Modern house-plans for everybody / For village and country residences costing from two hundred and fifty dollars to eight thousand dollars
Date: 2022-08-07T00:00:00+00:00
Keywords: Architecture; Domestic -- Designs and plans

The Project Gutenberg eBook of Modern house-plans for everybody

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Modern house-plans for everybody

Author: S. B. Reed

Release date: August 7, 2022 [eBook #68706]
Most recently updated: October 18, 2024

Language: English

Original publication: United States: Orange Judd Company, 1900

Other information and formats: www.gutenberg.org/ebooks/68706

Credits: Charlene Taylor and the Online Distributed Proofreading Team at https://www.pgdp.net (This file was produced from images generously made available by The Internet Archive)

*** START OF THE PROJECT GUTENBERG EBOOK MODERN HOUSE-PLANS FOR EVERYBODY ***

Transcriber’s Note: Illustrations have been moved to the end of each chapter.

Modern
HOUSE-PLANS
For
Everybody

FOR VILLAGE AND COUNTRY RESIDENCES
COSTING FROM TWO HUNDRED AND FIFTY
DOLLARS TO EIGHT THOUSAND DOLLARS

Including
Full Descriptions and Estimates in Detail
of Materials, Labor,
Cost and Many Practical Suggestions

By
S. B. REED
Architect

ILLUSTRATED

New York
ORANGE JUDD COMPANY
1900

Copyright,
ORANGE JUDD COMPANY,
1900.

PREFACE.

In the modernized and revised edition of “House-Plans for Everybody,” but little attempt has been made to change the text or floor plans, as these are standard features requiring no revision. In the matter of outward dress, however, nearly all the elevations have been redrawn, with special regard to modern ideas and tastes, and in this respect it is specially new and commendable. The author has been guided in this work by many years’ experience, in planning and superintending the erection of country buildings, and has selected, from an extensive aggregation of original designs in his possession, such examples as seemed best to serve for purposes of simplicity, comfort, and economy. All the matters here presented are purely practical—well calculated to assist such as are contemplating the erection of either a village or country house. The plans embrace almost every variety of arrangement and style—each one is accompanied with a detailed description of its conveniences and construction—and its cost is shown by careful estimates, made to correspond with a uniform standard of prices, at present rates. To builders, this work will be valuable as a handbook of reference, to aid them when applied to for suggestions, either in the projection of new dwellings, or in the alteration of old ones, saving much time, study and calculations. The estimates of cost have been found correct as to totals, in the neighborhood of New York, and in many other localities builders have offered to duplicate the structures for the figures given.

S. B. Reed.

CONTENTS.

| Page.

DESIGN NO. I.
A COTTAGE, COSTING $250.

Accommodations for Beginners in House-Keeping, with Limited Means.—Arranged as the Wing of a future Main House.—First Steps.

9

DESIGN NO. II.
COUNTRY COTTAGE, COSTING $450.

Approximating the Cheapest Construction.—Roofs must not be slighted.—Their Relative Cost.—Suggestions as to Inside Linings.

12

DESIGN NO. III.
COUNTRY COTTAGE, COSTING $550.

Effect of Angles and Vertical Lines.—New form of Radiator, with Designs and Description.—A Durable Wash for rough work. | 17

DESIGN NO. IV.
COUNTRY COTTAGE, COSTING $550.

Adapted to an Eastern Frontage.—Good accommodations for a small family.—May have a Vestibule in Piazza.—Exterior Plastering.

22

DESIGN NO. V.
CONVENIENT HOUSE, COSTING $650.

Little required to build a comfortable home.—Saving by use of regular sizes of Sash, Doors, etc.—Novelty Siding.—Gutters.—Desirability, and Cost of Hanging Sash.

26

DESIGN NO. VI.
A HOUSE, COSTING $700.

Providing for future Enlargement.—Framework below the First Floor.—Section of Frame, with Description.—Cornice. | 33

DESIGN NO. VII.
COUNTRY HOUSE, COSTING $750.

Fair Expression of Purpose.—Best Results from Location.—Outside Plastering.—Stearate of Lime.—Formula for Making. | 39

DESIGN NO. VIII.
A COTTAGE, COSTING $800.

Enlargement of Design No. 1.—Best use of the Space.—Short Spans, and Bridging of Beams.—Suggestions as to Location. | 44

DESIGN NO. IX.
COUNTRY OR VILLAGE COTTAGE, COSTING $1,000.

Cosy and Homelike.—Style Determined by the Form of Roof.—Modes of Plastering.—Advantages of the One-coat work. | 49

DESIGN NO. X.
A HOUSE, COSTING $1,100.

Adapted to a Twenty-five Foot Lot.—Trim Outline.—No Waste in Materials.—Pitch of Roofs.—Ventilator and Scuttle combined. | 54

DESIGN NO. XI.
A HOUSE, COSTING $1,600.

Practical Experience Valuable in Planning.—Conventional Requirements.—A Fifth House.—Section of Outside Wall, and Description.

62

DESIGN NO. XII.
A HOUSE, COSTING $1,700.

Important Features in Exterior.—Care in Foundations.—Regular versus Balloon Framing.—Painting. | 69

DESIGN NO. XIII.
FRENCH ROOFED COTTAGE, COSTING $2,000.

For thickly settled localities.—Enlivened Dressing.—Purpose of Ornament.—Bracing of Frame.—Taste in Painting. | 76

DESIGN NO. XIV.
FRENCH ROOFED COTTAGE, COSTING $2,000.

Conforming to a Declivity.—Outlines of Grounds.—Tower-like Corner, Supported by a Column.—Weight of Slate, and Tin. | 82

DESIGN NO. XV.
SOUTHERN HOUSE, COSTING $2,000.

Extended Area of Ground Floor.—Requirements for Shade.—Preparations for Severe Weather.—Food Department. | 86

DESIGN NO. XVI.
A HOUSE, COSTING $2,100.

Pointed Style—in harmony with rural surroundings.—Earth Finish around Foundation.—Exhausting poisonous vapors from cellars.

92

DESIGN NO. XVII.
A HOUSE, COSTING $2,200.

The most Economical Form.—High Foundations.—Surrounding Grades.—Bridging Beams.—Stairs.—Why Contractors differ.—Who qualified to estimate.

98

DESIGN NO. XVIII.
SOUTHERN HOUSE, COSTING $2,200.

Style adapted to Middle and Southern States.—Tower.—Verandas.—Windows extending to the Floor.—Ventilation. | 105

DESIGN NO. XIX.
STONE HOUSE, COSTING $2,500.

Balance in Outlines.—Site.—Cellar, how sweetened.—Plant Window, with Contents Reflected.—Drudgery of Housework. | 111

DESIGN NO. XX.
COUNTRY HOUSE, COSTING $2,600.

Suited to a Southern Climate.—Double Front.—May face any point of Compass.—Detailed Estimate of Windows and Doors. | 115

DESIGN NO. XXI.
FARM HOUSE, COSTING $2,600.

Economical and Practical.—Size and Shape.—Direction to Face.—Hight above Ground.—Cause of Decay in Principal Timbers.—Paving instead of flooring Shed.

120

DESIGN NO. XXII.
A HOUSE, COSTING $2,800.

Advantages of Square Form.—Rounded Roof Outlines.—New Modification of Mansard Roof.—Front Hall Dispensed with.—Chimneys to Save Heat.

128

DESIGN NO. XXIII.
COUNTRY OR VILLAGE HOUSE, COSTING $2,800.

Suited to the Wants of Professional Men.—Outlines and Dress.—Good Taste.—Rule for Projections.—Slate.—Estimate in Detail for Plastering.

134

DESIGN NO. XXIV.
FARM HOUSE, COSTING $2,800.

Questions Involved in Locations.—Distance from the Street to Build.—Seeming Growth of the Earth.—Superintending Construction.—Points.

140

DESIGN NO. XXV.
A HALF-STONE HOUSE, COSTING $2,800.

Rustic and Substantial.—Front and Rear Finish.—Construction.—Confined Sewage.—Prices of Building Materials. | 147

DESIGN NO. XXVI.
A FRAME HOUSE, COSTING $2,900.

External Features.—Spreading out.—Direction to Face.—An Auxiliary Apartment.—Building a Section at a Time.—Reducing the Cost.

152

DESIGN NO. XXVII.
A STONE HOUSE, COSTING $2,900.

Solid, Independent, and Homelike.—Vines and Creepers for Decoration.—Manner of Building Corners, with Designs and Description.

158

DESIGN NO. XXVIII.
A HOUSE, COSTING $3,000.

Suburban Cottage, with Modern Improvements.—High Foundations.—Large Rooms.—Platform Stairs.—Low-down Grates.—Coal-lift. | 164

DESIGN NO. XXIX.
A HOUSE, COSTING $3,100.

Summer Residence, with Principal Rooms in the Rear.—Parlor and Piazza for Use together.—Well, How Constructed. | 171

DESIGN NO. XXX.
FRAME AND BRICK HOUSE, COSTING $3,300.

Indestructible Covering.—Design Showing Method of Construction, with Description.—Economical Plumbing. | 175

DESIGN NO. XXXI.
A HOUSE, COSTING $3,700.

Residence or Parsonage.—Three Elevations.—Nearly Square Ground-Plan.—Arranged Similar to Double House. | 180

DESIGN NO. XXXII.
A HOUSE, COSTING $4,000.

Double Front.—Bay Windows.—Circular Window Heads.—Preventing drafts.—Fire-place Heaters.—Plumber’s Work in Detail. | 187

DESIGN NO. XXXIII.
A BRICK HOUSE, COSTING $4,000.

Compact Outline.—Vestibule Doors.—Vertical Side Walls in Mansard Roof.—Design of Frame, with Description. | 196

DESIGN NO. XXXIV.
COUNTRY RESIDENCE, COSTING $4,750.

Perspective View.—Physicians’ Office.—Laboratory.—Water Reservoir.—Fountain.—Heaters and Grates. | 203

DESIGN NO. XXXV.
SUBURBAN RESIDENCES, COSTING $4,000.

Mansard Roofs.—Variety.—Conservatory.—Roofing Materials foreign to each other.—Furnace. | 205

DESIGN NO. XXXVI.
A FARM HOUSE, COSTING $5,000.

Hooded Style.—Main Entrance from two directions.—Position of Kitchen Wing.—Conservatory.—Beam Filling. | 209

DESIGN NO. XXXVII.
A SUBURBAN RESIDENCE, COSTING $7,000.

Outlines determined by location.—Irregularities.—Pleasantest Apartments.—Arches.—Concrete Floors.—Parquet Floors. | 214

DESIGN NO. XXXVIII.
A SUBURBAN RESIDENCE, COSTING $8,000.

Perspective View.—Modern Improvements.—Five Story Tower.—Dormer Windows.—School Room.—Remarks on Style. | 220

DESIGN NO. XXXIX.
SIX CONTIGUOUS HOUSES, COSTING $6,000.

Building in Blocks.—What is Saved.—Overcoming many objections.—Preserving their identity as Cottages.—Deafening Partitions.

227

DESIGN NO. XL.
FIVE CONTIGUOUS HOUSES, COSTING $10,000.

Residence.—Corner-Stone.—Observatory.—Desirability.—Imposing and animated.—Full Specifications of Plumber’s Work. | 232

DESIGN I.
A COTTAGE, COSTING $250.

This plan was designed for a simple cottage, with sufficient accommodations for beginners in housekeeping with limited means. It is arranged as the Wing of a larger house to be erected in the future, as indicated in the dotted sketch adjoining the ground-plan. (The building, with the proposed enlargements complete, are given in Design VIII.) To a certain extent, one’s dwelling is an index of his character. Any effort at building expresses the owner’s ability, taste, and purpose. Every industrious man, starting in life, has a right, and should be encouraged, to anticipate prosperity, as the sure reward of honest worth; and he may, with propriety, give emphasis to such anticipations in every step, and with every blow struck. His dwelling may well express the progressive character, rather than a conclusive result. Beginning a home by starting with a room or two, as present means will allow, and increasing its dimensions as can be afforded, without the precarious aid of the money-lender, is honest, independent, and best provides against the ever-changing vicissitudes of life. The first step towards building is the preparation of plans. These should be sufficiently comprehensive to embrace all probable requirements. If only a small beginning is intended, it should be made to exhibit some degree of completeness, and be arranged to conform with the proposed future enlargements without serious alterations.... Exterior, (fig. 1).—In view of the relation this structure is to bear to a proposed main house, and to allow for the grading likely to be required in the ultimate completion of the whole, the foundation is made to show four feet above the ground. Such elevation adds to the prominence and good appearance of the building, and relieves the interior from the dampness likely to result from a closer contact with the soil. The style is simple, neat, and favorable for the using of ordinary materials and methods of construction.... Interior, (fig. 2).—Hight of ceiling, 9 feet. The entire floor space is utilized in the three convenient divisions—a Living-room, Bedroom, and a Large Pantry—with no chimney-breast, or stairway to interfere. Each room is pleasantly lighted, and the larger one has outside entrances front and rear. With a favorable location, the living-room may be made a very cheerful apartment.... Construction.—For economy, and in prospect of a future enlargement, that shall include ample cellars, such excavations are omitted for this building. The Foundations are brick piers, extending in the earth below the reach of frost, and 4 feet above, and the intermediate spaces are close-boarded, making an inclosure useful for many purposes. If desired, a sort of temporary cellar may be made, by deepening the central portion of this inclosure a foot or two, and banking the loose earth against the inside of the boarding. The Framework and other parts are substantially constructed, of materials as indicated in the appended estimate. The Chimney rests on the central partition (which is strengthened by the central pier of the foundation), and has two flues, with metal thimbles in the bottom of each—one to receive the stove-pipe from the living-room, and the other to serve as a ventilator for the bedroom. All of the materials are intended to be of merchantable quality. The siding, flooring, and casings are mill-dressed. The sizes of the sash are 2 ft. 8 in. × 5 ft. 2 in., and of the doors, 2 ft. 8 in. × 6 ft. 8 in., all 1¼ in. thick, and may be found ready-made, and seasoned, in the stock of any regular dealer.... In the following estimate, the item of $20, for carpenter’s labor, may seem very little. This amount is allowed for preparing the building ready for the plasterer, and is entered in this manner for convenience in making the calculations. Adding to the above amount the cost of such labor in the “completed” parts, will make a total of $50.

Estimate, cost of materials and labor:

1,000 | bricks, laid, at $12 per M. | $12.00
124 | yards plastering, at 20c. per yard. | 24.80
636 | ft. of timber, at $15 per M. | 9.54
| 2 | sills, 4 × 6 in. 18 ft. long. |
| 1 | girder, 4 × 6 in. 18 ft. long. |
| 2 | sills, 4 × 6 in. 16 ft. long. |
| 9 | beams, 3 × 6 in. 16 ft. long. |
| 4 | posts, 4 × 6 in. 10 ft. long. |
| 14 | ceiling boards, 2 × 4 in. 16 ft. long. |
75 | wall-strips, 2 × 4 × 13, at 11c. each. | 8.25
98 | siding, 9½ inches, at 25c, each. | 24.50
| Cornice materials. | 6.00
50 | shingling lath, at 5c. each. | 2.50
6 | shingling planks, at 20c. each. | 1.20
12 | bunches shingles, at $1.25 per bunch. | 15.00
36 | flooring, 9½ in., at 25c. | 9.00
7 | windows, complete, at $6. | 42.00
4 | doors, complete, at $5. | 20.00
2 | stoops and closets, complete. | 20.00
| Nails, $4; painting, $14; carting, $5. | 23.00
| Carpenter’s labor, not included above. | 20.00
| Incidentals. | 12.21
| Total cost. | $250.00

Fig. 1.—EXTERIOR OF COTTAGE.

Fig. 2.—INTERIOR OF COTTAGE.

DESIGN II.
COUNTRY COTTAGE, COSTING $450 TO $550.

This plan of an inexpensive country dwelling is adapted to the wants of many people whose circumstances will not admit of a larger outlay. It was originally prepared and published in response to many calls for very low-priced country houses, “some as cheap as lumber and nails can make them.” The present one approximates that point, and will aid in devising others.... Two Elevations are given for the same ground-plan; the first (fig. 3) is for a one-story house of the simplest design, with an entrance door, a neat porch, and two windows in front. The rear is arranged similarly. The roof is conspicuous, in keeping with its importance. No matter how cheaply one proposes to build a house, it is essential not to slight the roof. A roof fit for a one-story cottage would answer equally well on a three-story house, so that relatively the cost of this part becomes greater, as the other parts become reduced and cheapened.... Ground-Plan, (fig. 4).—The accommodations are quite sufficient for a small family, consisting of three rooms, two lobbies, a kitchen-pantry, and a clothes-press. The Lobbies protect the rooms from direct contact with the outside doors. The Living-room is large, and accessible alike from each entrance; it has windows front and rear, and is convenient to the pantry; one entire side is unbroken, giving additional space for furniture, etc. The Pantry is shelved on two sides, and has a sash opening from the rear lobby, receiving light through the head-light over the rear entrance door. The front Bedroom is of good size—large enough to be used as a sitting-room; it adjoins the rear bedroom, and a clothes-press, and has a window facing the road. The rear Bedroom is the most retired, and has a window looking to the rear. The Press or closet is shelved and hooked in the usual manner. The door between the bedrooms might be dispensed with, but its convenience more than repays its cost.... Construction.—The Foundations are of common stone and mortar, laid in trenches, so as not to be affected by frost, and show 1½ feet above ground. The supports for the central partitions are stone piers, 4 feet apart. The Chimneys are of hard brick and mortar, passing through the first story in two flues, but joined together beneath the roof, and finished above as a single chimney. All the timber of the exterior frame is of 4 × 6-inch spruce. The sills are laid flatways on the foundation, and the upright frame-work stands upon them. The beams are of 1¼ × 8-inch spruce planks; they are notched 4 inches, to fit on the sill, and bear on the foundation, and are nailed to the studding and sills, binding the whole together. The ceiling-strips are of 1¼ × 5-inch spruce, resting on the ties, and nailed to the studding. The rafters are 2 × 4-inch wall-strips. All beams, studding, and rafters, are placed 16 inches apart from centers. The siding is of 10-inch dressed pine. The roof is covered with 18-inch pine shingles, laid on 1¼ × 2-inch shingling-lath. The porch-frame is of dressed and cornered timber, and is roofed with shingles on flooring laid face down. The flooring is 1⅛ × 9-inch spruce “milled.” The interior is plainly cased: for doors and windows, 3¼ inches wide; base, 6 inches; chair-back in the living-room, 3 inches; all beveled. All sashes and doors are 1¼ inch thick. The interior side-walls and ceilings are white-sand finished, on brown mortar and seasoned lath. Many efforts have been made to devise something cheaper than plastering for the inside lining of walls, but no substitute has yet been found to equal it in cheapness or durability. Plastering, as usually prepared and applied, conduces to the healthfulness of any apartment, emits no odor of mouldiness, has no attraction or harbor for vermin, is impervious to air, and a non-conductor of sound. Where linings of thin wood or paper are used, it is necessary to deafen the partitions and ceilings, otherwise they will be noisy. Sound made in any one part will reverberate through the house with drum-like suggestiveness. Most of such materials absorb moisture rapidly from the atmosphere, and when at any distance from the house-fires, so as not to be warmed and dried, the moisture is retained in them. This is especially the case in chambers and closets. Rather than seek a substitute for plastering, it is better to extend its use, and, where practicable, apply it as an outside covering, as well as for inside linings, as described for Design VI. The Second Elevation, (fig. 5,) shows an enlargement of the first, by increasing the outlines of the roof, giving space for a Second Floor, (fig. 6). Such space, though not immediately required for bedrooms, would be valuable for many purposes. The appearance of the building is improved by the enlargement, and the extra cost will not exceed one hundred dollars.

Cost of Cottage—No. 1:

468 | ft. stone foundation, at 5c. per foot. | $23.40
1,000 | bricks in chimneys, laid, at $12 per M. | 12.00
270 | yards plastering, at 25c. per yard. | 67.50
576 | ft. of timber, at $15 per M. | 8.64
| 2 | sills, 4 × 6 in. 80 ft. long. |
| 2 | plates, 4 × 6 in. 32 ft. long. |
| 2 | sills, 4 × 6 in. 32 ft. long. |
| 4 | posts, 4 × 6 in. 10 ft. long. |
| 2 | plates 4 × 6 in. 20 ft. long. |
| 2 | girts, 4 × 6 in. 20 ft. long. |
160 | wall-strips, at 13c. each. | 20.80
56 | rough plank, at 16c. each. | 8.96
70 | flooring, at 20c. each, $14; 115 siding, at 25c., $28.75. | 42.75
156 | shingling-lath, at 6c. each. | 9.36
27 | bunches shingles, at $1.50 each. | 40.50
| Cornice and porch materials. | 21.00
4 | windows, at $5 each, $20; 9 doors, at $3 each, $27. | 47.00
| Closet finish and nails, $26.09; cartage, $12. | 38.09
| Carpenter’s labor, not included above. | 60.00
| Painting. | 50.00
| Total. | $450.00

Extra cost of cottage—No. 2:

3 | windows, at $5 each, $15; 70 flooring, at 20c, $14. | $29.00
25 | siding, $6.25; 19 rough plank, $3.04. | 9.29
23 | shingling-lath, $1.38; 4 bunches shingles, $6. | 7.38
25 | wall-strips, $3.25; 400 brick, $4.80. | 8.05
| Timber, $5; stairs, $20; porch, $5. | 30.00
| Carpenter’s labor. | 16.28
| Total. | $100.00

Fig. 3.—ELEVATION OF ONE-STORY HOUSE.

Fig. 4.—GROUND-PLAN OF HOUSE.

Fig. 5.—ELEVATION OF STORY-AND-A-HALF HOUSE.

Fig. 6.—SECOND FLOOR.

DESIGN III.
A COUNTRY COTTAGE, COSTING $550.

