAINAGE FROM FIXTURES OTHER THAN TOILETS

When the farmhouse does not have an indoor toilet but does have a kitchen sink or other similar fixtures, the drainage can be disposed of as shown in figure 12. Even where septic tanks have been installed, it is sometimes advisable to have a second disposal field for other fixtures than the toilet, to avoid overloading the tank, especially where large quantities of laundry water are discharged at one time.

Figure 12.—Disposal of drainage from kitchen fixtures, using a line of terra cotta or fiber drain tile surrounded with gravel. One or two rock-filled pits at the end of the line increase the absorption area and are desirable where there are several fixtures or the soil is nonporous. The pits may be lined with boards or masonry laid without mortar and provided with a tight cover.

These wastes are not likely to create serious health hazards, but they become nuisances if discharged promiscuously on the ground surface. Such drainage should never be permitted on the watershed of a spring.

Coarse sand and gravel, 12 to 18 inches deep, may be placed on the bottom of the pit, to strain out small particles of solids, which might clog the pores of the soil. If, after a few years, the sand or gravel becomes clogged with solids, it should be replaced with clean materials.

If excessive quantities of grease are permitted to enter the sink drain, a grease trap may be advisable.

CESSPOOLS

Cesspools are cheap in first cost but high in maintenance costs and often become nuisances. They should be located at least 150 feet from wells, 15 feet from seepage pits and property lines, and 20 feet from dwelling foundations. They should never be used in the vicinity of shallow wells and, in any case, only where permitted by State regulations.

The cesspool depends for its action upon seepage into the surrounding soil and consequently is particularly unsatisfactory in tight clay soils. In more open sand and gravel soils the seepage is reduced as the pores of the soil become clogged with particles of solids, until it stops entirely, and overflowing occurs. Emptying and then cleaning the walls and floor of a cesspool do not fully open up the clogged soil pores, and overflowing can be expected to occur soon again.

Solids in cesspools must be removed from time to time by bailing or pumping and should then be buried 18 to 24 inches deep in a trench where the water supply will not be endangered. Caustic potash (lye) will to some extent liquefy solids in a cesspool. This treatment does not eliminate the necessity of removing the contents when periodic inspection shows that the cesspool is nearly full. Caustic potash converts the greases into soft soap, whereas caustic soda forms a hard soap that does not readily dissolve. The chemical treatment is not effective in liquefying solids in the pores of the soil surrounding the cesspool.

Figure 13.—A neat, whitewashed lattice along the paved walkway provides protection from cold wind and rain and gives added privacy.

When clogging continues and cannot be corrected, in most cases the best solution to the problem would be to abandon the cesspool and install a septic-tank system with tile disposal field. The cesspool should be completely filled with stones, earth, or other solid materials to avoid possible cave-ins.[8]

[8] See The Septic Tank, p. 8.

PRIVIES

A privy when safely located and properly built and maintained is satisfactory for its purpose on the farm. Privies should be built 50 to 150 feet from the farmhouse, preferably on the opposite side of the house from prevailing winds, and at least 50 feet from the well. A site downhill from the well is generally safest. In some cases, however, the ground water may flow in a direction opposite to the slope of the surface, in which case the privy should be built on the other side of the well. Direction of flow may sometimes be learned from soil surveys, well-driller's data, or other similar sources. A distance of at least 6 feet from fences or other buildings allows for proper mounding of the privy and keeps it away from roof drainage from adjacent buildings.

Good, tight construction with screened ventilators keeps insects and birds from entering, prevents rapid deterioration of the building, and provides greater comfort for the user.

Certain features, while not essential to sanitation and satisfactory service, add to personal convenience. A paved walkway, well protected from cold winds and rain, is desirable. A neat, whitewashed lattice, as shown in figure 13, an arbor covered with vines, or a hedge screen adds to privacy.

The earth-pit privy is the simplest to build and the one most widely used. It is not generally recommended in localities where underground rock has crevices.

For a sanitary type of privy with reinforced concrete[9] floor, riser, and supporting sills see figure 14. Because privy units are commonly used as urinals, the use of impervious materials for risers and floors facilitates cleanliness. In the colder climates, wood treated with a preservative is durable and reduces the problem of moisture condensation. Therefore, wood could be used if approved by the State department of health.

[9] For information on making concrete see Farmers' Bulletin 1772, Use of Concrete on the Farm.

When it is considered impracticable to build the slab and riser of concrete, these parts may be of wood, as shown in figure 16. The building itself may be as shown in either illustration. A wood structure is easy to move to a new location.

A pit with a minimum capacity of 50 cubic feet[10] will usually serve five people over a period of 5 to 10 years. The privy should be moved when the pit is filled to within 18 or 20 inches of the top and a strong disinfectant spread in the old pit before covering it with earth.

