The Project Gutenberg eBook of Rudimentary Architecture for the Use of Beginners, by W. H. Leeds

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at https://www.gutenberg.org/license. If you are not located in the United States, you’ll have to check the laws of the country where you are located before using this eBook.

Title: Rudimentary Architecture for the Use of Beginners

Subtitle: The Orders and Their Æsthetic Principles

Author: W. H. Leeds

Release Date: May 28, 2021 [EBook #65462]

Language: English

*** START OF THIS PROJECT GUTENBERG EBOOK ***

RUDIMENTARY

ARCHITECTURE:

FOR

THE USE OF BEGINNERS.

THE ORDERS,

AND THEIR ÆSTHETIC PRINCIPLES.

BY

W. H. LEEDS, ESQ.

London:

JOHN WEALE,

ARCHITECTURAL LIBRARY, 59, HIGH HOLBORN.

M.DCCC.XLVIII.

CONTENTS.

PAGE

The Orders generally

3

First Order:

Ancient Doric

14

Modern Do.

25

Tuscan

28

Second, or Voluted-capital, Order:

Greek Ionic

30

Roman and Modern

46

Third, or Foliaged-capital Order:

Corinthian

53

Composite

62

Columniation: Forms and Denominations

of Temples and Porticoes

68

Intercolumniation

77

GLOSSARIAL INDEX

82

PREFACE.

It is important that an elementary treatise,—more particularly if it profess to be a popular one, intended for the use of beginners as well as for professional students,—should not only give rules, but explain principles also; and unless the latter be clearly defined, the memory alone is exercised, perhaps fatigued, owing to the former being unsupported by adequate reasoning. To confine instruction to bare matter-of-fact is not to simplify, much less to popularize it; since such mode entirely withholds all that explanation which is so necessary for a beginner, who will else probably feel more disheartened than interested. Any study which is presented in its very driest form by being divested of all that imparts interest to the subject, will soon become dry and uninteresting in itself, and prejudice may thus be excited against it at the very outset.

Those who pursue the profession of Architecture must of course apply themselves to the study of it technically, and acquire their knowledge of it, both theoretical and practical, by methods which partake more or less of routine instruction. Others neither will nor even can do so. If the public are ever to become acquainted with Architecture,—not, indeed, with its scientific and mechanical processes of construction, but in its character of Fine Art and Design,—other methods of study than those hitherto provided must be furnished, as it appears to have been assumed that those alone who have been educated to it professionally can properly understand any thing of even the Art of Architecture,—a fatal mistake, which, had it clearly perceived its own interest, the Profession itself would long since have attempted to remove; it being clearly to the interest of Architects that the public should acquire a taste and relish for Architecture.

The study of Architecture, it may be said, has of late years acquired an increased share of public attention; but it has been too exclusively confined to the Mediæval and Ecclesiastical styles, which have consequently been brought into repute and general favour,—a result which strongly confirms what has just been recommended, namely, the policy of diffusing architectural taste as widely as possible. As yet, the taste for Architecture and the study of it, so promoted, has not been duly extended; for next to that of being acquainted with the Mediæval, the greatest merit, it would seem, is that of being ignorant of Classical Architecture and its Orders; which last, however ill they may have been understood, however greatly corrupted and perverted, influence and pervade, in some degree, the Modern Architecture of all Europe, and of all those countries also to which European civilization has extended. Nevertheless, no popular Manual on the subject of the Orders has yet been provided,—a desideratum which it is the object of the following pages to supply.

W. H. LEEDS.

RUDIMENTARY ARCHITECTURE.

THE ORDERS.

Although this little treatise is limited to the consideration of Ancient and Classic Architecture, we may be allowed to explain briefly what is to be understood by Architecture in its quality of one of the so-called Fine Arts, if only to guard against confused and erroneous notions and misconceptions. It will therefore not be deemed superfluous to state that there is a wide difference between Building and Architecture,—one which is apparently so very obvious that it is difficult to conceive how it can have been overlooked, as it generally has been, by those who have written upon the subject. Without building we cannot have architecture, any more than without language we can have literature; but building and language are only the matériel,—neither, the art which works upon that matériel, nor the productions which it forms out of it. Building is not a fine art, any more than mere speaking or writing is eloquence or poetry. Many have defined architecture to be the art of building according to rule: just as well might they define eloquence to be the art of speaking according to grammar, or poetry the art of composing according to prosody. Infinitely more correct and rational would it be to say that architecture is building greatly refined upon,—elevated to the rank of art by being treated æsthetically, that is to say, artistically. In short, architecture is building with something more than a view to mere utility and convenience; it is building in such a manner as to delight the eye by beauty of forms, to captivate the imagination, and to satisfy that faculty of the mind which we denominate taste. Further than this we shall not prosecute our remarks on the nature of architecture, but come at once to that species of it which is characterized by the Orders.

In its architectural meaning, the term ORDER refers to the system of columniation practised by the Greeks and Romans, and is employed to denote the columns and entablature together; in other words, both the upright supporting pillars and the horizontal beams and roof, or trabeation, supported by them. These two divisions, combined, constitute an Order; and so far all Orders are alike, and might accordingly be reduced to a single one, although, for greater convenience, they are divided into three leading classes or families, distinguished as Doric, Ionic, and Corinthian. It was formerly the fashion to speak of the FIVE ORDERS, and also to treat of them as if each Order were reduced to a positive standard, admitting of very little deviation, instead of being in reality included in many subordinate varieties, which, however they may differ from each other, are all formed according to one common type, and are thereby plainly distinguished from either of the two other Orders. The vulgar Five Orders’ doctrine is, it is to be hoped, now altogether exploded; for if the so-called Tuscan, which is only a ruder and bastard sort of Doric, and of which no accredited ancient examples remain, is to be received as a distinct Order, a similar distinction ought to be established between the original Ancient or Grecian and the derivative Roman and Italian Doric, which differ from the other quite as much, if not more so, than the Tuscan does from either. Even the Grecian Doric itself exhibits many decided varieties, which, though all partaking of one and the same style, constitute so many Doric Orders. The Pæstum-Doric, for instance, is altogether dissimilar from the Athenian or that of the Parthenon. Again, if the Composite is to be received as a distinct Order from the Corinthian, merely on account of its capital being of a mixed character, partaking of the Ionic, inasmuch as it has volutes, and of the Corinthian in its foliage, the Corinthian itself may with equal propriety be subdivided into as many distinct Orders as there are distinct varieties; and the more so, as some of the latter vary from each other very considerably in many other respects than as regards their capitals. Except that the same general name is applied to them, there is very little in common between such an example of the Corinthian or foliaged-capital class as that of the monument of Lysicrates, and that of the Temple at Tivoli, or between either of them or those of the Temple of Jupiter Stator and the Pantheon, not to mention a great many others. Instances of the so-called Composite are, moreover, so exceedingly few, as not even to warrant our calling it the Roman Order, just as if it had been in general use among the Romans in every period of their architecture. With far greater propriety might the Corinthian itself, or what we now so designate, be termed the Roman Order, being not only the one chiefly used by that people, but also the one which they fairly appropriated to themselves, by entering into the spirit of it, and treating it with freedom and artistic feeling. In fact, we are indebted far more to Roman than to Grecian examples for our knowledge of the Corinthian; and it is upon the former that the moderns have modelled their ideal of that Order.

What has been said with regard to striking diversity in the several examples of the Corinthian, holds equally good as to those of the Ionic Order, in which we have to distinguish not only between Roman and Grecian Ionic, but further, between Hellenic and Asiatic Ionic. Nor is that all: there is a palpable difference between those examples whose capitals have a necking to them, and those which have none,—a difference quite as great, if not greater, than that which is recognized as sufficient to establish for the Composite the title of a distinct Order from the Corinthian; inasmuch as the necking greatly enlarges the proportion of the whole capital, and gives increased importance to it. The Ionic capital further admits of a species of variation which cannot possibly take place in those of either of the other two Orders: it may have either two faces and two baluster sides, or four equal and similar sides,—the volutes being, in the latter case, turned diagonally, the mode chiefly practised by the Romans; but by the Greeks, and that not always, in the capitals at the ends of a portico, by placing the diagonal volute at the angle only, so as to obtain two outer faces for the capital, one in front, the other on the ‘return’ or flank of the portico.

It is therefore unnecessary to say, that to divide the Orders into Five, as has been done by all modern writers, until of late years, and to establish for each of them one fixed, uniform character, is altogether a mistake; and not only a mere mistake as regards names and other distinctions, but one which has led to a plodding, mechanical treatment of the respective Orders themselves, nothing being left for the Architect to do, so far as the Order which he employs is concerned, than merely to follow the example which he has selected,—in other words, merely to copy instead of designing, by imitating his model with artistic freedom and spirit. Our view of the matter, on the contrary, greatly simplifies and rationalizes the doctrine of the Orders, and facilitates the study of them by clearing away the contracted notions and prejudices which have been permitted to encumber it; and owing to which, mere conventional rules, equally petty and pedantic, have been substituted for intelligent guiding maxims and principles.

Having thus far briefly explained the rationale of the Orders with regard to the division of them into three leading classes, each of which, distinct from the other two, yet comprises many varieties or species,—which, however much they may differ with respect to minor distinctions, all evidently belong to one and the same style, or what we call Order,—we have now to consider their constituent parts, that is, those which apply to every Order alike. Hitherto it has been usual with most writers to treat of an Order as consisting of three principal parts or divisions, viz. pedestal, column, and entablature. The first of these, however, cannot by any means be regarded as an integral part of an Order. So far from being an essential, it is only an accidental one,—one, moreover, of Roman invention, and applicable only under particular circumstances. The pedestal no more belongs to an Order than an attic or podium placed above the entablature. In the idea of an Order we do not include what is extraneous to the Order itself: it makes no difference whether the columns stand immediately upon the ground or floor, or are raised above it. They almost invariably are so raised, because, were the columns to stand immediately upon the ground or a mere pavement, the effect would be comparatively mean and unsatisfactory; the edifice would hardly seem to stand firmly, and, for want of apparent footing, would look as if it had sunk into the ground, or the soil had accumulated around it. With the view, therefore, of increasing height for the whole structure, and otherwise enhancing its effect, the Greeks placed their temples upon a bold substructure, composed of gradini or deep steps, or upon some sort of continuous stylobate; either of which modes is altogether different from, and affords no precedent for, the pedestal of modern writers. And here it may be remarked, that of the dignity imparted to a portico by a stylobate forming an ascent up to it in front, we have a fine example in that of St. George’s Church, Bloomsbury, which so far imitates the celebrated Maison Carrée at Nismes. Nevertheless, essential as some sort of stylobate is to the edifice itself, it does not properly belong to it, any more than that equally essential—in fact more indispensable part—the roof.

It is not without some regret that we abandon, as wholly untenable, the doctrine of the pedestal being an integral part of an Order: it would be so much more agreeable to say that the entire Order consists of three principal divisions, just the same as each of the divisions themselves. As regards the entire structure, such triplicity, that of ‘beginning, middle, and end,’ was observed. For ‘beginning,’ there was substructure, however denominated, or whether expressly denominated at all, or not; for ‘middle,’ there were the columns; and for ‘end’ or completion, the entablature. For the whole of a structure, there is or ought to be such ‘beginning, middle, and end;’ but from the Order itself we exclude one of them, as not being dependent upon it either for character or treatment.

The pedestal being discarded as something apart from the Order itself, the latter is reduced to the two grand divisions of column and entablature, each of which is subdivided into three distinct parts or members, viz. the column, into base, shaft, and capital; the entablature, into architrave, frieze, and cornice; so that the latter is to the entablature what the capital is to the column, namely, its crowning member,—that which completes it to the eye. Yet, although the above divisions of column and entablature hold good with regard to the general idea of an Order, the primitive Greek or Doric one does not answer to what has just been said, inasmuch as it has no base,—that is, no mouldings which distinctly mark the foot of the column as a separate and ornamented member. Hence it will perhaps be thought that this Order is not so complete as the others, since it wants that member below which corresponds with the capital above. Still the Grecian Doric column is complete in itself: it needs no base,—in fact, does not admit of such addition without forfeiting much of its present character, and thus becoming something different. Were there a distinct base, the mouldings composing it could not very well exceed what is now the lower diameter or actual foot of the column; because, were it to do so, either the base would become too bulky in proportion to the capital, or the latter must be increased so as to make it correspond in size with the enlarged lower extremity. Even then that closeness of intercolumniation (spacing of the columns), which contributes so much to the majestic solidity that characterizes the genuine Doric, could not be observed; unless the columns were put considerably further apart, the bases would scarcely allow sufficient passage between them. The only way of escaping from these objections and difficulties is by making the shaft of the column considerably more slender, so that what was before the measure of the lower diameter of the shaft itself, becomes that of the base. That can be done—has been done, at least something like it; but the result is an attenuated Roman or Italian Doric, differing altogether in proportions from the original type or order. The shaft no longer tapers visibly upwards, or, what is the same thing, expands below.

Before we come to speak of the Orders severally and more in detail, there are some other matters which require to be noticed; one of which is the origin of the Greek system of columniation, or the prototype upon which it was modelled. Following Vitruvius, nearly all writers have agreed to recognize in the columnar style of the ancients the primitive timber hut, as furnishing the first hints for and rudiments of it. Such theory, it must be admitted, is sufficiently plausible, if only because it can be made to account very cleverly for many minor circumstances. Unfortunately, it does not account at all for, or rather is in strong contradiction to, the character of the earliest extant monuments of Greek architecture. Timber construction would have led to very different proportions and different taste. Had the prototype or model been of that material, slenderness and lightness, rather than ponderosity and solidity, would have been aimed at; and the progressive changes in the character of the Orders would have been reversed, since the earliest of them all would also have been the lightest of them all. The principles of stone construction have so evidently dictated and determined the forms and proportions of the original Doric style, as to render the idea of its being fashioned upon a model in the other material little better than an absurd though time-honoured fiction. Infinitely more probable is it, that the Greeks derived their system of architecture from the Egyptians; because, much as it differs from that of the latter people with regard to taste and matters of ornamentation, it partakes very largely of the same constitutional character. At any rate the doctrine of a timber origin applies as well to the Egyptian as to the Hellenic or Grecian style. Indeed, if there be any thing at all that favours such doctrine, it is, that construction with blocks of stone would naturally have suggested square pillars instead of round ones; the latter requiring much greater labour and skill to prepare them than the others. But, as their pyramids and obelisks sufficiently testify, the most prodigal expenditure of labour was not at all regarded by the Egyptians. That, it will perhaps be said, still does not account for the adoption of the circular or cylindrical form for columns. We have therefore to look for some sufficiently probable motive for the adoption of that form; and we think that we find it in convenience. In order to afford due support to the massive blocks of stone placed upon them, the columns were not only very bulky in proportion to their height, but were placed so closely together, not only in the fronts of porticoes, but also within them, that they would scarcely have left any open space. Such inconvenience was accordingly remedied by making the pillars round instead of square. Should such conjectural reason for the adoption of circular columns be rejected, it is left to others to propound a more satisfactory one, or to abide, as many probably will do, by the old notion of columns being so shaped in order to imitate the stems of trees. It is enough that whatever accounts for the columns being round in Egyptian architecture, accounts also for their being the same in that of the Greeks.

Among other fanciful notions entertained with regard to columns and their proportions, is that of the different orders of columns being proportioned in accordance with the human figure. Thus the Doric column is said to represent a robust male figure, and those of the two other Orders, female ones,—the Ionic, a matron; the Corinthian, a less portly specimen of feminality. Now, so far from there being any general similitude between a Grecian Doric column and a robust man, their proportions are directly opposite,—the greater diameter of the column being at its foot, while that of the man is at his shoulders. The one tapers upwards, the other downwards. If the human figure and its proportions had been considered, columns would, in conformity with such type, have been wider at the top of their shafts than below, and would have assumed the shape of a terminus,[1] or of a mummy-chest. With regard to the other two Orders, it is sufficient to observe, that if so borrowed at all, the idea must have been preposterous. We happen to have a well-known example of statues or human figures, and those, moreover, female ones, being substituted for columns beneath an entablature; and so far are they from confirming the pretended analogy between the Ionic column and the proportions of a female, that they decidedly contradict it, those figures being greatly bulkier in their general mass than the bulkiest and stoutest columns of the Doric Order. At any rate, one hypothesis might satisfy those who will not be satisfied without some fancy of the kind, because two together do not agree: if columns originated in the imitation of stems of trees, we can dispense with the imitation of men and women, and vice versá.

Some may think that it is hardly worth while to notice such mere fancies; yet it is surely desirable to attempt to get rid of them by exposing their absurdity, more especially as they still continue to be gravely brought forward and handed down traditionally by those who write upon the Orders, or who, if they do not actually write, repeat what others have written. It is worth while to clear away, if possible, and that, too, at the very outset of the study, erroneous opinions, prejudices, and misconceptions. We do not pretend to explain and trace, step by step, the progress of the Doric Order, and of the columnar system of the Greeks, from their first rudiments and formation. We have only the results of such progressive development or formation; of the actual formation itself we neither know nor can now ever know any thing. The utmost that can now be done is to take the results themselves, and from them to reason backwards to causes and motives. Adopting such a course, we may first observe, that there is a very striking and characteristic difference between Egyptian and Grecian taste and practice in one respect: in the former style the columns are invariably cylindrical, or nearly so,—in the other they are conical, that is, taper upwards, and in some instances so much so, that were they prolonged to double their height, they would be almost perfect cones, and terminate like a spire. This tapering greatly exceeds that of the stems of trees, taking for their stem the trunk, from above which the branches begin to shoot out. It appears to have been adopted for purely artistic reasons, certainly not for the sake of any positive advantage, since the diminution of the shaft, and the great contraction of the diameter just below the capital, must rather decrease than at all add to the strength of the column. What, then, are the artistic qualities so obtained? We reply,—variety and contrast, and the expression of strength without offensive heaviness. The sudden or very perceptible diminution of the shaft,—it must be borne in mind that our remarks refer exclusively to the original Greek style or Doric Order,—produces a double effect; it gives the column an expression of greater stability than it otherwise would, combined with comparative lightness. What is diminution upwards, is also expansion downwards; and similar difference and contrast take place also with respect to the intercolumns, although in a reverse manner, such intercolumns being wider at top than at bottom. So far the principle of contrast here may be said to be twofold, although one of the two sorts of contrast inevitably results from the other. Were it not for the great diminution of the shaft, the columns would appear to be too closely put together, and the intercolumns much too narrow, that is, according, at least, to the mode of intercolumniation practised by the Greeks in most of their structures in the Doric style; whereas such offensive appearance was avoided by the shaft being made considerably smaller at top than at bottom,—consequently the intercolumns wider above than below, in the same ratio; so that columns which at their bases were little more than one diameter apart, became more than two, that is, two upper diameters apart at the top of their shafts, or the neckings of their capitals. In this style every thing was calculated to produce a character of majestic simplicity,—varying, however, or rather progressing, from heaviness and stern severity to comparative lightness of proportions,—for examples differ greatly in that respect: in some of the earlier ones the columns are not more than four diameters in height, while in some of the later they are upwards of six, which last-mentioned proportions not only amount to slenderness, but also destroy others. The capital itself may be proportioned the same as before relatively to the diameter of the column, but it cannot possibly bear the same ratio as before to its height. The average proportions for that member are one diameter for its width at its abacus, and half a diameter for its depth: consequently, if the entire column be only four diameters in height, the capital is ⅛th of it, or equal to ⅐th of the shaft; whereas, if the column be six or more diameters, the capital becomes only ¹/₁₂th of the column, or even less, so that the latter appears thin and attenuated, and the other member too small and insignificant. Yet though the original Greek Order or style exhibits considerable diversity with respect to mere proportions, it was otherwise very limited in its powers of expression, and moreover something quite distinct from the nominal Doric of the Romans and the Italians, as will be evident when we come to compare the latter with it.