These plans are for a low-priced house, similar in character to those in Design II., but differing entirely in outlines and arrangement, and embracing a much larger area of floor space, with increased accommodations.... Elevation, (fig. 7.)—The Front is broken with angles, furnishing a greater number of vertical lines, thus giving relief from the depressing appearance that would otherwise be manifest. The roof projections are proportionate, with simple finish. The cornices of the central or main part are the most prominent, and have plain trusses. The gable openings supplying ventilation between the ceilings and roof.... Ground-Plan, (fig. 8).—The interior contains five quite ample rooms, conveniently arranged, besides a lobby, pantry, and two closets. Hight of ceilings in two principal rooms, 9½ feet, in the side extensions, 6 feet at the plate, following the rafters to the center of the rooms, and from thence are leveled across at the hight of 9 feet. The front entrance is through a lobby. (If desired to economize further, the front stoop and one door may be saved, by putting an arch in place of the front door, making a recessed porch of the lobby.) The Parlor has two front windows, and a closet, and adjoins the kitchen and two bedrooms. The Kitchen is large, has two windows, an open fire-place, and adjoins a commodious pantry, and a bedroom. The Pantry has a large window, and is shelved on one side and end. A convenient Clothes-press opens from the right-hand bedroom. The Chimney is near the center of the house, insuring much saving of heat. The interior of this house may be comfortably warmed from a single fire, by placing a Radiator in the parlor, and leading the fire-draught from the kitchen stove through it. As the peculiar form and construction of this radiator is comparatively new, having originated with me, a description is here given, which will enable any skillful sheet-iron worker to make one (see figs. 9 and 10): A, is the parlor side of the chimney-breast; B, the kitchen side; C, chimney-flue; D, kitchen fire-place, containing kitchen-stove; E, smoke-pipe leading from the stove through the throat-piece, into the chimney-flue; F, F, stove-pipe branches passing through the back of the fire-place, and connecting the smoke-pipe, E, with the radiator; G, interior section of radiator; H, face of radiator; I, partition within radiator. The draught is regulated by a damper, J, in the smoke-pipe E, between the branches, F, F, and is forced through the radiator as required. The radiator may be made of any size desired to fit the mantle-opening, and if neatly constructed of Russian iron, will be quite ornamental. The partition, I, is 5 inches wide, and extends to within 6 inches of the bottom at either side, has turned edges, and is riveted to the front and back. In use, to start the fire, a direct draught is made by opening the damper, J, after which it may be closed to turn the draught through the lower branch-pipe into the central part of the radiator, where it descends, passing the lower ends of the partition, I, into the side passages, where it ascends and enters the upper branch-pipe, leading to the smoke-pipe, E. The bottom should have a collar to slide within the upright part, to facilitate cleaning when necessary. If there is no hearth-stone to set the radiator upon, the bottom may be filled with an inch deep of coarse plaster, which will make it safe even on a carpet. In setting the radiator, an inch or two of open space should be left between it and the chimney-back (just the thickness of the interior wall-plates of the mantle, against which the radiator should join.) Into the bottom of this space, air may be introduced from the outside of the house, through a two-inch pipe. The air thus let in becomes heated, and escapes around the margin, furnishing a pure healthful supply to the room.... Construction.—The estimate annexed, includes materials, and methods of construction similar to those described for Design II. The form and arrangement of this building admits of its being erected in sections; the central or main part may be first put up, and the side extensions added as means or necessity requires or allow. In localities where it is difficult to get dressed lumber, rough boards may be used for the siding, put on vertically, and battened, but in this case it would be practical to paint the cornices and other dressings only with lead and oil—using a lime-wash for the rough work. A durable wash may be made by slaking freshly-burned lump-lime in hot brine. This can be colored by adding dry-stainers as desired, and may be applied with an ordinary whitewash brush. Such work would greatly reduce the cost, and, if properly done, add a feature of rustic beauty, quite becoming in this class of building.

Estimate cost of materials and labor:

340 | ft. stone foundation, at 5c. per ft. | $17.00
1,000 | bricks in chimneys, laid, at $12 per M. | 12.00
290 | yards plastering, at 25c. per yard. | 72.50
800 | ft. of timber, at $15 per M. | 12.00
| 2 | sills, 4 × 6 in. 30 ft. long. |
| 8 | posts, 4 × 6 in. 13 ft. long. |
| 2 | sills, 4 × 6 in. 13 ft. long. |
| 2 | plates, 4 × 6 in. 30 ft. long. |
| 2 | sills, 4 × 6 in. 22 ft. long. |
| 2 | plates, 4 × 6 in. 13 ft. long. |
| 4 | sills, 4 × 6 in. 9 ft. long. |
| 2 | plates, 4 × 6 in. 22 ft. long. |
300 | wall strips, at 13c. each. | 39.00
70 | plank rough spruce, 1¼ × 10, at 16c. each. | 11.20
130 | siding, dressed pine, ⅛ × 10, at 25c. each. | 32.50
176 | shingling-lath, at 6c. each. | 10.56
30 | bunches shingles, at $1.50 per bunch. | 45.00
82 | flooring, dressed spruce, at 20c. each. | 16.40
8 | windows, at $5 each, $40; 10 doors, at $3 each, $30. | 70.00
| Closet and base finish, $16; cornice materials, $15. | 31.00
| Nails, $10; painting, $60; cartage, $14. | 84.00
| Carpenter’s labor, $75; incidentals, $21.84. | 96.84
| Total cost, complete. | $550.00

Fig. 7.—ELEVATION OF FRONT OF HOUSE.

Fig. 8.—GROUND-PLAN.

Fig. 9.—RADIATOR.

Fig. 10.-RADIATOR.

DESIGN IV.
A COUNTRY HOUSE, COSTING $550 TO $700.

This plan of a low-priced dwelling is adapted to the wants of many living in the country. It will accommodate a small family well, and has a pleasing appearance.... Exterior, (fig. 11.)—The Front has a sufficient variety of parts to insure a fair degree of picturesqueness. An allowable amount of neat tracery is admitted in the composition of the gables, and between the piazza columns, to give an expression of taste and cheerfulness. More than this would not accord with the utility and economy especially aimed at in these low-priced plans. If intended for a Summer Cottage, or Gate-lodge, for persons of larger means, the matter of exterior dress would assume quite a different aspect, and admit of more liberal treatment.... Ground-Plan, (fig. 12.)—The arrangement shown is adapted to an eastward frontage, placing the Entrances and the Living-room on the pleasant side, where least exposed to northerly winds and cold. Should an opposite frontage be selected, the plan may be suited to it by reversing the sides, as this would be reflected if held before a mirror. The hight of the ceilings are 10 feet. The front entrances open directly from the piazza to the parlor and living-room. These entrances may be protected in winter by a sash inclosure, forming a pleasant vestibule of a part of the piazza. The principal rooms are a Parlor, Kitchen, and two Bedrooms. The Parlor is in front of the main building, and of sufficient size for the ordinary uses of such an apartment. The Kitchen is intended as the Living-room, where the family, maintaining the simplicity of cottage life, spend much of their in-door time, sharing together the domestic cares and comforts. It is sufficiently spacious to admit of the requisite furniture, and allow of the ordinary family gathering without crowding. It has three windows; if desired, the upper part of the front door may have sashes, giving views in three directions. The pantry and lobby, at the rear, are of equal size, both opening from the kitchen. The two Bedrooms adjoin each other (but have no communication between them in the plan. This may be arranged as desired.) One opens from the parlor, the other from the kitchen, and each has a closet. The Chimney is placed between the kitchen and parlor, with an open fire-place on the kitchen side. The method of heating, described for Design III., would insure the comfortable warming of both of the principal rooms from one kitchen fire.... Cellar, (fig. 13.)—Hight, 6½ feet. The dimensions embrace the space below the kitchen and the bedrooms; it has three windows and an outside entrance. The part under the parlor is unexcavated.... Construction.—The Foundation-walls are of broken stone and mortar, and show 2 feet above ground. Those under the parlor are laid in trenches, extending below the reach of frost. The chimney is of hard brick and mortar. The frame-work, roofing, and exterior plastering, are similar to those described for Design VI. The gables are inclosed with vertical boarding, having their lower ends cut to pattern, and are battened over the joints. The ornamental verges in the gable-cornices are of pine boards, and, being of simple design, are readily made, and put in position while building. A pleasing effect is produced by “lining off” the surface of the exterior plastering into courses or squares. This is easily done with a “straight-edge,” and an S shaped iron while finishing. The final “Stearate” covering (see Design VI.) may be divided and shaded in two parts, and so applied as to give the alternate squares slight changes of shade. The best results may be obtained from exterior plastering where properly done. It is impervious to either air or water, and therefore equals the more expensive methods of inclosures for houses of this character. It should not be attempted over horizontal lines of framework, as the shrinking and consequent contraction will cause a bulging and cracking of the plaster at those points. Whenever obliged to cross such timbers, the upright framework must be halved on to them, and continued in whole lengths, to prevent such contractions. All joinings with the exterior wood-finish must be carefully made, especially at the top, to prevent water from entering, and running down behind the walls. Wide projectives of cornices afford a valuable protection for such walls against driving storms. Exterior plastering may be done in any season that is free from frost. An ordinary rain will do no injury to either of the two coats of plaster after they have become “set.” The “Stearate” should be applied as soon as the plastering is thoroughly dried.

Estimate for cost of materials and labor:

54 | yards excavation, at 20c. per yard. | $10.80
1,300 | ft. foundation, at 10½c. per ft. | 136.50
1,250 | brick, laid, at $12 per M. | 15.00
28 | ft. stone steps and sills, at 28c. per ft. | 7.84
120 | yards exterior plastering, at 30c. per yard. | 36.00
224 | ” interior ” ” 25c. ” ” | 56.00
1,700 | ft. of timber, at $15 per M. | 25.50
| 2 | sills, 3 × 8 in. 30 ft. long. |
| 3 | plates, 4 × 6 in. 16 ft. long. |
| 7 | beams, 3 × 8 in. 13 ft. long. |
| 3 | sills. 3 × 8 in. 16 ft. long. |
| 2 | plates, 4 × 6 in. 13 ft. long. |
| 10 | beams, 2 × 8 in. 16 ft. long. |
| 2 | sills, 3 × 8 in. 19 ft. long. |
| 9 | posts, 4 × 6 in. 10 ft. long. |
| 7 | beams, 2 × 8 in. 13 ft. long. |
| 2 | plates, 4 × 6 in. 30ft. long. |
| 14 | beams, 3 × 8 in. 16 ft. long. |
| 1 | piazza, 2 × 8 in. 18 ft. long. |
200 | wall-strips, at 10c. each, $20; cornice materials and gable finish, $18.25. | 38.25
180 | shingling lath, at 5c. each, $9.00; 16 spruce-planks, at 20c. each, $3.20. | 12.20
34 | bunches shingles, at $1.25 per bunch. | 42.50
80 | flooring-planks, at 20c., $16; piazza, $40. | 56.00
3 | cellar-windows, $9; 8 plain windows, $56. | 65.00
11 | doors, $44: closet-finish, $12: nails, $10: carting, $12. | 78.00
| Painting, $30; carpenter’s labor, $75; incidentals, $15.41. | 120.41
| Total cost. | $700.00
| If cellar is omitted, deduct, $167.14. Cost without cellar. | $532.86

Fig. 11.—FRONT ELEVATION OF HOUSE.

Fig. 12.—PLAN OF FIRST FLOOR.

Fig. 13.—PLAN OF CELLAR.

DESIGN V.
A CONVENIENT HOUSE, COSTING $650.

The accompanying plans were designed for a simple, compact, and economical house, and will be appreciated by any one who may desire to know just how little is required to build a comfortable home. They provide ample room for a small family.... The Cellar extends under the whole house, the walls are built as shown in the details of foundation and frame, given in Design VI., with 3 feet of masonry and 3 feet of frame-work.... The First Story contains a good-sized Hall, Parlor, and Kitchen, or Living-room, with two closets, pump, and sink. The stairs to the cellar lead directly from the kitchen, passing down under the stairs in the main hall. A “fire-place heater” can be put in the parlor fire-place, which will also warm the chamber above. This method of heating is economical, and occupies but little room.... The Second Story has three good-sized rooms, two closets, and small hall, in the main house, and an attic over the kitchen. The floor of the attic is one foot lower than that of the main house; this gives valuable room for storage, etc.... The hight of the first story of the main house is 8 feet 6 inches; of the second story, 7 feet. The hight of the kitchen ceiling is 7½ feet. The attic is arranged to have just standing room in the center.... A great saving of time and trouble is made, when openings are provided for regular sizes of sash, blinds, and doors, as they may be obtained of seasoned and well-made stock, at any time, from any dealer in such materials. These plans are drawn with reference to such regular sizes, viz.: the first-story windows are 2 ft. 7 in. × 5 ft. 6 in.; second story, 2 ft. 7 in. × 4 ft. 6 in.; cellar, 2 ft. × 2 ft. 8 in., all 1¼ inch thick. All principal windows should have their frames made with pockets and pulleys, and the sash hung with iron weights and good cord. The cost for the addition of these necessary parts, beyond what is required for the plain frame, is about as follows, for each window of ordinary size: 4 pulleys, (at 40c. per doz.) 14c.; 20 lbs. iron weights, 2½c. per lb., 50c.; ½ lb. sash-cord, 16c. per lb., 8c; 1 doz. screws, ⅞ in., 35c. per gross, 3c.; labor putting in pockets, pulleys, etc., 20 c.—Total, 95 cents, and when once done, will need no further attention or expense, while the house lasts. The satisfaction of having neat-fitting, easy-working sash, where the upper, or lower one, may be opened at will, is great. The saving of little fingers, and older nerves, to say nothing of shattered sash and glass, more than repays the extra cost of hanging sash.... The front, rear, and parlor Doors are 2 ft. 8 in. × 6 ft. 8 in. × 1½ in.; other first-story doors, 2 ft. 6 in. × 6 ft. 8 in. × 1¼ in.; second-story doors, 3 ft. 6 in. × 6 ft. 6 in. × 1¼ in.; all 4-paneled, and neatly moulded. The 1½-inch doors have mortise-locks; other doors rim-locks, all with porcelain knobs and escutcheons.... Blinds are included for the first and second stories, in the estimate appended, at an average cost of $2.40 per pair, and may be omitted, but are recommended as useful; they protect the sash from storms, and can be operated to give almost any desired light or shade in the rooms.... Many people may be in circumstances that would justify the building of one part of a house first, to be occupied as a temporary residence until means and opportunity warrant the building of the whole. A newly-married couple could arrange to have the kitchen part built as a residence for a season, rather than forego the opportunity of setting out trees, vines, and shrubbery, planting, and otherwise developing their grounds. They would then be near the work when building the main part, to superintend it, and care for materials, saving much that is often wasted, or lost. The wing, or kitchen part, could be built at a cost of about $185, so arranged as that the main house could be joined to it at any time—or, what would be better, the main house may be built first, at a cost of about $650, and the kitchen added at convenience.... The exterior dressing of cornice, window-caps, and stoop, are decided in their character for simplicity and boldness, giving a generous and finished appearance to the whole.... Novelty Siding, fig. 18, is mentioned in many of the estimates for these houses. This form of siding I first introduced some sixteen years ago, since which time it has grown into general favor and use in this neighborhood. It has the following merits to recommend it: 1st, It is easily put on by ordinary mechanics. 2d, When properly nailed to the frame, it strengthens it, so as to make bracing of the frame almost unnecessary. 3d, The spaces between the studding, when the interior is plastered, are each air-tight compartments, containing only stationary air, which is a non-conductor of cold (or heat), thus protecting the inside wall from the extreme changes of outward temperature. 4th, A cheaper quality of lumber can be used, the more cross-grained the materials, the less likely they are to check, or shrink, and any small, sound knots are easily covered with shellac before painting, which closes them effectually. 5th, The general surface is even, so that any brackets or other ornamentation can be put on without the trouble and difficulty of “scribing” them up to the clap-boarding.... The Shingling referred to in the estimate is of 18-inch pine shingles, and may be laid 5¾ inch to the weather, and secured with large-headed “shingle-nails.” It is best in laying shingles to lap at one-third the breadth, never in the center, for should one shingle check in the center, as they are liable to do, an opening is made through the three courses, and a leaky roof will be the result. “Shingling-lath” 1¼ × 2 in., with the lower edge placed just where the buts of the shingles would cover, will allow air to freely circulate on both sides of the shingles, and preserve them one-third longer than when laid on close planking, which holds the moisture, and assists decay of every part of the roof.... Gutters.—The old wooden gutter has nearly gone into disuse, and always seemed a barrier to any satisfactory finish of cornice. It was difficult to get timber of sufficient width for projections, and in such cases, the cornices were proportioned by boxing off, and building up around this “gutter-stick,” which was bad construction—the outer-edge of the gutter, being higher than the edge next the house, would cause the water, during heavy storms, or when the leader was choked up, to flow over against the frame-work of the building, which was one of the most frequent causes of decay and settling in the older houses in this country.—The tin-lined “box” and “trough” gutters are often troublesome; the tin can not be laid in them except in long lengths, which have been soldered together while flat and smooth. To lay these long lengths into the ready-formed gutter, requires much bending and hammering, which breaks the best tin at the soldered joints, on the under-side, where it is impossible to repair it, so that, while it may not appear at once to leak, it is sure to do so soon, to be discovered after the cornice has been swelled out of shape or destroyed. The gutter that I have adopted in all cases where practicable (see section, fig. 19), either for shingles or slate, is made of charcoal-tin, 14 inches wide, in lengths as long as can be well handled. One edge is turned or rolled up around a ⅝ iron rod, which makes a strong edge. Then a bend is made at 3½ inches from the turned edge, forming a right angle the whole length. This is laid on the second course of shingles, with one end lower than the other, so as to give a good run for the water. The ends are turned up, where required, to stop the water, and a tube put through the cornice in the usual manner.... For Tin Roofs, having a pitch of at least one inch to the foot, the gutters are formed in a similar manner, with the flat, or bottom part, about ½ inch wide, making a flange, which is soldered to the roof near the eaves, to a line drawn at an angle to make one end lower than the other, as for shingle roofs. This is the simplest and best kind of gutter, will outlast any other, and in the event of a possible damage, or leakage, no harm will be done beyond the loss or waste of the water that runs off over the eaves. It can be easily repaired, or replaced at any time, without interfering with the principal roof, and it saves the trouble and expense of building and boxing for gutters, or of making cornices with special reference to them, and it is cheaply constructed.—Estimate of Cost of building by this plan in the vicinity of New York City:

38 | yards excavation, at 20c. per yard. | $7.60
5,000 | brick, furnished and laid, at $12 per M. | 60.00
230 | yards lath and plastering, 3 coats, at 28c. per yard. | 64.40
1,412 | ft. timber, at $15 per M. | 21.18
| 1 | sill, 3 × 8 in. 92 ft. long. |
| 1 | girt, 4 × 8 in. 12 ft. long. |
| 4 | posts, 4 × 6 in. 21 ft. long. |
| 2 | ties, 4 × 6 in. 16 ft. long. |
| 2 | plates, 4 × 6 in. 19 ft. long. |
| 2 | ties, 4 × 6 in. 19 ft. long. |
| 2 | plates, 4 × 6 in. 12 ft. long. |
| 18 | beams, 3 × 8 in. 16 ft. long. |
| 10 | beams, 3 × 7 in. 12 ft. long. |
1 | locust-post, 4 inch. | 35
220 | wall-strips, 2 × 4 in. 13 ft. long, at 10c. | 22.00
160 | novelty siding-boards, 9¾ in., at 28c. | 44.80
30 | rabbeted siding, 9¾ in., at 28c, $8.40; 92 ft. cornice materials, $15. | 23.40
100 | shingling-lath, at 6c, $6; 16 bunches shingles, at $1.50, $24. | 30.00
| Tin gutters and leaders. | 7.00
90 | tongued and grooved flooring. 9½ in., at 30c. | 27.00
8 | windows with blinds, at $8, $64; 3 cellar windows, plain, at $3, $9. | 78.00
2 | stoop materials, $20; stairs, 1st story and cellar, $40. | 60.00
12 | doors and materials. | 48.00
| Carpenter’s labor (not included above). | 75.00
| Painting, two coats, $40; cartage, average one mile, $12. | 52.00
| Extras, for base, sink, pump, and nails, etc. | 34.27
| Total cost of materials and construction. | $650.00

Fig. 14.—FRONT ELEVATION.—Scale, 8 feet to 1 inch.

Fig. 15.—CELLAR.—Scale, 8 feet to 1 inch.

Fig. 16.—FIRST STORY.—Scale, 8 feet to 1 inch.

Fig. 17.—SECOND STORY.—Scale, 8 feet to 1 inch.

Fig. 18.—“NOVELTY SIDING.”

Fig. 19.—PORTION OF ROOF AND GUTTER.

DESIGN VI.
A HOUSE COSTING $700.

The plans here given are of simple design, intended to meet the large and increasing demand for low-priced country or village houses, having at the same time some architectural beauty. Without this latter feature, a comfortable house of this size can, in many places, be erected for much less than $700 even.... The house here described provides for as much room as a small family would require, while at the same time it admits of future enlargement, as one’s necessity or means may indicate, by additions, ells, or wings, at either side, or rear. In all cases, when planning small houses, it is best to provide for such enlargements. The triplet window in front is so arranged that it can be readily changed to a bay-window, when that improvement can be afforded, without marring the rest of the wood-work, or the harmony of the front elevation.... The Cornice of the main building is bracketed, and projects sufficient to relieve it of the stunted look so common to country houses. The brackets are made of 2 × 4-inch timber, in three pieces each, mitred to the angles required, and nailed together (see fig. 25), making an effective support and pleasant appearance.... A large saving in expense of foundations is secured by the following method of construction (see section of foundation and frame, fig. 24). The excavation is made for the cellar 2½ feet deep. A foundation of 8-inch brick-work, 3 feet high, or 6 inches above the level of the ground only, is required. A sill of 3 × 8-inch timber is laid on, and “flush” with the inside of the wall, to provide nailing for the wainscoting of the basement, if it is afterwards finished off.... The beams or joists for the first floor are supported by a plank-strip five inches wide, let into the inside of the frame at a proper hight, and securely fastened with heavy nails. The other parts of the framing are executed, and the whole raised, in the usual manner.... The inclosing, or siding, below the first story, is of 10-inch boards rabbeted and cross-grooved in imitation of large stone-work, and painted in contrast with the principal body of the house, and the water-table is put just above them.... Many small houses in the country are built without any permanent foundation, but are temporarily supported on posts set in the ground, and “boarded down.” They are always shaky, and doubtful while they stand, and are frequently blown over altogether. As will be readily seen, the above method provides for the saving of one-half of the mason-work in the foundation. In many places stone is abundant, and will answer the same purpose as brick in this case, except for the 6 inches above ground. The laying up of a single-face wall, 2½ feet high, of rough stone and mortar, would cost but a trifle. If the cellar should be finished at any time for basement purposes, these walls would be much drier and more healthful than when the walls are entirely of masonry. In this case it would be preferable to have the foundation walls 6 inches higher, so as to have the basement rooms 7 feet in the clear.... Several houses have been built on this plan in villages, and in most cases it has been decided not to have any rear outside door for the first story (fig. 22), but to wait until a kitchen could be finished in the front part of the cellar, when the common entrance would be by the area to the kitchen. In the plan (fig. 22), we have indicated two rear windows, but a door may take the place of either of them. We have also indicated by dotted lines where pantry, sink, etc., may be placed in the corner, according to the wishes of the proprietor.... There is but one chimney. The parlor is heated by running a stove-pipe through earthen thimbles placed in the partitions under the stairs, to the chimney, which is perfectly safe, and no heat is lost. When desired, a fire-place, or stove-pipe flue, may be carried up through the parlor, as well as through the living-room, and the two be brought together above the stairs into one chimney.... The Second Story, (fig. 23), may be divided into three rooms, the front one being 12 × 15 feet; or, if preferred, this front room may be divided into two smaller rooms, as indicated by the dotted lines. One may be 8 × 12, and the other 6½ × 12. The latter would be large enough for an ordinary bed (4½ × 6½ feet), with stand or chair by the window; and in this case a small closet could be cut off from the corner, opening into the large room, as shown by the dotted lines.