[10] Recommended by the Committee on Promotion of Rural Sanitation, Public Health Engineering Section of the American Public Health Association, 1932.

Figure 14.—Sanitary type of privy. Detailed plans and a bill of materials for this design can be had from the United States Public Health Service, Washington 25, D. C.

It is important to have the earth-pit privy more than 50 feet from the well even where the water table is not near the surface. The ground water should flow from the well toward the privy, and it is important that this direction of flow be determined in advance.

Wood is most commonly employed for the main part of the building. The ground outside should be sloped as shown, to shed water away from the building, and the roof should extend beyond the walls to shed water away from the pit.

CARE AND MAINTENANCE

All privies require periodic attention. Seats and covers should be washed weekly with soap and water or with disinfectants, such as cresol, pine oil, and hypochlorite or chloride of lime. These have deodorant properties and are available at most grocery or drug stores. Druggists generally carry a more refined product and consequently the price is higher.

During the fly season fly and mosquito eggs will be destroyed by pouring half a pint of crude oil, crankcase oil, fuel oil, kerosene, or borax solution (1 pound powdered borax dissolved in about 10 gallons of water) over the contents of the pit about once a week.

Figure 15.—Pit privy of all-wood construction. The sills and riser of this type should either be treated or made of cypress, redwood, cedar, locust, fir, or other decay-resistant wood.

Odors from privy pits and vaults can be reduced by covering the contents with dry earth, ashes, manure, or sawdust. These materials fill up the pit rather quickly, but can be used where other deodorants are not available. Sometimes two cakes of yeast dissolved in 2 gallons of water are effective in reducing odors. Commercial deodorants are available from suppliers of disinfectants.

If a person in the family has typhoid fever or is a carrier of that disease or has dysentery, it is advisable to disinfect the excreta. Fire, live steam, boiling water, and such chemicals as caustic soda (sodium hydroxide), caustic potash (potassium hydroxide), or hypochlorite or chloride of lime may be used. The heat generated by the slacking of quicklime is also effective. Best results are obtained if the infected material is treated prior to depositing it in the privy. Further advice may be obtained from physicians, local health officers, or State health departments.

CHEMICAL CLOSETS

In general, chemical closets should be used only where there are elderly or infirm people unable to get outdoors, particularly in winter-time. In some localities their use is forbidden by law because of improper maintenance. Strict adherence to the manufacturer's directions for making the installation is necessary to obtain satisfactory service. The chief advantage of chemical closets is that they may be within or adjoining the house and used without regard to soil or ground-water conditions. The caustic chemicals required, if used properly, reduce the quantity of solid matter by liquefying action, disinfect and deodorize the contents, and lessen danger from flies. Disadvantages are the cost of the chemicals and necessity for careful and constant maintenance.

The chemical-tank closet is generally recommended rather than the dry-type chemical closet. Three variations of tanks are available commercially. One type contains a clean-out opening in the top of the tank, through which the contents are removed by pumping or bailing. The second type has, in addition to a clean-out opening, a drain valve at the bottom, which is operated by a handle extending to a clean-out opening, so that gravity drainage of the tank is possible. The third type is self-draining; as the excreta are added an equal volume of liquid is spilled out the overflow. The solid matter must be removed manually or through the sludge drain.

The last-mentioned type requires frequent addition of chemicals, and the others are recharged after each emptying. The presence of odor is an indication of insufficient chemical or of the need for emptying and recharging. The same precautions apply to selecting an area for disposing of the tank wastes as to disposing of the materials removed from cesspools.[11] Since the contents of chemical closets are caustic, they may kill vegetation with which they come in contact.

[11] For disposal methods in tight soils, see p. 16.

The dry-type chemical closet is cheap, simple, and easy to install but requires frequent emptying. Pine tar and coal tar will accomplish only partial disinfection and deodorization, but caustic disinfectants produce liquefication in addition if used in sufficient quantities. The caustic chemicals may cause burns if the receptacle is too full or if spilled where they come in contact with the body.

This form of closet is more of an expedient than a permanent installation, and daily care is necessary to prevent the development of insanitary conditions.

DISPOSAL OF GARBAGE AND TRASH

Domestic garbage and trash on farms can be divided into four classes—(1) waste of plant or animal origin suitable for animal feed, (2) unpalatable plant or animal waste, (3) combustible trash, and (4) noncombustible material. The disposal of these wastes is simplified if the four classes are kept separate.

Trash to be burned should be kept dry. Coffee grounds, tea leaves, citrus rinds, fish heads, entrails, eggshells, and similar material are most readily handled if drained and put in paper sacks.

Cans should be placed where they will not collect water and become breeding places for mosquitoes. Cans will corrode faster if heated sufficiently to burn off all grease. When the trash accumulates it should be hauled to some out-of-the-way place, such as a gully, or buried.