Before we enter upon this part of our subject, and previous to an examination of the details of the several Orders, it should be observed that the diameter, that is, the lower diameter of the column, is the standard by which all the other parts and members of an Order are measured. The diameter is divided into 60 minutes, or into two halves or modules of 30 minutes each; and those minutes are again subdivided into parts or seconds when extreme accuracy of measurement is required; which two last are noted thus: 5′ 10″, for instance, meaning five minutes and ten seconds.

DORIC ORDER.

It has been already observed, that in the genuine Doric the column consists of only shaft and capital, which latter is composed of merely an echinus and abacus, the first being a circular convex moulding, spreading out beneath the other member, which, although a very important one, is no more than a plain and shallow square block upon which the architrave rests, not only firmly and safely, but so that the utmost expression of security is obtained, and pronounced emphatically to the eye. Such expression arises from the abacus being larger than the soffit or under surface of the architrave itself; and as the former corresponds, or nearly so, with the lower diameter of the shaft, it serves to make evident at a glance that the foot of the column is greater than the soffit of the architrave placed upon the columns. Thus, as measured at either extremity, the column is greater than the depth or thickness of the architrave, and projects beyond the architrave and general plane of the entablature. Now this would produce a most unsightly effect were the columns of the same, or nearly the same diameter throughout. In such case they would appear not only too large, but most clumsily so, and the entablature would have the look of being set back in the most awkward and most unaccountable manner. Instead of which, the architrave, and consequently the general plane of the whole entablature, actually overhangs the upper part of the shaft, in a plane about midway between the smallest diameter of the column, just below the capital and the face of the abacus. Even this, the overhanging of the entablature, would be not a little offensive to the eye, were the abacus no larger than the architrave is deep; whereas, being larger, it projects forwarder than the face of the architrave, thereby producing a powerful degree of one species of æsthetic effect, namely, contrast,—and if contrast, of course variety also; for though there may be variety without contrast, there cannot be contrast without variety. Another circumstance to be considered is, that were not such projection beyond the face of the architrave given to the abacus, that and the rest of the capital could not correspond with the foot of the shaft, and thus equalize the two extremities of the entire column. As now managed, all contradictions are reconciled, and the different sorts of contrast are made to contribute to and greatly enhance general harmony. In the outline of the column we perceive, first, contraction,—then expansion, and that in both directions,—for in like manner as the column diminishes upwards and the capital expands from it, its shaft may be said to expand and increase in bulk downwards, so as to agree with the abacus or upper extremity.

Though a few exceptions to the contrary exist, the shaft of the Doric column was generally what is technically called fluted, that is, cut into a series of channels touching each other, and thus forming a series of ridges upon its surfaces,—a mode of decoration, we may observe, altogether the reverse of that which was practised by the Egyptians, some of whose columns exhibit, instead of channels or hollows, a series of convex mouldings that give them the appearance of being composed of very slender pillars or rods bound together. Many have attempted, with perhaps pains-taking but idle inquiry, to account for the origin of such fluting or channeling, supposing, among other things, that it was derived from the cracks and crevices in the stems of trees, or from the streakings occasioned by rain on the shafts of the columns. Most perverse ingenuity! We do not find any thing like such marked streakings on columns even in this rainy English climate of ours; much less would they have been at all visible in such a climate as that of Greece. Others have supposed that these channels were at first intended to hold spears! that is, to prevent them from slipping and falling down when set up against a column; than which idea it is hardly possible for the utmost stretch of ingenuity to go farther in absurdity.

We, who are less ambitious, content ourselves with supposing that the fluting of columns was introduced and adopted principally for the sake of effect. If other motives for doing so existed, we know them not, nor need we care, since study of effect alone suffices to account for such mode of decoration. By multiplying its surfaces, it gives variety to the shaft of the column, and prevents it from showing as a mere mass. With the same, or very nearly the same bulk and degree of solidity as before, it causes the column to appear much less heavy than it otherwise would do, and contributes to a pleasing diversity of light and shade, reminding us of Titian’s ‘bunch of grapes.’ Being upon a curved surface, the channels serve to render the circularity of the column more apparent, since, though they are all of the same width, they show to the eye narrower and narrower on each side of the centre one,—no matter in what direction the column is viewed. Here then we have variety combined with uniformity, and a certain apparent or optical irregularity with what we know to be perfect regularity. In the Doric Order the number of channels is either sixteen or twenty,—afterwards increased in the other Orders to twenty-four; for they are invariably of an even number, capable of being divided by four; so that there shall always be a centre flute on each side of the column, that is, in a line with the middle of each side of the abacus. Doric flutings are much broader and shallower than those of the Ionic or Corinthian Orders;—broader for two reasons,—first, because they are fewer in number; and secondly, because there are no fillets or plain spaces left between them upon the surface of the shaft. Their proportionably much greater shallowness, again, may be accounted for equally well: were the channels deeper, not only would they seem to cut into the shaft too much, and weaken it, but also produce much too strong shadows; and another inconvenience would be occasioned, for the arrises or ridges between the channels would become very sharp and thin, and liable to be injured. The mode of fluting Doric columns with mere arrises between the channels, instead of fillets, has been retained by the moderns as characteristic of the Order; but as the Order has been treated by them, it is little better than a mere distinction, with very little regard to general character. In the original Doric almost every part is marked by breadth, or by flatness, or by sharpness. There are no curved mouldings or surfaces, except the cymatium of the cornice and the echinus of the capital, which last is generally kept exceedingly flat. The breadth and shallowness of the channels, and the flat curves in which they commence and terminate, are therefore in perfect keeping with the style in other respects; so also are the sharp arrises or ridges between the channels or flutings on the surface of the shaft, they being expressive of a severe simplicity. The same remark applies to the horizontal annular narrower channels or incisions immediately beneath the echinus of the capital, and lower down, which last are just the reverse of the projecting astragal or convex moulding given to the Doric capital by the moderns. Why such horizontal channels or grooves should have been cut in the very thinnest and weakest part of the column, where they diminish instead of adding to strength, it is not easy to say, except that they were merely for the sake of effect,—of producing shadow, and increasing the proportions of the capital, to which they seem to belong. We leave others, should any be so disposed, to object that the lowermost groove or grooves, as the case may be, give the capital the appearance of being a separate piece, merely joined on to the shaft without such joining being concealed. Looking at it differently, we will rather say that such groove is intended to mark to the eye the commencement of the capital, the portion above it of the shaft being thereby converted into the hypotrachelium or necking of the capital itself, which is thus enlarged in appearance without being actually increased, and rendered unduly heavy. It is not, however, every example of the Order that has such necking: while in some the groove separating the capital from the shaft is diminished to a mere line,—which looks like a joining not intended to show itself,—in others it is omitted altogether. With respect to the echinus, we have little more to remark than that its office—which it performs admirably—is, by expanding out, to connect the diminished upper end of the column with the overhanging abacus; and the former being circular and the latter square, but adapted to each other in size, a beautiful combination is produced of a circle inscribed within a square; and the result is variety, contrast, and harmony. In its profile or section,—by which latter term is understood the contour of any moulding or other member,—it is usually very flat, little more than a portion of a cone (turned downwards), with scarcely any perceptible degree of convexity, except just beneath the abacus, where it is suddenly rounded and diminished, so that the abacus does not seem to press upon or compress it too much.

We arrive now at the entablature, the first or lowermost division of which, the architrave, otherwise called by the Greek name of epistylium (from ἐπι, upon, and στύλος, column), is no more than a plain surface whose height, including the tænia or fillet which finishes it and separates it from the frieze, is equal to the upper diameter of the column. Such, at least, may be considered its standard proportion, that by means of which it conforms to and harmonizes with the column itself. The second or middle division of the entablature, namely, the frieze, constitutes in the Doric style a very characteristic feature of the Order, being invariably distinguished by its triglyphs and metopes. The former of these are upright channeled blocks, affixed to or projecting from the frieze, and are supposed to have been originally intended to represent the ends of inner beams laid upon the architrave transversely to it. The metopes, on the contrary, are not actually architectural members, but merely the intervals or spaces between the triglyphs; so that without the latter there could not be the others, because it is the triglyphs which produce the metopes. With slight variations in different examples, the frieze is of about the same height as the architrave,—a trifle less, rather than more; and the average proportion for the breadth of the triglyphs is the mean diameter of the column, or that taken midway of the shaft. The face of the triglyph has two glyphs or channels carved upon it, and its edges beveled off into a half channel, thus making what is equal to a third glyph, whence the name triglyph, or three-channeled. We have till now reserved speaking of what, although it shows itself upon the architrave, belongs to the triglyph, and is in continuation of it, namely, the fillet and guttæ attached to the tænia of the architrave immediately beneath each triglyph, and corresponding with it in width. These small conical guttæ or drops are supposed, rather whimsically, by some to represent drops of rain that have trickled down the channels of the triglyph, and settled beneath the ledge of the architrave. Others suppose them to have been intended to indicate the heads of nails, screws, or studs. Leaving all such suppositions to those who have a taste for them, we will be satisfied with discerning artistic intention and æsthetic effect. That member of the triglyph,—for such we must be allowed to consider it,—is of great value, serving, as it does, to impart somewhat of decoration to the architrave, to break the monotony of the otherwise uninterrupted line of the tænia, and to connect, to the eye at least, the architrave and frieze together. Although in a much fainter degree, the architrave is thus made to exhibit the same system of placing ornamental members at regular distances from each other, as is so energetically pronounced in the frieze itself. If it be asked why the same, or something equivalent to it, was not extended to the architrave in the other Orders, our answer is, because a similar motive for doing it does not exist. The triglyph being suppressed in the Ionic and Corinthian frieze, the accompanying guttæ beneath it were of necessity omitted also, otherwise they would have made evident that the triglyph ought to have been shown likewise. There is, indeed, one example, the monument of Thrasyllus, of a Grecian Doric entablature, whose frieze is without triglyphs (wreaths being substituted for them), and the guttæ are nevertheless retained. But how?—instead of being placed at intervals, as if there were triglyphs, they are continued uninterruptedly throughout, so that the idea of triglyph disappears; besides which, the example here referred to is altogether so anomalous and exceptional as to be not so much a specimen of the Doric Order as of the Doric style, modified according to particular circumstances; on which account it is highly valuable, since we may learn from it that where peculiar circumstances required—at least admitted of peculiar treatment, the Greeks did not scruple to avail themselves of the liberty so afforded.

With regard to the arrangement of the triglyphs, one is placed over every column, and one or more intermediately over every intercolumn (or space between two columns), at such distance from each other that the metopes are square; in other words, the height of the triglyph is the measure for the distance between it and the next one. In the best Greek examples of the Order there is only a single triglyph over each intercolumn, whence that mode is sometimes called monotriglyphic or single-triglyphed intercolumniation; which is the closest of all, the distance from axis to axis of the columns being limited to the space occupied above by two metopes and two triglyphs, i. e. one whole triglyph and two halves of triglyphs. In such intercolumniation the number of the triglyphs is double the number of the columns, minus one. Further, it is evident that as there must be a triglyph over every column, the triglyphs must regulate the intercolumniation. The width of the intercolumns cannot be at all less than the proportion above mentioned; neither can it be increased, except by introducing a second triglyph,—and if a second triglyph, a second metope also, over each intercolumn, thus augmenting the distance between the columns to half as much again, which becomes, perhaps, too much, the difference between that and the other mode being considerably more than the diameter of a column; whereas in the other Orders the intercolumns may be made, at pleasure, either a little wider or a little narrower than usual. One peculiarity of the Grecian Doric frieze is, that the end triglyphs, instead of being, like the others, in the same axis or central line as the columns beneath, are placed quite up to the edge or outer angle of the frieze. In itself this is, perhaps, rather a defect than the contrary, although intended to obviate another defect,—that of a half metope or blank space there,—for it produces not only some degree of irregularity, but of æsthetic inconsistency also, the triglyph so placed being, as it were, on one side of, instead of directly over the column. One advantage attending it is, that the extreme intercolumns become in consequence narrower than the others by half a triglyph, and accordingly a greater degree and expression of strength is given to the extremities of a portico.

The Doric Cornice.—The third and last division of the entablature which remains to be considered is, although exceedingly simple, strongly characteristic, and boldly marked. With regard to its proportions, it is about a third or even more than a third less than the other two, and may itself be divided into three principal parts or members, viz. the corona, with the mutules and other bed-mouldings, as they are termed, beneath it and the epitithedas above it. The mutules are thin plates or shallow blocks attached to the under side or soffit of the corona, over each triglyph and each metope, with the former of which they correspond in breadth, and their soffits or under-surfaces are wrought into three rows of guttæ or drops, conical or otherwise shaped, each row consisting of six guttæ, or the same number as those beneath each triglyph. Nothing can be more artistically disposed: in like manner, as an intermediate triglyph is placed over every two columns, so is an intermediate mutule over every two triglyphs. The smaller members increase in number as they decrease in size; and in the upper and finishing part of the Order, the eye is led on horizontally, instead of being confined vertically to the lines indicated by the columns below. The corona is merely a boldly projecting flat member, not greatly exceeding in its depth the abacus of the capital; in some examples it is even less. The epitithedas, or uppermost member of the cornice, is sometimes a cymatium, or wavy moulding, convex below and concave above; sometimes an echinus moulding, similar in profile to the echinus of the capital. The cornice may be said to be to the entablature, and indeed to the whole Order, what the capital is to the column,—completing and concluding it in a very artistic manner. By its projection and the shadow which it casts, the cornice gives great spirit and relief to the entablature, which would else appear both heavy and unfinished. In the horizontal cornice beneath a pediment, the epitithedas is omitted, and shows itself only in the sloping or raking cornices, as they are called, along the sides of the pediment.

Antæ.—Pilasters, as well as columns, belong to an Order, and in modern practice are frequently substituted indifferently for columns, where the latter would be engaged or attached to a wall. In Grecian architecture, however, the antæ,—as they are thus termed, to distinguish them from other pilasters,—are never so employed. They are never placed consecutively, or in any series, but merely as a facing at the end of a projecting wall, as where a portico is enclosed at each end by the walls forming the sides of the structure, in which case it is described as a portico in antis. Although they accompany columns, and in the case just mentioned range in the same line with them, antæ differ from them, inasmuch as their shafts are not diminished; for which reason their faces are not made so wide as the diameter of the columns, neither are their capitals treated in the same manner, as both shaft and capital would be exceedingly clumsy. The expanding echinus of the column capital is therefore suppressed, and one or more very slightly projecting faciæ, the uppermost of which is frequently hollowed out below, so as to form in section what is called the ‘bird’s beak’ moulding. In a portico in antis the want of greater congruity between the antæ and the columns is made up for by various contrasts. Flatness of surface is opposed to rotundity, vertical lines to inclined ones (those of the outline and flutings of the column), and uniformity, in regard to light, to the mingled play of light and shade on the shafts of the columns. Instead of attempting to keep up similarity as far as possible, the Greeks made a studied distinction between antæ and columns, not only in those respects which have been noted above, but carried difference still further, inasmuch as they never channeled the faces of their antæ, whereas the moderns flute their pilasters as well as columns. Hardly was such marked distinction a mere arbitrary fashion; it is more rational to suppose that it was adopted for sufficient æsthetic reasons and motives; nor is it difficult to account, according to them, for the omission of channeling on the shafts of antæ. Upon a plain surface the arrises between the channels would have occasioned an unpleasing harshness and dryness of effect, as is the case with fluted Doric pilasters, and would have been attended with monotony also, the lines being all vertical, and consequently parallel to each other; whereas in the column, the channels diminish in breadth upwards, and all the lines are inclined, and instead of being parallel, converge towards each other, so that were the shaft sufficiently prolonged, they would at last meet in a common point or apex similar to that of a spire. Owing to this convergency, the lines on one side of a vertical line dividing the column, or rather a geometrical drawing or elevation of it, into two halves, instead of being parallel, are opposed to each other, like the opposite sides of an isosceles triangle; and this opposition produces correspondence.

PEDIMENT.—In addition to what has been already said relative to this very important feature of Grecian architecture, some further remarks will not be at all superfluous. In the first place, then, the pediment proves to us most convincingly that a figure which, considered merely in itself, is generally regarded as neither beautiful nor applicable to architectural purposes, may be rendered eminently beautiful and satisfactory to the eye. Reasoning abstractedly, it would seem that if such figure is to be made use of at all, the equilateral triangle would recommend itself in preference to any other, as being obviously the most perfect and regular of all triangles. For a pediment, however, such form would be truly monstrous; and yet even the equilateral triangle, or even one of still loftier pitch, may, under some circumstances, become a pleasing architectural form, as we may perceive from pyramids and Gothic gables. How, then, is this seeming inconsistency or contradiction to be explained? It explains itself, if we merely reflect, as we ought to do, that in architecture, forms and proportions are beautiful not positively but only relatively. Were it not so, the same forms and proportions would be beautiful, and equally so under all circumstances, without any regard to purpose or propriety. It must also be taken into account that habit, custom, association of ideas, or prejudice, greatly influence our notions of architectural beauty. We are prejudiced in favour of the low Greek pediment, if for no other reason, because it is sanctioned by Greek authority and is according to Greek precedent. In all probability, had that people employed high-pitched instead of low-pitched pediments, we should, without inquiring further, have admired the former rather than the latter. What we have now to inquire is, why lowness of pitch for the pediment best agrees with the Greek system and its principles. Notwithstanding that the pediment forms no part of the Order, since the latter is complete without it,—and in fact the pediment occurs only at the ends of a sloping roof,—the pediment must, when it does appear, be in accordance with the Order itself, or that front of the building which is beneath the pediment; consequently the pitch of the latter must be regulated by circumstances,—must be either greater or less, according to the proportions of the front itself. So far from being increased in the same ratio, the wider the front,—the greater the number of columns at that end of the building,—the lower must the pediment be kept, because the front itself becomes of low proportions in the same degree as it is extended or widened. Under all circumstances, the height of the pediment must remain pretty nearly the same, and be determined, not by width or horizontal extent, but by the height of what is beneath it. The height of the pediment or its tympanum (the triangular surface included between the horizontal cornice of the Order, and the two raking cornices of the pediment) never greatly exceeds the depth or height of the entablature; for were it to do so, the pediment would become too large and heavy, would take off from the importance of the Order, and appear to load its entablature with an extraneous mass which it was never calculated to bear.

We hardly need observe that it was, if not a constant, a very usual practice with the Ancients to fill in the whole of the tympanum of the pediment with sculpture, and also the metopes of the frieze, by which the latter, instead of being mere blank spaces between the triglyphs, were converted into highly ornamental features.

MODERN DORIC.