Cost.—The following estimate in detail, at present prices, near this city, will enable any one to determine the cost of building by this plan. Allowance can be made for any difference in cost of materials or labor as required in other localities:

43 | yards excavation, at 20c. per yard. | $8.60
6,000 | brick, laid complete, at $12 per M. | 72.00
1,636 | ft. timber, at $15 per M. | 24.50
| 2 | sills, 3 × 8 in. 29 ft. long. |
| 2 | sills, 3 × 3 in. 16 ft. long. |
| 4 | posts, 4 × 7 in. 21 ft. long. |
| 28 | beams, 3 × 8 in. 16 ft. long. |
| 2 | ties, 4 × 6 in. 29 ft. long. |
| 2 | plates, 4 × 6 in. 29 ft. long. |
| 2 | ties, 4 × 6 in. 16 ft. long. |
| 2 | plates, 4 × 6 in. 16 ft. long. |
32 | rafters, 3 × 4 in. 12 ft. long, at 20c. | 6.40
200 | wall-strips, 2 × 4 in. 13 ft. long, at 11c. | 22.00
162 | novelty siding-boards, 9½ in., at 28c. | 45.36
28 | rabbeted siding, 10 in., at 28c. | 7.84
97 | flooring spruce, 9½ in., at 28c. | 27.16
123 | shingling-lath, 1¼ × 2 in., at 6c. | 7.38
22 | bunches shingles, 18 in., at $1.25. | 27.50
14 | windows, with blinds, two stories, 9 at $8; 5 at $3. | 87.00
2 | stairs, $25; 11 doors and trimmings, $44; 1 stoop materials, $10. | 79.00
14 | rough spruce-plank, 1¼ × 10 in., at 30c. | 4.20
100 | feet cornice materials. | 20.00
| Carpenter’s labor (not included above). | 90.00
350 | yards plastering, three coats, at 25c. | 87.50
| Cartage, average one mile. | 12.00
| Painting, two coats, $40; extras, for tin, nails, etc. $31.56. | 71.56
| Total cost in above style. | $700.00

Fig. 20.—ELEVATION OF HOUSE.—Scale, 8 feet to 1 inch.

Fig. 21.—CELLAR.—Scale, 8 feet to 1 inch.

Fig. 22.—FIRST STORY.—Scale, 8 feet to 1 inch.

Fig. 23.—SECOND STORY.—Scale, 8 feet to 1 inch.

Fig. 24.

Fig. 25.

DESIGN VII.
COUNTRY HOUSE, COSTING $750 TO $1,050.

These plans represent a commodious dwelling house, constructed with especial regard for economy and utility, and they will be appreciated by those desiring to provide a comfortable, permanent shelter for home by the use of limited means.... Elevation, (fig 26).—In preparing plans for “low-priced” houses, the simplest outlines are indicated. Having to combine usefulness and small outlay, there can be no latitude for architectural display, beyond mere matters of accommodation and completeness. The exterior of this example fairly expresses its domestic purpose. The breadth of the front, the preponderance of horizontal lines, and the hooded roof, are each indicative of strength, and suggest its adaptation to rural situations. The satisfactory appearance of this house will greatly depend on its location. The best results would be obtained by placing it on a slight knoll, giving it additional altitude. This would prevent its being obscured by shrubbery and trees, which are indispensable accompaniments of a properly developed homestead.... Cellar, (fig. 27).—Hight, 6½ feet. It has three windows, an outside entrance, and stairway leading to the kitchen above.... First Story, (fig. 28.)—Hight of ceiling, 10 feet. The accommodations, consisting of five rooms, a pantry, and two closets, are adapted to a good-sized family. The Parlor and Kitchen are the principal rooms, and occupy the middle portion, their sides being protected by other rooms, and, having the fire-place between them, they are easily warmed. The device for heating described for Design III. would serve admirably in this house. Two Bedrooms adjoin the parlor. Many might choose to have double doors entering these bedrooms, to allow all three rooms to be used together occasionally. This would not preclude the use of the smaller ones as bedrooms, or, if preferred, as a sewing-room and a library. The Kitchen is the largest apartment, and has doors leading to the pantry, bedroom, parlor, stairway, and the rear entrance. The outside or entrance doors may be protected in severe seasons by storm-doors hung to open outward, with loose joint-buts to allow of their ready removal. The rear veranda is similar to the front one shown on the elevation.... Second Story, (fig. 29).—The front portion only is finished, with ceilings 8 feet high, and is divided into two chambers and four closets. The rear portion is left unfinished, to be used as an open garret. The space above the ceiling of the finished portion may be floored over with boards, to serve for storage of quilting-frames, trunks, etc.... Construction.—The excavations for the cellar are 4 feet deep. The foundation-walls are of broken stone, laid in mortar, and show 2 feet above the earth-grade. A strong girder, resting on large posts, or columns of stone or brick, supports the center of the building. In setting the girder, it should be elevated from ½ to ¾ of an inch in the center, rising gradually from each end, to allow for settling, which invariably occurs from shrinkage of the interior frame-work. The timber for the frame-work is indicated in the estimates below, and is substantially framed together. All the outside studding is halved over the principal timbers, to prevent vertical shrinkage from affecting the exterior covering of the side-walls. The exterior covering is of lath and plaster, as follows: all cornices and other dressings, and the roof, should first be completed—and all window and door frames set and cased. The outside frame should then be thoroughly lathed outside and inside. All this is to prevent jarring or pounding on these parts during the application or setting of the plaster. The plaster is made in the usual manner of fresh lime and sharp sand, with half a bushel of hair to each barrel of lime used, and allowed to lay two weeks to insure a thorough slaking and permeation of the lime. It is then applied in two coats—the first a “scratch,” the second a “browning.” The surface is floated with a darby, (not trowelled). After having stood a sufficient time to become dry, the whole is covered with a preparation called “Stearate of Lime,” using an ordinary white-wash brush. The formula for making this stearate of lime (known only to a few, who have treated it as a secret,) is here published for the first time, and it will be understood by those familiar with the nature and operation of slaking lime. The ingredients are simply fresh-burned finishing-lime, using the lumps only, unrendered beef-suet, and hot water. It is necessary that these parts be kept in lively motion while dissolving, or they will be entirely destroyed by “burning.” The usual process is to sink a large barrel, having an open end, 2 feet in the ground, pounding the earth around to make it firm. An upright piece, 4 inches in diameter, and 6 feet long, is set upright in the center of the barrel, and held in position by cleats at the bottom and top, leaving the upright free to turn. Arms are put through the upright within the barrel, and a cross-bar or lever is attached to the upper end—the whole making an apparatus similar to a “clay-mill.” One bushel of lime, 20 lbs. of suet (chopped fine), and a barrel of boiling water are provided; and while one works the “mill,” another feeds alternately lime, suet, and hot water. This quantity of material, costing about $2, will make a full barrel of the preparation. Any desired shade may be afterwards given by adding stainers. This mixture is applied while hot—two coats being necessary to insure a thorough covering. This will also be found a valuable preparation for covering exterior brick or concrete work. It is impervious to water, and will outlast any of the paints prepared for such purpose. All other information concerning the finish of this house may be inferred upon a careful study of the following estimates.—Estimate cost of materials and labor:

95 | yards excavation, at 20c. per yard. | $19.00
1,062 | ft. stone-foundation, at 15c. per ft. | 159.30
24 | ft. stone steps and coping, at 28c. per ft. | 6.72
2,000 | bricks in chimneys, laid, at $12 per M. | 24.00
517 | yards plastering, inside at 25c. per yard. | 129.25
130 | ” ” outside, at 30c. per yard. | 39.00
1,850 | ft. of timber, at $15 per M. | 27.75
| 2 | sills, 3 × 8 in. 34 ft. long. |
| 2 | sills, 3 × 8 in. 25 ft. long. |
| 1 | girder, 4 × 8 in. 32 ft. long. |
| 4 | posts, 4 × 8 in. 11 ft. long. |
| 3 | ties, 3 × 6 in. 34 ft. long. |
| 2 | plates, 4 × 6 in. 15 ft. long. |
| 2 | perlines, 3 × 8 in. 25 ft. long. |
| 2 | perlines, 4 × 6 in. 18 ft. long. |
| 100 | beams, 1¼ × 8 in. 13 ft. long. |
300 | wall-strips, at 11c. each. | 33.00
4 | locust-posts, at 30c. each, $1.20; 190 flooring, at 20c. each, $38. | 39.20
216 | shingling-lath, at 6c. each. | 12.96
39 | bunches shingles, at $1.25 per bunch. | 48.75
3 | cellar windows, at $3, $9; 12 plain windows, at $7, $84. | 93.00
17 | doors, at $4 each, $68; 2 verandas, $50 each, $100. | 168.00
| Stairs, $20; cornice materials, $18. | 38.00
| Closet finish and base, $15; nails, $12; cartage, $20. | 47.00
| Painting, $40; carpenter’s labor, $100; incidentals, $25.07. | 165.07
| Total cost, complete. | 1,050.00
| Omitting cellar and verandas would save | 300.00
| Total, after deductions. | $750.00

Fig. 26.—ELEVATION OF FRONT OF HOUSE.

Fig. 27.—PLAN OF CELLAR.

Fig. 28.—PLAN OF FIRST FLOOR.

Fig. 29.—PLAN OF SECOND FLOOR.

DESIGN VIII.
A COTTAGE, COSTING $800 TO $1,050.

This design is an enlargement of the small cottage described in Design I. The arrangements are very complete in convenience, appearance, and economy.... Exterior, (fig. 30).—The outlines and style are simple. The front is enlivened by the Porch, Bay-Window, and other projections. The details of finish are of neat design, and in harmony, giving an agreeable expression of taste and refinement—features especially pleasing in cottage architecture.... Cellar, (fig. 31).—Hight in clear, 6½ feet. It is under the main building only; has two windows, and stairs leading to the first story. It contains 378 feet area, giving abundant room for all ordinary requirements.... First Story, (fig. 32).—Hight of ceiling, 9 feet. The best use is made of the space by having but few divisions, leaving good-sized rooms. The Hall is small, but is conveniently arranged to answer all necessary purposes. It is entered from the front porch, and communicates directly with the parlor and dining-room, and by the main stairs with the second story. There is sufficient room for a hat-rack at the right of the front door. The Parlor is of fair size, the large bay-window adding materially to its area and cheerfulness. With very little expense in furniture, this apartment may be made pleasant and cosey. The Dining-room extends the whole width of the house, and has a window at each end. It is conveniently arranged, with doors opening from the hall, parlor, kitchen, pantry, and to the stairs. The Kitchen is commodious and pleasant; has three windows, an outside rear entrance, and adjoins the dining-room, pantry, and bedroom. The Pantry is sufficiently large and convenient to answer the requirements of both dining-room and kitchen. It has a small window, and is thoroughly shelved. The Bedroom opens directly from the kitchen. Its purpose in the partial erection (as shown in Design I.) may be changed in the completed building here described by making it an auxiliary of the kitchen for the coarser work; or, if needed, it may still be used as a bedroom for help.... Second Story, (fig. 33).—Hight of ceiling, 8 feet. There is a hall, two chambers, two bedrooms, and two closets, in this story, and no waste room. The Hall is just large enough for convenience. The Chambers are of ample dimensions, with a chimney between them, admitting the use of stoves when required.... Construction.—The Foundations for the main house are of broken stone and mortar, showing three feet above ground, neatly pointed where exposed to sight. The Wing is supported on piers, as described in Design I. Girders (shown on the cellar-plan by dotted lines), supported on strong posts, carry the central portions of the building. The shortness of the spans between bearings allow very light floor-beams. It is, however, important that the beams should be bridged to secure uniformity of strength, and prevent vibrations. The Frame is constructed in the usual manner—all the ties, girts, and headers being “framed in.” The inclosing is sufficiently indicated in the estimate. The front windows have semi-circular heads outside. In their construction the frames and sash are square, to admit ordinary curtain fixtures on the inside. The circular head is outside of, and “planted” on the flat casing, or “blind-strip,” and is made perfectly tight by a flange of tin. The additional expense of such circular finish is but trifling, compared with its good appearance. The side and rear windows have square heads, with rabbeted drips. Blinds are intended for all windows above the cellar. Ventilators are placed in each gable. The Porch has boxed pedestals and columns, scroll-sawed balusters, and circular spandrels. The inside walls and ceilings are “sand-finished” on two coats of brown mortar. The main stairs are constructed with a quarter circle, and winders at the top. These winders extend beyond the hall into the ceilings of the dining-room (as sketched), but do not interfere with its use, or seriously injure its appearance. The Bay-Window is neatly arched on the inside. Marble mantels are put in the parlor and dining-room, and shelves in the chambers. The second story-hall is lighted through the door (sash) of the front bedroom.... Suggestions.—This plan was arranged to suit a village lot 25 feet in width, leaving a passage-way at the side. This necessitated placing the wing at the rear of the main house. If there is more ground, the wing may be placed at the right of the main part, facing the road. The communications between the dining-room and wing would be still similar to those shown. The window at the right of the dining-room would be placed in the rear. These changes entail no extra expense, if determined on before commencing to build.—Estimate cost of materials and labor for main house:

56 | yards excavation, at 20c. per yard. | $11.20
875 | ft. stone-foundation, at 5c. per ft. | 43.75
2,000 | brick, furnished and laid, at $12 per M. | 24.00
340 | yards plastering, complete, at 25c. per yard. | 85.00
1,126 | ft. of timber, at $15 per M. | 16.89
| 2 | sills, 4 × 6 in. 24 ft. long. |
| 2 | sills, 4 × 6 in. 21 ft. long. |
| 9 | ties, 4 × 6 in. 24 ft. long. |
| 4 | ties, 4 × 6 in. 21 ft. long. |
| 4 | posts, 4 × 6 in. 19 ft. long. |
| 2 | plates, 4 × 6 in. 24 ft. long. |
| 1 | girder, 4 × 6 in. 21 ft. long. |
| 22 | beams, 3 × 6 in. 24 ft. long. |
250 | wall-strips, at 11c. each. | 27.50
162 | siding, 9 in., at 20c. each. | 32.40
| Cornice materials. | 18.00
135 | shingling-lath, at 5c. each. | 6.75
8 | rough planks, at 20c. each. | 1.60
24 | bunches shingles, at $1.25 per bunch. | 30.00
112 | flooring, 9 in., at 25c. | 28.00
2 | cellar windows, complete, at $4. | 8.00
1 | bay-window, complete. | 40.00
5 | plain windows, complete, at $12. | 60.00
| Stairs, complete, $40; 12 doors, complete, $96. | 136.00
| Mantels, $39.91; porch, $30; closets, $10. | 79.91
| Nails, $9; painting, $50; carting, $12. | 71.00
| Carpenter’s labor (not included above). | 80.00
| Total cost of main house. | $800.00
| Add Design I.’s estimate for wing. | 250.00
| Total for whole complete. | 1,050.00

Fig. 30.—FRONT ELEVATION.

Fig. 31.—PLAN OF CELLAR.

Fig. 32.—PLAN OF FIRST FLOOR.

Fig. 33.—PLAN OF SECOND FLOOR.

DESIGN IX.
COUNTRY OR VILLAGE COTTAGE, COSTING $1,000.

This plan is designed to answer many requests for a “cosey and homelike Cottage, suited to the wants of Mechanics and Laboring People, costing from $700 to $1,000.” It is best adapted to a westward frontage—with the hall, entrances, and porches protected from the north, but may be easily adapted to an opposite frontage by reversing the plan—placing the hall, etc., on the opposite side of the main house. The width, 21 feet, adapts it to a 25-foot village lot, leaving a side passage to the rear.... Exterior, (figs. 34 and 35.)—The style of any building is determined by the form of its roof; the steep and hooded style in this design accords fully with domestic feelings and artistic sentiments, and is growing in public favor for suburban structures. Compared with the usual Mansard style is more practical, less expensive, and serves equally well. The side-angles, porches, bay-window, cornices, and chimneys, each of simple construction, make up a pleasing variety of parts. All superfluous ornamentation is avoided. A too common fault prevails in villages, and even in the country, of building close up to the street lines. A clear depth of at least 20 feet in front should be devoted to a flower-garden, shrubbery, and vines, for flowers are proper accessories of cottage adornment, and architectural ornamentation can never compensate for their absence.... Cellar, (fig. 36.)—Hight of ceiling, 6½ feet. It extends under the front half of the building, giving an average area of 11½ × 15 feet—quite sufficient for ordinary requirements. It has two small front windows. A good ventilation may be had through the chimney; openings in the rear foundation allow a circulation of air over the unexcavated portion.... First Story, (fig. 37.)—Hight of ceiling, 9 feet; is divided into a hall, parlor, living-room, rear entry, and a closet. The Hall, entered from the front porch, connects through doors with the parlor, living-room, and rear entry, and contains the main stairs. The Parlor has a large bay-window in the front, opposite to which is a marble shelf resting on stucco trusses. It communicates with the living-room and hall. The remaining wall spaces are unbroken, for furniture and wall ornaments. The Living-room is a little larger than the parlor, has two windows, an open fireplace, a closet, and doors leading to the front hall, parlor, and rear entry. The rear entry is under the platform of the main stairs; is divided from the front hall, and is to be used as the common entrance. It has doors leading from the front hall, living-room, rear porch, and the cellar stairs. The parlor may be warmed by placing a radiator under the marble shelf, and passing the smoke-pipe from the living-room through it, as for Design III. The cost of such a radiator is $6.... Second Story, (fig. 38.)—Hight of center ceilings, seven feet; hight of side-breast walls, 3½ feet. The stairs leading to this story are made with a platform, placed three risers below the upper landing, which allows for the required head-room. The divisions provide for four rooms, a hall, and two closets; the large chamber has a double window in front, a marble shelf on the chimney-breast, and a closet; the hall bedroom is designed to be used in connection with the large chamber as a child’s room.... Construction.—The excavation for the cellar is made four feet deep, and for the rear foundation walls one foot. The loose earth is graded around the foundation at completion, leaving 1½ feet of the foundation exposed to sight on the outside. The foundation walls are of broken stone, laid in common mortar, 16 inches thick, and neatly pointed where exposed to sight, and are generally even with the framework on the outside. Provision is made for the cellar stairway by extending the adjoining walls beyond the inside of the frame to the hight of the ground, and finishing above with brick-work. The chimney is started with the cellar walls, and arranged with two continuous flues to the top. Side-openings are made under the cap by inserting 6-inch earthen thimbles on each side of the flues. The top courses of brick-work are laid across the entire chimney, making a solid and more lasting cap. Sheet-iron thimbles are put in the chimneys adjoining the parlor and front chamber. The framing, inclosing, flooring, etc., are done in a substantial manner, of materials indicated in the estimate below. Beams placed two feet apart from centers; rafters and studding 16 inches apart. The cornice-trusses are made of 2 × 4-inch timber, as shown in Design VI., and the shingling and gutters in Design V. Sash, 1¼ inch thick, glazed with second quality of French sheet-glass, counter-checked, and hung to iron balance-weights, with good cord. Doors 4-paneled each, for the outside and rooms in first story, and 1½ inches thick; all others 1¼ inches thick, moulded, with double faces. The main stairs has a 7-inch octagon newel, a 2¼ × 4-inch moulded rail, and 2-inch turned balusters, all of black walnut. The side-walls and ceilings of the two full stories are white-sand finished, on one coat of “laid-off” brown mortar. This is the favorite mode of plastering through the Eastern States, while in the neighborhood of New York two coats of brown mortar are usually applied. Where one-coat work is properly done, more hair is mixed in the mortar, increasing its strength. The same quantity of mortar is used as for two coats. The advantages claimed for the “one-coat work” are, a saving of one-third in labor, and obviating the delay for the additional coat to dry. All the wood-work usually painted, and the chimney-top, have two coats of best American lead and raw linseed-oil. For more extended remarks on painting, see article with Design XII.

Estimate of materials required, and total cost.

58 | yards excavation, at 20c. per yard. | $11.60
26 | perches stone-work, complete, at $2.50. | 65.00
2,000 | bricks, furnished and laid, complete, at $12 per M. | 24.00
360 | yards plastering, complete, at 25c. | 90.00
1,694 | ft. timber, at $15 per M. | 25.41
| 1 | sill, 4 × 7 in. 26 ft. long. |
| 3 | sills, 4 × 7 in. 15 ft. long. |
| 1 | sill, 4 × 7 in. 23 ft. long. |
| 8 | posts, 4 × 7 in. 13 ft. long. |
| 1 | girt, 4 × 6 in. 15 ft. long. |
| 3 | ties, 4 × 6 in. 15 ft. long. |
| 1 | plate, 4 × 6 in. 26 ft. long. |
| 1 | plate, 4 × 6 in. 23 ft. long. |
| 14 | beams, 3 × 7 in. 21 ft. long. |
| 13 | beams, 3 × 7 in. 15 ft. long. |
| 20 | ceiling-strips, 1¼ × 5 in. 13 ft. long. |
50 | joists, 3 × 4 in. 13 ft. long, at 16c. each. | 8.00
200 | wall-strips, 2 × 4 in. 13 ft. long, at 13c. each. | 26.00
130 | siding-boards, at 23c. each. | 29.90
160 | shingling-lath, at 6c. each. | 9.60
40 | bunches shingles at $1.25. | 50.00
12 | spruce plank, at 20c. | 2.40
| Materials in cornices, $14; stoops, complete, $20. | 34.00
95 | flooring, at 18c. each. | 17.10
2 | cellar windows, complete, at $3 each. | 6.00
2 | single windows, complete, at $12 each. | 24.00
3 | double windows, complete, at $15 each. | 45.00
15 | doors, complete, at $9 each. | 135.00
| Closet, shelving, and nails. | 20.00
| Stairs, $50; bay-window, complete, $50. | 100.00
| Tin (gutters, valleys, and leaders). | 11.00
2 | marble shelves, $10; painting, $80; carting, $15. | 105.00
| Carpenter’s labor, not included above. | 100.00
| Incidentals, sink, pump, etc. | 60.99
| Total cost. | $1,000.00

Fig. 34.—FRONT VIEW OF COTTAGE.

Fig. 35.—SIDE VIEW OF COTTAGE.

Fig. 36.—PLAN OF CELLAR.

Fig. 37.—PLAN OF FIRST FLOOR.

Fig. 38.—PLAN OF SECOND FLOOR.

DESIGN X.
A HOUSE COSTING $1,100.