Neat-appearing garbage containers are desirable for kitchen use and should be small enough to require daily emptying. Large containers may be placed within easy reach outside the house and screened with a lattice fence or shrubbery. Substantial containers of rust-resistant metal will not quickly become an eyesore and a nuisance. Tight covers should be used to keep out prowling animals and to eliminate the habit of tossing wastes from the back door. Open or wooden containers are not recommended.

A good way to protect the garbage pail is to place it in a small pit that has a manhole frame and a lid that can be raised by foot pedal. A gravel bottom in the pit will assist in draining water away.

Outdoor receptacles, if emptied and cleaned once a week, generally do not become foul. Grease, coffee grounds, and other similar materials that adhere to the sides of containers can be removed by scraping with a little sand prior to scalding.

Electrically operated units grind garbage and bones and discharge the material through the kitchen-sink drain. They will not handle tin cans, glass, and the like. They may be used on farms if the septic tank is larger than normal and if sufficient water is available for flushing the drain to prevent clogging.

Garbage to be fed to animals should be preserved as carefully as is human food. To prevent the spread of trichinosis and other diseases, it should be cooked before it is fed to hogs. Garbage left uneaten by the animals should be disposed of by one of the methods described above.

Incineration is the most sanitary method of disposing of farm wastes. Garbage, however, is not easily burned. Figure 16 shows a type of incinerator[12] suitable for farm homes. Details of construction for a brick incinerator are given in figure 17. Brick, stone, concrete, or other fire-resistant material may be used. Commercial incinerators, some of which are designed to be built into the house, also are available, although these cost considerably more than the home-made type shown.

[12] Blueprints of this design may be obtained from the extension agricultural engineers at most of the State colleges.

A limited quantity of refuse may be burned in a kitchen range or a furnace, but it may cause accumulations of grease in the flue and require frequent cleaning to prevent fire.

Next to burning, burial is the most desirable method of waste disposal. Waste material may be deposited in a trench 3 or 4 feet wide, 7 or 8 feet long, and 4 or 5 feet deep and covered with earth when filled to within 18 inches of the top. If there is no fire hazard, the contents of the trench may be burned.

Garbage may be included in a compost heap with leaves, peat, manure, and similar materials. The compost pile should be in an inconspicuous place, built up to the desired height with materials that will rot, and then covered with 2 or 3 inches of earth. The top should be level and the sides steep sloping. It is necessary that the material being composted be kept moist; otherwise it will not rot. Frequently commercial fertilizer is added to increase the fertilizing value of the compost.

Ashes and clinkers removed from furnaces should be placed in metal containers to eliminate fire hazard. Wood ashes may be spread on the lawn or garden, as they have some fertilizing value.

Figure 16.—A satisfactory incinerator for household use.

Figure 17.—Details of construction of the household incinerator pictured in figure 16.
Click on image to view larger sized.

Trash burners of various designs suitable for burning small quantities of paper and rags are available or may be improvised. The main requirements are provision for adequate draft and for preventing the escape of burning paper or live embers.

U. S. GOVERNMENT PRINTING OFFICE: 1948

For sale by the Superintendent of Documents, U. S. Government Printing Office
Washington 25. D. C. - Price 10 cents

Transcriber Note

Illustrations were repositioned so as to not split paragraphs.

*** END OF THE PROJECT GUTENBERG EBOOK SEWAGE AND GARBAGE DISPOSAL ON THE FARM ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG™ LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg electronic works

1.A. By reading or using any part of this Project Gutenberg electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg mission of promoting free access to electronic works by freely sharing Project Gutenberg works in compliance with the terms of this agreement for keeping the Project Gutenberg name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg License must appear prominently whenever any copy of a Project Gutenberg work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg™ License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg work, (b) alteration, modification, or additions or deletions to any Project Gutenberg work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg

Project Gutenberg is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg’s goals and ensuring that the Project Gutenberg collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 41 Watchung Plaza #516, Montclair NJ 07042, USA, +1 (862) 621-9288. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg eBooks with only a loose network of volunteer support.

Project Gutenberg eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

back

Table of Contents

- SEWAGE AND GARBAGE DISPOSAL ON THE FARM
- Contents
- CHARACTERISTICS OF SEWAGE

- PROTECTION OF WATER SOURCES FROM HOUSEHOLD WASTES

- SEPTIC-TANK SYSTEMS

- GREASE TRAPS

- DISPOSAL OF DRAINAGE FROM FIXTURES OTHER THAN TOILETS

- CESSPOOLS
- PRIVIES
- CHEMICAL CLOSETS
- DISPOSAL OF GARBAGE AND TRASH
- THE FULL PROJECT GUTENBERG™ LICENSE