Of the Roman and the modern varieties of this Order we shall treat much more briefly, because our remarks may be confined to comparison and the notice of differences. Certain it is that the original character of the Order was gradually lost sight of more and more, till at length it was converted into something quite different from its Greek type. The few circumstances in which Modern Doric, as we may call it, resembles the original one, are little more than the mode of fluting with arrises instead of fillets,—the general form of capital composed of echinus and abacus, and the triglyphs upon the frieze. The differences are, if not greater, far more numerous. The column becomes greatly elongated, being increased from six to eight diameters. The sunk annulets beneath the capital were omitted or converted into fillets; the capital was increased in depth by a distinct necking being given to it, divided from the shaft by a projecting moulding, which in that situation is called an astragal. The abacus, too, is made shallower, and has mouldings added to it. One of the greatest changes of all, as far as the column is concerned, is the addition of a base to it, which is partly both consequence and cause of the greater slenderness of the shaft; for were the shaft not reduced in diameter,—which is the same as being made more diameters in height,—the base added to it would enlarge the foot of the column: so again, on the other hand, were only the shaft decreased in thickness, without any mouldings for a base being added to it, that end of the column would be as much too small. The base best adapted to the Order, as being the most simple, though not uniformly made use of, is that which consists of merely a torus, or large circular and convex-sided block, and two shallow fillets above it. It may here further be noticed, that besides the base itself, or the base proper, the moderns have, for all the Orders alike, adopted an additional member, namely, a rather deep and square block, which, when so applied, is termed a plinth; and beneath this is frequently placed another and deeper one, called a sub-plinth. Contrary as this is to the practice of the Greeks, it is by no means an unwarrantable license, for had no greater liberty been taken with the Orders and the modes of applying them, they would have remained comparatively quite pure. In apology for the plinth beneath a base, it may be said to produce a pleasing agreement between both extremities of the column,—in the Doric Order at least, where the square plinth beneath the circular torus of the base answers to the square abacus (which is itself another plinth, though differently named) placed upon the circular echinus of the capital.

Passing over several particulars which our confined limits will not permit us to notice, we may remark, that if greatly altered, not to say corrupted, from its primitive character, the Doric Order, as treated by the moderns, has been assimilated to the other Orders,—so much so as, though still differing from them in its details, to belong to the same general style. One advantage, if no other, of which is, that it may, should occasion require, be used along with the other Orders; whereas the original or Grecian Doric is so obstinately inflexible that it cannot be made to combine with any thing else, or to bend to modern purposes. So long as a mere portico or colonnade, and nothing more, is required, backed by a wall unperforated by windows, its character and characteristic system of intercolumniation can be kept up, but no longer; or if it is to be done, it is more than has yet been accomplished. Nothing could be more preposterous, or show greater want of proper æsthetic feeling, or greater disregard of æsthetic principles, than the attempt to combine, as was done by Nash in the Park façade of Buckingham Palace, a Grecian Doric Order with a Corinthian one. So totally irreconcileable are the two styles, that it was like placing Tudor or florid Perpendicular Gothic upon the early Lancet style. Besides, in that instance, the Doric, though affecting to be Greek, was depravated most offensively, as may still be seen in what is now left in the two low wings, the architrave and frieze being thrown together into one blank surface.

TUSCAN ORDER.

This, as already stated, is not entitled to rank as a distinct Order, being, in fact, nothing more than a simplified, if not a spurious and debased variety of the Doric. No authentic examples of it exist: it is known only from what Vitruvius says of it, following whose imperfect account, modern writers and architects have endeavoured to make out something answering to it. Yet what has been so produced is to all intents and purposes Doric,—though not Grecian Doric,—excepting that the shafts are unfluted and the frieze quite plain; which last circumstance, and much more, as has just above been intimated, is a mere trifling discrepancy, since not the triglyphs merely, but the frieze may, it seems, be omitted without thereby forfeiting the character of Doric for the Order. Though the Tuscan is spoken of, it is not practised. Almost the only example of what is called by that name in this country is Inigo Jones’s portico of St. Paul’s, Covent Garden, which, though not devoid of character and effect, is remarkable chiefly for the great width of the intercolumns, and the great projection of its very shallow, and therefore too shelf-like cornice, which, if no other part, must be admitted to differ widely from the comparatively slightly projecting and massive Doric cornice. The Tuscan has, however, been treated differently by different Architects, and some of them have given it what is merely a modification of the Doric cornice without its mutules. Their Tuscan becomes, in fact, very little more than a plainer sort of their own Doric, distinguished from it chiefly, and that only negatively, by the omission of triglyphs on the frieze. One thing which the Moderns have done, both in their Doric and their Tuscan, is to assimilate pilasters to columns, giving to the former precisely the same bases and capitals as the others have, and also generally diminishing their shafts in the same manner. Still all the differences here pointed out, together with many minor ones besides, do not constitute different Orders, unless they are to be multiplied by being subdivided into almost as many distinct Orders as there are varieties of one and the same class. All the Dorics and the Tuscan agree in having the echino-abacus capital. Therefore, if we want a quite different and distinct Order, we must turn, as we now do, to the voluted-capital class of columns, or that which bears the name of the

IONIC ORDER.

How this Order originated,—what first led to the adoption of volutes as a suitable decoration for the capital,—whether they were mere decoration, or were at first intended to express some meaning,—whether they were intentionally devised for the latter purpose, or grew out of some accidental hint,—must now be entirely matter of conjecture. Of one thing we may be quite certain, that the Order as we now find it in the best and best known examples, was not struck out all at once, but must have passed through several stages till it was ultimately matured into perfection.

Although the capital is the indicial mark of the Order,—that by which the eye immediately recognizes and distinguishes it,—the entire column is of quite a different character from the Doric. Besides having the addition of a base, the shaft is of more slender or taller proportions, and consequently made much less visibly tapering; for if it diminished in the same degree as the Doric shaft does,—the Ionic being about two diameters longer,—the upper one would, in consequence of such tapering, become much too small; and a further consequence would be that the foot and base of the column would appear much too large,—perhaps clumsily so. Not knowing expressly to the contrary, we are at liberty to suppose that it was the altered form and character of the capital itself which first led to the formation of a base or series of mouldings at the bottom of the shaft, in order to produce such degree of finish below as would correspond with and balance the richness and flow of outline given to the capital. And it must be allowed that the swelling contours of the base are admirably in keeping, and harmonize with the play of curves in the volutes; whereas, were the shaft to stand immediately upon the floor or pavement without any base, as in the Doric Order, although such treatment is in perfect correspondence with the character of that echino-abacus Order, it would be just the reverse in the voluted one. There would be a harshness and abruptness below, in grating discord with the graceful flow of lines in the capital above. This feeling dictated the necessity for a corresponding base, which, although generally spoken of as an addition to the shaft, may with far greater propriety be said to have been taken out of it. Any actual addition to the foot of the shaft would have been the same as an enlargement of it, producing disproportion, and therefore deformity. The most rational explanation therefore is, that the original diameter for the foot of the shaft was retained, but the foot itself shaped into mouldings, and the portion immediately above it pared away or reduced, so that the column became more diameters in height than before. That being done, and a distinct base so obtained, it was found necessary to make a further change, for the sharp arrises of the Doric mode of fluting occasioned a degree of harshness quite at variance with the greater delicacy aimed at in other respects. Those arrises were accordingly converted into fillets, which are not actual members, but merely spaces left between the channels or flutes themselves, which last are consequently narrower than in the Doric column; and their comparative narrowness is further increased by their being augmented in number, from that of twenty to twenty-four. Thus the change from the Doric to the Ionic column may be accounted for, rationally at least, and æsthetically, if not historically. We do not, indeed, profess to know and determine the actual origin of the volutes of the capital, and therefore leave those who put faith in Vitruvius to believe, if they can, that they were derived from the imitation of the curls in a lady’s head-dress; or, as others will have it, that the idea was borrowed either from rams’ horns, or the slender and flexile twigs of trees placed upon the capital for ornament! We also leave those who are not satisfied with our way of accounting for the base given to the Ionic column to fancy that this member was intended to imitate the ancient chaussure or sandals.

The Ionic capital is far more complex than that of the Doric, and not only more complex, but more irregular also: instead of showing, like the other, four equal sides, it exhibits two faces or fronts parallel to the architrave above it, and two narrower baluster sides, as they are termed, beneath the architrave. Some consider this irregularity a defect, which, if such it be, is to be got over only by either turning the volutes diagonally, as in some Roman and modern examples, or by curving concavely the faces of the capital, instead of making them planes, so as to obtain four equal faces or sides, as is done in the capitals of the inner Order of the Temple of Apollo at Bassæ. At least that method, and the other one of turning the volutes diagonally, are the only methods that have been practised for giving perfect regularity to the Ionic capital by means of four equal faces; for, though difficult, it is possible to accomplish the same purpose differently, by making the abacus quite square, as in the Doric Order, and letting the volutes grow out of it on each side or face, their curvature commencing not on the upper horizontal edge, but descending from the vertical edges of the abacus. In fact, the volutes might be fancied to have originated in a prolonged abacus, first falling down on each side beneath the architrave, and then coiled up on the back and front of the column for the two faces, which thus became greater in width; after which a smaller ornamental abacus was introduced as a crowning member, immediately beneath the architrave. As it is now treated, the great extent of the two flat voluted faces prevents the capital from being square. Let us endeavour to explain this: as average measurement, we may put down 50 minutes, or 10 less than the lower diameter, for that of the upper diameter of the shaft; 65 for the sides of the abacus; from 56 to 60 for the soffit of the architrave, which last accordingly overhangs the upper part of the shaft; and 90 minutes, that is, three modules, or a diameter and a half, for the faces of the capital, measured across the volutes. Now, were the capital square—as deep from back to front as it is wide in front—its bulk would be excessive, and out of proportion with the column and other parts of the Order, and inconsistent with the delicacy aimed at in all respects. The mere lateral expansion of the capital, on the contrary, as viewed in front, does not occasion any appearance of heaviness,—rather that of richness; more especially as the bulk is greatly diminished by the following ingenious expedient. Instead of the baluster side being made cylindrical by being kept of the same diameter throughout, and equal to the face of the volute, it is gradually diminished from each face; so that the side of the capital thus becomes in a manner hollowed out; and not only that, but great play of form is imparted to it, and its curvature both contrasts and harmonizes with the curves of the volutes themselves.

If there be not the same completeness with respect to uniformity in all the four sides as is obtained in the Doric and Corinthian capitals, at any rate the most admirable artistic contrivance and propriety are exhibited. The only thing to be objected against the Ionic capital is, that in the end columns of a portico the form of capital just described occasioned obvious if not offensive irregularity, because on the return or side of the building the baluster side showed itself beneath the face of the architrave: yet even this was of little consequence if there was merely a single row of columns in front; but where the colonnade was continued along the flanks of the building also, a very unsightly sort of irregularity was produced; for while all the other columns on those flanks showed the faces of their capitals, the end one would show its baluster side. Here then a difficulty presented itself that demanded some ingenuity to overcome it; and hardly can we sufficiently admire the happy expedient by which it was surmounted. It was necessary to give the capital at the angle two adjoining voluted faces, so that it should agree with those of the other columns both in front and on the flank of the building. This was accordingly effected by placing the volute at the angle, diagonally, so as to obtain there two voluted surfaces placed immediately back to back,—a most happy and simple contrivance, which, now that it has been applied, every one is at liberty to fancy he could have found out for himself. Nevertheless it is not every one that approves of it, for there are some who affect to regard that disposition of the volute at the angle as a defect. If it be strictly considered merely in itself, it may, perhaps, be objected to such capital that in itself it is irregular, one of the volutes in each of its faces being turned obliquely and foreshortened, while the other volute in the same face is seen directly in front, as in all the other capitals. Yet surely such partial and trifling irregularity may very well be excused, instead of being imputed as a defect, since it obviates far greater irregularities, and contributes so effectively to general harmony and symmetry. At all events, it is incumbent upon those who make the objection to show how much better they could have managed matters. So far are we from objecting to it, that we do not see why the same diagonal disposition of the volutes should not, occasionally at least, be employed for all the capitals alike, thereby giving them, although in all other respects perfectly Greek as to style, four uniform faces, as in some of the Roman and Italian examples of the Order.

How little modern Architects are capable of modifying the Ionic capital, and adapting it to particular circumstances, may be seen in the colonnades of the façade of the British Museum, where, at the re-entering or internal angle formed by colonnades at right angles to each other, the column at the angle has two adjoining voluted faces given to it; but as a re-entering or inner angle is circumstanced quite differently from an external one, the consequence is that each of those faces falls opposite the baluster side of the columns ranging with it either way. We explain this briefly in two simple diagrams, in which f indicates the face or voluted side of the capital, and b the baluster side. In an external angle, or the return of a portico, the faces and sides are arranged thus, so that b b b b come opposite each other; but in an internal or re-entering angle, the reverse takes place; for we have then this disposition of the faces and sides of the capitals, in which a voluted face comes opposite to the baluster side of the next capital,—a most unsightly irregularity, and one all the more unpardonable because it could have been got over, if in no other way, by converting that column (a) into a square pillar, which would besides give strength, or the expression of it, where such expression is very desirable.

If these observations on the Ionic capital seem to detain us too long, we cannot help it: they are nothing less than indispensable for a proper understanding of its nature, and the peculiarity of circumstances attending it. What remains to be observed is, that owing to its complexity, that capital admits of very great diversity of character and decoration. It is sometimes without, and sometimes has a necking to it, which may either be plain or decorated, as may best accord with the particular expression, either as to richness or quiet simplicity, which is aimed at as the characteristic of the entire design. The capital may be modified almost infinitely in its proportions; first, as regards its general proportion to the column; secondly, as regards the size of the volutes compared with the width of the face. In the best Greek examples the volutes are much bolder and larger than in those of the Roman and Italian, in some of which they are so greatly reduced in size, and become consequently so far apart from each other, as to be insignificant in themselves, and give the whole capital an expression of meagreness and meanness. The spirals forming the volute supply another source of variety, since they may be either single or manifold. In what is called the Ilissus Ionic capital there is only a single spiral, or hem, whose revolutions form the volute, which mode, indeed, prevails in all the Roman and modern Ionics; but in the capitals of the Temple of Erechtheus at Athens, there are, besides that principal spiral, other intermediate ones which follow the course of its revolutions. Again, the cathetus, or eye of the volute, where the spiral or spirals terminate, admits of being made smaller or larger. It is, besides, sometimes flat, sometimes convex, and occasionally carved as a rosette. All these variations are independent of the general composition of the capital, and though not all equally good, they both suggest and authorize other modifications of the Ionic type, and fresh combinations.

One exceedingly interesting example, highly valuable as suggestive study,—one quite sui generis, and perhaps on that account viewed with more of prejudice than relish, is the internal Order of the Temple of Apollo at Bassæ, delineated and described by Mr. T. L. Donaldson, in the supplementary volume to Stuart’s ‘Athens.’ This example, which seems to have found favour only in the eyes of Mr. C. R. Cockerell, who has employed it on more than one occasion, has, as already intimated, four similar faces; yet if it so far agrees with many Roman and modern Ionic capitals, it differs from them totally in every other respect. While the faces of the latter are formed rather by merely sticking on the volutes diagonally, instead of turning them, so in the example now under notice, each face may be said to be arched, since it curves downwards on each side from the middle of its upper edge, instead of being there straight or horizontal beneath the architrave. Owing to this circumstance the faces of the capital have the look of being rather affixed to than properly connected with the abacus, and there is a certain degree of incongruousness and want of finish. So far, then, there is room for improvement, and perhaps in some other respects also; yet upon the whole there is much to approve of and admire in this capital, among whose peculiarities it deserves to be noted that the space between the volutes is not above half the width of the volutes themselves. Nor is it for its capital alone this that example of the Order is remarkable, its base being equally peculiar, on account of its simplicity of form, and still more so, perhaps, on account of its very great expansion, spreading out below to considerably more than two upper diameters of the shaft; which perhaps causes the capital to appear rather too small in comparison with it. This base is all the more remarkable because it differs entirely from what is called the Ionic base, although not employed by the European Greeks for that Order, who made use of what is styled the Attic base, consisting of two tori and a scotia, or deep curved hollow, between them. The proper Ionic base, or what is so called, differs from every other form of that member, being greatly contracted in its lower mouldings, which, if not a deformity, is not a particular beauty, as it gives the base too much the appearance of being reversed or turned upside down; and hence it is difficult to assign any probable or sufficient motive for such conformation of mouldings in the foot of a column. Perhaps the only modern instance of the application of that base occurs in the tetrastyle (four-columned) portico of Hanover Chapel, Regent Street, whose Order is copied from the Temple of Minerva Polias at Priene, in Asia Minor; to which example we shall presently have occasion to refer again when we come to speak of the Ionic entablature. Before so doing we have to call attention to another peculiarity in the columns within the Temple at Bassæ, whose base is above shown: we allude to the mode in which the shafts are fluted, which seems to indicate a transition from the Doric to the Ionic style, the fillets being exceedingly narrow, and the channels shallow and very slightly curved, which gives the shaft altogether a different character from that attending the usual mode of fluting practised for this Order.

Although it is a modern composition, derived from the study of Greek fragments, yet certainly not on that account the less meritorious than if it were an express copy from some one particular example, we may be allowed to speak of the Order, or rather the columns of the hexastyle (six-columned) portico of the Church in Regent Square, Gray’s Inn Road, erected between twenty and thirty years ago by Mr. Inwood, soon after the completion of St. Pancras’ Church, whose portico so admirably exemplifies the florid and elaborately wrought Ionic of the Temple of Erechtheus at Athens. The columns of the Regent Square Church,—and it is on account of the columns alone that we allude to it,—differ from all other known examples; not only in their bases and capitals, but also in the very peculiar mode of fluting, or rather striating, employed for their shafts. Not having detailed drawings, or any drawings at all to assist us, we cannot pretend to enter into description, but can only say that base, shaft, and capital are unlike all received examples, and at the same time so well adapted to each other as to produce artistic unity and consistency of character; and that character is stamped by breadth and simplicity. With respect to the fluting, it partakes of what may be called striating, the fillets showing themselves rather as narrow surfaces raised upon the shaft, than the channels as positive hollows between them. The capital is at once graceful and simple, and derives much of its peculiar character from the enlarged eye of the volute, which is occupied by a rosette ornament.

Interesting as it would be to particularize other examples, we cannot do so here, which is the less to be regretted because mere verbal remarks, unaccompanied by drawings on such a scale as to fully show all their minutiæ, would not be very satisfactory. Perhaps we shall be thought to have already dwelt rather too long on the mere column, for we have not yet quite done with that part of the Order. It remains to be observed, that notwithstanding its situation is such as to render detail there hardly noticeable, the baluster side of the capital was always enriched. In Greek examples it had a series of wide channels with broad fillets between them, and where great richness was affected, as in the Ionic of the Temple of Erechtheus, the fillets had an additional moulding upon them, carved into beads. In the Asiatic examples, on the contrary, and Roman ones also, the baluster side is usually cut into the form of leaves, bound together, as it were, in the centre by a broad moulded ring, which produces an exceedingly good effect; and indeed, in several instances, much better taste is manifested in that obscure part of the capital than in the face itself.

Although it is repetition to say that the base usually given to this Order by the Greeks was the Attic one, consisting of two tori, divided by a scotia, we here refer to that part of the column again for the purpose of noting a species of enrichment applied to it, the upper torus being sometimes fluted horizontally, at others cut to resemble an interlaced chain-like ornament, now called a guilloche. Modern Architects, however, invariably leave the upper torus of the base quite plain, even when they scrupulously copy every other part of the column. The only instance of channeling upon the upper torus, to which we can point, is that of the portico of St. Pancras’ Church, which building well deserves to be carefully examined and studied by those who would acquire a correct idea of the exquisite finish and richness of Grecian Ionic details, and their effect in execution.