This economical cottage has ample, convenient apartments for a medium-sized family, and is adapted to either a village or a more rural location. A 25 × 100-feet lot will contain such a house, besides the needed side alleyway to the rear. Those contemplating the erection of low-priced, tasteful cottages in duplication, either for selling, or by coöperation as in Building Associations, will find this plan suited to their wants.... Exterior, (fig. 39).—The front presents a graceful, trim, outline, with a neat and pleasant arrangement of openings. The Porch fits in an angle, with its steps projecting beyond the principal building, providing an appropriate entrance to the house. The large Bay-window is the most imposing feature of the front, is expressive of comfort and cheerfulness, and gives a good appearance and character to the whole building. The principal cornices are neatly trussed, and have such “spread” as gives a finished and bold appearance to the roofs. It has such proportions and genteel style, that if near a more formidable or costly residence, it would not disgrace it.... Cellar, (fig. 40.)—Hight 7 ft. Its outlines correspond with the ground-plans of the principal building; it is three feet below the general surface of the ground, and four feet above, and has an outside entrance door, three good sized cellar windows, two of which are in the front, and one at the side, contiguous to the coal-bin. It is accessible from the first story by a plain stairway. If desirable at any time, a pleasant basement room may be finished in the front part, at a small cost.... First Story, (fig. 41).—Hight of ceilings, 9½ feet. It is divided into three rooms of nearly equal size, with a Hall and two Closets. The Bay-window adds considerable to its area, making it the largest and pleasantest room. The Dining-room adjoins the parlor, and may be used with it as occasion requires by opening the folding doors. Each of these rooms has neat marble mantles, and opens into the front hall. The Kitchen connects with the dining-room, and is provided with a pantry, pump, sink, two windows, and an outside door leading to the rear yard. When houses are built on single village lots, it is usual to arrange for one “blank” side, as in this plan, but where more ground is allowed, it is desirable that openings should be made for at least one window in each story of this side, as they would add to the cheerfulness of the interior, and give a better appearance to the outside. Two windows are thus indicated by dotted lines, one for the dining-room, and one for the interior chamber, though the latter is lighted from the roof, as noted. It may be advisable even to put two other windows on this side of the house, for the outside general good appearance, or blind-windows may be put in at small expense, for the same purpose.... Second Story, (fig. 42).—Ceilings 8 feet high. The divisions are very simple, making four rooms, three closets, a stairway, and passage leading to each room.... Construction.—Reference is had in this plan to what is known in the trade as “piece-lumber”—the joists, wall-strips, boards, etc., being generally in lengths of 13 feet each. There is great economy in being able to use such standard lumber, without cutting to waste. Figure 43 shows how a neat, cosey cottage-frame may be cheaply constructed almost wholly of such 13-feet materials. But there is a decided preference for full chamber ceilings, and as the difference in cost would not exceed $60, it is best to make the house two full stories high. The principal frame is of 3-inch timber, with studding of 2 × 3 inch. This thickness of the frame-work secures some 220 feet more interior space to the rooms, than in the use of 4-inch timber, besides saving one-fourth of its quantity and cost. Ordinary 1¼ × 10-inch spruce plank are used for the frame-work, for the floors and ceilings. For the beams they are reduced to the depth of eight inches, and the 2-inch strips sawed off are used for shingling-lath. For the ceiling-frame of the second story, they are simply sawed through the middle, leaving each half five inches deep, and are all placed 16 inches apart from centers. One row of cross-bridging is put through the center of each tier of beams, and the center of the ceiling-strips are secured by hangers from the rafters. The Rafters are 2 × 4 inches, framed to rest on the principal plates, where they are connected with the ceiling-strips by spikes, preventing any settling or spreading of the roof. The Roof of the main wing is constructed with double pitch, corresponding with that of the main roof. The principal roofs are finished with shingles, and has improved gutters, described in Design V. The porch and bay-window roofs are covered with tin laid on smooth boarding.—The rake or pitch of roofs has much to do in giving character and finish to buildings. For ordinary roofs, when shingles or slate are used, the rise should be one-third the width of the building, as in this case, the rise is 4⅓ feet, for the width of 13 feet. This pitch is very pleasant to the eye, and easy of construction. In larger buildings, it is often desirable to secure more space or head-room in the attic, when the rise should be one-half the width of the building. We would never go between these two angles in search of a roof-line that would gratify good taste, or comport with any style, but deviations above one-half or below one-third may be made, as circumstances indicate.—Circular openings covered with blinds, in each gable, give free air circulation between the ceilings and roof. Every dwelling should have some way of readily reaching the roof from the inside to clean the gutters, repair the roof or chimneys, and in case of fire in the house or in the neighborhood. An opening is made in the ceiling of the middle chamber (fig. 42) over and just inside the door, and thence through the roof. This is neatly boarded around its sides, forming a “well,” and is covered at the top with a sash, sloping with the roof, hung so as to be easily opened and closed by a cord from the inside. This provides for light, ventilation, and a scuttle in combination. A sash, hung on center pins to revolve, over the door of this room, transmits light from the skylight to the second-story passage and stairway, and supplies ventilation.... The mason’s work is complete and substantial in every part. The foundation walls, piers, and chimneys, are of hard brick and mortar; the plastering is two coats of brown mortar and a hard finish.... Heating.—Only two fires are required at any time to make the principal rooms of this house comfortable. The parlor, and chamber immediately above it, are warmed through a heater placed in a parlor fire-place. The dining-room has a radiator fitted in the opening of the mantel, and connected by 5-inch pipes through the fire-place back with the kitchen stove.

Estimate of materials and cost:

40 | yards excavation, at 20c. per yard. | $ 8.00
12,000 | brick, furnished and laid, at $12 per M. | 144.00
32 | ft. stone steps and coping, at 20c. per ft. | 6.40
450 | yards plastering, at 30c. per yard. | 135.00
1,969 | ft. of timber, at $15 per M. | 29.53
| 1 | sill, 4 × 8 in. 39 ft. long. |
| 1 | girt, 4 × 8 in. 13 ft. long. |
| 1 | plate, 3 × 4 in. 104 ft. long. |
| 116 | studding, 2 × 3 in. 10 ft. long. |
| 6 | posts, 3 × 8 in. 20 ft. long. |
| 1 | tie, 3 × 6 in 104 ft. long. |
| 1 | sill, 2 × 4 in. 91 ft. long. |
| 153 | studding, 2 × 3 in. 9 ft. long. |
70 | planks for beams and ceilings, at 25c. each. | 17.50
55 | rafters, 2 × 4 × 13, at 13c. each. | 7.15
208 | siding, 10 inch, at 26c. each. | 54.08
100 | lbs. tarred felting, at 3c. per lb. | 3.00
| Materials in cornices, water-table, and corner-boards. | 20.00
165 | shingling-lath, at 6c. each. | 9.90
28 | bunches shingles, at $1.50 per bunch. | 42.00
200 | ft. gutters, leaders and roofs, at 8c. per ft. | 16.00
96 | flooring, at 26c. each. | 24.96
| Stairs, complete, $40; porch and stoops, complete, $40. | 80.00
| Bay-window, complete. | 60.00
8 | windows, complete, at $10 each. | 80.00
3 | cellar windows, complete, at $6 each. | 18.00
15 | doors, complete, at $8 each. | 120.00
| Closets and shelving, $8; mantels, $30. | 38.00
| Pump and sink, $18; nails, $15. | 33.00
| Painting, $60; cartage, $13.48. | 73.48
| Carpenter’s labor, not included above. | 80.00
| Total cost, complete. | $1,100.00

Fig. 39.—ELEVATION OF FRONT OF HOUSE.

Fig. 40.—PLAN OF CELLAR.

Fig. 41.—PLAN OF FIRST FLOOR.

Fig. 42.—PLAN OF SECOND FLOOR.

Fig. 43.—MANNER OF FRAMING.

DESIGN XI.
A HOUSE COSTING $1,600.

This plan is for a comfortable and genteel dwelling, suited to almost any location, and for the accommodation of an averaged-sized family. Upwards of twenty years’ experience in planning and building has taught me that it is not difficult to design either as to Style, Room, or Cost, when the owners have means sufficient to gratify their individual tastes, and no special care is required to save expense. But it is quite another matter to provide plans for the great mass of people who, through habit or necessity, put everything to the test of economy, and to whom every inch of room, or foot of material, is an important consideration. In designing and projecting such work, theories avail little; practical experience must then be the chief guide.... Conventional modes of living have established a system of household arrangement and economy requiring for every home of even moderate refinement, a house with a front hall, a parlor, a dining-room, and a kitchen on the first floor, and a liberal suite of chambers in a second story. Our plan herewith, though only 20 by 30 feet, provides for all the above. If built on an ordinary 25-feet village lot, it will allow a needed passage-way on one side. In rapidly filling up, crowded localities, four persons owning single lots, making a frontage of 100 feet, can arrange together and build five houses on this plan for about the cost of erecting four detached houses. The fifth house may be rented or sold for the benefit of the four owners. In such cases, a hall should be finished in the basement, with an entrance in front similar to the one shown in the rear in fig. 45.... The Front Elevation is made up of simple parts, in a neat arrangement. The Bay-window indicates refinement, and adds largely to the area or room of the parlor.... The Cellar walls are of hard brick, are 8 inches thick, 7 feet high, and show at least 3 feet above ground. For health’s sake alone, as well as for a better appearance, and for convenience, if the basement should ever be desired finished off in rooms, which can be done at any time with little expense, it is best to always place the first floor well up from the ground. In very cold localities, frost can be kept out of the basement by banking up in winter, or better by laying the brick walls with an opening up through the center, extending bricks across the opening at frequent intervals to secure firmness. This central air-chamber promotes health, warmth, and dryness in the basement or cellar. One foot of the soil taken from the excavation for the cellar should be used in grading around the house, to secure the flow of water away from it, and still leave the walls three feet or more above the ground.... First Story, (fig. 46).—Hight of ceiling, 9½ feet. The divisions embrace three rooms, a hall, and two closets. Double doors are provided for the front entrance, and between the parlor and dining-room, and marble mantles and shelves in the principal rooms. A movable “Dresser” having drawers and shelving with small doors, is indicated for the dining-room. This room may be heated by leading a pipe from the kitchen stove to a drum and back into the chimney, or up through the chamber above to warm that somewhat. A “Fireplace heater” in the parlor will warm the chamber above.... Second Story, (fig. 47.)—The hight of the ceilings are 8½ feet. There are four chambers, with closets to each, and a small hall. The head-room over the main stairs extends beneath the closet to the inner edge of the shelf shown—the floor in these parts being angled to suit the pitch of the stairs.... Remarks on construction.—An end section of the “Novelty siding” is shown in fig. 48. This is of 10-inch boards, 1 inch thick, cut as shown in the engraving. The groove in the center gives it the appearance of narrow clapboards; the lap of about an inch closes tightly, and the thick boards not only add to the warmth, but also to the strength. A house covered with this will vibrate very little in the most windy situations, and be firmer than one covered with thin siding having much heavier timber. Where planing mills are accessible, it is little more expensive than the dressed half-inch boarding, and the appearance is quite as pretty. In this vicinity it is customary to purchase a lot of pretty good quality merchantable pine boards, select the best and clearest of knots for siding, and use the rest for flooring where knots are not objectionable when to be covered with carpeting. The smaller and firm knots in the siding used, are readily covered with paint, if first primed with a little solution of shellac in alcohol. A section of the wall is shown in fig. 49. The studding, 2 × 4, makes a space of four inches between the siding and plastering. Tarred paper, or what is termed roofing-felt, is procured in rolls 32 inches wide. A saw run through the roll cuts it into 16-inch strips. The studs being set 16 inches apart from center to center, leaves the clear space of 14 inches. The strips of felt are turned up an inch on each edge, and these turned edges are held against the studs by lath firmly up and down, so as to hold the sheets midway between the plastering and siding. This leaves two air-chambers, both good non-conductors of heat. Mice or insects will not eat or go through this material. It is impervious to currents of air, and the whole is as warm as if filled in with brick. The cost is very small, and, as will be readily seen, it is much warmer than when the felt is put on directly under the boards, leaving only one air-chamber, and that a wide one.... In all house-plans, we advise putting in all the closets possible; they are always convenient, even a foot square “cubby-hole” in the side of a chimney is a handy place. In planning a house, after making the size as large as one’s means will allow, the “better half” should be consulted as to the advisability of making this or that room a little smaller by cutting off a few inches here and there to enlarge a pantry or closet.... We always advise to put in an extra bell or two, and one or more speaking-tubes, to connect the upper and lower rooms. The cost is but trifling, if they are put in when building. A hundred feet of speaking-tube will cost but $2 or $3; the carpenter can insert it behind the lath, running it from one room to another in a few minutes, and it will save many steps, and much calling through the halls, especially when the mother happens to be an invalid, and restrained to a chamber.... In arranging sink, table, dish-pantry, etc., with reference to dining-room and kitchen, always plan to save steps. A distance of 10 feet extra, traveled over each way, say 20 times a day, in handling food and dishes, amounts to 28 miles extra walking every year, all of which may be saved by a slight change in arrangement. These are small matters, but these have much to do in making a “convenient house.”

Cost.—The following Estimates of cost in detail will give an idea of the general character of the work. The prices given are for materials in the vicinity of New York. Carpenters wages are reckoned at $2 per day; mason’s work, $2.50 per day; and painters, $3 per day:

| Excavation, 2½ ft. deep, at 20c. per yard. | $11.00
12,000 | hard brick, furnished and laid, at $12 per M. | 144.00
28 | ft. stone steps, at 40c. per ft. | 11.20
16 | ft. stone sills, at 30c. per ft. | 4.80
488 | yards lath and plastering, at 30c. | 144.90
2,000 | ft. timber, at $15 per M. | 30.00
| 2 | sills, 4 × 7 in. 20 ft. long. |
| 2 | sills, 4 × 7 in. 30 ft. long. |
| 4 | posts, 4 × 7 in. 20 ft. long. |
| 2 | plates, 4 × 6 in. 20 ft. long. |
| 2 | plates, 4 × 6 in. 30 ft. long. |
| 2 | ties, 4 × 6 in. 26 ft. long. |
| 2 | ties, 4 × 6 in. 30 ft. long. |
| 2 | girders, 4 × 8 in. 15 ft. long. |
| 2 | stringers, 3 × 8 in. 20 ft. long. |
| 30 | beams, 3 × 8 in. 20 ft. long. |
32 | rafters, 3 × 4 in. 12 feet long, at 18c. | 5.76
300 | wall-strips, 2 × 4 in. 13 ft. long, at 11c. | 33.00
200 | novelty siding-boards, 9½ in., at 30c. | 60.00
160 | lbs. tarred paper, at 5c. | 8.00
100 | hemlock boards, 10 in., at 18c. | 18.00
100 | ft. main cornice, at 40c. | 40.00
1 | bay-window, complete, with blinds, labor included. | 60.00
1½ | stoops, complete, labor included. | 70.00
8 | windows, with blinds, at $16. | 128.00
4 | windows, with blinds, at $8. | 32.00
8½ | squares of tin roofing, at $7. | 59.50
100 | ft. gutters and leaders, at 10c. | 10.00
150 | flooring-plank, tongued and grooved, at 28c. | 42.00
| Stairs, main and cellar, $60; base-boards, shelving, etc. $30. | 90.00
4 | mantels (1 full marble, and 3 marble shelves on trusses of plaster). | 50.00
21 | doors, complete, labor included, $158; 350 lbs. nails, at 5c., $17.50. | 175.50
| Painting, two coats. | 80.00
| Carpenter’s labor, not included in windows, doors, and porches, about $200.00; cartage, average one mile, $30.00. | 230.00
| Allow for extras, cistern, pump, sink, etc., etc. | 62.34
| Total. | $1,600.00

Prices vary in different localities, somewhat, but when higher in some particulars, they will generally be lower in others, so that the whole cost will not be greatly different over a considerable extent of country. There are many items that can be cut down in the above estimate, where great economy is needful. For example, substitute wood for stone steps and sills; omit the blinds and bay-windows, use cheaper doors, pine-stair railing and newel, instead of walnut, etc. Our estimate is for a pretty, complete, tasteful house.

Fig. 44.—FRONT ELEVATION OF HOUSE.

Fig. 45.—PLAN OF CELLAR.

Fig. 46.—PLAN OF FIRST STORY.

Fig. 47.—PLAN OF SECOND STORY.

Fig. 48.—“NOVELTY SIDING.”

Fig. 49.—SECTION OF OUTSIDE WALL.

DESIGN XII.
A HOUSE COSTING $1,700.

The plans here given are similar in many respects to Design XI., and are somewhat larger, but can be built for very nearly the same cost.... Elevation, (fig. 50).—The front is irregular, having an angle, which narrows the parts, supplies more vertical lines, and adds to their length comparatively. These are important features, imparting a graceful appearance, and influencing the entire character of the house.... The angle affords ample room for the piazza, which can be built for much less cost than when its three sides are exposed. The next attractive features of the front are the bay-windows below, and double windows above, with the balustrade and hood so proportioned and arranged that they conform with each other with pleasing effect.... Cellar, (fig. 51).—The Foundation Walls are of hard brick laid in mortar, 8 inches thick, and 7 feet high. In localities where the foundation rests on loose sand, care should be taken to provide a bedding, laid 4 inches below the cellar bottom, 16 inches wide, of brick, or better, of large flat stones. Still greater care should be bestowed on the bedding for the chimneys and girder supports, for they sustain the greatest proportionate weight, and any settlement of these parts will cause a depression of the floors, disarranging the whole house, and become an immediate and continuous source of anxiety and expense. The Area in the rear is built of hard brick and mortar, with blue-stone steps and coping. Blue-stone sills are provided for each of the cellar windows.... First Story, (fig. 52.)—The interior arrangement of the plan will be appreciated as making the best possible use of the room. The Front Hall is wider than is usual in houses of this character. The Stairs are arranged with the “quarter circle” about midway of their hight, which brings the niche down where it becomes an important feature of the hall. The three principal rooms, the parlor, dining-room, and kitchen, can be entered from the hall. The latter two rooms have doors leading to the lobby. The Lobby is built of 4½-inch tongued and grooved ceiling-boards, with sashes made to swing. A Shelf, 1½ feet high, and another just above the sash, give sufficient frame-work to fasten the center of the boarding; the ends are nailed to the sill and plate; these shelves will be found useful for many purposes. Attached to the lobby, and built with it, is a good-sized Pantry (P), for the dining-room. The Kitchen is provided with a closet at the side of the chimney, a sink, with small closet underneath, and a direct communication to the cellar stairs under the hall stairs. The window in the side of the dining-room may be omitted, if the house is in a village and joins another, but this is desirable to give abundant light in this, which is really the living-room of the family.—The method of heating indicated in Design XI. is applicable to this plan.... Second Story, (fig. 53.)—The peculiar manner of constructing the Stairs brings their landing nearly in the center, so that hall space sufficient only for four doors is necessary, leaving almost the entire floor to be laid off into rooms. The heavy lines show the most simple method of dividing this story into four rooms. Should another room be desirable, it can be taken off from two rooms, as shown by the dotted lines. In this case, another window may be inserted as indicated. Every one’s experience will suggest that there can not be too many closets, and we have added one to every room in the house, except the parlor.... Construction.—The bill of timber appended indicates a “regular” Frame. It is a great satisfaction and saving to have the timber properly “laid out,” and framed by, and under the immediate direction of a master mechanic, so as to be quickly and substantially raised. Four good carpenters would easily frame all the timber in this house in two days, and raise it the next day. At least one man of well-known ability and experience as a mechanic should be with and take charge of those employed to build a house. It is not economical for one about to build a home to trust such work to the caprice of an inexperienced man, who has “helped” around some job, until he has learned the name of tools, but who has no positive knowledge of the trade, and could not for his life “lay out” the corner-post for a two-story house, yet is shrewd enough to screen his deficiencies by suggesting “balloon,” or something indefinite, that requires little or no skill. It sometimes happens, in localities remote from large cities or large towns, that persons are obliged to do with make-shifts, to get a home at all. It was such a condition of things that led the well-disposed pioneer of the West to adopt the method called “Balloon framing,” which is really no framing at all, and required no skill to get up a kind of home acceptable under such circumstances. But wherever skilled labor may be had, it is ridiculous to see a gang of intelligent(?) mechanics standing up pieces of diverse lengths, and propping them in a vertical position with rods running every way as braces, not one of which can be removed until the upper ends are secured by ties of some sort. A good frame in a house is equivalent to a good constitution in a man, and is of vital importance; it need not be clumsy or overloaded, but should at least have the merit of being able to stand alone.... Painting.—The principal object in Painting should be to protect and preserve the materials used in construction, as also to give a good appearance. All exterior wood-work, though executed with the greatest care and in the most substantial manner, if left exposed to climatic influences, is very soon destroyed. It is economy to use only the best lead and linseed-oil in painting exterior wood-work. They will outlast all other compounds, present a better appearance, and in the end furnish a much better foundation for future painting. The difference in cost between the best materials and the imitations, for painting the exterior of a house built on these plans, would not exceed $12, and the cost of labor would be just the same in either case. The first coat or “priming,” should be put on with the greatest care, so as to thoroughly cover and close all the pores in the exposed surface. All window and outside door frames, corner-boards, window-caps, water-table, and stoop-flooring, should be primed before setting, especially their edges, where joinings require to be made, as it will be the last opportunity to do justice to these parts, where moisture is liable to collect and remain. When priming is well done, it is best to let the building stand until thoroughly dried, both inside and out, before adding the second coat. It must be evident to any one that much of the water used in the plastering must percolate through, and thoroughly saturate every part of a house. Sufficient time should be allowed for this moisture to pass off, and the whole house to become dried out.... The nails should then be “set,” which will tighten up permanently all the laps in the siding, after which the work should be properly puttied, and the second coat applied. Autumn is the best season to paint, after the extreme heat has passed, and insects have disappeared; the process of drying will be slower and more perfect, with less waste by evaporation, leaving a smooth, solid surface. I am often asked “what color to paint?” Notwithstanding much has been said against white for outside painting, and realizing that there are many cases where white would not be suitable, or thought of, yet I believe that for suitability and good taste, in nine cases out of ten, very light colors, or pure white, are indicated. I have known instances where much time has been spent to discover a suitable color for a house, where nearly all the different pigments were drawn from, and after much mixing and testing, the result has generally been an unknown and unnamed shade, as if everything depended on some sentimental “blending with the background,” or in other words, painting the house out of sight. As a rule, paint so as to best reveal the true character of the building, and this is best done when the colors afford the foundation for the natural shadows that result from the true and actual projections. For the body and trimmings are suggested a light “Dorchester” gray; roofs, graphite-black; sash, coach-black; blinds, “chocolate.”