For Ionic Antæ a few words will suffice. Without exactly agreeing with that of the column, the base does not differ very materially from it, except, indeed, in the Ilissus example, where it is lower than the other, and consists only of a shallow scotia with a channeled torus above it. In the Erechtheum example it is distinguished from the column base chiefly by both lower and upper torus being channeled. The capital, or, as it is more commonly termed, anta-cap, on the contrary, is differently shaped from that of the column, in consequence of having no volutes; wherefore it is not by any means so wide, neither is it so deep. The mouldings, too, though of the same character, are differently disposed. Still the anta-cap corresponds with the capital as to plainness or enrichment,—being either carved or not, as those of the latter happen to be; and if the capital has an ornamented necking, so also has the anta. One singularity in the treatment of Ionic antæ, is that of the face of the anta, a slight break being made down the middle of it, which causes it to appear composed of two very narrow faces put together side by side, but not exactly flush with each other. This kind of antæ, in imitation of those of the Erechtheum—perhaps the only precedent for it—has been adopted for St. Pancras’ Church. What could have led to it is rather difficult to conjecture, since there does not appear to be any adequate motive for it, or any purpose gained by it.

IONIC ENTABLATURE.—As expressed in the terms of the diameter of the column, that is, measured by it, the entablature exceeds that of the Doric Order. In the Parthenon the entire height of the entablature is not more than 2 diameters; while in both the Ionic and Erechtheum it is 2 diameters and 17 parts, or the third of a diameter more; whereas it would seem that the Ionic column being much slenderer, the entablature ought to be less than 2 diameters in height, instead of being more. And so it is, and less in a considerable degree: it is the height, not the diameter, of the column which regulates the height of the entablature; in other words, the height of the latter must be in proportion to that of the former.[2] Now 2⅓ diameters for the entablature is much less in proportion to a column 8 or 9 diameters high, than 2 diameters for the entablature is to one that is only 6 diameters high. In the latter case the entablature is equal to one-third of the column, and one-fourth of the whole Order; but in the other, 2⅓ diameters amount to only a fourth, or thereabouts, of the height of the column, and consequently to only about a fifth of the entire Order.

The Ionic architrave does not differ materially from that of the Doric. Its average or standard height is the upper diameter of the column. In the plainer examples of Ionic, such as the Ilissus one, the face of the architrave is quite plain, as in the preceding Order, and distinguished from it only by the Doric tenia being converted into a moulding of a plain bead and small echinus, surmounted by a narrow tenia or broad fillet. In more decorated examples, as that of the Erechtheum, the face of the architrave is divided into three surfaces or courses, called faciæ, which very slightly project before or overhang each other, and the moulding between the architrave and frieze is increased in depth; there is a greater number of mouldings, and some of them are enriched by being carved, or, as it is termed, cut.

As to the Ionic frieze, triglyphs being discarded for it, and no other characteristic members substituted for them, it becomes no more than a plain surface interposed between the architrave and cornice, unless,—as is now never done, although it was, in all probability, generally done by the Ancients,—it is enriched with figures in bas-relief or other sculpture. Yet as mere sculpture of that kind, however essential to effect, is not taken into account, or considered to belong even to the character of an Order, but to be something quite extraneous that may either be introduced or omitted at pleasure, it is omitted accordingly; whereby the frieze is reduced to a mere blank surface, which leaves nothing more to be said concerning it.

The Ionic cornice affords but little scope for further observation, more particularly in the Athenian examples, in which it consists of little more than the corona and cymatium above it, and some narrow bed-mouldings beneath the former member, partly got out of its hollowed soffit or under surface. Consequently the whole cornice looks rather meagre and poor, especially if the richer form of capital with a necking to it be employed for the columns. In such case there is no corresponding degree of richness and increased importance in what is, nevertheless, the completing member or division of the entire Order, and ought accordingly to be treated as such. On this account we hold the cornice of the Erechtheum example to be very unsatisfactory, and to derogate from what is the character of the Order in all other respects: while the capital is particularly ornate, luxuriant, and complicated in design, the cornice, which, as has been before remarked, is to be considered as the capital of the entire Order, is particularly simple and severe; and owing to the want of a sufficiency of bed-mouldings beneath it, the corona appears to jut out too abruptly immediately over the frieze, without due preparation for it. Were the frieze sculptured, such enrichment would, perhaps, without any thing further, confer an adequate degree of ornateness upon the whole entablature, and bring it into keeping with the highly finished columns. If, on the contrary, the frieze is to be left plain, the best way would be to reduce its height a little, and perhaps that of the architrave also, and enlarge the cornice by introducing dentels into it. These last-mentioned members,—which, although considered by modern writers to be characteristic of the Ionic Order, and to be to its cornice what mutules are to the Doric, and modillions to the Corinthian, do not appear to have been so regarded by the Greeks themselves,—consist of a series of narrow upright blocks (supposed to represent the ends of joists), placed closely together, so that the spaces between them, which are only about half as wide as the blocks themselves, appear to indent that portion of the cornice, which, when introduced without being so ornamented, is called an uncut dentel band.

The Priene example, to which we referred when speaking of Ionic bases, offers what, in our opinion at least, is a far better model for an Ionic cornice than that of the Erechtheum, and which, with perhaps some modification of it, might very well be applied to the more florid Athenian Order; and though to do so would be contrary to precedent, that would matter little, so that the change itself were in conformity with artistic effect and æsthetic principles.

The Temple of Jupiter at Aizani in Asia Minor exhibits a remarkable example of the Ionic Order, the details of which were recently published, for the first time, by M. Texier. In its general conformation the base resembles the Priene example; but the entablature is quite different. The architrave is divided into three faciæ, separated by a cut moulding; and the upper faciæ is surmounted by an exceedingly deep and highly enriched course of mouldings. The frieze, too, is ornamented in a very unusual fashion, acanthus leaves being placed upon it at intervals, somewhat after the manner of triglyphs, and connected together with scrolls. The cornice has both dentels and modillions and a narrow corona, but a deep cymatium or epitithedas, enriched with carving.

We will not pursue our notice of the Greek or Ancient Ionic any farther, but here conclude it with observing, that notwithstanding its decided superiority to the Roman, &c., especially in its capital, the former has not been adopted by the Italian and French Architects of the present day. In this country, on the contrary, the Greek Ionic has been employed almost to the entire exclusion of the other, from the time of its being first made known to us by means of Stuart and Revett’s ‘Antiquities of Athens,’ and the ‘Ionian Antiquities;’ to which publications may be added the ‘Unedited Antiquities of Attica,’ which contains other specimens of the Order, found at Eleusis, remarkable for their refined simplicity and also their gracefulness. Not the least important lesson to be derived from these and similar publications is, we permit ourselves to say, the learning from them that the Greeks treated their Orders with artistic spirit and freedom, conforming to a certain type or general standard for each, but varying their details and modifying their proportions.

For examples of Grecian Doric and Ionic which may be seen in London, and which the student would therefore do well to look at and carefully examine for himself, since he will from these learn more than he possibly can do from books alone, we refer to the following buildings: for Doric, the tetrastyle portico of Covent Garden Theatre, and the hexastyle one of the Colosseum in the Regent’s Park; which latter shows the Order to much greater advantage than the other, owing to its being free from such disturbing and very un-antique additions as several doors and windows within it, which inevitably destroy all breadth and repose;—it has also the advantage of a west aspect, by which the full effect of light and shade is produced. For Ionic examples, we refer to St. Pancras’ Church, New Road, whose order is a faithful transcript from that of the Erechtheum; the same building also affords an instance of the application of a caryatid order of female figures in the porch, or rather the porch-like structure, on its north and south sides,—the idea of which is taken from a similar small structure attached to the Athenian Temple;—the University Club House, Pall Mall East, where the same Order is applied upon a much smaller scale, and raised upon a basement floor;—the Chapel in South Audley Street;—the portico of the Post Office, and the façade of the British Museum;—the portico of the College of Surgeons, Lincoln’s Inn Fields, whose columns, proportioned according to the Ilissus example, were originally plain, but were fluted, and the mouldings of the entablature cut, when the building was altered and greatly improved some years ago, by Mr. Barry;—the portico of Hanover Chapel, Regent Street, which, as the reader is already aware, shows the Priene Ionic;—and lastly, for we will not further extend this list, the portico of the India House, Leadenhall Street, which is remarkable for its frieze being sculptured, and its pediment also filled in with figures in relief. Of similar decoration for the Doric Order we cannot point out any instance here, both the metopes of the frieze, and the pediment, being left plain in all our English specimens of that Order.

ROMAN AND MODERN IONIC.

To elucidate this part of our subject at all satisfactorily would require a great number of drawings; accordingly we must make shift as well as we can without them, leaving the student to turn to other works for examples,—should he, as we trust he will, have imbibed from our remarks any relish for the study of the Orders by accurate comparison of various examples of one and the same Order. Neither the Romans nor their modern successors appear to have comprehended the genius of the Ionic Order any more than of the Doric. Their best imitations, both of the one and the other, were of but a bungling kind. They certainly had no great affection for either, for we find comparatively very few instances of them in Roman remains. As treated by them, the Ionic capital was not only greatly impoverished, but deformed also,—impoverished by the volutes being greatly reduced in size, and consequently in importance also, as characteristic marks of the Order,—and deformed, owing to the tasteless treatment of it in other respects. Instead of the gracefully flowing festoon hem, or mouldings over the echinus, which seems to connect the two volutes or sides of the face of the capital together, there is a straight line without any moulding to it, and the echinus, projecting before it, produces an appearance of clumsiness—of the several members not being properly adjusted to each other. As in all the Greek examples, the echinus of the capital, which passes behind the volutes, is invariably carved with that sort of pattern which workmen call ‘eggs and darts,’ ova or egg-shaped ornaments, almost naturally resulting from the contour of the moulding before it is cut; and the echinus of the Ionic, being always so carved, is on that account distinguished by the name of ovolo,—not because its section or profile is any portion of an oval or elliptic curve; for among other things the Roman style differs from the Greek in having all its moulding, both convex and concave, formed of portions of circles, by which its details become less elegant in contour. But we cannot enter into such niceties in a mere rudimentary work. Even in the best Roman and modern examples, the volutes are decidedly inferior to Greek, being comparatively tame and meagre, yet coarse also. Italian Architects have sometimes made them so small and insignificant that they give scarcely any character to the capital, or render it distinguishable, at a little distance, from the Doric, its general mass being no greater. The spiral makes fewer revolutions, and the hem or moulding which forms it is flat, as is also the inter-spiral or general surface of the volute, which has never any secondary spirals upon it, though that and the intervolute are sometimes enriched with foliage.

Of the Roman Ionic Order, as a whole, we know very little, there being only three accredited examples of it, viz. the Theatre of Marcellus, the Temple of Fortuna Virilis, and the Temple of Concord. Of the first of these, the capital is the simplest and plainest, and also the smallest in its proportions; that of the second is by very far the best, its volutes retaining most of the Greek character; and that of the third is remarkable, if not for its ugliness in other respects, for its volutes being turned outwards diagonally, so as to present four equal faces,—a mode afterwards re-invented and brought up as a novelty by Scamozzi, in honour of whom it has since been distinguished by the name of the Scamozzi capital. But if there are few ancient buildings remaining of the Roman Ionic Order, there are numerous detached specimens of it in antique columns that have been preserved by having been made use of in other buildings, or deposited in collections of sculpture. Many of these have been delineated and published by Piranesi and others; and they are so numerous and so varied that we cannot pretend either to classify them, or to particularize even the principal ones. All that we can here say is, that although they fall far short of the refined taste exhibited in Greek examples, some of them possess considerable merit, and supply ideas for other and better varieties. They also serve to convince us that, like the Greeks, the Romans did not abide by a single stereotype pattern for each Order: the attempt to establish such uniformity and conformity to rule was reserved for the Palladios and Vignolas of the 16th century.

There is a fine antique example of the kind in the British Museum, in which the volutes are placed diagonally, and beneath each face of the capital there is not a mere flat mask, but a head, cut out in bold relief, all of them different from each other. The whole is excellently well composed, and highly interesting as a study. One of the varieties of Ionic capitals shown by Piranesi is that from a column in the Church of Santa Maria Transtevere at Rome, which is ornamented on its face with a small head or bust upon the face of the intervolute and abacus, and the eye of the volutes themselves is unusually large, and contains a small half-length female figure carved upon it,—which, though it can be distinctly seen in a drawing, can be hardly perceptible in the column itself. The only other variety of or invention for the Ionic capital that we can notice is one that has frequently been practised by Italian Architects, and which may be distinguished as the festoon or festooned capital, the volutes being turned diagonally, and a festoon being suspended from the eye one volute to that of the other beneath each face. This not only gives variety and richness to the capital, but by increasing its volume or bulk, increases its importance also, and produces great play of light and shade: there is harmony together with diversity in the combination of forms, the curve of the festoon being, though dissimilar, in agreement with the outline of the volutes. The columns of the circular portico to the Church in Langham Place have capitals of this description, in which cherub heads are introduced into the festoons; and so far as the mere capitals go, that specimen of Ionic is entitled to much praise: the misfortune is, that the Order is not satisfactory as a whole; for the increased richness of the capitals requires that there should be a corresponding degree of richness given to the entablature. At present there is no proportion—that is, with regard to decoration—observed; for the same entablature, or cornice at least, which is in keeping with a smaller and plainer capital, cannot be equally adapted to a larger and more ornate one, but partakes of either excess, or the ‘too much’ in the one case, or of deficiency, or the ‘too little’ in the other,—not perhaps as to size, but in regard to the quantum of embellishment. To obviate the meagreness and insignificance of the usual Italian Ionic capital, Sansovino and some others have frequently given it a necking, either plain or enriched, which, even when plain, greatly improves the general appearance of the column by increasing the depth of the capital and reducing the height of the shaft. To make this the clearer, let us, without pretending at all to exactness, call the column nine diameters high, and the capital either half a diameter, or a whole one, accordingly as it is without or with a necking: now in the first case the capital will be to the shaft (base included) only as one to seventeen, whereas in the other it becomes as one to eight; which is not at all too much, while the other way the shaft is much too lanky, and the capital too low,—as is probably felt by those who cannot explain the cause of such disagreement and disproportion.

ENTABLATURE.—There is not much to say, at least there is no occasion for saying much, relative to this part of the Roman and Modern Ionic Order. The ancient examples of it are by far too few to admit of any general laws for it being derived from them; nor are the examples themselves very satisfactory. That of the Ionic of the Theatre of Marcellus is, perhaps, the best upon the whole, and seems to have been that which has guided the Moderns in the composition of their entablature, although they have very greatly diminished the proportions of the cornice, which is there nearly equal to both architrave and frieze together. In the Athenian Ionic we may set down the architrave, frieze, and cornice as about 50, 50, and 35 minutes respectively, making altogether two diameters and 15 minutes (or a quarter of a diameter); therefore the cornice is to each of the other two divisions of the entablature only as 35 to 50. In the Roman Ionic, on the contrary, the cornice is by much the largest division: in the Fortuna Virilis example the measures are,—architrave 38', frieze 19', cornice 70'; in that of the Theatre of Marcellus, 43'—36'—66', making the entire entablature 127', or 2 diameters 7'. Although modern Architects vary from these proportions, and some of them make the frieze equal to or more than the architrave, they all agree—in doctrine at least, if not in practice—in making the cornice the largest division of the entablature; and as the projection is usually equal to its height, or thereabouts, the cornice thus gains in importance both ways, and, as far as its mere proportions are concerned, becomes an adequate finishing to the entire Order. This latter mode certainly appears more in accordance with artistic principle: shall we then presume to say that the Greeks were wrong in their treatment of the Ionic cornice?—Well, let us say then, that they were not quite so right as they might have been. To us, the Asiatic Ionic cornice (for instance that of the Priene Order) is far more satisfactory than either the Hellenic or Athenian; and in our opinion it would require a cornice richer still, to correspond with the highly elaborated Erechtheum capital, and maintain due artistic keeping in the whole of that Order. These remarks partake, perhaps, too much of digression: we will therefore dismiss them, and the cornice also, merely adding that either dentels, or larger plain blocks, placed rather wide apart from each other, are considered the proper characteristic marks of the Ionic cornice.

There is nothing in either the architrave or the frieze that calls for observation, except that the Moderns have frequently given to this Order, by way of distinction, a convex frieze, technically termed a pulvinated one from its fancied resemblance to a cushion (pulvinar), whose sides swell out by compression when sat upon. A frieze of the kind occurs in what is otherwise a very corrupt specimen of the Order, in the Baths of Diocletian. It would be absurd to suppose that such form of frieze originated in an imitation of the thing after which it is now named; and there are two motives, either of which, or both combined, may have led to it. The first of them is, that such curvature in the face of the frieze may have been thought very suitable for the Ionic Order, as agreeing with the curved forms predominating in the character of the capital, namely, the volutes. The second is, that a convex surface produces greater diversity of light and shade than a plain one; and coming between the architrave and cornice, is sufficiently distinguished by contour alone. Still it must be admitted that such form is somewhat too arbitrary and fanciful to be in accordance with strict architectural principles. It is well enough suited for interiors, or for entablatures upon a small scale, such as those of doors and windows, but not for a large external Order. The pulvinated frieze occurs frequently in the Cinque-cento and Renaissance styles, and in our own English Renaissance, or Elizabethan. An instance of it may be seen in that well-known and celebrated piece of architecture by Jones, the front of Whitehall Chapel, whose Ionic Order generally will convey an idea of the Italian mode of treating it. And it so happens that the tasteful little screen front of Dover House (added by Holland to the original mansion), on the opposite side of the street, offers an example of the Ilissus Ionic, whereby immediate comparison between the two styles may easily be made. Another specimen of Italian Ionic, and of Italian Doric, is the new portion lately added to the Carlton Club House, Pall Mall, which is all but a literal copy from Sansovino’s Library of St. Mark at Venice. Sansovino seems there to have aimed at the greatest possible richness for both Orders; and in his building the Doric metopes are sculptured, but are left plain in the Club House, although such decoration for them would have been novelty here, and would have brought that lower Order more into keeping with the upper one. The shafts of the columns are not fluted as in the Italian building, but for very sufficient reason: being of dark polished granite, they would have acquired no great richness in consequence of their being so cut; on the contrary, the effect of the material itself would have been impaired. The Ionic capitals have an ornamented necking, which is here not only a beauty but a great propriety, because without it the capitals would have looked diminutive, more especially beneath such a greatly exaggerated entablature. Tested by ordinary rules, this last must be pronounced monstrous, licentious in the extreme, perhaps downright barbarous; and, no doubt, would be so, were it not protected by the name of Sansovino. His English copyist has therefore sufficient authority for it,—not so, Sansovino himself: whence, then, did he get his precedent? Well, he dispensed with precedent, and using the privilege of a Master in his Art, ventured beyond its written rules and conventionalities,—ventured where he might have failed, and exposed himself to derision,—but succeeded, and has been crowned by applause. In Art, as in other things, success sanctifies enterprize: if you fail, the world calls you a madman or fool; if you succeed, it bows down to you as a genius. It must be confessed that such an entablature as Sansovino has there given his Ionic Order would be nothing less than monstrous, did the Order itself constitute the edifice, as in the antique temple; instead of which, the two Orders there introduced are no more than ornamental accessories, and the greatly enlarged entablature of the upper one is to be regarded as proportioned with reference not so much to its own columns as to the general mass of the entire façade. It may be as well to remark here, that both the Carlton Club House and Whitehall Chapel are instances of super-columniation, or two Orders placed one over the other—in the former building, an Ionic over a Doric—in the latter, a Corinthian over an Ionic Order. And in both cases the columns are attached or engaged, as is said of columns which are united to the face of a wall so as not to project from it as much as their diameter, but only about half or three-quarters of it, and are therefore termed respectively half or three-quarter columns.

CORINTHIAN ORDER.

We now arrive at the third and last of the Orders, or that which is distinguished from the other two, more by its deep and foliaged capital than by its proportions,—at least it is chiefly so distinguished from the Ionic, with which it has in other respects many points in common; for the columns of both have bases differing but little from each other, and their shafts are fluted in the same manner. How this Order came to obtain the name of Corinthian is not very clear; nor is it, architecturally, of any moment whether such name be right or wrong. All that is certain is, that examples of this Order have not been found at Corinth itself, where, judging from its name, it would seem to have been the prevalent style of building, and there brought to perfection. There is a pretty legend relative to the origin of the Corinthian capital, which, if not true, has at least probability in its favour, and is many degrees less nonsensical than the supposed origin of the Ionic one. Nay, it is even valuable and instructive, as showing how well a skilful artist can derive hints from trivial or accidental circumstances, and by improving upon them, turn them to account. As the story goes, the sculptor Callicrates was so struck by the graceful forms into which the leaves of an acanthus plant had grown up around a tall basket covered by a square slab, that he sketched it, and conceived the idea of fashioning the capital of a column after it. It must be owned that the anecdote seems itself to be an invention intended to account poetically for the origin of such form of capital, and perhaps on no better grounds than that of a fancied general resemblance,—just as some dreamers have detected the origin of the Gothic style in an avenue of lofty over-arching trees, or in the interlacing stems of a framing of wicker-work. Unluckily for the credit of so respectable a legend, the earliest examples exhibit, instead of the strongest and most direct resemblance to the presumed prototype, the faintest and most vague of all. The Corinthian capital seems rather to have developed itself gradually out of the Doric one; first, by its necking being deepened and ornamented with a row of leaves, and then afterwards the echinus suppressed, and the whole body of the capital made to expand in a concave curve up to the abacus, with a second row of plain and flatter leaves above the first one. At least the capitals to the small columns of the porches of the Tower of the Winds at Athens, and others discovered at Miletus and elsewhere, seem to favour such hypothesis; and in further evidence of such Doric derivation is the circumstance of the columns of the Tower of the Winds being without bases. It will be argued, perhaps, that such examples do not all answer to the character afterwards established and adhered to for capitals belonging to that Order. Very true: but then they may surely be received as incipient efforts and attempts towards the formation of a third class of capitals; and in the instances just referred to, the overhanging square abacus without any foliage or curling tendrils spreading out to support its extremities, points, in our opinion, clearly enough to a derivation from the Doric capital, considerably enlarged downwards, and also greatly enriched. However, we leave others either to adopt or reject this notion, just as they may be disposed. At the best, all such questions are little better than matters of idle curiosity, and must always remain questions after all.

To quit conjecture for fact, the fact is the Corinthian Order does not appear to have been ever matured into a distinct style and complete system by the Greeks. There is, indeed, one solitary Athenian example of Corinthian, which exhibits the utmost refinement of exquisite richness attempered by exquisite delicacy. In the Lysicrates capital,—as we will for convenience call it (the example alluded to being that of the monument of Lysicrates, otherwise called the Lantern of Demosthenes, at Athens),—foliation may be said to have attained its culminating point: rivalled it may be, but hardly surpassed. Still it must be confessed, as a whole, that Order leaves much to be desired for it, there being nothing of corresponding beauty and luxuriance in the rest of it. The cornice, for instance, is only a simple dentelled Ionic one, nor are any of the mouldings of the entablature cut. There was, however, in that particular case, above the entablature, what fully counterbalances and carries out the idea and expression of the capitals, namely, the ornamental roofing, and the matchless finial which crowns the structure, and produces a full climax of beauty and of grace. Charming as the original itself is, or, more correctly speaking, was, it has perhaps been more blunderingly copied and imitated than almost any other antique structure. Although the whole—its lofty-proportioned basement included—is not above 36 feet high, a copy of it, or what calls itself such, has sometimes been hoisted up on the top of a lofty tower, or raised on a modern church or chapel to serve as its belfry; or else the columns and entablature have been taken just verbatim, and applied, by way of change, as an Order, upon a scale for which the capitals, at least, were never intended. The Strand front or entrance of Exeter Hall consists of a loggia with lofty columns of the kind, whose capitals, being placed at such a height, show as no better than heavy sculptured masses whose details it is impossible, or at least requires great patience, to make out. More preposterously still, the Girard College at Philadelphia plumes itself upon exhibiting an exact copy of this Order, where the columns are magnified to the height of between fifty and sixty feet, so that all that can be made out of the capital is, that it is exceedingly rich,—by very far too much so for any other part or feature in the building;—and that is called being classical!

Let us now consider the Corinthian Order in its general and prominent characteristics, belonging to all varieties of it alike. Although the Order itself is the most delicate and lightest of the three, the capital is the largest, being considerably more than a diameter in height,—upon the average, about a diameter and a quarter. This, however, will cause the reader no surprise, if he bears in mind what has been before said as to the proportion to be observed between the column and its capital. The taller the former is, the taller must be the latter also, and so far bulkier; although, while actually increasing its bulk, its tallness corrects the appearance of heaviness by giving the proportion of slenderness. A capital whose height is only half a diameter is, of course, by no means positively so bulky as one which is upwards of an entire diameter in height, but then it is much bulkier or broader in its proportions, being about twice as broad as it is high,—whereas the other is much higher than it is wide. This explanation makes, we hope, the matter sufficiently clear, and that after it the reader will not feel himself at all puzzled about it.

The capital has two rows of leaves, eight in each row, so disposed that of the taller ones composing the upper row, one comes in the middle, beneath each face of the abacus, and the lower leaves alternate with the upper ones, coming between the stems of the latter; so that in the first or lower tier of leaves there is in the middle of each face a space between two leaves occupied by the stem of the central leaf above them. Over these two rows is a third series of four leaves, turned so as to support the small volutes which, in turn, support the angles of the abacus. Besides these outer volutes, which are invariably turned diagonally, as in the four-faced Ionic capital, there are two other smaller ones, termed caulicoli, which meet each other beneath a flower on the face of the abacus. The abacus itself is differently shaped from what it is in either of the other two Orders. In the Doric it is, as we have seen, merely a thick square slab, fitting the echinus beneath it, and left perfectly plain. In the Ionic it is square, but its sides are moulded, whether they are carved or not. The Corinthian abacus, on the contrary, is not, properly speaking, a square, although it may be said to be so in its general form, inasmuch as it possesses squareness, having four equal sides. Instead of being straight, the sides of the abacus are concave in plan, being curved outwards so as to produce a sharp point at each corner, which is accordingly cut off. Thus we find that the abacus here assumes a very different shape from its original one; yet merely to know this is to know very little. Such form of it is of course a distinction, but it was not for the sake of distinction that it was adopted. It grew out of intention and purpose: it was dictated by necessity—by artistic necessity at least, which requires that the abacus should be adjusted to and conform to the upper part of the capital, so that they fit each other. Now a square abacus would not at all suit a capital whose foliage spreads out so widely at its angles. We have spoken of the capitals of the Tower of the Winds, as, according to our opinion, showing the earliest formation of what we now call the Corinthian capital. In that example the abacus is square, and the upper row of leaves are of the kind called water-leaves, from their resemblance to those of water-plants, being broad and flat, and merely carved upon the vase or body of the capital. The next stage of progress or transition was to add larger curling leaves and volutes to support the angles of the abacus; but then if the abacus remained square as before, it would either overhang the capital too much in the centre of each face of it, or would not cover the enlarged sweep of the leaves and volutes at the angles. Consequently, it was necessary to effect both extension and reduction for the abacus,—extension at its angles, and reduction as regards its general bulk, which beforehand apparently very difficult, if not impossible feat, was accomplished in the simplest manner possible, by merely curving the sides of the abacus. Thus not only is the abacus expressly shaped in conformity with the great projection of the leaves, &c., at the four angles of the capital,[3] but a beautiful contrast, contributing to general harmony, ensues in consequence,—the concave sides of the abacus corresponding antithetically—in other words, contrasting with the general convexity of the capital.

The general structure and configuration of the Corinthian capital are now described, and, it is to be hoped, understood also. It may be as well, however, just to recapitulate: the body of the capital is surrounded by two rows of leaves, eight in each row; besides which there are four leaves, which, with the volutes over them, serve to support the four angles of the abacus, which is fashioned as we have just been explaining. Simple and limited as these elementary and constitutional forms may be thought to be,—insufficient for any great variety or range of character, the Corinthian capital admits of almost infinite modification. Putting entirely aside all details and their minutiæ, the capital of this Order is susceptible of very great diversity of character in regard to its general proportions alone, as may be seen by a comparison of a few—and they but a very few—examples given in a note below.[4]

Almost every antique example is marked by something peculiar to itself; wherefore, properly to analyze them and compare them all, would require not only some scores, but some hundreds of drawings, and hundreds might be multiplied into thousands, were we to collect together all the varieties of the descendants of the Corinthian or foliaged-capital column that are to be found in buildings of the so-called Byzantine style, when the original idea of an Order had been entirely lost sight of. In fact, all the compositions that have been produced with the intention of producing a new, and what as such ought to be a perfectly distinct Order, congruent in all its parts, have consisted of little more than variations of the Corinthian capital; as if difference in the details of the capital sufficed to constitute a different and quite distinct Order. Properly understood, Order is, if not exactly so, little more than another word for style; and a new style is not to be invented or established, like the alteration from old to new style of the almanac by Act of Parliament. Style must of necessity grow up gradually: the ideas of many minds must contribute to its formation.

From the examples whose proportions are stated in the preceding note, it will be seen that the height of the capital varies from 60', or just a diameter, to 87', or nearly half as much again; although it must be allowed that the latter is a very unusual degree of height, nor does that example (the Lysicrates one) belong, like the others, to the Roman Corinthian class. Reserving our remarks on one or two particular specimens of the latter till after we have spoken generally of the other parts of the Order, we continue by saying that the proper Corinthian base differs from that of the usual Ionic or Attic in having two smaller scotiæ, separated by two astragals: however, both kinds are employed indiscriminately, and the Attic is that which is generally used, except a greater degree of delicacy and richness than ordinary be required. As the shaft is fluted similarly to that of the Ionic column, viz. with twenty-four channels, there is nothing for notice or remark there, unless it be that the flutes are sometimes cabled, as it is called, that is, the channels are hollowed out for only about two-thirds of the upper part of the shaft, and the remainder cut so that each channel has the appearance of being partly filled up by a round staff or piece of rope, whence the term cabling. Though not approved by puritan critics,—who, nevertheless, wink at, or else are blind to much greater licenses,—this mode of fluting certainly gives an expression of greater strength to the lower part of the column, and, by contrast, that of greater delicacy to the upper one. Although fluting, for the columns, seems to have been considered by the Ancients essential to the character of this Order, the Moderns appear to consider it quite a matter of indifference, and what may be omitted at discretion. Undoubtedly there are several antique examples exceedingly richly decorated in all other respects, yet with the shafts of the columns unfluted; but then that was for very good reason, the shafts being either of polished granite, or precious marble, whose intrinsic value and beauty fully supplied the place of further embellishment.

ENTABLATURE.—The architrave is generally divided into three faciæ, (the lower one much narrower than the others, which is rather contrary to architectonic principle, the weaker member being placed under heavier ones,) with mouldings between them, which, though frequently left plain, are properly enriched in the best and most consistently finished-up examples. We pass over the frieze, that being merely a single surface, either plain or sculptured. The cornice is very much larger than in the other Orders,—larger as to height, and consequently as to projection also; which increased height and projection, and we may add, increased richness, are demanded by the greatly enlarged bulk of the capital and its more elaborate decoration. Examples vary so greatly that we can give only approximating mean and average proportions, which may be set down at about 2 diam. 12' for the whole entablature, and 54', or something less than a diameter, for the cornice; but it is in many instances more, in others as much less. As may be supposed from this greatly increased depth of the cornice, it consists of a greater number of mouldings beneath the corona, for that and the cymatium over it invariably retain their places as the crowning members of the whole series of mouldings. To the dentels of the Ionic cornice is added a row of modillions, immediately beneath and supporting the corona. These modillions are ornamental blocks, curved in their under surface somewhat after the manner of the letter S turned thus [symbol]; and between them and the dentels, and also below the latter, are other mouldings, sometimes cut, at others left plain. Sometimes a plain uncut dentel band is substituted for dentels; sometimes, in simpler cornices, that is omitted altogether, and plainer blocks are employed instead of modillions; or else both dentels and modillions are omitted, as in the Temple of Antoninus and Faustina, notwithstanding that it is considerably enriched, even the face of the corona being fluted.

Besides the several varieties of the Corinthian shown in the whole composition of the Order, or the columns and entablature together, there are numerous fragmentary examples existing, either in single columns or capitals alone, or in cornices and other parts of entablatures; some of which display such prodigality of decoration and such difference of character from the usual Corinthian, that they might very well pass for belonging to a distinct Order, if that variety which is classed as a separate one, under the name of COMPOSITE, can with any propriety be reckoned such, merely because the volutes at the angles of the capital are expanded into the proportions of those in the Roman Ionic capital.

The very dissimilar varieties to be met with, all belonging to one and the same Order, show plainly enough that the Architects of antiquity considered themselves at liberty to design their own detail, and to treat an Order as a composition marked out for them in its leading forms and general proportions, but which they might fashion nearly ad libitum in other respects. Modern Architects adopt a contrary course, which, if not particularly artistic, or even rational, is certainly convenient; although in spite of all precaution to secure conformity and maintain architectural orthodoxy, grievous licentiousness will creep in. It is something to get what is only a faithful copy of an ancient example, but it is only very rarely we get even that. For instance, fluting is omitted for the columns where such decoration may be required, in order to make them correspond with the degree of richness given to the entablature; or else it is the latter with which wholesale liberty is taken,—mouldings which in the cornice of the original are more or less enriched, being left plain, or a bare frieze substituted for a sculptured one, and other little liberties of that kind, which are considered perfectly allowable, and to make hardly any real difference, although they in fact alter the character of the whole composition. Either the original is itself faulty, or it must suffer by piecemeal alteration. It will, perhaps, bear to be somewhat reduced in richness, or, vice versâ, to have a greater degree of decoration given it; but in whichever way such kind of alteration takes place, it should be conducted uniformly for the whole composition. No excellence of proportions can atone for disproportion in regard to consistency of embellishment, and for the general disharmony of the whole composition. Italian Architects not unfrequently either overload their compositions with ornament, or leave them quite bare, and make no scruple of putting a cornice of the most meagre description, without either dentels or modillions, to an Order whose capitals denote it to be intended for Ionic or Corinthian.

It was, perhaps, fortunate both for Sir John Soane, and that example of the Corinthian which he employed for the Bank of England, that it was not an invention of his own, or it would, in all probability, have been ridiculed as a monstrosity; and he would have been thought to have there out-Soaned himself in whimsicality and capriciousness. As it happens to be, however, an express copy from the circular Temple at Tivoli, people are at liberty to admire it, more especially as the mere application of it for the first time in this country—the only one where it has been adopted—does not exalt Soane into the successful inventor of a ‘new Order.’ In the system of the Orders it may certainly be regarded as a newly-discovered planet, being so distinct from every other example of the foliaged-capital class; distinct not only in the capital itself, but in all its members, in all its proportions, in the style of all its details, and, consequently, in its character. The height of the column is only 9·25' diameters; the capital, measured from above the astragal, only 1 diameter, and the entablature only 1·42' diameter. These proportions give the whole Order a certain expression of masculine simplicity, more especially as the column is hardly diminished at all, the difference between the upper and lower diameter amounting to no more than 4', or only ¹/₁₅th of the larger diameter, that being of course 60', and the other 56'. The base consists of two tori, but instead of the usual scotiæ between, there is merely a narrow plain fillet, and a second broader one, overhung by the upper torus. Besides which, another peculiarity is, that the lower torus is somewhat detached from the surface on which the column stands, by a very narrow but deep incision beneath it,—a mode of treatment quite different from the usual one of placing the base upon a square plinth, but which, different as it is, does not produce, as might be supposed, any appearance of weakness, the incision being no more than a mere line—a delicate artistic touch. The fluting (at least the mode in which the flutes are terminated) is not a little remarkable; for below, they and the fillets are continued, and die into the upper edge of the base; while above, they are terminated horizontally instead of by a semicircular curve, as in all other examples of both Ionic and Corinthian fluting. The capital is so exceedingly peculiar in conformation and detail as to defy verbal description. The leaves have nothing in common with those of the usual acanthus; the volutes are of peculiar shape, and the flower which ornaments the abacus is as singularly large, and descends to the top of the upper leaf: boldness and breadth of parts characterize the whole composition, and also that of the entablature. As all its mouldings are uncut, this last would be much too plain to be in keeping with the column, were not the frieze sculptured with rich and ‘bossy’ festoons in the same energetic style as the capitals. Such ornamentation of the frieze is absolutely part and parcel of the Order; and the value of it will be best understood by comparing those parts of the Bank, in which it is retained, with others in which it is omitted. The same Order, with the frieze enriched, has also been since employed in the front of St. Paul’s School, St. Paul’s Churchyard; but there, owing to windows and other disturbing circumstances, its effect is greatly impaired, as is the case even in the centre of the south front of the Bank itself, where it differs widely from the beautiful loggia at the north-west angle of that edifice, and compared with which it manifests in the part first mentioned a sad falling off, becoming no better than a dull, spiritless, prosaic version of its real self. In a word, it is out of its element.

The next, and it must be the last example which can here be noticed, is that of the so-called ‘Jupiter Stator,’ which may be said to exhibit Corinthianism in its fullest luxuriance. Great as is the dissimilarity between this and the preceding example of the Order, they are alike in one respect, each being perfect in its way, complete, and harmonious in all its parts; and we ought to be thankful that two such opposite specimens of one and the same—namely, the foliaged-capital style—have been preserved to us for our admiration, and for our instruction also, as if on purpose to convince us what opposite kinds of beauty may be arrived at where, though the general configuration of the Order is adhered to, a different spirit and character are infused into it. Of the example now referred to, the character is elaborate richness subdued by refined taste. Though of lower proportions than usual, the capital is singularly ornate, and a corresponding degree of ornateness is diffused over the entire Order. The second or middle facia of the architrave, and all the members of the cornice, except the dentels and the cymatium over the corona, are sculptured, and the whole is consistently finished up in every part. The first application among us of this superb example of the Corinthian was in Holland’s beautiful portico to Carlton House, where, instead of being moderated, its richness was even augmented, the bases of the columns being carved, and the frieze sculptured. That portico has disappeared: the columns, indeed, still remain, having been used for the portico of the National Gallery, but the Order itself exists no more—at least not there. Another copy of it we now have in the Treasury Buildings, Whitehall, where it was applied by Soane, but with no great judgment or taste, his building being quite at variance with the Order he selected for it, the former being any thing but Corinthian in character. Perhaps he selected it, as we have done, for the purpose of exhibiting in two of his works such very distinct styles of Corinthian as are the Tivoli and the Jupiter Stator Orders. As now altered by Mr. Barry, the Treasury Buildings have received a great accession of richness, and the frieze, which was before plain, is now ornamented. But the Order itself is not improved, at least does not show itself to the same advantage as before, by being raised so much higher above the eye than it was at first; it looks comparatively diminished, and the beauty of its details is lost. We have, indeed, the Order; and nothing is wanting but that impressiveness and effect which gave such charm to the portico of Carlton House.