Cost.—The following items, prepared with care, embrace the full bill of materials and labor required in the construction of this house, together with their present cost in the vicinity of New York:

57 | yards excavation, at 20c. per yard. | $11.40
13,000 | brick, furnished and laid, at $12 per M. | 156.00
500 | yards lath and plastering, at 30c. per yard. | 150.00
28 | ft. stone steps and coping, at 40c. per ft. | 11.20
16 | ft. stone sills, at 30c. per ft. | 4.80
2,370 | ft. of timber, at $15 per M. | 35.55
| 2 | sills, 4 × 7 in. 30 ft. long. |
| 2 | sills, 4 × 7 in. 22 ft. long. |
| 1 | girt, 4 × 8 in. 16 ft. long. |
| 1 | girt, 4 × 8 in. 8 ft. long. |
| 26 | beams, 3 × 7 in. 22 ft. long. |
| 6 | beams, 3 × 7 in. 15 ft. long. |
| 6 | posts, 4 × 7 in. 20 ft. long. |
| 2 | ties, 4 × 6 in. 30 ft. long. |
| 2 | ties, 4 × 6 in. 22 ft. long. |
| 2 | plates, 4 × 6 in. 30 ft. long. |
| 2 | plates, 4 × 6 in. 22 ft. long. |
| 8 | pieces, 3 × 7 in. 16 ft. long. |
400 | wall strips, 2 × 4 in. 13 ft. long, at 11c. each. | 44.00
200 | novelty siding boards, 9½ in., at 30c. each. | 60.00
160 | lbs. tarred paper, at 5c. per lb. | 8.00
128 | tongued and grooved flooring, 9½ in., at 35c. each. | 44.80
110 | hemlock boards, at 18c. each. | 19.80
9½ | squares of tin roofing, at $7 per square. | 66.50
120 | ft. cornice, at 30c. per ft. | 36.00
111 | ft. gutter and leader, at 10c. per ft. | 11.10
1 | bay-window, with blinds, complete. | 60.00
| Materials in stoop, lobby, balcony, hood, and corner-boards. | 78.00
8 | windows, with blinds, complete, at $16 each. | 128.00
4 | cellar windows, complete, at $4 each. | 16.00
24 | doors, complete, at $8 each. | 192.00
2 | stairs, complete. | 60.00
2 | marble mantels and 4 pine mantels. | 75.00
| Base-boards and shelving. | 25.00
| Nails, sink, and pump. | 34.00
| Cartage, average one mile. | 30.00
| Carpenter’s labor (not included above). | 200.00
| Painting, two coats. | 80.00
| Extra for girder supports, grading, etc. | 62.85
| Total cost of materials and construction. | $1,700.00

Fig. 50.—ELEVATION OF FRONT.

Fig. 51.—PLAN OF CELLAR.

Fig. 52.—PLAN OF FIRST FLOOR.

Fig. 53.—PLAN OF SECOND FLOOR.

DESIGN XIII.
FRENCH-ROOFED COTTAGE, COSTING $2,000.

These plans were designed for a genteel cottage adapted to thickly-settled localities, where the increased value of lands make it necessary to reduce the area, and build upwards. Several houses constructed from these plans in this vicinity are admired for their convenient accommodation and cheerfulness.... Exterior, (fig. 54.)—The Foundation extends four feet above ground, giving a desirable altitude to the whole building. The front is enlivened by the numerous window and door openings, the several projections of piazza, dormers, and cornices, and the variety of the materials used. The dressing of the several parts are of simple designs. The projections of cornices, etc., should always be self-sustaining, yet while this is true, there is sure to be a fancied necessity for some apparent support obvious from the outside. Such supports require special treatment, with a view to their proper form and proportion, and should be sparingly applied, giving to each one its distinct place and purpose. Brackets of neat pattern are often crowded so closely together as to cheapen and destroy their beauty, and overload the cornice, thus reversing their legitimate purpose as supports.... Cellar, (fig. 55.)—Hight of ceiling 7 feet; it extends under the main house only. Its hight above the ground gives an opportunity for good-sized window openings. If desired at any time, an airy and light work-room or laundry can be made by dividing and flooring a part of this story at little cost.... First Story, (fig. 56).—Hight of ceiling 10 feet. It has a hall running through the whole length of the main house, with entrances from both front and rear. The parlor, dining-room, and kitchen, are all good-sized apartments, and pleasantly arranged. Double folding doors are provided for the front entrances and from the hall to the parlor, and sliding doors between the parlor and dining-room. A bay-window adds materially to the size and pleasantness of the dining or living-room. Each room has an open fire-place; the kitchen has a pump and sink, with the usual supply and waste pipe connections. The rear stoop is roofed, and has a portable enclosure of light ceiling boards, to be used in severe weather.... Second Story, (fig. 57.)—Hight of ceiling 8½ feet. The divisions of this story are simple—giving a hall, two large chambers, with passage between, two hall rooms, and two closets.... Construction.—The estimate given provides for foundation of broken stone, laid and neatly pointed with good mortar; the stone exposed to sight on the outside to be “semi-dressed.” Blue-stone, or other suitable stone obtained most readily, are used for the sills of cellar windows, for the steps, and wall coping of the cellar entrance. The principal timber is of seasoned spruce or pine, thoroughly framed, raised, and secured. The “framing-in” of braces is too frequently omitted—cutting them “barefoot,” and spiking, being substituted. The latter does very well where the frame is strongly sheathed over, and the outer siding applied afterwards. The sheathing aids largely in stiffening the frame, but should not be relied on to the exclusion of the necessary braces to square up the frame, and prevent the swaying which often happens unobserved, to be discovered when too late to remedy it. Laxity in the matter of bracing has led to frequent errors as to their proper place in the frame. When framed in they are invariably placed in the upper angles under the ties and plates, adjoining the posts, and when barefoot they should be put in the same angles; never, as is frequently done for convenience, in the lower angles, nor on the sills. A moment’s reflection will convince any one that if the right angles along the principal frame are rigidly maintained, displacements will never occur, except, as rarely happens, the whole is bodily raised from the foundation by a hurricane. The most reliable angles are those formed by the tie and post connections, because at these points the posts are tenoned and mortised together, and secured with hard wood pins. Those least reliable are at the foot of the posts, adjoining the sills, where their connections are secured only by the weight of the upper frame. Braces placed in the latter angles serve only as fulcrums to endanger the frames when tested by ordinary winds; but if the former or upper angles are made positive, by having substantial braces in them, the severest gales may be defied. The siding is of narrow, clear pine clapboards, laid on “thicknessed” sheathing. The Mansard part of the main roof is covered by 8 × 16-inch slate—the piazza, bay-window, kitchen, stoop, cornices, window, and deck roof with IC. charcoal tin—all laid on hemlock boards. Tarred felting is spread under all siding and slate. The first and second stories are fully completed inside; the attic is floored, but otherwise unfinished, but may be divided at any time into rooms as shown for the second story (fig. 57). The interior plastering is three-coat work, on seasoned lath. All sash are four lights, and hung to balance-weights. Blinds are properly hung (outside) to each window. All wood, tin, and brick-work, usually painted, has two coats of best lead and oil-paint, with stainers to suit the owner’s taste. The choice of colors for the exterior is frequently canvassed during the construction of these buildings; often some person of taste (?) decides by “warming”—adding red and yellow, until, by the preponderance of these stainers, the most sombre and dismal colors are produced. The most appropriate and pleasing shade for the body of this class of house is a light gray; for the trimmings, dark gray; for the sash, burnt sienna; for the blinds, chocolate. The tin roofing should match the slate in color. Red colors should be sparingly used, or omitted altogether.

Estimate of materials required, and total cost:

50 | yards excavation, at 25c. per yard. | $12.50
975 | ft. of stone foundation, at 8c. per ft. | 78.00
45 | ft. blue-stone sills, steps, and coping, at 30c. per ft. | 13.50
4,000 | bricks, furnished and laid, at $12 per M. | 48.00
480 | yards plastering, at 30c. per yard. | 144.00
| Cornices and centers, stucco. | 30.00
4,000 | ft. of timber, at $15 per M. | 60.00
| 2 | sills, 4 × 8 in. 29 ft. long. |
| 2 | sills, 4 × 8 in. 21 ft. long. |
| 1 | sill, 4 × 8 in. 16 ft. long. |
| 2 | sills, 4 × 8 in. 13 ft. long. |
| 1 | girt, 4 × 8 in. 29 ft. long. |
| 6 | posts, 4 × 7 in. 22 ft. long. |
| 6 | ties, 4 × 6 in. 29 ft. long. |
| 6 | ties, 4 × 6 in. 21 ft. long. |
| 2 | plates, 4 × 6 in. 13 ft. long. |
| 1 | plate, 4 × 6 in. 16 ft. long. |
| 2 | posts, 4 × 6 in. 13 ft. long. |
| 30 | beams, 3 × 8 in. 21 ft. long. |
| 15 | beams, 3 × 7 in. 21 ft. long. |
| 7 | beams, 3 × 8 in. 16 ft. long. |
| 2 | decks, 3 × 8 in. 18 ft. long. |
| 2 | decks, 3 × 8 in. 26 ft. long. |
| 1 | cross-tie, 3 × 8 in. 18 ft. long. |
| 4 | hips, 3 × 7 in. 14 ft. long. |
| 2 | piazzas, 3 × 7 in. 19 ft. long. |
| 2 | piazzas, 3 × 7 in. 18 ft. long. |
325 | wall-strips, at 12c. each, $39; 75 joists, at 16c. each, $12. | 51.00
210 | hemlock boards, at 12c. each, $25.20; cornice materials, $60. | 85.20
215 | sheathing, at 16c. each, $34.40; 560 pine siding, at 12c. each, $67.20. | 101.60
8 | squares slate, at $8.50 per square. | 68.00
13 | squares tin, at $7.50 per square. | 97.50
65 | ft. leaders, at 10c. per ft., $6.50; 260 flooring, at 18c. each, $46.80. | 53.30
| Piazza and stoop, complete, $80 and $28. | 108.00
4 | cellar windows, complete, at $4 each. | 16.00
5 | plain windows, complete, at $12 each. | 60.00
6 | plain windows, complete, at $10 each, $60; 1 bay window, $60. | 120.00
5 | dormer windows, complete, at $16 each. | 80.00
13 | doors, complete, at $10 each. | 130.00
1 | area door, $5; stairs, $90; closets, pump, and sink, $50. | 145.00
| Mantle, $52; tarred felting, $10. | 62.00
| Carpenter’s labor, not included above. | 135.00
| Carting, average 1 mile, $30; painting, $130; incidentals, $141.40. | 301.40
| Total cost, complete. | $2,000.00

Fig. 54.—ELEVATION OF FRONT OF HOUSE.

Fig. 55.—PLAN OF CELLAR.

Fig. 56.—PLAN OF FIRST FLOOR.

Fig. 57.—PLAN OF SECOND FLOOR.

DESIGN XIV.
A FRENCH-ROOFED COTTAGE COSTING $2,000.

These plans were designed for a cottage recently built by Mr. W. W. Billings, in New London, Conn. These sketches embrace also the outlines of the grounds immediately surrounding. The site faces a street having steep grades, conforming to the general declivity upon which a large part of the city is built. The grounds are raised above the sidewalk, and leveled in front, and are faced with stone-work from 2½ feet high at left, to 6 feet high at the right. The rear grounds are 6 feet higher than those in front. The step A, at the entrance (see fig. 59), is 8 inches above the sidewalk. B is the bottom of the cellar, 2 feet 2 inches higher than A, and is solid rock. The walk leading from A to the rear ascends 1¼ inch to the foot; the banks at either side are terraced, and have stone steps inserted in them leading to the flagging at the foot of the porch steps, and also to the area, or cellar entrance.... Elevation, (fig. 58.)—The French roof style is well adapted to this situation on account of its rounded and solid appearance. The irregularities of outline secure agreeable features of variety and picturesqueness. The Foundation shows 4 feet above ground in front, and 1 foot in the rear. The Porch is in an angle, and the second story extending over it is carried up vertically past the slated part of the main roof, forming a tower-like corner. This corner is largely supported by a single column, and to make it as light as possible, slating of this portion is omitted.—(As usually laid, slate weighs 500 lbs.; tin, 50 lbs. per square.).... Cellar, (fig. 59.)—Hight is 6½ feet. Four windows are placed where they give light to every part. An outside door opens to the area, the latter being covered by the front porch. The front portion of this cellar can easily be finished off for a work-room or summer kitchen.... First Story, (fig. 60.)—Hight of ceiling 10 feet. The arrangements are convenient, comprising a hall, parlor, dining-room, and kitchen. The main entrance leads from the right of the porch, and the hall runs parallel with the front. Many persons prefer the entrance arranged in this way, as the contents of the hall are not exposed to the street whenever the doors are opened or left ajar. A partition crosses the hall under the platform, adjoining the cylinder, forming a rear passage leading from the kitchen to the cellar stairs. The Parlor has a large bay-window in front, with a marble mantle directly opposite. The Dining-Room and Kitchen each have windows giving views in three directions. The small wing at the rear contains a good-sized pantry, closet, and the rear entrance or lobby.... Second Story, (fig. 61.)—Hight of ceiling 9 feet. The divisions include a hall, three large chambers, a bedroom, and three closets. All parts are well lighted. Ventilating Registers are placed in the center of each chamber ceiling. The space above this ceiling under the tin roof is ventilated through 8-inch pipes inserted in opposite sides of the roof. These pipes have funnel-shaped covers, elevated two inches above the upper end of the pipes.... Construction.—The Foundation Walls are of semi-dressed stone. The Chimneys are of hard brick, the cellar portions are constructed with a hollow space or ash-pit, arranged to receive the ashes from the fires of the first story. The siding is beveled clap-boards, laid on sheathing felt. The mansard parts of the main roof are covered with 8 × 16-inch Keystone slate laid on felt. All other roofs are of IC. charcoal tin, all laid on seasoned boards. The two full stories are hard finished upon two coats of brown mortar. All parts usually painted have two coats of paint, of material and shades to suit the owner. For suggestions on selecting colors or shades see Design XIII.—Estimate cost of materials and labor:

46 | yards excavation, at 20c. per yard. | $9.20
1,300 | ft. stone foundation, at 15c. per ft. | 195.00
40 | ft. blue-stone, at 25c. per ft. | 10.00
5,000 | bricks in chimney, at $12 per M. | 60.00
700 | yards plastering, at 30c. per yard. | 210.00
3,650 | ft. timber, at $15 per M. | 54.75
100 | joists, at 14c., $14; 400 wall-strips, at 11c., $44. | 58.00
1,660 | ft. siding, at 2¾c. per ft. | 45.65
| Cornice materials, $70; felt, $10. | 80.00
220 | rough boards, at 15c. each. | 33.00
9 | squares slate, at $9 per square. | 81.00
13 | squares tin, at $7.50. | 97.50
194 | spruce flooring, at 20c. each. | 38.80
14 | pine flooring, at 25c. each. | 3.50
4 | cellar windows, complete, at $3 each. | 12.00
8 | plain windows, complete, at $12 each. | 96.00
1 | bay window, complete. | 50.00
7 | dormer windows, at $14. | 98.00
| Porch, finished, $22; mantles, $50. | 72.00
| Stairs, $65; nails, sink, and ventilator, $32. | 97.00
| Closet, finished, $13; painting, $150. | 163.00
18 | doors, complete, at $9 each. | 162.00
| Carting, $25; labor, not included above, $225. | 250.00
| Incidentals. | 23.60
| Total cost, complete. | $2,000.00

Fig. 58.—ELEVATION OF FRONT OF HOUSE.

Fig. 59.—PLAN OF CELLAR AND GROUNDS.

Fig. 60.—PLAN OF FIRST FLOOR.

Fig. 61.—PLAN OF SECOND FLOOR.

DESIGN XV.
A SOUTHERN HOUSE COSTING $2,000.

These plans, designed for a Georgia residence, will be adapted to the requirements of others desiring to build an inexpensive rural home in any of the Southern States.... Exterior, (fig. 62.)—The plan indicates that the proprietor is not circumscribed by want of land, and prefers to extend the area of the ground floor, rather than to build upward. The breadth of the front (48 feet), the large entrance and window openings, the spacious verandas, and broad steps, are each prominent and desirable features, indicative of comforts and hospitality. The elevated, or second story part of the Main House, forms a substantial and fitting center, around which the roofs of the wings and verandas incline, and adds largely in giving poise and character to the whole building. The hight from the earth grades to the frame-work of the building is 2 feet. Its location should have a good surface drainage assured during rainy seasons, and afford pleasant outlooks from the verandas.... Interior.—In most parts of the South, very much of the year could be a latitude comfortably spent out of doors altogether, but for the requirements of shade and retirement. There are times, however, when severe weather makes it necessary that one’s family should be well housed, and when a good fire is both a luxury and necessity. A house for such should have large rooms, with high ceilings, an abundance of door and window openings, and a plentiful spread of shady verandas. Where practicable, the windows should have folding sashes opening to the floor, if protected by outside coverings. There should be at least one chimney in the main or highest part of the house, having a large open fire-place adapted to the use of wood for fuel, and having openings near the room ceilings into the flues, for ventilation. The Dining-room, Kitchen, and the more domestic offices, require a separate and distinct building, situated a short distance in the rear of the house, and connected with it by a covered passage-way.... First Story, (fig. 63.)—Hight of ceiling 10 feet. The simple arrangement shown provides for each of the above requirements. The front Entrance is through large double doors. The Hall extends through the house. The Living-room, a large apartment adapted to a good-sized family, is centrally situated, and protected on every side from the direct rays of the sun; it adjoins the pleasant and shady verandas front and rear, both being accessible through the folding windows, that open like doors down to the floor. It communicates with the hall through wide double doors, has a large closet and an open fire. The Bedroom is of good dimensions, has three windows opening to the verandas, and one side window. The two closets are so arranged as to form an alcove to the rear window. The ceiling of this alcove is arched over, producing a very pleasant effect. An opening is made near the ceiling into one of the flues of the adjoining chimney for ceiling ventilation. The Parlor (or Library) is situated in the most quiet part of the building, where company may be entertained, or persons may engage in reading or study, without disturbance from those engaged in housework. Large windows open to the front veranda, and other windows are provided at the side and rear. A covered Passage-way leads from the rear hall door to the food departments. These consist of a Dining-room, Kitchen, Store-room, and two Closets, and to the rear of these is added a servant’s Bedroom. The dining-room and kitchen are each of ample size, with windows arranged on opposite sides to admit a plentiful supply of fresh air. A pump, sink, and two wash-tubs are provided in the kitchen. The store-room and closets are thoroughly shelved. If desirable, a china closet may be easily constructed at one side of the fire-place, into which one of the doors already provided would open.... Second Story, (fig. 64.)—Hight of ceiling 9 feet. This may be divided into two or more rooms, as required, for bedrooms. The cross-partitions may be 8 feet high, admitting a free passage of air above them.... Construction.—Brick piers, placed 6 feet apart under all sills, are intended for the foundation. The remaining space is left unobstructed for the circulation of air. A cellar may be excavated, and walled up under the main house, with stairs leading to it from the rear veranda, under the main flight. In the estimate, provision is made for a regular frame of sawed timber, which should be framed and raised in a substantial manner. The siding for the main house and wings is of 6-inch pine clap-boards, laid 5 inches to the weather. The roofs of the main house and wings are laid with hemlock boards; all other roofs and cornice projections are laid with inverted 1 × 4½-inch tongued and grooved pine flooring, and lastly covered with IC. charcoal tin, locked and soldered in the best manner. The cornices are constructed with wide projections, and have neat truss supports. The verandas are made with simple parts. The columns for the front are 7-inch boxed, with bases, and scrolled spandrels; for the rear of 3 × 4 joist with bases, and plain spandrels. The veranda plates and rafters are dressed for painting, and are left exposed to sight. The pediments shown on the front are of open work, to allow the warmed air from near the roofs to escape. The upper frame-work (plates and rafters) of the rear building are also planed, and left exposed to sight from the inside. The inclosing and partitions for this part are of 1 × 4½-inch pine tongued and grooved flooring, dressed on both sides, put on in a vertical manner, and nailed to the sills and plates; 1¼-inch pine battens are put around the inside of the rooms at the proper hight for a chair-rail (2¾ feet to the upper edge), and joined to the casings of the doors and windows of like materials, and all thoroughly nailed with “clinch” nails to the upright boarding. The roof is built as described for the verandas, is double pitch, and has sufficient spread to include the shed, making it a part of the same building. The kitchen chimney is built nearly in the center of this building, has a large open fire-place, and has a good hight above the roof. All floors are of 1 × 4½-inch tongued and grooved pine flooring, close laid and blind nailed. All rooms in the main building and wings are hard-finished upon two coats of brown mortar. All work usually painted has two coats of good paint. The roof-gutters are made as shown in Design V.... Estimate:

8,000 | bricks in piers and chimneys, furnished and laid, at $12 per M. | $96.00
550 | yards plastering, at 28c. per yard. | 154.00
5,054 | ft. timber, at $15 per M. | 75.81
| | Sills, 4 × 8 in. 261 ft. long. |
| | Ties, 4 × 6 in. 261 ft. long. |
| | Plates, 4 × 6 in. 92 ft. long. |
| 4 | hips, 3 × 8 in. 17 ft. long. |
| 56 | beams, 2 × 8 in. 14 ft. long. |
| 32 | beams, 2 × 8 in. 21 ft. long. |
| 4 | posts, 4 × 7 in. 22 ft. long. |
| 1 | piazza sill, 3 × 8 in. 230 ft. long. |
| 1 | piazza plate, 3 × 8 in. 206 ft. long. |
| | Piazza beams, 2 × 6 in. 384 ft. long. |
50 | joist, 3 × 4 in. 13ft. long, at 16c. each. | 8.00
300 | wall-strips, 2 × 4 in. 13 ft. long, at 11c. | 33.00
370 | siding (6-inch clap-boards), at 18c. each. | 66.60
170 | hemlock boards, at 16c. each. | 27.20
240 | ft. cornice, bracketed, at 20c. per ft. | 48.00
208 | ft. simple rear cornice, at 8c. per ft. | 16.64
38 | squares of tin, at $7 per square. | 266.00
6,000 | ft. of 1 × 4½ tongued and grooved flooring pine, at 3c. per ft. | 180.00
24 | piazza columns, complete, average at $1 each. | 24.00
1 | stairs, complete, $50; 31 windows, at $10, $310. | 360.00
20 | doors, at $8, $160; 1 mantle, $50. | 210.00
| Sinks, pumps, and wash-tubs. | 22.00
| Closet finish, $12; nails, $25. | 37.00
| Painting, $100; carting, $20. | 120.00
| Boards for outside casings and incidentals. | 105.75
| Carpenter’s labor. | 150.00
| Total cost, complete. | $2,000.00

Fig. 62.—FRONT VIEW OF HOUSE.

Fig. 63.—FIRST STORY.

Fig. 64.—SECOND STORY OF MAIN BUILDING.

DESIGN XVI.
A HOUSE COSTING $2,100.