As to that variety of the Corinthian which passes under the name of Composite, the reader may now, after what has been said and shown, be left to judge whether it can with any propriety be classed as a distinct Order, instead of being reckoned merely as a variety of the other, and by no means the most striking variety of that foliaged-capital class. The difference between the two extends to no more than a part of the detail of the capital, the general normal character or Corinthianism of which is no way affected. And if the Ionic Order be allowed to comprehend many decidedly marked varieties of the voluted-capital type, there surely can be no necessity for splitting Doric and Corinthian, and getting out of them the Tuscan and Composite Orders. It will, perhaps, be fancied by some that by thus reducing the number of the Orders to three, we in some degree limit the resources which the Architect derives from them. The fact, however, is precisely the reverse; for although we limit them in number, we set no limits to their respective powers. A hundred different examples, each marked by individual character, or peculiarity of treatment, may yet all belong to the same generic type or order. Ancient examples are not to be considered merely as patterns, to be copied mechanically, but as studies for the Architect’s guidance and instruction.

COLUMNIATION.

Columns and entablatures in themselves do not, properly speaking, constitute an Order, although they serve as specimens of it. They must enter into and regulate the organization of a structure before they can become by composition what is, strictly speaking, an Order. As exhibited in their temples, the system of columniation practised by the Ancients was strictly organic and natural. Instead of being something accessory, supplementary to, and independent of the fabric, that might be either omitted or applied at pleasure, as commonly practised in Italian and modern composition, the Order itself constituted the exterior of the building, at least of that side or front of it where it was introduced, when it was not continued throughout; so that the Order and its dimensions once established, and the mode of intercolumniation determined, the edifice shaped itself. Before we enter upon the subject of intercolumniation, it will be desirable to explain the various forms of temples, and the technical terms by which they are distinguished.

The naos, or cella, as it is more usually called, or temple itself, was comparatively small, even where the entire mass was of considerable size, gradual extension of plan being produced not so much by any great enlargement of the interior as by external columniation and its gradual development. It is probable that the earliest Greek temples consisted of the naos only, and were accordingly plain ASTYLAR buildings, or without columns, except in front or at the entrance end, where an enclosed porch was formed by introducing columns, by continuing the side walls, and placing columns between them in antis, that is, between the two antæ or pilasters forming the ends of those walls. The next step seems to have been to advance the porch before the main building, instead of keeping it recessed within the side walls, thereby converting it from a portico in antis, into a prostyle, or projecting line of columns: thus a distyle in antis, or a portico consisting of two columns between antæ, consequently of three intercolumns, or open spaces between the antæ and columns, would become a tetrastyle, or projecting portico of four columns and three intercolumns. By the other end of the building being similarly treated, the temple became amphiprostyle, or prostyle at both ends, in rear as well as in front, the sides still remaining astylar. The next and last style of advancement was to continue columniation all round, enclosing the cella within colonnades along its sides as well as at its ends, which disposition of plan is expressed by the terms peristyle, or peristylar, and peripteral, which of necessity produces two columns and two intercolumns more in front; for what would otherwise be merely a tetrastyle prostyle, with four columns and three intercolumns (the number of the latter being always one less than that of the others), becomes by the colonnades being continued along the side, a hexastyle (six columns and five intercolumns); or if originally a prostyle hexastyle, it would be rendered an octastyle (eight columns and seven intercolumns), and so on.[5] It should be observed, too, that a building cannot at the same time be peristylar and have a prostyle portico, the latter being merged in the general columniation, instead of projecting from the rest of the edifice as a distinct feature. Of peristylar temples there were two sorts, viz. those with a single row of columns on each side, and those which have two, which last are distinguished by the term dipteral, i. e. having two wings or aisles on each side. Although it did not at all affect the general external appearance, notwithstanding that it extended the plan by adding two more columns and intercolumns to the front, this last-mentioned mode was attended with greater richness of columniation, and the inner columns contributed not a little to variety of effect and play of perspective; besides which, greater sheltered space was gained for ambulatories; whereas in the usual simple peristyle, where the space between the outer columns and the walls of the cella was limited to the width of a single intercolumn, the side colonnades were mere narrow passages, very little wider—at least in Doric temples—than the diameter of the columns themselves, consequently of very little actual service. In what is called the pseudo-dipteral mode, more of clear space within the colonnades was provided by omitting the inner columns, which mode reduced the plan to that of a simple peristyle, the only difference being, that instead of the width of a single intercolumn, a clear space, equal to two intercolumns and one column, was gained for the ambulatories. The Temple of Jupiter at Selinus was of this description, and being only octastyle in front,—the least possible width for a dipteral or pseudo-dipteral plan,—of the seven front intercolumns, four (i. e. two on each side) were given to the lateral colonnades, and only three left for the breadth of the cella, which must have looked like a smaller edifice standing within a colonnaded and covered enclosure.

The above few and simple arrangements of plan are nearly all the varieties that the Greek temple style offers; and some of them are little better than distinctions without differences, inasmuch as the differences do not affect general external appearance. Peripteral, dipteral, and pseudo-dipteral, all agree in the main point, and the two latter answer to the name of peripteral as well as the first, being merely modifications of it. Great as were its æsthetic beauties, Greek Architecture was—why should we scruple to confess it?—exceedingly limited in its compass and power of expression: what it did, it did admirably, but it confined itself too much to one idea. “When you have seen one green field,” says Johnson, “you have seen all green fields;” and so we may say of Greek temples,—when you have seen one or two of them, you have seen all of them. However they may differ from one another as to the treatment of the Order adopted for them, the number of their columns, and mere particulars of that kind, they resemble each other very nearly in all leading points. Not only were their plans invariably parallelograms, but alike also as to proportion, forming a double square, or being about twice as much in length as in breadth; for so exceedingly methodical was the Greek system, that the number of columns on the flanks or sides of a peripteral temple was regulated and determined by the number of those in front. The number of the columns in front was invariably an even one, as otherwise there would be no middle intercolumn; but on the flanks of the edifice, where there was no entrance, the number of the intercolumns was an even, and that of the columns an uneven one, so that a column came in the centre of these side elevations.

As to the mode in which the front influenced the sides by determining the number of columns for them, the established rule seems to have been to give the flanks twice as many intercolumns as there were columns at each end: thus the Parthenon, which is octastyle, has sixteen intercolumns, consequently seventeen columns, on each flank. In like manner, a hexastyle temple would have twelve intercolumns and thirteen columns on its sides. There are, however, exceptions; for instance, the temple at Selinus, which has been mentioned as an example of the pseudo-dipteral mode of columniation, is an octastyle, with sixteen, or just twice as many columns on its sides as in front; consequently the intercolumns are only fifteen, and being uneven in number, there is a middle one, as in the front itself. After all, the difference caused by there being an intercolumn more or less than usual is but a very slight one, such as is to be ascertained only by counting the columns, and such as not to occasion any perceptible difference in the general physiognomy of the building.[6]

Besides the restriction as to general proportion of plan, namely, the fixed relationship between the length and the breadth of the building, proportion with regard to height was limited in a different way, and in such a manner that the character of increased richness and importance derived from a greater number of columns was attended, not indeed by decreased height, but by decreased loftiness, or proportional height, that is, height as measured by either breadth or length. Paradoxical as this may sound at first, nothing can be more clear when once explained. Discarding nicety of measurement, we will call a tetrastyle portico about a square in height, that is, about as high as wide; but add four more columns, extend it from a tetrastyle to an octastyle, so that it becomes about a double square in breadth, or twice as wide again, and the inevitable consequence is, that it is then only half as high as wide; that is, as to proportion, only half as lofty as it was before. The expression of loftiness, in which altitude greatly predominates over breadth, was quite beyond the reach of the Greek system. Their temples might be planted on lofty eminences, but the structures themselves never towered upwards. As far as it went, their system was perfect,—so complete indeed in itself as to be unfit for almost any other purposes than that for which it was expressly framed.

If the Romans corrupted the Greek Orders, the Doric and Ionic, they developed and matured the Corinthian Order, and also worked out a freer and more complex and comprehensive system of Architecture. To say nothing of their introduction and application of those important elements of both construction and design, the arch and vault—which hardly belong to a mere treatise on the Orders—it is to the Romans that we are indebted for varieties and combinations of plan that will be sought for in vain among Grecian structures.

Of the Romans it may be said, “Mutant quadrata rotundis,”—circular forms and curves displaying themselves not only in elevation and section, but in plan; and while, among the Greeks, Architecture was confined almost exclusively to external appearance and effect, in the hands of the Romans it was made to minister to internal display of the most enchantingly picturesque kind, as would be amply attested by the Pantheon alone. In that edifice, and Hadrian’s Mausoleum (now barbarized into the Castello di S. Angelo), the cylindrical form was exhibited upon an imposing scale; in the Temple at Tivoli, in far lesser dimensions, but with most captivating taste; and again in the Tomb of Cæcilia Metella, we have a fine example of an unbroken astylar circular mass. In such structures as the Colosseum and other Roman Amphitheatres, a different form of curvature, namely, the ellipsis, was employed with admirable propriety and effect. In interiors, again, we find the hemicycle or concave semicircular form both frequently and variously applied by the Romans in such edifices as their Baths, which afford many excellent studies for combinations of plan.

To enter into the system of Roman Architecture as the subject itself would require, would very far exceed our present purpose and limits; much less can we pretend to treat here of the still more varied and complex Italian or Modern-European system, into which fenestration so largely enters, columniation being, more frequently than not, subordinate. Were we to touch upon the last-mentioned style and its various elements, it could be only so superficially as to be more disappointing than instructive. Better that the reader should admire our forbearance than complain of our unsatisfactory jejuneness. We may, however, permit ourselves to throw out one or two general remarks; the first of which is, that it is a great error to confound with the Italian the two Ancient Classical styles, applying to them alike the epithet ‘Grecian,’ merely in contradistinction to Gothic or Mediæval Architecture. It is absurd, too, to pretend to test by the Greek style, one so totally differently constituted as the Italian; an error that could hardly have been fallen into but for the practice of applying the same names to very different things. The term ‘Order’ has quite a different meaning, as applied to the original classical mode of the Art, from what it has in the other. In Italian composition, an Order is more frequently than not, mere decoration in the shape of columns and entablatures, fashioned secundum artem (a very different thing from artistically), so as to resemble in detail and certain conventional distinctions those of the Ancients. Infinitely better would it have been, if, instead of allowing themselves to be misled by the pedantry of Vitruvius, the Architects of the so-called Revival, who showed much happiness of invention in other respects, had treated the Orders freely; or perhaps still better, had they worked out ideas of their own for columns and entablatures, whenever they had occasion for them either as matters of necessity, or as mere decoration. Had the Italians allowed themselves greater latitude in that respect, they would, in all probability, have been far less licentious upon the whole than they frequently were, and their buildings would have been more homogeneous—more of a piece. But they must, forsooth, be Doric, Ionic, or Corinthian, ofttimes all the three at once, and a very great deal else into the bargain. Therefore the affecting to retain the ancient Orders in their purity served no other purpose than that of making all the more evident how completely their first intention and character had been lost sight of.

The clinging with scrupulous punctilio to what had become dead-letter forms after the system which had produced them had been abandoned and exchanged for another and widely different one, was merely superstition and pedantry. It might show acquaintance with traditional learning and the writings of Vitruvius; but it also showed dulness of æsthetic feeling, or, what is not much better, deficiency of æsthetic power. There was, however, one mode of applying columns, which, although generally regarded as the most licentious and unorthodox,—nay, even preposterous, because quite contrary to all classical practice and precedent,—has at least one propriety, that of being rational, since columns there officiate as columns—as real supports; whereas in a great deal of Modern Architecture that is admired for the correct taste it displays, columns and their entablatures are mere expletives, instead of actual component parts of the fabric, and simulate a mode of construction neither required for nor practised in the fabric itself. The particular mode here alluded to is that in which arches are not only introduced together with columns, but the arches and columns are so indissolubly married together that they cannot be divorced, inasmuch as the arches are supported by the columns themselves, the former springing immediately from the capitals of the latter.[7] Such combination, it might be supposed, would be gladly admitted as sufficiently legitimate, both because in accordance with rational architectonic principles, and because it greatly extends the resources of the Art; nevertheless, such is the omnipotence of prejudice, that instead of being welcomed and adopted by us, it has been decried as a barbarism. As an irresistible and crushing argument against it, we are told that columns were not originally intended to be so applied;—admirable logic, truly! There are a great many other things besides columns which have in course of time come to be applied to uses not originally contemplated. In regard to that combination of columns and arches according to which the latter spring immediately from the others, and are supported by them, there are two questions: the first and practical one is; Do the columns afford sufficient support?—the second and æsthetic one is; Is there also appearance of sufficient support; or, is there any thing contradictory to principle, to judgment, and good taste? The first question needs no answer, since it answers itself, it being an indisputable fact that columns so employed do answer the purpose to which they are turned. The other question is not so easily answered: the prejudiced will of course answer it according to their own contracted taste and narrow notions, condemning the mode alluded to, without any inquiry into its merits and advantages, merely on the ground of its being quite at variance with the classical system of trabeated columniation, that is, with columns supporting a horizontal architrave and entablature, or general horizontal trabeation. That by the substitution of arches for architraves, the character of the Greek system is forfeited, cannot be denied; but then another character is established, whose difference from the original one ought not to be made its condemnation. To demand of a different mode that it should resemble and conform to the laws of that from which it differs, is absurdity in the extreme, for it is requiring that it should be at once a different one and the same. To compare different styles is a very useful sort of study; but to make any one style the criterion or standard by which others are to be judged, is preposterous.

The style in which the arch and column enter into direct combination with each other, and for which there is no specific name, has at all events some economical recommendations, inasmuch as shorter columns, and fewer of them, are required, than would be necessary for the same height and length according to the trabeated mode. In itself, too, it possesses much ‘capability;’ yet, as is the case with every other style, the merit of the works produced in it depends upon the manner in which it is treated, and the talent brought to it. There is no style of the Art so poetical that the flattest prose may not be made out of it; and hardly any so utterly prosaic as to be incapable of being kindled into poetry by the Promethean torch of geniality—artistic treatment, and, con amore, æsthetic feeling.

INTERCOLUMNIATION.

Although Intercolumniation consists only in regulating and determining the spaces between the columns, and consequently does not affect the nature of the composition,—for a tetrastyle, hexastyle, &c., would still be such, no matter how narrow or wide the intercolumns or intervals between the columns may be,—very much depends upon it, with regard to expression and effect. How intercolumniation is regulated in the Doric Order has been already explained at page 20: in that, the distances between the columns is governed entirely by the triglyphs of the frieze, so that there can be no medium between monotriglyphic and ditriglyphic intercolumniation, accordingly as there is either one or two triglyphs over each intercolumn. But in the other Orders there is no such restriction; in them the intercolumns may be made wider or narrower, as circumstances require, but of course under the guidance of judgment and good taste; for what is left à discrétion is not always very discreetly used. Vitruvius and his followers, however, have not cared to trust to individual discretion or indiscretion, but have fixed certain positive and distinct modes of intercolumniation, viz. five,—perhaps out of compliment to the five Orders, to wit:

Pycnostyle, or closely set, in which the intercolumns are one diameter and a quarter, or a half, in width.

Systyle, in which they are two diameters wide.

Eustyle, or well spaced, in which they are two diameters and a half.

Diastyle, in which they are three diameters.

Aræostyle, or thinly set, in which they are four diameters.

Let us repudiate for Architecture all such formal act-of-parliament legislation, and take pycnostyle and aræostyle as the greatest allowable degree of closeness or of distance at which the columns can be placed; and it follows that between such maximum and minimum any intermediate measure is admissible, and that there is no occasion to fix it positively and arithmetically, and make distinctions which are, after all, only arbitrary. There are a great many matters in design which must be left to the Architect, and intercolumniation is one of them. It is not possible to have precise rules for every thing, neither is it desirable; for if every thing in it could be done by rule, Architecture would forfeit its nature as one of the Fine Arts, and be reduced to a merely mechanical one. What is done by rule can be done by one man just as well as by another.

Excepting the terms pycnostyle and aræostyle, which are useful as expressing the greatest degree of closeness or of openness of intercolumniation consistent with well-proportioned arrangement, the others may be dispensed with. To designate one mode as eustyle, par excellence, is very much like saying that the proportions assigned to it, viz. 2·30′ or 2½ diameters, are the very best, and all the rest comparatively defective; according to which doctrine, the monotriglyphic mode of intercolumniation usually employed by the Greeks in their Doric temples, and which answers to the character of pycnostyle, is not so well proportioned as what is emphatically called eustyle. Let it be whatever it may, as expressed in terms of the diameter of the columns, intercolumniation should always deserve the name of eustyle, or well-proportioned, by being such as satisfies the eye, and contributes to the particular character that befits the occasion and harmonizes with the other proportions of the structure. Pycnostyle, or close spacing, carries with it the expression of both richness and strength, the solids or columns being very little less than the voids or intercolumns. Aræostyle, or wide spacing,—and ditriglyphic Doric intercolumniation may be called such,—produces an effect of openness and lightness, but also partakes of meagreness and weakness, owing to the want of sufficient apparent support for the entablature,—a very frequent fault in Modern Architecture, where frugality as to columniation has often been allowed to produce a degree of poverty which contrasts very disagreeably with that of the decoration affected by the Order itself. Intercolumniation ought to be made to depend in some measure upon the nature of the composition: a tetrastyle portico, for instance, or a distyle in antis, admits of wider intercolumniation than would be suitable for an octastyle, because pycnostyle, where there are only three intercolumns, would produce too great narrowness of general proportions for a portico.

Hardly is there need for observing, that be their proportions what they may, the intercolumns in a colonnade or portico must be all alike; nevertheless in a Grecian Doric portico there is, as we have seen, some difference, the two extreme intercolumns being there narrower by the width of half a triglyph. There is, besides, another exception from the general principle, for the centre intercolumn of a portico was frequently made somewhat wider than the others, in order to mark the entrance, and the better to display and afford greater space for access to the door within.

One mode of columniation and intercolumniation which remains to be spoken of, is that which has sometimes been practised by Modern Architects, and combines the two extremes of pycnostyle, or still closer intercolumniation, and aræostyle. This consists in coupling the columns and making a wide intercolumn between every pair of columns, so that as regards the average proportion between solids and voids, that disposition does not differ from what it would be were the columns placed singly. Although denounced by some critics, more especially Algarotti, as altogether licentious and indefensible, and although it is not to be especially recommended, or indeed practicable on every occasion, the coupling of columns may, under some circumstances, be not only excusable, but advisable and proper. As is the case with almost every thing else in matters of art, all depends upon how it is done, and whether with or without sufficient reason. That there is no classical authority for it, is no valid reason against it; in the constitution of the ancient temples there was nothing to require or motive it. It may be conceded, however, that coupled columns, forming a prostyle surmounted by a pediment, are objectionable; because where so strong a resemblance to the antique model is preserved in other respects, a departure from it in regard to the disposition of the columns has a disagreeably disturbing effect.

Having gone through the Classical Orders, and explained their elements and constitution, we have performed as much as we purposed, or as we promised. Within the same compass we might, no doubt, have touched upon a great deal besides that belongs to the study of Greek and Roman Architecture, by restricting ourselves to bare matter-of-fact, and suppressing all comment, and so treating the subject drily and superficially. Proceeding upon the principle of multum haud multa, we have aimed at nothing more than to initiate the reader in such manner as to excite interest in the subject, and stimulate to further inquiry. Should we have effected that, and should we have disabused him of the prejudices and contracted notions generally entertained in regard to the Orders, or else armed him against them, we shall have accomplished the multum—the main point of all. Much shall we have taught, and much will he have learnt, should he now reject the fatal doctrine of the Five Orders, and relinquish it to school-boys and school-masters,—to the plodders who work by pattern, and design by rote and by routine. Much, very much indeed, will have been learnt, by the reader, should he have learnt or have been put in the way of learning, to look upon those various compositions in the three several styles of columniation, which are called Orders, not with the eyes of a Builder or a Mechanic, but with the intuition and the feeling of an Artist; in short, to look upon them as general types to be diligently studied, and then imitated with congenial gusto.

GLOSSARIAL INDEX.

We here make one alphabetical arrangement serve the double purpose of an Index referring to the pages where the respective matters are treated of, and of a Glossary affording explanation, or further remark, as may be, where required. This latter is by no means to be considered a complete or general Glossary of Architectural Terms, but merely as an accompaniment to the present Treatise, and a specimen, perhaps, of what is still a desideratum, namely, a real Lexicon—that is, one which explains things as well as terms—of Ancient and Modern Architecture, similar to what has been provided with regard to the Mediæval Styles of the Art.

ABACUS.—The plate or shallow block forming the uppermost member of a capital is so called for the sake of distinction, for when a similar one is placed beneath the base of a column, it is called a plinth. The Doric abacus is spoken of at page 14, and is here shown in a plan of the capital and architrave; a a a a being the angles of the soffit or underside of the abacus which overhang the echinus e e e e; and s s the soffit of the architrave. From this, the relation between the abacus and architrave, and how much the former exceeds or projects out beyond the latter, will be better understood than by the engraving at page 14, where the capital is shown only in elevation.

The next figure is still more indispensable for understanding the conformation of the Ionic capital. (See page 32.) Here the abacus shows itself only in front at f f, over the two voluted faces, the rest being concealed by the baluster sides b b of the capital, which extend beyond the abacus, and convert the general plan into more than a square. Although the channels and other details of the baluster sides are omitted, and only their general shape shown, the engraving explains how those sides are reduced (p. 33) by being hollowed out or curved concavely on the plan.

In the next, or Corinthian Order, a similar curvature is given to the abacus itself on all its four sides; the capital of this Third Order having that in common with the First one, that it is quite regular. One great point of difference between the Doric and Corinthian abacus is, that in the former the angles are unsupported, and overhang the circular body of the capital, while in the Corinthian they are extended outwards diagonally, as a a a a in the figure, and supported by the caulicoli or small volutes, which they in turn serve to cover. The letters f f f f indicate the rosettes or flowers on the four faces of the abacus.

ÆSTHETICS—ÆSTHETIC.—A modern architectural writer condemns these terms as ‘silly and pedantic’ ones that have ‘lately come into use in the Arts,’ and as ‘useless additions to the nomenclature’ and language of art-criticism. In what respect ‘Æsthetics’ is at all more pedantic than ‘Optics,’ ‘Mathematics,’ ‘Physics,’ and other words of a similar class now familiar to English ears,—although they are all of them essentially Greek,—or more pedantic than a great many architectural terms which are not only Greek but altogether technical, it is not easy to divine; while as to silliness, there seems to be far greater silliness in rejecting, or objecting to, than in adopting terms which are not only highly expressive and convenient, but have found their way into every European language, from that of Russia to that of Spain.

The term Æsthetics implies the perception and the study of those qualities which constitute the beautiful and artistic, and form the finer essence of all productions of Fine Art. It carries with it, therefore, a more exact and philosophic meaning than the word Taste. In its adjective form, in which it more frequently occurs, it is particularly useful, as no adequate epithet can be substituted for ‘Æsthetic.’ Thus we speak of the ‘æsthetic sense,’ of ‘æsthetic feeling,’ or ‘study,’ or ‘principles,’ &c.; but we cannot say the ‘tasteful sense,’ or ‘tasteful study.’ As to the species of study just alluded to, no term may be required to designate it, because study of the kind is generally dispensed with for Architecture, an historical and technical knowledge of it being deemed sufficient, without any acquaintance with those comprehensive æsthetic principles of the Art which can guide us where technical rules stop short, and mere rules abandon us to error or to doubt.

ANTÆ, Doric, 22.

————, Ionic, 40.

ANTEFIXÆ.—Called by some, Greek Tiles,—upright ornamental blocks placed at intervals on the cornice along the side of a roof, to conceal or rather terminate the ridges formed by the overlapping of the roof tiles.

ARÆOSTYLE.—The widest mode of intercolumniation, 78.

ASTRAGAL.—A small convex moulding. The term is applied chiefly to that which is employed to separate the capital from the shaft of a column.

ASTYLAR.—From the Greek privative α, and στύλος (stylos), a column: columnless or without columns, a term that expresses the absence of columns or pilasters, where they might otherwise be supposed to occur.

ATTIC.—This is usually defined to be a small Order placed over a principal one; from which it might be supposed that it differed from the Orders in general chiefly by being applied on a smaller scale; instead of which it has nothing of columniation and trabeation in it. There is far greater analogy between an attic and a stylobate, or continuous pedestal, both of them consisting of base, a dado or die, and a simple cornice, and the difference between them consisting chiefly in their application, the stylobate being below, and the attic above the Order. Attics are either plain or pilastered accordingly as the building itself is astylar or the contrary; but what are called attic pilasters are no more than slight breaks or projections on the general surface, with the mouldings above and below breaking round them, without any sort of capital, but just after the manner of pedestals: their faces, however, are sometimes distinguished from the intermediate surfaces by being panelled and otherwise enriched, as is done, for instance, in the façade of the new Treasury Buildings: another mode of decoration is to place either a statue, or else a caryatid figure, before each break in the front of the Attic, an example of which occurs in the Strand front of Somerset House. When introduced only over particular portions of a façade, such as the centre or extremities, the Attic is an exceedingly useful element in composition, inasmuch as it serves not only to give such parts greater importance, but also to produce play of outline or sky-line; whereas, if continued throughout, it is apt to produce heaviness as well as monotony, and some degree of feebleness of expression also, its cornice forming, in comparison with the principal cornice below, but a very insignificant finish to the general structure.

AXIS.—An imaginary line through the centre of a column, &c., or its geometrical representation. Where different members are placed over each other, so that the same vertical line, on the elevation, divides them equally, they are said to be on the same axis, although they may be on different planes. Thus, triglyphs and modillions are so arranged that one coincides with the axis or line of axis of each column. In like manner, the windows or other openings in the several stories of a façade must all be in the same respective axis, whether they are all of the same breadth or not.

BALUSTER side of Ionic capital, 33.

BED-MOULDINGS.—This may be understood as a collective term for all the mouldings beneath the corona or principal projecting member of a cornice, which, without bed-mouldings, would appear too much like a mere shelf.

CABLED fluting, 60.

CAPITAL.—The capitals of the columns constitute the principal and most obvious indicial mark of the respective Orders. For those of each of the Three Classes or Orders a certain character conformably with the rest of the Order is to be observed; but that attended to, further restriction is unnecessary. Between several examples, all decidedly referable to one and the same Order, very great special differences occur, and there might easily be a very great many more. Although the capital itself is indispensable, it is so only æsthetically, and not out of positive necessity. The necessity is only artistic: decoration of the kind there must be, but the express mode of it is one of those matters which should be left to design, to which it properly belongs. Capitals are just as legitimate subjects for the exercise of taste and invention as any thing else in decorative design. The capital is only an ornamental head to the column, and therefore admits of being as freely designed as any other piece of ornament, on the conditions of its being accordant in character with the rest of the Order, and of forming an agreeable transition from the shaft of the column to the architrave.

CARYATIDES.—Anthropostylar pillars or human figures (usually female ones) employed instead of columns to support an entablature. Such figures ought always to be perfectly free from all attitudinizing, and to appear to support their burden without any effort. Some very matter-of-fact critics object to caryatides as being at the best only beautiful absurdities; as if statues so applied were particularly liable to be mistaken for living persons subjected to a more severe punishment than that of being posted up in a niche, or on the top of a building.

COLUMNIATION, 68.

CORINTHIAN, or Third Order, 53; Lysicrates example, 55; Tivoli, 65; ‘Composite,’ or Ionico-Corinthian, 62.

CORNICE.—Doric, 21; Ionic, 42; Corinthian, 61.

CORONA.—That part or member of a cornice which projects out over and protects the bed-mouldings (see Bed-Mouldings), and throws off the rain from the rest of the entablature.

CYMATIUM.—A moulding whose section or profile is convex below and concave above. See Mouldings.

DADO.—The general plane surface of a pedestal or stylobate between the upper and lower mouldings.

DENTELS.—The series of small upright blocks introduced among the bed-mouldings of a cornice. They are supposed to be peculiarly characteristic of the Ionic cornice, but are also employed for the Corinthian one, beneath the modillions, which latter are the principal characteristic of the Corinthian cornice, as dentels alone of the Ionic.

DIAMETER.—The lower diameter of the column is taken as the proportional measure for all the other parts and members of an Order, for which purpose it is subdivided into 60 parts, called minutes, or into two modules of 30 minutes each; but the module is quite an unnecessary distinction, not being, like the diameter, the constant measure of any one member of the Order, and the use of it merely adding to the terms of computation. It is surely much more simple and convenient to write 1·40′, meaning 1 diameter and 40 minutes, than 1d. 1m. 10′. Being proportional measures, diameters and minutes are not fixed ones, like feet and inches, but are variable as to the actual dimensions which they express—larger or smaller, according to the actual size of the diameter of the column. For instance, if the diameter be just 5 feet, a minute, being ¹/₆₀, will be exactly 1 inch; if 2½ feet, the minute will be half an inch; or if the diameter be only one foot, the minute is ¹/₆₀ of a foot, or ⅕ of an inch.

DIE.—See Dado.

DIMENSIONS.—In architectural description, some positive dimensions or approximation to them should always be stated. Such mere epithets as large, lofty, spacious, &c., mean nothing,—convey only an exceedingly vague, general idea according to the particular notions of those who employ them; and, like all epithets, they are liable to the most shameful abuse.

ECHINUS.—A large convex moulding, generally of elliptical or eccentric contour in the Greek style, and forming the quarter of a circle in the Roman. The echinus is the indicial mark of and constitutes the principal portion of the Doric capital, the other being the abacus; at least the term echinus is applied especially to that member of the capital, although in many Greek examples its profile has scarcely any convexity, but more resembles a portion of an inverted cone (18). In Roman and Modern Architecture the echinus is usually called the ovolo. See Mouldings.

ELEVATION may be defined to be the upright plan of a building, or any part of a building, showing its exact form and dimensions as they actually exist; whereas in perspective the forms are shown not as they exist, or are in themselves, but merely as they appear to the eye, according to the station of the spectator. Elevations are of two kinds, viz. geometrical and perspective. In the former, the whole is projected upon the same plane, the remote parts are shown of their full size, and distance can be expressed only by shadow thrown upon the second plane by parts in the nearest one; whereas Perspective elevation partakes of parallel perspective, and the parts beyond the first plane are shown diminished by distance, and also come into view, although they may be behind others on the first plane by which they would be concealed in a geometrical representation. For instance, supposing a portico to have a second row of columns in the same axes as those in front, that circumstance would not be at all apparent in a geometrical elevation, but could be understood only by means of the plan, the inner columns being concealed by those before them; but in a perspective elevation they would show themselves, as would also the ceiling and floor.

ENTABLATURE.—The horizontal portion of an Order; the trabeation or system of beams supported by the columns. There may, however, be entablature without columns,—where the latter are suppressed, as on the flanks of an apteral temple; or omitted entirely, as in astylar building. For the entablatures of the respective Orders, see pages 18, 41, 60.

ENTASIS.—A slightly convex curvature given in execution to the outline of the shaft of a column, just sufficient to counteract and correct the appearance, or fancied appearance, of curvature in a contrary direction (i. e. concavely), which might else take place and cause the middle of the shaft to appear thinner than it really is. Entasis is therefore nothing positive: it is not intended to show itself, for were it to do so,—were there to be any visible swelling,—it would be a deformity; yet such deformity has been studiously adopted by many Modern Architects, merely, it would seem, for the sake of making evident that at all events they took pains to guard against an imaginary defect. The subject of entasis has been made one of those nugæ difficiles which those who can do nothing else make great parade with. To such, then, be left all such sublimated transcendental niceties. If a column only 30 or 40 feet high would appear thinner in the middle than it really is, unless there made somewhat thicker than it would be were its profile a straight line, the same appearance would take place in any other lofty object, and in a greater degree in proportion to actual height; so that a tower of great loftiness, both positively and proportionally, ought—unless entasis were given it, to look thinner in the middle than at top and bottom. If such appearance really does take place, it is one perfectly in accordance with the laws of vision, therefore no more than a natural and perfectly proper one. In all such cases the judgment corrects the eye, and prevents mistakes. It would, in fact, require a very great stretch of imagination to fancy what we know to be straight, and of the same breadth throughout, is not so: if we can fancy that, we can also fancy that the further end of a building is not so high as the nearer one, and that instead of being horizontal, the cornices slope downwards. So much for the fuss made about entasis, including that about the hypothetical curvature in the horizontal lines of the Parthenon, where curvature was administered, if administered at all, in an exceedingly homœopathic ratio.

EPISTYLIUM.—The architrave or horizontal course resting immediately upon the columns. Hence we should denote as Epistylar Arcuation that system in which columns support arches instead of horizontal architraves and entablatures. See p. 75.

EPITITHEDAS.—A term applied by some writers, by way of distinction, to the cymatium on the sloping or raking cornices of a pediment, which superimposed moulding (as its name implies) was frequently largely developed, and enriched with an ornamental pattern.

FENESTRATION, termed by the Germans Fenster-architektur, is, in contradistinction from columniation, the system of construction and mode of design marked by windows. Fenestration and Columniation are so far antagonistic and irreconcileable, that fenestration either interferes with the effect aimed at by columniation with insulated columns, as in a portico or colonnade, or reduces it, as is the case with an engaged Order, to something quite secondary and merely decorative. Astylar and Fenestrated ought, therefore, to be merely convertible terms; but as they are not, we may be allowed to invent that of columnar-fenestrated, to denote that mode of composition which unites fenestration with the semblance, at least, of the other. Employed as a collective term, Fenestration serves to express the character of a building or design with regard to the windows generally: thus we say, the Fenestration is excellent, or the contrary,—ornate or meagre,—well arranged or too crowded,—which last circumstance is a very common fault, and is destructive both of grandeur and of repose. Si quæris exemplum, circumspice.

FILLET.—Any narrow flat moulding or surface is so termed. Fillets are used either to separate or finish other mouldings. The intervals or spaces between the flutes on the shaft of a column are also called fillets, although not actual members, but merely the surface left between the hollowed channels or flutes themselves.

FLUTING.—The collective term for the channels cut on the shafts of columns. Hitherto this has been restricted to little more than two modes, viz. with arrises or sharp ridges, as in the Doric Order (p. 17), or with fillets. A different mode of striating the shafts of columns is described at page 39, and many others might easily be devised.

FRIEZE.—The middle one of the three divisions of an entablature. It derives its name from the Italian Fregio, ornament, as being that part of the entablature especially appropriate for sculptural embellishment, yet, in contradiction to such signification, the frieze is all but invariably made a mere plain surface by Modern Architects; except the Order employed happens to be Doric, and then triglyphs are introduced as matter of course, but the metopes left blank, even though ornateness is studied in other respects, and in parts not comprehended in the Order itself. For the Ionic Order, Modern Architects have sometimes employed the so-called pulvinated frieze (p. 50), that is, one whose face is curved convexly; but upon what principle they have appropriated such form of the frieze to that Order in particular, when it is just as suitable for the Corinthian, is not said, and not to be guessed.

HYPOTRACHELIUM.—The necking of a capital introduced between the capital itself and the shaft of the column. In the Grecian Doric, the hypotrachelium is little more than nominal, being marked only by one or more horizontal channels or incisions, and the flutings continued through them; whereas to the Modern Doric capital a distinct necking is given by the astragal which separates the capital from the shaft, and marks its commencement. But that is considered an essential part of the capital, and as to the Corinthian capital it does not admit of any necking; wherefore the Ionic one possesses a great advantage over either of them, inasmuch as it may have a distinct necking or not, and it may be either plain or enriched.

INTERCOLUMN and INTERCOLUMNIATION.—The subject of Intercolumniation is treated of at page 77, &c. These two terms are generally confounded together; or rather, the second is very improperly substituted for the other, contrary to all analogy of language and distinctness of meaning. Having only a general collective import, Intercolumniation can, like Columniation, be used only in the singular. We may say of a portico, &c., that its intercolumniation is good or poor, close or straggling, but not that it consists of so many intercolumniations (according as the number may be), since such mode of expression is no better than a solecistical vulgarism. We might just as well describe a tetrastyle portico as having four columniations, as say that it has three intercolumniations.

‘LYSICRATES’ CAPITAL, 55.

METOPE.—The spaces between the triglyphs of the Doric frieze, which in the Parthenon, for instance, were filled in with sculpture; but in modern porticoes that pique themselves upon being after the Parthenon, they are mere blanks.

MINUTE.—The sixtieth part of the diameter of the column as a proportional measure. Minutes are written thus, 10′, i. e. ten minutes.

MODILLION.—The small bracket-shaped members or ornaments in the Corinthian cornice are termed modillions. See page 61.

MODULE.—The semi-diameter of the column, or 30 minutes. See Diameter.

MOULDINGS.—The principal mouldings and the difference of their profiles in the Grecian and Roman styles are here exhibited.

Greek.

Roman.

Echinus or

Ovolo.

Cyma Recta.

Cyma Reversa.

Scotia.

Torus.

MONOTRIGLYPHIC.—That mode of intercolumniation in the Doric Order according to which there is only a single triglyph over each intercolumn, 20.

MUTULES.—The small blocks or plates attached to the soffit of the corona in the Doric cornice.

NECKING.—See Hypotrachelium.

OVOLO.—See Echinus.

PEDESTAL.—No constituent or essential part of an Order, but merely a casual addition to it, 7.

PEDIMENT answers to the Gable in Gothic Architecture, &c., it being the vertical triangular plane at the end of a roof which slopes downwards on each side from its ridge. The Pediment differs from the Gable in having a tympanum, or clearly defined triangular surface with a horizontal cornice below and two sloping or raking cornices. See page 24.

PILASTER.—Unknown to Greek Architecture, in which only antæ (see Antæ) were admitted: Pilasters are employed by the Moderns as substitutes for an Order in engaged columns, and are, perhaps, even preferable to the latter, inasmuch as they combine better and more naturally with the wall to which they are attached.

PLAN.—A plan may be familiarly described as an architectural map, or map of a building: therefore only those who cannot comprehend a geographical or topographical map—a degree of obtuseness hardly credible—can be at any loss to understand an architectural one, the latter being precisely of the same nature as the others, with this difference in its favour, that it is much less conventional. To define it more exactly,—a plan is a horizontal section supposed to be taken on the level of the floor through the solid parts of the fabric—walls, columns, &c., so as to show their various thicknesses and situations, the dimensions of the several spaces or rooms, the position of the doors by which they communicate with each other, and various particulars that cannot otherwise be explained. Studying buildings without plans is like studying geography without maps. Nevertheless, most persons ignore—affect a genteel ignorance of such vulgar and technical drawings as plans. Plan frequently costs the Architect more study than all the rest of his design. Very much mistaken are they who suppose that convenience alone has chiefly to be considered. Convenience is, of course, or ought to be, made a sine quâ non; yet it is not so much a positive merit in itself, as the want of it is a positive defect. Mere convenience is not an artistic quality: from that to beauty of plan,—to striking combinations, and studied effects, and varied play of arrangement, the distance is very great. A common-place plan is but a very dull uninteresting affair. It is no more than what any builder can accomplish; but a plan replete with imagination, piquant play, and well-imagined contrasts, is no every-day matter.