This plan, embodying the principal characteristics of a design I made several years ago, for the residence of Mr. Arthur Waller, Newtown, L. I., has a homelike, tasteful, and picturesque appearance—particularly now, with its neatly laid-out grounds and grown up shrubbery, which especially befit its pointed style, and demonstrate the harmony that exists between these simple cottage outlines, and rural surroundings. It is thus adapted to either a suburban or more retired country situation.... Elevation, (fig. 65.)—A noticeable peculiarity is the earth finish around the foundation, which is simply utilizing the earth from the cellar. This is banked against the foundation, up to within six inches of the wood, evenly graded at 45 degrees angle, and neatly covered with closely laid turf. This conceals a roughly constructed foundation; it insures more dryness of the cellar, and consequently of the whole house; it guards the cellar against extreme heat in summer, and frost in winter; and it gives such a visible breadth of bottom as to add to its apparent strength. This earth finish around the foundation is especially adapted to wet or clayey soils, where it is desirable to have the cellar mostly above ground; at the same time it secures greater elevation to the whole building.... There are marked features of dissimilarity in the several openings, and in the details of the exterior dressing, each part being adapted to its special purpose, and so arranged as to be in keeping with the general design; it therefore unites harmony and beauty.... Cellar, (fig. 66.)—The Cellar extends under the whole house; clear hight 6½ feet. The outside entrance to the cellar is by an area-way, having stone steps and walls, with hatchway and inside doors; the hatchway doors, when closed, being even with the sloping earth finish.... First Story, (fig. 67.)—Hight of ceiling 9½ feet. The irregular outlines of this plan contribute to the cheerfulness of the different apartments, by giving opportunity for the insertion of windows where they will command the most pleasing prospects. The principal entrance is from the porch through double doors to the spacious hall, which adjoins the parlor and dining-room. The Parlor has one bay and two plain windows, with large wall space for furniture and wall decoration. The Dining-room is conveniently arranged to connect with the principal hall, parlor, rear lobby, large pantry, or closet, and the cellar stairway, and has a large bay and one plain window. The Kitchen is planned to have a range, sink, pump, wash-tubs, and the usual pipes for cold and hot water, and is provided with two windows, situated in opposite sides of the room to give abundant light, and afford thorough ventilation; a closet adjoins the chimney-breast, and a cupboard is put beneath the sink. The Pantry is of good dimensions, contiguous to both dining-room and kitchen, has a suitable window, and is furnished with shelving. The rear entrance is from the covered stoop to the rear lobby, and from thence to either dining-room or kitchen.... Second Story, (fig. 68.)—This story is reached by a winding stairway from the principal hall, and contains four good-sized chambers, a bath-room, five large closets, and the needed passage-ways. The breast-walls are vertical to the hight of 3½ feet, and are continued upward along the underside of the steep roof frame-work to the ceiling, which is 8 feet high. The Bath-room is provided with a bath-tub and seat-closet. The Tank is 1 foot 8 in. wide, 2 feet long, and 3 feet deep, and is placed in the closet adjoining the bath-room, at a hight of 2 feet above the floor, and provided with a neat-fitting lid. The spaces above and below the tank may be used as a closet for toweling, etc. The interior location of this tank should insure it against frost, so long as the house is occupied by the family.... Construction.—The excavations for the cellar are 2 feet deep, and the earth is used as above described. The materials for the principal foundations may be of the roughest stone, such as are commonly used in farm-fencing, and coarse mortar. Very little skill is required in the construction of these walls, as only the last, or top course, is seen from the outside, which should be laid to a line, and levelled to receive the frame-work. The exposed portions of the bay-window foundations are constructed of brick laid in mortar, resting on stone-work, and leaving an interior recess or shelf, as shown on the cellar plan. The cellar windows are of good dimensions, and situated where they will insure sufficient light, and provide for the complete airing of the cellar. An opening should be left in one, or both of the chimneys, near the cellar ceiling, having a continuous flue to the top, which will be heated by contact with the fire-places above when in use, and produce a draft that will exhaust the poisonous vapors always generated in cellars, and prevent them from rising through the house to contaminate the air of the living-rooms. This cellar may be easily and cheaply divided into separate apartments by rough planking or otherwise, if ever desirable. The rear portion might be readily converted into a laundry, where the wash-tubs, with their accompanying pipes, might be placed, leaving more kitchen room, and relieving it of the steam and general disturbance of the ever-recurring washing days. Large durable posts are placed in the cellar, resting on large flat stones that have been embedded in the cellar bottom, as supports for the 4 × 8-inch girders, shown on the cellar plan by the dotted lines. By the estimate, it will be seen that very little timber is used in the frame-work, of which the sills and beams comprise the heavier parts. I would enforce the importance of having the frame fitted and secured together in a substantial manner. The beams should be bridged as described for Design XVII.... The exterior sides of the frame-work are designed to be inclosed with double boarding, with an intermediate lining of tarred felting. The first covering should be milled to even thicknesses, and put on horizontally and double nailed to each stud. The felting is next applied in whole width strips, running from the sill to the plate. The water-table and window-frames are next put in their places, after which the final covering of tongued and grooved sheathing is put on vertically, with the lower ends neatly fitted to the water-table, and the upper ends covered with a 10-inch board forming a frieze to the cornice. The siding should then be painted one coat in a thorough manner, when battens of 1½ inch “half round” (previously painted both sides) are firmly nailed over the joints of the sheathing. The windows are all arranged for 1½-inch sash, hung to iron weights with good cord, and neatly cased and moulded on the inside; outside blinds are intended for each window above the cellar. The cornices are constructed in the simplest manner, and the perforated barges and finials are made as indicated by the elevation, and placed near the extremity of the gable cornices, from which ever-varying shadows are made against the building, producing the most delicate and pleasing effects. It is purposely intended that the roofs of the principal building, porch, stoop, bay, and dormer windows, shall have sufficient pitch for shingling.... The character of the balance of the work may be inferred from the estimate which is given in detail.—Estimate:

61 | yards excavation, at 20c. per yard. | $12.20
1,278 | ft. stone foundation, complete, at 12c. per ft. | 153.36
5,000 | brick for bays and chimneys, furnished and laid, at $12 per M. | 60.00
30 | ft. stone steps and coping, at 30c. per ft. | 9.00
660 | yards 3-coat plastering, complete, at 28c. per yard. | 184.80
3,526 | ft. timber, at $15 per M. | 52.89
| 1 | sill, 4 × 8 in. 151 ft. long. |
| 10 | posts, 4 × 6 in. 13 ft. long. |
| 1 | plate, 4 × 6 in. 136 ft. long. |
| 4 | valleys, 3 × 7 in. 17 ft. long. |
| 1 | girder, 4 × 8 in. 16 ft. long. |
| 13 | beams, 3 × 8 in. 22 ft. long. |
| 19 | beams, 3 × 8 in. 16 ft. long. |
| 15 | beams, 3 × 8 in. 15 ft. long. |
| 1 | beam, 3 × 7 in. 80 ft. long. |
| 50 | rafters, 3 × 4 in. 13 ft. long. |
300 | wall-strips, 2 × 4 × 13, at 11c. each. | 33.00
200 | sheathing, 9 in., at 18c. each. | 36.00
100 | lbs. tarred felting, at 5c. per lb. | 5.00
200 | tongued and grooved sheathing, at 28c. each. | 56.00
200 | battens, at 6c. each. | 12.00
| Materials in cornices and water-table. | 38.00
325 | shingling-lath, 1¼ × 2 × 13, at 6c. each. | 19.50
60 | bunches shingles, at $1.50 per bunch. | 90.00
177 | flooring, 1¼ × 9½ in., at 25c. each. | 44.25
2 | stoops (front and rear), complete. | 80.00
2 | bay-windows (with blinds), complete. | 100.00
10 | plain windows (with blinds), complete, at $12 each. | 120.00
4 | dormer windows (with blinds), complete, at $20 each. | 80.00
3 | cellar windows, complete, at $6 each. | 18.00
| Stairs, complete, $75; 24 doors, complete, at $8 each, $192. | 267.00
3 | mantles, complete, $20, $10, and $6. | 36.00
| Shelving, etc., $12; nails, $18; painting, $110. | 140.00
| Plumbing and range, complete, $222.70; cartage, average 1 mile, $25. | 247.70
| Carpenter’s labor, not included above. | 150.00
| For contingencies. | 55.30
| Total cost, complete. | $2,100.00

Fig. 65.—ELEVATION OF HOUSE.

Fig. 66.—PLAN OF CELLAR.

Fig. 67.—PLAN OF FIRST FLOOR.

Fig. 68.—PLAN OF SECOND FLOOR.

DESIGN XVII.
A HOUSE COSTING $2,200.

These plans are for a full two-story house, that will embrace the merits of the most economical form of construction (having a floor measurement of 24 × 28, nearly square), with symmetry of style, and containing a very commodious and convenient interior arrangement. The Elevation (fig. 69), has marked features of simplicity and refinement, with sufficient diversity of parts to give variety and grace, without pretentious display. We invariably recommend high foundations for houses of this character; of course a foot in hight at the bottom will add a foot to the hight of the whole, imparting a better appearance externally, and on account of the better ventilation thereby afforded to the cellar, adds greatly to the healthfulness of the interior of the whole house. Additional steps will be required to the stoops, but the cost of these are compensated by deductions in the excavation for the cellar, and stone steps to the area. The large porch and double doors, the bay and other windows, each distinctive in themselves, and adapted to their places, similar only in conformity of character, are so proportioned as to harmonize with each other with pleasing effect. The pediments of the roof are so arranged that each “face” of the building will have very nearly the same appearance of outline. The main cornice projects two feet beyond the frame-work of the house, and is supported by large trusses; all other cornices and window-caps have proportionate projections, insuring heavy shadows, giving relief and finish to the whole.... Cellar, (fig. 70.)—Excavations for this cellar are made 2 feet 6 inches below the general surface of the ground. The Foundation-walls, Chimneys, Girder-supports, and rear Area-walls are built as described for Design XII., after which the earth is graded around, and up against the foundation, so as to give such slope as will turn the water away from the house and walks, leaving the foundation 4 feet above the final grade.... First Story, (fig. 71.)—This story contains the principal hall, parlor, dining or living-room, kitchen, rear lobby, three closets, and private stairs. The principal Hall is entered from the front porch, through large double doors, is square (10 × 10 feet), and contains the principal stairs, which are built with a quarter circle and niche nearly in the center of their hight, as described in Design XII. This hall connects with the parlor through double doors; this will be found to give an impression of amplitude that would scarcely be expected in a house of this size. The Parlor has a large bay-window, finished with elliptical arch and ornamental corbels, and a marble mantle. The Dining-room is intended as the living-room of the family, and communicates with each room and hall of the first story; has a closet under the front stairs, and has a marble mantle. The Kitchen is provided with a large range, two closets, sink, with cold and hot water, and closet underneath, and communicates with the dining-room, lobby, and cellar stairway. The rear entrance to this story is through the lobby, which has two small windows. The private stairs are arranged to start from the rear lobby.... Second Story, (fig. 72.)—The manner in which this story is divided into rooms very much resemble a “double” house, the hall being nearly in the center of the house, and the rooms at either side: contains hall, two stairways, six rooms, and five closets. The hall is 5 ft. 6 in. × 10 ft., and has seven doors leading from it to the different rooms and private stairway. Many persons require a “study”; the room directly above the principal hall is best adapted for such purpose, has a large closet, and is most convenient to the stairs. The door to this room should have ground glass upper panels, to admit light to the hall. The Bath-room is provided with French bath-tub, seat-closet, and wash-basin. The soil-pipe from this story will be concealed by passing down inside one of the kitchen closets. Marble shelves, resting on stucco trusses, are intended for each of the four principal rooms of this story.... General Details.—It is intended that all the work should be done in a workmanlike and substantial manner, of good materials, as indicated in the estimate. All the principal timber is framed together, and raised in the usual manner, and secured with hard-wood pins. The enclosing should be dressed, of thoroughly seasoned materials, and nailed with 10d. nails. The cornices are ornamented with bold panelled brackets and dentil courses. Each gable is provided with a circular ventilator. All roofs are covered with charcoal tin, laid on rough boards, and have gutters as described for Design V., at a cost of 10 cts. per running foot. The columns of the front porch are turned, and have ornamental caps and square pedestals. The stoop-rail is 5 inches wide, and the balusters are scroll-sawed, of 1½-inch pine plank. The trusses under the bay-window are large, scroll-sawed, and ornamental. The flooring should be thoroughly dried, close-laid, and double-nailed to each beam with 10d. nails. While laying the floor (having reached the center of the span of the beams), a row of cross-bridging should be put in, in a strong manner. In this way, the inequalities of the upper surfaces of the beams, which are always more or less sprung, will be brought into line by the flooring, and each piece of bridging will receive its relative proportion of the weight. The tarred paper is next inserted between the outside studding, in the manner described for Design XI., which is much cheaper than “brick-filling,” and for many reasons more desirable. The central partitions, that carry the principal weight, should be studded strongly of 4-inch materials, or wall-strips set edgeways. All closet, stair, and cross partitions may be set of 2-inch materials, or wall-strips set flatways. This latter method saves nearly one-half of the space taken by the partitions, which may be added to the size of the rooms, where it frequently happens that a few inches becomes a matter of importance. The second-story ceiling timbers are of wall-strips, put 12 inches from centers, and a flooring of rough boards is laid over a part, to make room for storage, etc. All sash are 1½ inches thick, and have second quality French glass in them, and are hung with iron weights. We think there is a good opportunity for improvement in the manufacture of window sashes, making them air-tight, and suggest inserting the necessary rubber strips near their edges, and especially in the lips of the check-rail—this would effectually shut out all drafts of air, and make the unsightly and impracticable “weather-strip” unnecessary. All stairs should have 1¼ strings and treads, and ⅞ risers, and should be so housed, glued, and keyed, as to make them solid; squeaky stairs are abominable, and even when assured of their safety, one feels an instinctive suspicion of danger, and will look for treachery in every part of the house. Black walnut panelled newel, moulded rail, and fluted balusters, are intended for the principal flight of stairs. Setting the niche is a part of the stair-builder’s work, and should always be included in his estimate for stairs of this character. The trimming of the hall, dining-room, and parlor, are of clear pine, the architraves are 8 inches wide, and “double-moulded,” with panelled back to each window. Base 7-inch and moulded. All other rooms have 5-inch “single trim,” with back moulding, and base to match. All doors panelled and moulded; all room-doors have mortise locks, and closet-doors have rim-locks, all with brass bolts and keys; knobs and escutcheons of porcelain, and all saddles are of hard-wood. All parts of this house that are usually painted should have two coats of paint of the best materials, and of such colors as shall suit the owner. All hard-wood, such as the stair-rail, bath-room finish, and saddles, should have two coats of linseed-oil.... Cost.—Contractors everywhere differ in their estimates for work of any kind. These differences are sometimes the result of some peculiar circumstance, but most generally they arise through some misapprehension of fact; either the plans are incomprehensible, or the description of them ambiguous, leading to a variety of interpretations, and consequently a variety of prices, some of which are too low, and some too high. The low man who usually proposes to do the best work, and the most of it, gets the job, and executes the work in accordance with his preconceived ideas, gets his money, and leaves the owner in possession of something he did not expect. No one can know the extent and character of the work better than the projector of them, who should be equally qualified to give exact estimates of quantities and cost of everything connected with their thorough development and execution, and thus truly fulfill his mission as the architect of the works. Cost is one of the most interesting features in any project, and no plan is hardly worth considering that does not comprehend in some way the expense of its execution. Builders and others interested in such plans, will appreciate the detailed estimates, as furnishing the key to the whole plan, supplying the needed information as to the real quality and character of the work.—Estimate:

62 | yards excavation, at 20c. per yard. | $12.40
13,000 | hard brick, furnished and laid, at $12 per M. | 156.00
700 | yards lath and plastering, at 28c. per yard. | 196.00
32 | ft. stone steps, at 40c. per ft. | 12.80
24 | ft. stone sills, at 30c. per ft. | 7.20
2,300 | ft. of timber, at $15 per M. | 34.50
| 2 | sills, 4 × 7 in. 24 ft. long. |
| 2 | sills, 4 × 7 in. 28 ft. long. |
| 4 | posts, 4 × 7 in. 20 ft. long. |
| 2 | ties, 4 × 6 in. 24 ft. long. |
| 2 | ties, 4 × 6 in. 28 ft. long. |
| 2 | plates, 4 × 6 in. 24 ft. long. |
| 2 | plates, 4 × 6 in. 28 ft. long. |
| 1 | girt, 4 × 8 in. 28 ft. long. |
| 30 | beams, 3 × 7 in. 24 ft. long. |
| 4 | valleys, 3 × 7 in. 12 ft. long. |
400 | wall-strips, 2 × 4 in. 13 ft. long, at 11c. each. | 44.00
230 | novelty clear siding-boards, at 28c. each. | 64.40
175 | lbs. tarred paper, at 5c. per lb. | 8.75
150 | tongued and grooved flooring, at 28c. each. | 42.00
130 | hemlock roof-boards, 16c. each. | 20.80
12 | squares of tin roofing, at $7 per square. | 84.00
156 | ft. gutters and leaders, at 10c. per ft. | 15.60
104 | ft. cornice, at 40c. per ft. | 41.60
1 | bay-window (with blinds), complete. | 75.00
12 | plain windows (with blinds), complete, at $16 each. | 192.00
8 | cellar windows, complete, at $4 each. | 32.00
1 | stoop (except tin as above), complete. | 70.00
27 | doors, complete, at $9 each, $243; 3 stairs, complete, $70. | 313.00
2 | marble mantles, and 4 shelves on trusses. | 50.00
| Range, plumbing, sink, bath, water-closet, and pump. | 314.55
| Corner-boards, base, and shelving, $32.50; nails, $20. | 52.50
| Cartage, average one mile. | 20.00
| Carpenter’s labor, not included above, $200; painting, $100. | 300.00
| Incidentals. | 40.90
| Total cost, complete. | $2,200.00

Fig. 69.—ELEVATION OF FRONT OF HOUSE.

Fig. 70.—PLAN OF CELLAR.

Fig. 71.—PLAN OF FIRST FLOOR.

Fig. 72.—PLAN OF SECOND FLOOR.

DESIGN XVIII.
A SOUTHERN HOUSE COSTING $2,200.

This plan of a simple, yet genteel Southern house, embraces ample interior accommodation for the wants of a good-sized family. It has an abundance of outside verandas and artificial shade, and may be constructed at a very moderate cost.... Exterior, (fig. 73.)—The style is adapted to the Middle and Southern States, because of its elevation and airiness, the overhanging projections of its roof, and the facility with which wings or verandas may be added. The Tower is a conspicuous feature, and though without any special ornamentation, it gives an expression of unity and completeness to the whole structure. The Verandas on every side afford protection from the sun. Many persons prefer disconnected verandas (as shown in figs. 73 and 75), with open ends to the roofs for the escape of the heated air that would otherwise be retained in them. Moreover, disconnected verandas prevent the annoyance arising from the noise made by children who are fond of running and playing upon them.... Cellar, (fig. 74.)—This is under the kitchen wing only; is 6½ feet deep, has two windows, an outside entrance with stone steps, and a stairway leading to the rear entry of the first floor.... First Story, (fig. 75.)—Hight of ceiling in the main house, 11 feet, and in the wing 9 feet. The entrance Hall, nearly square, and entered from the front piazza through double doors, contains the main stairs, and communicates with the parlor and dining-room. Each of these apartments communicates with the library through large sliding-doors. The windows to these rooms open to the floor, and are protected on the outside by the verandas. The front parlor window is 6½ feet wide, with the sashes arranged to slide in pockets at either side, by which means the parlor is apparently prolonged to, and may be used with the veranda. Each of the large rooms has fire-places and marble mantles. The closet for the dining-room is under the main stairs. The Kitchen is in the rear wing, and separated from the main house by the rear lobby and the pantry; it has a good-sized double window at each side, a large pantry, and a fire-place. In the rear entry are stairways leading to the second story and to the cellar.... Second Story, (fig. 76.)—Hight of ceilings in main house, 9 feet, and in the wing 7 feet. It is divided into six chambers, besides halls and closets. The three larger Chambers have fire-places with marble shelves, and two windows in each. The window in the small chamber is placed near the ceiling, above the kitchen roof. The two Chambers in the wing are intended as servants’ rooms, and have no communication with the main house.... Tower and Attic.—The Tower has an inclosed stairway, with a door at the foot. The main roof finish at the rear of the tower is leveled even with the main ridge, inclosing the intervening space; this affords room for a door leading from the tower to the attic. This story is thoroughly floored, and has small windows in each gable, and is useful as a place for storage. In cases of necessity, a portion of this attic may be used for bedrooms.... Construction.—The Cellar excavations are made in the ground 4½ feet deep, and for the underpinning of the main house one foot. The loose earth is used in grading, raising the surface immediately surrounding the foundation 8 inches. The foundation walls are 8 inches thick, of hard brick and good mortar. The cellar walls are 6½ feet high, and the underpinning 3 feet 2 inches high, leaving an exposed surface 18 inches high at completion. Only the portions of the foundation plan, shown darker in the plan, fig. 74, are walled, the intervening spaces being left open for the free circulation of air. The general character of the materials to be used in the construction of this house (a large portion of which is milled, and manufactured ready for use,) may be inferred from the appended estimate. The manner of putting these materials together is of great importance, and should be entrusted only to skillful and thorough workmen. The details of the exterior finish are so plain, that the work of “getting out” the several parts may be done by the mechanics employed in building, without recourse to the scroll-saw or carver. The truss-work of the cornices, and the open frame-work, and columns of the verandas, are of dressed timber, and stop-chamfered. All the roofs have sufficient pitch to allow the use of shingles, which are much lighter and cooler than slate or metal. Veranda roofs so constructed do not reflect so much heat into the chamber windows as others, which is important in a warm climate.... Ventilation.—Large window openings, with easy working sashes, are provided, and afford the best means of changing the air of any apartment. The chimneys are large, and have open fire-places, and ventilating side-flues with registers near the ceilings. These openings, which should never be closed, will be found to afford satisfactory ventilation. During seasons of extreme heat, the tower may be made to serve as a general ventilator, by lowering the upper sashes, and opening all the doors leading to it. The following estimate includes everything necessary to complete this building in a thorough manner, at prices now ruling in the vicinity of New York.—Estimate:

61 | yards excavation, at 20c. per yard. | $12.20
15,000 | bricks, furnished and laid, at $12 per M. | 180.00
26 | ft. stone steps and sills, at 30c. per ft. | 7.80
700 | yards plastering, at 28c. per yard. | 196.00
6,112 | ft. of timber, at $15 per M. | 91.68
| | Sills, 4 × 8 in. 247 ft. long. |
| 1 | tie, 4 × 6 in. 247 ft. long. |
| 1 | plate, 4 × 6 in. 247 ft. long. |
| 7 | posts, 4 × 7 in. 22 ft. long. |
| 4 | posts, 4 × 7 in. 34 ft. long. |
| 1 | ridge, 2 × 7 in. 40 ft. long. |
| 1 | ridge, 2 × 7 in. 30 ft. long. |
| 78 | beams, 2 × 8 in. 16 ft. long. |
| 34 | beams, 2 × 8 in. 15 ft. long. |
| 39 | beams, 2 × 7 in. 16 ft. long. |
| 15 | beams, 2 × 7 in. 11 ft. long. |
| 1 | piazza, 2 × 7 in. 375 ft. long. |
| 2 | valleys, 3 × 8 in. 16 ft. long. |
100 | joist, 3 × 4 in. 13 ft. long, at 16c. each. | 16.00
400 | wall-strips, 2 × 4 in. 13 ft. long, at 11c. each. | 44.00
420 | siding, 6½ in. wide 13 ft. long, at 26c. each. | 109.20
| Materials in cornices and verandas. | 40.00
120 | hemlock boards (for main house), at 15c. each. | 18.00
236 | pine boards for roofing, 4½ × 13, at 18c. each. | 42.48
67 | bunches shingles, at $1.50 per bunch. | 100.50
| Finial on tower. | 8.00
168 | Flooring for verandas, 4½ in. wide, at 20c. each. | 33.60
360 | flooring for inside, 9½ in. wide, at 26c. each. | 93.60
| Stairs, $70; closet finish, $20. | 90.00
2 | cellar windows, complete, at $6 each. | 12.00
28 | windows, at $10, $280; 32 doors, at $9, $288. | 568.00
3 | mantles, $25 each, $75; 3 shelves, $6 each, $18. | 93.00
224 | ft. gutters and leaders, at 8c. per ft. | 17.92
| Nails, $22; painting, $125; carting, $25. | 172.00
| Carpenter’s labor, not included above. | 200.00
| Incidentals. | 54.02
| Total cost, complete. | $2,200.00

Fig. 73.—VIEW OF EXTERIOR OF A SOUTHERN HOUSE.