PODIUM.—A continued pedestal; a dwarf pedestal wall; a closed parapet employed instead of an open balustrade.

POLYSTYLE.—Having a number of columns. Where columns occur behind columns, as where a portico has inner columns, like that of the Royal Exchange, such portico may be termed polystyle.

PORCH.—Any small portico considerably lower than the main structure to which it is attached may be so termed, in contradistinction from one carried up the height of the building, or as high as the principal cornice.

PORTICO.—For the different plans and denominations of porticoes, see p. 69.

PROFILE.—The outline of a series of mouldings, or of any other parts, as shown by a section through them.

PROPORTION.—The magnitude of one part as compared with some other. The term ‘proportion’ is used absolutely in the sense of ‘good proportion;’ although every thing that has shape has proportions of some kind or other. The subject of Proportions has been greatly mystified by writers who have laid down certain fixed proportions as the best of all on every occasion, and as the ne plus ultra of artistic taste. But fixed proportions can be followed mechanically by every one alike; whereas it requires ability to deviate successfully from routine measurement, and apply the poco piu or the poco meno as the particular occasion or the particular effect aimed at may require—at least justify. It is the eye that takes cognizance of proportions; and the Architect’s own eye ought to be quite as correct as that of other people.

PROSTYLE.—A portico which projects from the body of a building, or the rest of a façade. See page 69.

PULVINATED.—A frieze whose face is convex instead of plain is said to be pulvinated, from its supposed resemblance to the side of a cushion, which swells out when pressed upon. See page 50.

RAKING CORNICES.—A term, rather unmeaning in itself, applied to the inclined cornices on the sloping sides of a pediment.

RUSTICATION.—Although Rustication is not spoken of in this treatise, the term is here inserted for the purpose of remarking that what is so called might frequently be more correctly described as Decorative Masonry, since, so far from expressing rudeness or coarseness, it may be made to display the most studied nicety and elaborate finish. Rustication, no doubt, originated in a very rude mode of construction; but what was at first clumsiness and irregularity, was afterwards refined into an artful and symmetrical disposition of the stones and courses of masonry, by a similar æsthetic process to that which converted the original amorphous stone pillar into the Doric column. To call such masonry, as some have done, only cicatrizing and gashing, betrays a loss for both arguments and words. Decorative masonry is most assuredly not according to Greek taste or practice; for the Greeks affected to suppress the appearance of articulation in masonry, and thereby to give their buildings, as far as possible, the look of not being fabricated, but carved out of one block of solid material. Yet it does not therefore follow that the other mode of decidedly articulating and pronouncing the joints and courses of the stones is bad, because it is an opposite one. So far from being unæsthetic, it possesses much that recommends it artistically, for it gives colour, and produces richness of surface where there would else be blankness. A wall whose face is so decorated forms an admirable ground to columns or pilasters, which it serves to relieve very effectively, as is exemplified in the screen façade of Dover House, that little architectural gem by Holland, which, though by no means faultless, has more of genuine artistic quality than any other building of its time in the whole Metropolis.

SECTION.—A vertical plan of the interior of a building, showing it as it would appear upon an upright plane cutting through it. Though rarely shown, sections are almost as indispensable as plans, like which, they show the thicknesses of the walls; and in addition those of the ceilings and floors; and show also heights, both of the rooms themselves, and of doors and windows;—moreover, the forms of the ceilings, whether flat, or coved, or vaulted. In one respect, too, a section partakes of the nature of an elevation, the plane parallel to the line of section being an elevation of the interior, or rather consisting of as many elevations as there are separate rooms or divisions. Sections may be described as either furnished or unfurnished; the former show only construction and the strictly architectural parts, wherefore, if the side of a room happens to be quite plain, without door, chimney-piece, or other feature, that side or space will be a blank, or little better. Furnished sections, on the contrary, exhibit, besides what strictly belongs to the Architecture and its decoration, mirrors, pictures, statues, furniture, draperies, and all other accessories. The number of sections required depends upon the nature of the plan, and what there is worth showing. If the design be worthy of it, there should be as many sections as will suffice to show every side of every principal apartment; though it may not be necessary to repeat the entire section through every floor. Sections are the deliciæ of architectural illustration, and, it would seem, far too precious to be frequently exhibited.

SOFFIT.—From the Italian soffitto, a ceiling; the under surface of any projecting moulding or member.

STYLE, in the sense of a column (from the Greek στύλος, a column), enters into a great number of useful compound terms referring to matters connected with columniation, and which may here be grouped together, so that any word ending in ‘style’ may be found here, though passed over in its alphabetical order. The number of columns in the front of a pedimented portico is briefly expressed at once by any of the following terms:

Distyle in

antis,

two

columns and two antæ.

Tetrastyle

”

four

columns.

Hexastyle

”

six

”

Octastyle

”

eight

”

Decastyle

”

ten

”  almost the greatest

number that can be placed beneath a pediment.

As regards Intercolumniation, we have—Pycnostyle—Eustyle—Aræostyle, 79.

The terms descriptive of the plans and columniation of ancient temples are—Prostyle—Amphiprostyle—Peristyle, 69.

Also,

Monoprostyle, a

prostyle

with

one

intercolumn

on its flanks.

Diprostyle

”

”

two

”

”

Triprostyle

”

”

three

”

”

To which may be added—

Heterostyle, composed of different Orders, as where one Order is employed for the centre of a composition, and another for the wings.

Macrostyle denotes a large Order, that is, one forming the height of the building.

Microstyle, on the contrary, denotes a lesser Order, belonging only to some low division of the building, as for instance, a porch. Thus porticoes are macrostylar, porches microstylar. In Italian composition, microstylar doors and windows, i. e. doors and windows decorated with small columns, are of frequent occurrence.

STYLOBATE.—That part of a structure on which an Order is raised, and on which the columns immediately stand. The term is, however, restricted to what partakes of the character of a pedestal, and not to a mere plinth or socle on the one hand, or to a lower fenestrated floor on the other.

VOLUTE.—The characteristic ornaments and indicial marks of the Ionic capital formed by circumvolving spiral mouldings are termed volutes. The small circle in which the spiral or springs terminate is called the eye of the volute.

Printed by Hughes & Robinson,

King’s Head Court, Gough Square.

ARCHITECTURE OF THE METROPOLIS.

A New and considerably Enlarged Edition,

with many additional Subjects and Plates.

It is proposed to publish, in 20 Monthly Parts, this very important work, to contain 180 plates and 800 pages of letterpress description of the Public Buildings of London. Each Part will contain 9 plates and 40 pages of text, Price 2s. 6d., to be ready for delivery on the Magazine day of each month, beginning with (December 31, 1848) January 1, 1849.

To the Architect, Builder, the Student in Architecture, and the Amateur, this desirable work for professional use and study is offered at an extremely small charge, and published at such intervals as to be convenient for all classes, entitled

ILLUSTRATIONS

OF

THE PUBLIC BUILDINGS OF LONDON:

Originally edited by the late AUGUSTUS PUGIN, JOS. GWILT, BRITTON, and others.

NEWLY EDITED AND ENLARGED BY W. H. LEEDS.

Manifold as are the publications which represent the various structures of the metropolis, this is the only work which describes them, not ad libitum, in views which, even when perfectly correct, show no more than the general aspect and locality of each building from a certain point, and consequently afford no information beyond mere external appearance—but exhibits them architecturally by means of plans, elevations, and occasionally both sections and interior perspective views. Thus a far more complete and correct knowledge may be obtained of each edifice, in its entire arrangement in all its parts and dimensions, than by pictorial views of them.

As studies for the Architect, the subjects contained in these volumes strongly recommend themselves,—more particularly so, as of the majority of them no plans and elevations are to be met with in any other publication, which materially enhances the interest of this collection, and it preserves to us authentic and tolerably complete records of many buildings which no longer exist. Among these are CARLTON HOUSE, illustrated with several plates, including sections, and a plan of the private apartments; the late ENGLISH OPERA HOUSE; MR. NASH’S GALLERY, which has since been dismantled of its embellishments; THE ROYAL EXCHANGE, and the BOARD OF TRADE.

Among the new subjects introduced in this new edition will be found:—The New Plan and Elevation of the BRITISH MUSEUM—NEW HOUSES OF PARLIAMENT—ROYAL EXCHANGE—ARMY AND NAVY CLUB—NEW CONSERVATIVE CLUB—REFORM CLUB—MUSEUM OF ECONOMIC GEOLOGY—MANSION OF THE EARL OF ELLESMERE (Bridgewater House); together with several Plans of Basements, showing kitchens and domestic offices, and conveniences not hitherto given.

List of Plates and short abstract of Subjects.

Adam, R., architect.—All Saints’ Church, Poplar.—All Souls’ Church, Langham Place.—Ancient Theatres.—Astley’s Amphitheatre.

Beazley, S., architect.—Berlin, theatre at.—Bordeaux, theatre at.—St. Bride’s Church, Fleet Street; spire, interior, and altar-piece.—Burton, Decimus, architect.

Chelsea, church of St. Luke at.—Churches, remarks on galleries in.—Cockerell, C. R., architect.—Colosseum.—Covent Garden, St. Paul’s Church.—Covent Garden Theatre.

Dimensions of domes.—Diorama.—Domes, table of dimensions of the principal ones.—Drury Lane Theatre.—Dunstan’s, St., in the East, tower of.—Dunstan’s, St., in the West, Fleet Street.

Elmes, Mr., his plan for improving the area around St. Paul’s.—English Opera House.

Gallery, Royal, and staircase, House of Lords.—George’s, St., in the East.—George’s, St., Bloomsbury, its steeple.—Gibbs, James, architect.

Halls, dimensions of.—Hanover Chapel.—Hardwick, T., architect.—Hawksmoor, Nicholas, architect.—Haymarket Theatre.—Henry the Seventh’s Chapel.—Hosking, Mr.—Hope, Mr.—House of Lords, staircase, and Royal gallery.

Inwood, Messrs., architects.

James’s, St., Piccadilly.—James’s, St., Theatre.—Jones, Inigo, architect.

Knights Templars.—Knights Hospitallers.

Law Courts, Westminster.—Lyceum Theatre.

Mary, St., Woolnoth, church of.—Mary-le-bone Church, account of.—Mary-le-Bow, St., church, steeple.—Mikhaelov, architect.—Moller, architect.—Monuments, at St. Paul’s.

Nash, J., architect.—Newman, J., architect.

Opera House, Italian.

Paul’s, St., Cathedral; description of the former cathedral; history of the present edifice; description; compared with St. Peter’s; monumental sculpture.—Paul’s, St., Covent Garden.—Peter-le-Poor, St., church of.—Porticoes, remarks on, by J. B. Papworth.—Pugin, A., architect.

Ralph, his opinion on St. Stephen’s, Walbrook; St. Paul’s, Covent Garden.—Repton, G. S., architect.—Royal Amphitheatre, Westminster.

Savage, James, architect; his justification of the tower of Chelsea Church.—Shaw, J., architect.—Smirke, Sir R., architect.—Soane, Sir J., architect.—Spires, remarks on.—Stephen’s, St., Walbrook.

Temple Church, history; monuments; description.—Theatres, remarks on,—Thomond, architect.

Walbrook, St. Stephen’s.—Walpole, Horace, his opinion of St. Paul’s, Covent Garden.—Westminster Abbey.—Westminster Hall.—Willement, T., painted window by, in St. Dunstan’s West.—Wilson, E. J., remarks on spires by; description of Westminster Hall.—Wren, Sir Christopher.—Wyatt, Benjamin, architect.

Abraham, R., architect.—Adam, Robert, architect.—Arch, Green Park.—Ashburnham House.

Bank of England, account of; New Dividend Pay Office—Basevi, G., architect.—Banqueting House, Whitehall.—Barry, C., architect.—Barry, James, painter.—Belgrave Square.—Bethlehem Hospital.—Blackfriars’ Bridge.—Bonomi, Jos., architect.—Bridges, London Bridge.—British Museum, account of; description of the new building.—Brooks, W., architect.—Burlington House—Burton, D., architect.

Carlton Palace.—Chambers, Sir W., architect.—Christ’s Hospital, new Hall.—Club House, Travellers’.—Club House, Union.—Club House, University.—Cockerell, C. R., architect.—College of Physicians, Warwick Lane.—College of Physicians, Pall Mall East.—Column, the York.—Corn Exchange.—Cornwall Terrace.—County Fire Office.—Custom House.—Cunningham, Allan.

Dance, Mr., architect.—Dodd, Ralph, engineer.

Eaton Square.

Fishmongers’ Hall; former building; new Hall; interior described.—Freemasons’ Hall.

Galleries, dimensions of various.—Gandy-Deering, architect.—George’s, St., Hospital.—George’s, St., Bloomsbury, portico of.—Grecian architecture, modern, remarks on.—Greenough’s, Mr., Villa.

Holkam House.—Holland, H., architect.—Hope’s, Mr., House.—Horse-Guards.—Hospital, Bethlehem.—Hospital, St. George’s.

India House.—Intercolumniation, remark on the term.

Jones, Inigo.—Jupp, R., architect.

Kendall, H. E., architect.—Kent, W., architect.—King’s College.

Labelye, architect.—Lewis, J. architect.—Libraries, dimensions of some.—London Institution—London University.—London Bridge, the old one; the new one.

Mansion House.—Mark’s, St., North Audley Street.—Museum, British.—Museum, Soanean.—Mylne, R., architect.

Nash, J., architect.—Nash’s, J., House and Gallery.—National Gallery.—Newgate.

Palace, Buckingham; interior; sculpture gallery; state apartments.—Papworth’s remarks on Somerset House; on English Villas.—Pimlico Institution, portico of.—Pitts, W., sculpture by.—Ponz, remark by, on the Royal Exchange.—Portico, St. George’s Hospital;—National Gallery; London University; St. Martin’s; St. George’s, Bloomsbury; Carlton Palace.—Post Office.—Privy Council Office, &c., account of.

Ralph, Mr.—Regent’s Park.—Rennie, J., engineer.—Roberts, H., architect.—Royal Exchange; destruction of the building by fire.—Russell Institution.

Sandby, T., architect.—Saunders, G., architect.—Shaw, J., architect.—Sion Park Gateway.—Smirke, Sir Robert, architect.—Smith, G., architect.—Soane, Sir J., architect, his House and Museum.—Society of Arts.—Somerset House.—Southwark Bridge.

Taylor, Sir R., architect.—Telford, Mr., his opinion of the Mansion House. Temple Bar.—Terraces in Regent’s Park.—Travellers’ Club House.

Vardy, Mr., architect.—Vauxhall Bridge.—Villa, Mr. Burton’s.—Villa, Mr. Greenough’s.—Villa, Mr. Kemp’s.

Union Club House.—University Club House.—Uxbridge House.

Walpole, Horace, his character of Lord Burlington: remark on Burlington House.—Ware, S., architect.—Waterloo Bridge.—Westminster Bridge.—Wellington House.—Wilkins, W., architect.—Wren, Sir C., architect.

York Column.—York Stairs Water-gate, &c.

Footnotes:

[1] The species of statue so called, and consisting of the upper part of a human figure growing out of a pedestal which tapers downwards, and appears to enclose the rest of the body.

[2] The necessity for agreement in this respect between the column and its entablature will be rendered apparent by the preposterous effect produced in two instances where the columns have been prolonged to an absurd height without the entablature being deepened in the same degree; namely, the portico of the Admiralty, and that within the court of Furnival’s Inn; the first of which is bad enough, the other far worse in every respect.

[3] For similar reason, the same concavity in the sides of the abacus takes place in the four-faced Ionic capital, the abacus being so shaped in order that it may subtend over and cover the diagonally turned volutes.

[4] We place these examples according to their respective proportional heights, beginning with the highest, and descending to the lowest, and note their measurements in minutes rather than in diameters and fractional parts, as being the most direct and convenient mode of comparison. The height of the capital is taken exclusive of the astragal which divides it from the shaft of the column; and as the expansion of the capital upwards has also to be considered, the extreme width of the abacus is also indicated.

Height of

Captial

Diagonal of

Abacus

Lysicrates example

87'

94'

Nerva do. (columns of the Forum of Nerva)

73'

90'

Pantheon at Rome

69'

90'

Jupiter Stator, Temple of,

66'

97'

Tivoli, Temple of the Sibyls,

60'

81'

[5] By way of illustrating these terms more directly by instances taken from well-known modern porticoes which answer to the respective denominations and distinctions above noted, we here give a classified list of some of them:

Distyle in antis.

Two columns

Three

St. Paul’s, Covent Garden.

& two antæ.

inter-

columns.

Hanover Chapel, Regent Street.

Tetrastyle.

Four columns.

*Covent Garden Theatre.

Hexastyle.

Six columns.

St. George’s Church, Bloomsbury.

*St. George’s, Hanover Square.

St. Martin’s Church.

Five

*St. Pancras’ Church.

inter-

India House.

columns.

Post Office.

*College of Surgeons.

*College of Physicians.

*Colosseum.

Octastyle.

Eight columns.

Seven

National Gallery.

inter-

Royal Exchange.

columns.

British Museum.

Decastyle.

Ten columns.

Nine

London University College.

inter-

columns.

The porticoes marked with the * are simple prostyles, or monoprostyle, advancing only a single intercolumn forwarder than the rest of the building; while the others are diprostyle, or show two open intercolumns on their flanks; except Hanover Chapel, whose portico is partly prostyle and partly recessed, and that of the India House, which is entirely recessed, although its elevation is not a composition in antis; had it been such, it would have been a tetrastyle in antis, that and a hexastyle having the same number of intercolumns, viz. five.

[6] Should the reader be quite fresh to the subject, he is recommended to draw out for himself,—merely roughly mark down,—the several dispositions of columns which have been spoken of; for by compelling him to consider them carefully, he will be better able to understand them, and have them distinctly impressed upon his memory. The annexed may serve as a specimen of such short-hand architectural notation, in asterisks.

- * * * * * * * * * * * * * *

- *  Peripteral Hexastyle,  *

- *       12 intercolumns     *

- *         on sides.         *

- * * * * * * * * * * * * * *

[7] This mode of uniting together columns and arches is perfectly legitimate, whereas that in which a fragment of the usual entablature is left sticking or added to each column, (as, for instance, in the interior of St. Martin’s Church,) is decidedly solecistical, since it is injuriously reminiscent of epistylar construction or trabeation,—is in itself unmeaning, and causes the columns to appear to have been too short, and therefore to have been eked out in height by blocks upon them, fashioned to resemble so many detached bits of an entablature.

Transcriber’s Notes:

The illustrations have been moved so that they do not break up paragraphs and so that they are next to the text they illustrate.

Typographical and punctuation errors have been silently corrected.

The advertisement for the book “ARCHITECTURE OF THE METROPOLIS” has been moved from the beginning of the book to the end of the book.

*** END OF THIS PROJECT GUTENBERG EBOOK ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

The Project Gutenberg eBook of Rudimentary Architecture for the Use of Beginners, by W. H. Leeds

RUDIMENTARYARCHITECTURE: FORTHE USE OF BEGINNERS.

PREFACE.

THE ORDERS.

DORIC ORDER.

MODERN DORIC.

TUSCAN ORDER.

IONIC ORDER.

ROMAN AND MODERN IONIC.

CORINTHIAN ORDER.

COLUMNIATION.

INTERCOLUMNIATION.

GLOSSARIAL INDEX.

THE FULL PROJECT GUTENBERG LICENSE