Fig. 74.—CELLAR AND GROUND PLAN.

Fig. 75.—PLAN OF FIRST FLOOR.

Fig. 76.—PLAN OF SECOND FLOOR.

DESIGN XIX.
A STONE HOUSE, COSTING $2,500.

This plan has many features to commend it as an economical country house. It is similar in many respects to Design XXVII., having an equal breadth of front, and is constructed of like substantial materials. The arrangement of the several parts, however, are more regular and compact, and embrace accommodations for a good-sized family.... Exterior, (fig. 77.)—At first sight, the reader will perceive the perfect balance apparent in the outlines and details of the front. Variety is also an especial feature, resulting from the pleasing diversity and systematic distribution of the prominent parts. The site has much effect upon the appearance of any building. This house should have a commanding position to afford such views as would seem to be expected from its broad and generous windows. Health and happiness being largely dependent on the situation, it is important to select a position having a natural drainage, and therefore more likely to be surrounded with pure wholesome air.... Cellar, (fig. 78.)—Hight 6½ feet. The plain engraving saves the need of further explanation. The ceiling is smoothly “laid off” with one coat of plaster, and the walls are flush-pointed, so that the whole interior may be whitewashed whenever it shall be desirable to lighten or sweeten the cellar.... First Story, (fig. 79.)—As is suggested by the exterior, system and order are prominent features in the interior arrangement. The main entrance is through double doors. The principal hall is central and roomy, and contains the open and balustered stairway to the second story. The two principal rooms are of equal size, with outlooks front and rear. The Parlor has a pleasant bay or plant window, arranged to be shut off, when desirable, by large sash doors. This window has no floor, but is cemented around its sides below the floor-line, to secure dryness to the walls, and is filled with earth wherein plants may be grown. The thick masonry surrounding this plant-bed will secure it from frost. The temperature required to make the parlor comfortable will be sufficient for the plants, while the strong sunlight will insure their vigorous growth. A mirror may be placed on the mantle opposite this window, arranged to reflect its contents, and make a most cheerful picture.—The Living-room is a convenient apartment, in easy communication with the front and rear entrances, the wood-house, and cellar-stairs, passing down under the front hall stairs. It has a large pantry, and is provided with a range, sink, stationary wash-tubs, water, and waste-pipes. The importance of having cold and hot water always ready should not be overlooked. Very much of the drudgery of housework in the country consists in drawing and carrying water, and besides, it generally happens that when water is most wanted, the vessels are empty, necessitating great inconvenience and frequent distress.—The Bedroom is situated between the parlor and living-room, and communicates with both, and has a good-sized closet. This apartment may be used as a sewing-room, where such work need not be put away every time it is laid down for a moment. The Wood-house at the rear is constructed of light materials, and serves as a fuel and utensil room.... Second Story, (fig. 80.)—This story is divided into five chambers, a hall, and seven closets. Each room is entered directly from the hall, obviating the too frequent necessity of passing through one room to reach another. Closets are a necessity to any well ordered household; their uses are so numerous that it is hardly possible to provide too many.... Remarks on Construction.—The element of durability is an important quality of this structure, avoiding the necessity and expense of frequent repairs. The exterior walls are constructed of stone and brick, as described in Design XXVII. Care should be taken to make these walls perfectly solid and thorough. The mortar used should be of the best lime, and coarse, sharp sand. Such mortar improves with age, always increasing in hardness and strength. The brick corner-work may be laid in dark or blue mortar with good effect in subduing the strong contrasts in color. Interior plastering should never be applied directly to the stone-work. Such walls do not readily conform to the sudden changes of the surrounding temperature, and are rendered damp and unwholesome from the moisture of the air being condensed upon them. They should be furred off, leaving an air-space between the stone-work and plastering, through the whole hight of the wall, and opening into the spaces between the rafters of the roof. Side-walls constructed in this manner afford a most comfortable interior, having a more equal temperature than is possible in the usual frame building, and neither the severe cold of winter, nor the extreme heat of summer, is immediately felt within. The chimneys are of hard brick; their interior location insures a great saving of fuel, as the heat that is radiated from them greatly assists in warming the house. The principal roofs are covered with dark slate. “Keystone” and “Chapman” are good qualities, and are mostly used in this vicinity; they have good color, and do not fade. A good effect is produced by clipping the exposed corners of about one-third of the slate, in a uniform manner, and laying them in belts of five or six courses each across the roof.

Estimate of the Cost:

111 | yards excavation, at 20c. per yard. | $22.20
171 | perches stone-work, at $2.75 per perch. | 470.25
103 | ft. stone sills and steps, at 30c. per ft. | 30.90
2,000 | bricks in angles, etc., at $12 per M., laid. | 24.00
4,000 | bricks in chimneys, at $12 per M., laid. | 48.00
660 | yards plastering, at 28c. per yard. | 184.80
80 | yards plastering in ceiling of cellar, at 20c. per yard. | 16.00
3,367 | ft. of timber, at $15 per M. | 50.50
| 2 | girders, 4 × 8 in. 32 ft. long. |
| 4 | plates, 4 × 8 in. 11 ft. long. |
| 2 | purlins, 4 × 8 in. 38 ft. long. |
| 1 | ridge, 2 × 6 in. 29 ft. long. |
| 1 | ridge, 2 × 6 in. 22 ft. long. |
| 44 | beams, 3 × 8 in. 13 ft. long. |
| 22 | beams, 3 × 8 in. 11 ft. long. |
| 40 | rafters, 2 × 5 in. 19 ft. long. |
| 4 | valleys, 3 × 7 in. 21 ft. long. |
| 18 | collars, ¼ × 5 in. 14 ft. long. |
230 | wall-strips, at 11c. each. | 25.30
130 | furring strips, at 6c. each. | 7.80
| Anchors, of tire iron, $3; cornice materials, $30. | 33.00
300 | shingling-lath, at 6c. each. | 18.00
| Rear wing, exclusive of tin, complete. | 100.00
20 | squares of slate, at $9 per square. | 180.00
32 | hemlock boards, at 16c. each. | 5.12
3½ | squares of tin, at $7 per square. | 24.50
60 | ft. of leaders and gutters, at 10c. per ft. | 6.00
213 | flooring, 8 inch, at 25c. each. | 53.25
| Stairs, complete. | 70.00
| Piazza and stoop, exclusive of tin, complete. | 80.00
6 | cellar windows, complete, at $5 each. | 30.00
17 | plain windows, complete, at $10 each. | 170.00
4 | dormer windows, complete, at $18 each. | 72.00
27 | doors, complete, at $9 each. | 243.00
4 | mantles, 2 marble and 2 wooden, complete. | 62.00
| Closet finish, complete. | 18.00
| Range and plumbing, complete. | 150.00
| Nails, $14; painting, $60; cartage, $15. | 89.00
| Carpenter’s labor, not included above. | 125.00
| Incidentals. | 91.38
| Total cost, complete. | $2,500.00

Fig. 77.—FRONT VIEW OF HOUSE.

Fig. 78.—PLAN OF CELLAR.

Fig. 79.—PLAN OF FIRST FLOOR.

Fig. 80.—PLAN OF SECOND FLOOR.

DESIGN XX.
A COUNTRY HOUSE, COSTING $2,600.

This plan is somewhat similar in style and materials to Design XXIV. The changes here indicated adapt it to a more southern climate, such as larger window openings, more piazzas, and placing the domestic rooms at the rear of the main building.... Exterior, (fig. 81.)—“Double front” houses (as those having their front entrance in the center are usually called), may face any point of compass, and are adapted to almost any situation. They appear best when located at sufficient distance from the road to allow extended, neatly laid-out approaches, and thus give an air of retirement.... Cellar, (fig. 82.)—Hight, 7 feet. Full size of the main building, with window openings on every side.... First Story, (fig. 83.)—Hight of ceilings in main house, 11 feet; in the wing, 9 feet. The apartments embraced in the main house are unusually large, airy, and pleasant. All the windows open down to the floor, and are protected from sun and rain by the piazza. The Hall has a wide entrance leading from the piazza, and contains the principal flight of stairs. The Parlor and Living-room are of equal size (14 × 24 feet), have windows looking in three directions, and have open fire-places in each. The rear entry occupies part of the main house and wing, its hight of ceiling is determined by the platform of the main stairs. It communicates conveniently with the rear piazza, main hall, living-room, kitchen, cellar-stairs, and a closet. In the Wing are a kitchen, work-room or summer-kitchen, butler’s pantry, and two closets. The Kitchen communicates with the living-room through the butler’s pantry, which is “dresser-finished” with drawers and shelving. The work-room is furnished with a pump, sink, and two stationary wash-tubs. If desired, a bath-room may be placed in this wing, and fitted up with the necessary plumbing, as shown in Design XXXIII.... Second Story, (fig. 84.)—Hight of ceiling, 9 feet. A hall, three chambers, a bedroom, and four closets are the divisions of this story. The stairs leading to the attic are placed above those of the first story, with a door at the foot.... Attic.—The estimate provides for a floor in this, and for casing the four pair of windows, but it is otherwise left unfinished. Four or more bedrooms may be made in this story if desired.... Construction.—The materials are indicated in the estimate. The foundation-walls show 2 feet above the ground. The timber is framed and raised in the most thorough manner. The beams are placed 2 feet apart from centers, and bridged with one row of “cross-bridging” in each span. Observe that the main posts are 25 feet long; this includes the whole hight from bottom of sills to top plates, and allows for four feet of inside breastwork from the attic floor to foot of main rafters. The main roof is set at an angle of 45°. The “open-worked” barges in the pediment (fig. 81), are of 1¼-inch-plank, 16 inches wide, pierced in simple figure, and require only one set of patterns for the four gables. The piazza-rafters show in their ceilings. Perforated pediments in each side allow the escape of heated air from under the roofs. The columns are “boxed” 7 inches square, and chamfered. The spandrels are scroll-sawed from 3-inch timber. The two full stories are hard finished on two coats of brown mortar and seasoned lath. All doors are panelled, and all architraves in the main house are double moulded; in the wing single moulded. All sashes are 1½ inch thick, and glazed with second quality French glass. The parlor and living-room have marble mantles; the chambers have marble shelves resting on stucco trusses. The main stairs have an 8-inch octagon newel, a 2¼ × 4¼ moulded hand-rail, and 2-inch fluted balusters, all of black walnut, as also are the saddles to each room. All knobs, roses, and escutcheons are of white porcelain. All wood usually painted has two coats of best paint, in shades to suit the owner’s taste.

Estimate of Cost:

137 | yards excavation, complete, at 20c. per yard. | $27.40
52 | perches stone-work, at $2.75 per perch. | 143.00
6,000 | brick, furnished and laid, at $12 per M. | 72.00
44 | ft. blue-stone, at 30c. per ft. | 13.20
623 | yards plastering, complete, at 28c. per yard. | 174.44
7,126 | ft. timber, at $15 per M. | 106.89
| 1 | sill, 4 × 8 in. 205 ft. long. |
| 10 | posts, 4 × 8 in. 25 ft. long. |
| 2 | girders, 4 × 8 in. 25 ft. long. |
| 1 | tie, 4 × 6 in. 124 ft. long. |
| 1 | plate, 4 × 6 in. 205 ft. long. |
| 1 | piazza, 3 × 5 in. 332 ft. long. |
| 90 | beams, 3 × 8 in. 15 ft. long. |
| 15 | beams, 3 × 8 in. 17 ft. long. |
| 4 | valleys, 3 × 8 in. 23 ft. long. |
| 40 | rafters, 3 × 5 in. 20 ft. long. |
| 1 | piazza, 3 × 8 in. 370 ft. long. |
500 | wall-strips, at 11c. each. | 55.00
360 | siding, at 28c. each. | 100.80
| Materials in cornices, corner-boards, etc. | 40.00
360 | shingling-lath, at 6c. each. | 21.60
65 | bunches shingles, at $1.50 each. | 97.50
134 | hemlock boards, at 16c. each. | 21.44
15 | squares tin roofing, gutters, and leaders, at 7c. per ft. | 105.00
360 | flooring, at 28c. each, $100.80; stairs, complete, $90. | 190.80
| Piazzas, except roofing, complete. | 150.00
8 | cellar windows, $48; 30 windows, $300. | 348.00
28 | doors, complete, at $10, $280; closet finish, $20. | 300.00
| Mantles and shelves, $75; nails, $20. | 95.00
| Painting, complete, $150; cartage, $35. | 185.00
| Pump, sink, and range, $60; incidentals, $42.93. | 102.93
| Carpenter’s labor, not included above. | 250.00
| Total cost, complete. | $2,600.00

The following detailed estimate of the cost of windows and doors, “complete,” are given in explanation as to what is included in the foregoing and other lists, viz.:

First-class Windows, complete.—For a 2-7 × 6-2 window, with panelled back, and full double trim, viz.:
22 ft. running lumber in frame, at 4c. | $0.88
4 pulleys. | .14
28 lbs. iron weights, at 2½c. | .70
Sash cord, 8c.; screws, 3c. | .11
22 ft. of 8-inch trim, at 8c. | 1.76
Panelled back materials. | .48
Sash, glazed, counter-checked, and hung. | 2.80
Blinds, with fastenings. | 1.80
Materials in outside cap. | .64
Nails, 8c.; labor, $4. | 4.08
Total. | $13.39

Second-class Windows, complete.—For a 2-7 × 5-2 window, with plain single moulded trim, viz.:
20 running ft. of lumber in frame, at 4c. | $0.80
4 pulleys, at 40c. per dozen. | .14
26 lbs. sash-weights, at 2½c. | .65
Sash-cord. | .08
Screws. | .03
16 ft. of 5-inch trim, at 5c. | .80
Sash, glazed, counter-checked, and hung. | 2.16
Blinds, with fastenings. | 1.56
Nosing, apron, and drip. | .30
Nails, 6c.; labor, $2.50. | 2.56
Total. | $9.08

Where there are an equal number of each class, I should put their cost at $11.23 each, and where the second class preponderates, as is usually the case, the average price is reduced accordingly:

First-class Doors, complete.—Double-faced, 2-8 × 7 ft., full trimmed:
Door, 4-panelled, at factory. | $2.50
20 ft. running trim, 8 in., at 21c. | 4.20
Saddle. | .15
Buts and screws. | .16
Locks and knobs. | .50
22 running ft. base, at 9c. | 1.98
Nails, 6c.; labor, $3. | 3.06
Total. | $12.55

Second-class Doors, complete.—Single-faced, 2-6 × 6-8, single trim:
Door, 4-panelled, at factory. | $1.90
18 ft. running trim, at 15c. | 2.70
Saddle. | .15
Buts and screws. | .15
Locks and knobs. | .35
22 running ft. base, at 7c. | 1.54
Nails, 5c.; labor, $2. | 2.05
Total. | $8.84

It will be noticed that the item for Base is included in above estimate for doors. The figures (22 feet) are an average per door, deduced from careful calculations, and are introduced here for the purpose of aiding any one in readily making up an estimate for a whole building.

Fig. 81.—ELEVATION OF FRONT OF HOUSE.

Fig. 82.—PLAN OF CELLAR.

Fig. 83.—PLAN OF FIRST FLOOR.

Fig. 84.—PLAN OF SECOND FLOOR.

DESIGN XXI.
A FARM-HOUSE COSTING $2,600.

These plans were designed for a convenient and comfortable Farm-house in the American style, comprehending the most economical and practical methods of construction. The size and shape of such houses should be made to conform to the requirements of those who are to occupy them. Unlike the villager, the farmer has ample road front, and his house should be so arranged as to secure the most pleasant outlook from the living rooms. For many important reasons a farmer’s house should be set back from the highway at least 75 feet, 200 feet is much better. Everyone appreciates a nice lawn in front of a country home, through which inviting approaches lead from the road entrances bordered with flowers, and where space is allowed for shade trees and shrubbery. The width of country roads when first projected is usually limited to 50 feet. There is no certainty, however, that an increased width or the straightening of a roadway will not be demanded at any time and such contingencies should be provided for. Other considerations require but a moment’s thought to convince anyone of the desirableness of an ample front lawn.... Exterior, (fig. 85.)—Farm houses usually stand disconnected and apart from other buildings, and should have outlines that will best adapt them to the conditions that are otherwise manifest in the location. This plan is intended for an eastern frontage, where it would face the morning sun, when the principal and broader portions of the building, at the right, would be doubly valuable as a shield to ward off the northern winds from the parts of the house most used by the occupants. (By reversing the plan it would be equally adapted to the opposite, or easterly side of a road.) It is intended that the body of the house shall be set at least two feet above the ground; this gives opportunity for good-sized cellar-windows, that will admit light, and afford good openings for cellar ventilation, and also secure the frame-work of the building against moisture from the ground. Such moisture, if allowed, will cause decay of the sills and other principal timbers, and is sure to percolate upward into the house, filling it with unwholesome vapors. The variety of the general outlines as shown in the elevation are calculated to impart a cheerful and lively appearance always desirable in a country home, and very pleasant to the passer-by. The ridged roofs, with their spreading gables and ample projections, are features of frankness in which there is no attempt at concealment or imitation. The bay-windows, wide entrance, and spacious piazza, are each expressive of liberality and refinement. The extreme simplicity of the details, and methods of construction, devoid of all ostentatious display, clearly express the purpose of the building, and commend it to the consideration of all who are interested in rural house building.... Foundation, (fig. 86.)—In most locations stone are abundant; our estimate comprehends the building of the foundation-walls of rough, broken stone, laid in coarse mortar, and neatly pointed where exposed to sight. Any man who is at all familiar with the most ordinary stone-work, such as building “wall” fences, could build these foundations acceptably; they should be laid up 18 inches thick, and flush with the outside of the frame-work of the building. Our plan shows a cellar under the central part of the building only, which should be 7 feet deep; this cellar will be found sufficiently spacious for the uses of most families, but may be enlarged if desirable. One of the “wise sayings” we heard in youth was, “always build your cellar under the whole house.” Unless there are ample cellars under the barns, the house-cellar is never too large. In this case, it will be but little extra cost and labor to take out the earth, and carry the foundations down. The walls provided would do most of this, and then we have ample cellars for all wants, and have room to partition off fruit and vegetable rooms, the former of which need to be much cooler than the latter, if one would keep fruit well. The side-walls of the area are built of the same materials as the cellar-walls, with the stone steps inserted while building. The foundations shown on the plan where no cellar is required, are built of the same materials, laid in trenches, which have been excavated 18 inches wide, and 2 feet deep. The chimney foundations should be started and laid up with the other walls. A very effectual ventilation may be provided from the cellar by arranging an opening that shall lead to the left-hand flue of the kitchen chimney; this flue will be warmed by contact with the range when in use, and a strong draft will be made, which will exhaust the damp, foul odors so common in deep cellars. It will be observed that the cellar is protected from the extreme changes of outward temperature by the walls and spaces at each side, and by the partial coverings in front and rear.... First Story, (fig. 87.)—This story is divided into three large and three small rooms, and hall. By this plan, the kitchen is intended as the living-room of the family, and is so arranged as to be the most convenient and pleasant room in the house; has large windows front and rear, which will admit an abundance of light, and afford an outlook each way. A large range is placed in the fire-place, with a water-back connecting with the boiler in the laundry. The clock and lamp-shelf is placed on the opposite side of the room from the fire-place: should never be over it. Adjoining the kitchen, and connected with it, is a pantry, containing shelving, drawers, and a wash-tray, with cold and hot water. The Laundry, or work-room, is arranged to connect directly with the kitchen and pantry, and leads to the rear outside door. This room is fitted up so that the principal kitchen-work may be done in it, with great facility, and with few steps, and contains a closet, sink, pump, wash-tubs, tank, and boiler. The hight of the ceiling in this room is 10 feet in the clear. The Tank (not shown in the drawings), is situated close up to the ceiling, above the pantry door, is 8 feet long, 3 feet wide, and 2 feet deep. The boiler is of copper, 40-gallon capacity, and is placed directly in the rear of the kitchen chimney. The sink and wash-tubs are shown on the plan, and are to be provided with cold and hot water. The force-pump is placed next to the sink, under the tank—by this method but little plumbing is required, and a very perfect and satisfactory arrangement is secured. The boiler keeps the temperature of this room sufficiently warm to prevent damage to the pipes from frost. The Bedroom also adjoins the kitchen, and has a closet for clothing, and two windows. The principal Hall, included in the central building, is entered through large double doors from the front piazza, and connects through doors with the parlor, kitchen, and back passage, and contains the principal stairs, which are of easy “platform” construction. The Parlor has a large bay-window, marble mantle, and adjoins the library through large sliding-doors. The Library has a marble mantle, and closet, and connects with the back passage at the rear of the principal stairs. The Front Piazza has its ends sheltered by the projections at each side, and is arranged to require but two columns. If desirable at any time, a part of this piazza can be enclosed with sash at very little expense, which would provide a very convenient conservatory for plants and flowers. The rear “shed” is provided with a roof and columns, but has no wooden floor. It is intended that the grounds around the rear of the central building shall be graded well up, say within a foot of the rear door-sills, so as to require but a single step, or large flat stone, to each door. The outside cellar doors would be made to lay even with the final grade, and hung to the coping-stones of the area-walls, and the remaining space paved or flagged with stone. When once properly done, the finish of this character will last a lifetime without trouble, while wood-work could never be satisfactory, and would often require renewal. Whenever the cellar doors are opened, they are hooked up against the columns, where they form a railing, or guard, to prevent the usual danger of an open hatchway.... The Second Story (fig. 88), has a hall, four large and three small chambers, with four closets, and stairway leading to the attic. Each of the large Chambers has two windows, and a ventilating register in the flue of the chimney adjoining. All these rooms have full hight ceilings, and are not so close to the roof as to be affected by their absorbed heat of summer, but have complete square ceilings, with large air-spaces between them and the roofs. The Attic of the principal building is completely floored, and has windows in each gable or pediment, and may be used for storage, drying clothes in stormy weather, and for many other purposes.... Construction.—The estimate appended indicates the kind and quantity of materials used, which will be found to be such as are now most generally adopted for buildings of this character. The work is very simple, and may be executed by the simplest methods. Information concerning the application and uses of the “felting” may be found in Design XI. We have before suggested that “there are circumstances that would justify the building of one part of a house first.” Should it be desirable, the central portion of this house could be built first, and would be found quite sufficient as the dwelling house of a small family, and the remainder added afterwards as required.... Estimate.—The following estimate has been carefully compiled, and may be relied on for quantities, etc. Prices vary in different localities, but the figures here given form a good basis of calculation:

65 | yards excavation, at 20c. per yard. | $13.00
882 | ft. foundation, at 15c. per ft. | 132.30
725 | ft. foundation, at 10c. per ft. | 72.50
6,000 | bricks in chimneys, at $12 per M. | 72.00
40 | ft. stone steps and coping, at 30c. per ft. | 12.00
900 | yards lath and plastering, at 28c. per yard. | 252.00
4,799 | ft. of timber, at $15 per M. | 72.00
| | Sills, 4 × 8 in. 218 ft. long. |
| 1 | girt, 4 × 8 in. 20 ft. long. |
| 7 | posts, 4 × 7 in. 22 ft. long. |
| 2 | posts, 4 × 7 in. 18 ft. long. |
| 45 | beams, 3 × 8 in. 16 ft. long. |
| 22 | beams, 3 × 8 in. 22 ft. long. |
| 15 | beams, 3 × 7 in. 9 ft. long. |
| 4 | valleys, 3 × 8 in. 20 ft. long. |
| | Ties and plates, 4 × 6 in. 384 ft. long. |
500 | wall strips, 2 × 4 in. 13 ft. long, at 11c. each. | 55.00
340 | novelty siding boards, 9½ in., at 28c. each. | 95.20
150 | lbs. tarred felting, at 5c. per lb. | 7.50
300 | matched flooring boards, 9½ in. wide, at 28c. each. | 84.00
20 | rough spruce plank, at 25c. each. | 5.00
270 | shingling-lath, at 6c. each. | 16.20
48 | bunches shingles, at $1.50 each. | 72.00
75 | hemlock boards, 10-inch, at 18c. each. | 13.50
7 | squares of tin roofing, at $9 per square. | 63.00
| Materials in cornices and outside casings. | 60.00
33 | narrow pine flooring for front piazza, at 25c. each. | 8.25
67 | narrow pine ceiling, at 25c. each. | 16.75
1 | bay-window, complete. | 75.00
26 | plain windows, complete, at $12 each. | 312.00
4 | cellar windows, complete, at $6 each. | 24.00
30 | doors, complete, at $10 each. | 300.00
| Stairs, complete, $70; 8 closets, fitted complete, $40. | 111.00
2 | marble and 2 pine mantles. | 50.00
| Nails, $20; range, with elevated oven, $80. | 100.00
| Plumbing, $84; cartage, average 1 mile, $27.08. | 111.08
| Carpenter’s labor, not included above. | 250.00
| Painting. | 120.00
| Incidentals. | 25.72
| Total cost, complete. | $2,600.00

Fig. 85.—FRONT ELEVATION OF FARM HOUSE.

Fig. 86.—PLAN OF CELLAR.

Fig. 87.—PLAN OF FIRST STORY.

Fig. 88.—PLAN OF SECOND STORY.

DESIGN XXII.
A HOUSE COSTING $2,800.

This plan of a suburban, or a country house, has all the advantages of the square form—providing convenient, commodious interior apartments, and has a simple, expressive outside dress, that compares favorably with more pretentious, expensive dwellings.... Exterior, (fig. 89.)—The outlines of the main building are rounded and compact, indicating completeness and solidity. The front tower-like projection is a central and distinctive feature, around which the other parts are symmetrically balanced. The Porch and roofed balconies are simple and neat. The main roof, a new modification of the “Mansard roof,” is a conspicuous part, giving an expression of strength and unity to the design. The main cornice has full projections, with neat solid trusses, and is separated into sections by the chamber windows, giving relief from the monotony and depressing effects usual in all continuous horizontal lines. All the second story windows of the main building have projecting hoods appropriately interlaced with the principal roof work, securing pleasant shadows to those parts, and imparting a marked finish and variety. The dormer windows are triangular, and are placed immediately above those of the lower stories, prolonging the vertical lines of openings, to which they form a fitting termination.... First Story, (fig. 90.)—Hight of ceiling, 10 feet. The usual front hall is dispensed with, and the stairway is placed where it is more convenient and accessible, and is not a conductor of cold drafts through the house. Many think it necessary to have stairways share with the parlors the most valuable and conspicuous position; they should more frequently be placed in some subordinate relation, without seeming to control the general arrangement. The entrance from the front porch is through double doors to the vestibule, and thence to either the parlor or family-room. Side doors lead to the pleasant and shady front balconies. The Parlor and Family-room are of equal size, and may be used as one spacious apartment by opening the sliding doors. The Dining-room is pleasantly situated, and opens into the family-room, rear entrance, and hallway. It has one large bay-window, and two plain ones, an open fire-place, and a dish or china closet, c. The Kitchen is isolated, relieving other rooms of its noise and odors, is convenient to the dining-room, cellar-stairway, and rear entrance, through the rear lobby, and has an open fire-place, closet, and large pantry, range, boiler, sink, wash-tubs, and the necessary pipes for water. The hall is central, accessible from the parlor, dining-room, and rear entrance, and is thoroughly lighted and ventilated by the window at the head of the stairs.... Second Story, (fig. 91.)—Hight of ceiling, 8 feet. This story contains a hall, four good-sized chambers, with closets, and two windows to each. The Bath-room has bath-tub and seat. A Conservatory connects through sash doors with the two front chambers.... Attic, (fig. 92.)—Hight of ceiling, 8 feet. The stairs to this are placed immediately above those to the second story, are ceiled in, with a door at the bottom. The rear portion is finished on a line with the two chimneys, into two bedrooms and a hall. The front portion is floored, but otherwise left unfinished as an open garret, valuable as a play-room for the children, a clothes drying-room, and many other purposes.... Construction.—The Foundation, of hard brick and good mortar, is shown by the Cellar plan, (fig. 93.)—It shows four feet above the grade in front, and, if desirable, may show one-half that hight in the rear. There is usually sufficient earth taken from the cellar excavations to give such desirable grade as shall turn off all water from the immediate grounds and walks. The chimneys are also of hard brick, are independent of the foundations, and are carried up perfectly plumb to the roof, where they are finished with neat bases and caps. The central position of these chimneys is proof against cold-air openings at their sides, and insures saving the heat radiated from them. It is impossible to prevent cracks from appearing along the sides of chimneys in frame buildings, and when these cracks communicate directly with the outside covering, they often admit much cold air.—The principal frame is 20 ft. high, substantially constructed, as indicated by the upright section (fig. 94). The main plates are in line with the beams of the attic story, and the roof-purlins are 8 feet above them. The side-rafters are 12 feet long, fitted and spiked to the purlins and plates, with their lower ends extending 2½ feet down from the latter in a continuous line. Rough brackets connecting the rafters with the upright frame-work, forming the foundations or frame of the principal cornice. By this method of extending the rafters downward instead of upward, the desirable hight and proportion of roof are obtained. The exposed surfaces that require siding are reduced from the usual hight of 22½ feet to 16 feet, and the cornices are more substantial and less complex. The siding, roof-boarding, slating, and trimming are done in the usual manner. The gutters are laid in with the slate, as described in Design V. The hoods and dormer windows have slate coverings, interlaced with the principal roof, with joinings and flashings of sheet-lead. The following estimate provides for the thorough completion of the building in an appropriate and substantial manner.—Estimate:

82 | yards excavation, at 20c. per yard. | $16.40
16,000 | brick, furnished and laid, at $12 per M. | 192.00
44 | ft. stone steps, coping, etc., at 30c. per ft. | 13.20
750 | yards plastering, at 28c. per yard. | 210.00
3,497 | ft. timber, at $15 per M. | 52.45
| 1 | sill, 4 × 8 in. 116 ft. long. |
| 1 | girt, 4 × 8 in. 30 ft. long. |
| 11 | posts, 4 × 7 in. 19 ft. long. |
| 1 | tie, 4 × 6 in. 146 ft. long. |
| 1 | plate, 4 × 6 in. 138 ft. long. |
| 1 | perline, 3 × 7 in. 96 ft. long. |
| 48 | beams, 2 × 8 in. 14 ft. long. |
| 24 | beams, 2 × 8 in. 18 ft. long. |
| 27 | beams, 2 × 8 in. 15 ft. long. |
| 1 | stoop, 3 × 7 in. 70 ft. long. |
30 | rafters, 3 × 4 in. 13 ft., at 16c. each. | 4.80
380 | wall-strips, at 11c. each. | 41.80
200 | siding, 10-inch, at 26c. each. | 52.00
| Materials in cornices and corner-boards. | 50.00
261 | hemlock roof-boards, at 16c. each. | 41.76
19 | squares of slating, at $9 per square. | 171.00
8 | squares of tinning (IC. charcoal) at $7 per square. | 56.00
250 | ft. gutters and leaders, at 8c. per ft. | 20.00
300 | flooring, 9 × 1¼ in., at 26c. each. | 78.00
200 | lbs. felting, at 3c. per lb. | 6.00
3 | stairs, complete. | 75.00
| Porch, balconies, and stoops, complete. | 160.00
6 | cellar windows, $36; 1 bay window, complete, $60. | 96.00
12 | plain windows, $144; 9 hooded windows, complete, $135. | 279.00
8 | dormer windows, complete, at $8 each. | 64.00
32 | doors, at $9.50 each, $304; 7 closets, complete, $14. | 318.00
3 | marble mantles, $60; 3 marble shelves, complete, $18. | 78.00
| Range and plumbing, complete. | 188.09
| Well, from bath-room to roof, complete. | 15.00
| Gas-pipes for 18 lights, complete. | 40.00
| Bells and speaking-tubes, complete. | 20.00
| Finish of part of attic, complete. | 60.00
| Nails, $24; cartage, average 1 mile, $25. | 49.00
| Carpenter’s labor, not included above. | 150.00
| Painting, 2 coats, complete. | 150.00
| Incidentals. | 52.50
| Total cost, complete. | $2,800.00

Fig. 89.—FRONT ELEVATION.

Fig. 90.—PLAN OF FIRST FLOOR.

Fig. 91.—PLAN OF SECOND FLOOR.

Fig. 92.—ATTIC.

Fig. 93.—PLAN OF CELLAR.

Fig. 94.—SECTION.

DESIGN XXIII.
A COUNTRY OR VILLAGE HOUSE, COSTING $2,800.—FOR PHYSICIANS, LAWYERS, CLERGYMEN, JUSTICES, NOTARIES, EDITORS, ETC.

This plan is designed to meet the wants of a large class residing in the country, or smaller villages, who are not only directly interested in agricultural pursuits, but who have also some professional or official vocation, such as: Physicians, Lawyers, Justices, Notaries, Clergymen, etc. They require in connection with their residences an apartment adapted to their special callings, that shall in no way interfere with their domestic arrangements, where all persons making business calls may enter without feeling that they are intruding on the privacy of the household.... Elevation, (fig. 95.)—The exterior outlines and dress of this plan are a fair representation of the prevailing styles of American rural house architecture, in its most genteel and practical forms. There is a manifest propriety in the strong and decided features of the exterior finish of this example, wherein each part has its distinctive characteristics of utility, harmony, and truthfulness—a combination that never fails to please even the most tasteful, and it may therefore be regarded as the real basis of beauty. We frequently meet with oddly-proportioned country houses, evidently constructed with a sole regard to utility, that present a stunted and cadaverous appearance, having been shorn of their beauty through a mistaken idea that economy precludes the least indulgence in taste. Good taste only demands that every separate part of any building shall be in harmony with the whole, and this feature of harmony is not so much a subject of expense as of expression, being a result of mode rather than the matter of construction. The materials necessarily required for any building assume shape and expression according to the methods of their application, and they may be applied in disproportion, so as to be of permanent disgrace; whereas the same materials properly and intelligently used, with a like expense of handling, develop into proportionate and expressive forms of elegance and grace. A building constructed as indicated by these plans presents a pleasing appearance from any direction, each face being broken by wings or other projections, which give relief from the formalities of a large, flat surface. From the front there is an expression of completeness indicating full provision for comfort, and an air of contentment. From the sides are presented to the best advantage the more extended surfaces, including the large corniced gables of the principal building, the rear wing, and other projections. The rear has an equally finished and satisfactory appearance.... The Cellar (fig. 96), is the full size of the ground-plans, with a clear hight of 7 feet. The five cellar windows are placed where they will admit light to every part. An outside entrance is under the rear lobby, and a stairway leads directly to the kitchen.... First Story, (fig. 97.)—The arrangement is very simple and convenient, comprising good-sized hall, parlor, living-room, kitchen, office, study, five closets, and two stairways, with ceilings 10 feet high. The Parlor is pleasantly situated, has two front windows opening directly to the piazza, from which they derive shade and protection. The Dining or living-room opens into the hall, parlor, and kitchen, and has two closets. One end of this room is octagonal, and extends 6 feet beyond the face of the principal, with three windows, affording a pleasant outlook. The Kitchen adjoins the dining-room, has two closets, is fitted up with a range, sink, and wash-tubs, and is conveniently connected with the cellar and with second story by private stairways. The Office is entered from the front porch, and is in direct communication with the principal hall, has a good-sized closet from the space under the principal stairs, and has a private room or Study.... Second Story, (fig. 98.)—This is divided into four commodious apartments, beside a hall, bath-room, and the necessary closets, and has ceilings 8 feet high in the main building, and 7 feet in the rear wing. The Bath-room is provided with a seat-closet and bath-tub. An inclosed stairway leads to the Attic, where two or more bedrooms may be finished, besides leaving space for garret purposes. The tank placed over the ceiling of the bath-room is arranged to receive water from the principal roof, and is provided with an overflow pipe leading to the cistern.... General Requirements.—Full brick foundations are estimated for. Where coarse stone can be had, they answer as well, and at less cost, for the portions below ground; they should be laid even with the brick-work on the inside when finished. The wood-work is to be substantially constructed of good and sufficient materials throughout. The roofs of the piazza, stoop, bay, lobby, and window caps, are covered with charcoal tin, and in each case an allowance is made for a “flashing” of 6 inches in width to turn up behind the siding, to prevent leakage. The principal and the two wing roofs are each covered with dark slate with ridge plates of zinc. The gutters are to be those described for Design V. The joinings of the wing-roofs against the main building are made perfectly tight by laying in, against the building, right angle strips of zinc or tin “flashing,” with each course of slate before the siding is put on. Slate is unquestionably the best material for such roofing when the form of roof will admit of its use; its cost is the same as for good tinning, and about 2 cents per square foot in excess of pine shingles; when once properly done, will last for centuries; it is fire-proof, and the water from it is much purer, an important consideration when rain and cistern water is used for cooking or drinking. Its color and appearance are agreeable—in fact roofs of other materials are often painted in imitation of slate from choice.... The most expressive portions of any buildings are their projecting cornices. As a rule, for houses of this style, such projections should be one inch for every foot of their hight from the foundation. And the same rule will apply to every detail of the exterior finish; for example, as in this case, the principal building being 22 feet high at the plate, the principal cornices should project 22 inches; the piazza being 11 feet high, its cornice projects 11 inches; the windows, 6 feet high, have caps projecting 6 inches, etc. By this simple rule, all such projections may be readily determined, and thus secure perfect proportion and harmony of parts.... The inside plastering is “three-coat work.” All side-walls should be continued down close to the floor, to prevent the passage of air or sound. Care should be taken to make the walls straight and true, with the second coat of “browning,” for the last or white coat, though applied in the best manner, can never overcome malformations in the body of the plastering; on the contrary, the finer the finish of last coat, the more visibly will such defects appear. In the concluding estimate, 28 cents per yard is allowed for the cost of plastering, which is ample, as shown by these calculations for 100 yards, viz.:

2,000 | lath, at $2 per M. | $4.00
10 | lbs. lath-nails, at 6c. per lb. | 60
4 | barrels lime, at $1 per barrel. | 4.00
5 | loads sand, at 30c. per load. | 1.50
1 | barrel finishing lime, at $1.40 per barrel. | 1.40
1½ | bushel plaster, 37c.; 1 bushel hair, 50c. | 87
| Cartage. | 3.00
| Labor putting on lath, at 10c. per bunch. | 2.00
½ | day laborer (mixing mortar), at $1.50 per day. | 75
1½ | days mason (work), at $2.50 per day. | 3.75
1½ | days laborer (“tending” mason), at $1.50 per day. | 2.25
| Use of screen, water barrel, and scaffolding. | 1.00
| Total cost for 100 square yards, complete. | $25.12
| Incidentals. | 2.88
| Estimated at 28c. per yard. | $28.00

In some localities, a practice prevails among masons of including in their measurements of plastering one-half of the openings of doors and windows, which is obviously unjust, and a frequent cause of dispute. Such openings will average at least 2 yards each—in this house would aggregate 50 yards—and in every case should be deducted, unless otherwise agreed previously.—Estimate:

113 | yards, excavation, at 20c. per yard. | $22.60
12,000 | brick, laid complete, at $12 per M. | 144.00
47 | ft. stone steps and coping, at 30c. per ft. | 14.10
841 | yards plastering, at 28c. per yard. | 235.48
5,135 | ft. timber, at $15 per M. | 77.02
| 1 | sill, 4 × 8 in. 200 ft. long. |
| 1 | girder, 4 × 8 in. 30 ft. long. |
| 7 | posts, 4 × 7 in. 21 ft. long. |
| 2 | posts, 4 × 7 in. 18 ft. long. |
| 2 | posts, 4 × 6 in. 12 ft. long. |
| | Piazza, 3 × 8 in. 82 ft. long. |
| | Piazza, 3 × 5 in. 40 ft. long. |
| | Plates, 4 × 6 in. 100 ft. long. |
| | Ties, 4 × 6 in. 330 ft. long. |
| 1 | ridge, 3 × 7 in. 26 ft. long. |
| 20 | rafters, 3 × 5 in. 20 ft. long. |
| 35 | beams, 3 × 8 in. 22 ft. long. |
| 9 | beams, 3 × 8 in. 19 ft. long. |
| 21 | beams, 3 × 8 in. 13 ft. long. |
4 | locust posts in cellar, at 30c. each. | 1.20
375 | wall-strips, 2 × 4 in. at 11c. each. | 41.25
170 | lbs. tarred paper or felting, at 3c. per lb. | 5.10
330 | siding, 10-inch, at 28c. each. | 92.40
| Materials in cornices, water-table, etc. | 50.00
213 | hemlock boards (for roofing), at 20c. each. | 42.60
18½ | squares slate roofing, at $9 per square. | 166.50
3 | squares tin, at $8 per square. | 24.00
300 | flooring, 9 in., at 28c. each. | 84.00
| Stairs, complete. | 100.00
5 | cellar windows, complete, at $6 each. | 30.00
18 | plain windows, complete, at $12 each. | 216.00
35 | doors, complete, at $10 each. | 350.00
| Piazza, porch, and lobby, complete. | 150.00
4 | mantles, complete, at $20 each. | 80.00
| Closet finish, complete. | 25.00
| Range and elevated oven, etc., complete. | 80.00
| Plumbing, complete. | 175.00
| Bells and speaking-tubes, complete. | 15.00
| Nails, $25; painting, $200; carting, $35. | 260.00
| Carpenter’s labor, not included above. | 223.83
| Incidentals. | 94.92
| Total cost, complete. | $2,800.00

Fig. 95.—ELEVATION OF HOUSE, WITH OFFICE ATTACHED.

Fig. 96.—PLAN OF CELLAR.

Fig. 97.—PLAN OF FIRST FLOOR.

Fig. 98.—PLAN OF SECOND FLOOR.

DESIGN XXIV.
A FARM-HOUSE COSTING $2,800.

This plan will be recognized as comprehending the general characteristics of those given in Designs XXI. and XXVI. It is designed to be constructed of similar materials, with a like variety of pleasing and decided outlines, and to give an equal amount of accommodation and convenience. The division and arrangement of the several parts, however, are entirely changed, being especially intended to meet the requirements of a location having a western frontage. Location is an important consideration, involving many questions of adaptation, that should always guide to the selection of such a plan as will express a natural fitness for the situation, and truthfully indicate its purpose.... Exterior, (fig. 99.)—Only two feet of the foundation-walls are exposed to sight, which brings the frame-work of the building quite near enough to the ground. The surface of the earth surrounding such buildings should have a grade of at least one-half inch to the foot, for the distance of 50 feet in every direction, to insure the turning away of all surface water from the walks and grounds. Another good result derived from such grade is the additional altitude given to the building, imparting a much better appearance. The general outlines of the elevation are very simple, devoid of all pretentious ornamentation. The wide frontage, the large and numerous openings, and ample roofs, are each expressive of frankness and hospitality, eminently befitting the home of the farmer. The front Porch is unusually wide, and arranged to have large columns, and stationary seats at either side. The Bay-window has square projections, instead of octagonal, which are equally appropriate in this case, and less costly. The cornices of the principal building project 20 inches, and those of the wing 16 inches, and both are provided with scroll-sawed trusses. The chimney-tops are large, and heavily capped. The same general finish, as is shown on the front, is put on the sides and rear, so that the building presents an equally complete and satisfactory appearance from every direction. Buildings of this character should be set back from the street line at least 50 feet—150 feet would be much better—to give room for trees, shrubbery, and walks.... Cellar, (fig. 100.)—The plans provide for a cellar under the principal building only, which gives a clear space of 22 × 25 feet. If desired, the space beneath the wing may be included at an additional cost of $65. The excavations for the cellar in the earth is 3 feet 8 inches deep; this allows the foundation-walls to be 7 feet high. The earth thrown out is to be graded around the building to the hight of 1½ foot, thus leaving two feet of the foundation exposed on the outside. Country houses are frequently set so low down as to be a matter of regret ever afterwards. There are constant accumulations of dust, and other matter, caught and held by the shrubbery and grasses, so that there is soon discovered a seeming growth of the earth upward around the house and immediate grounds, making it impossible to adapt the grades that are desirable. It is far better that foundations are a little too high than too low, for when too high, the approaches can easily be raised at any time with a few loads of earth; but when too low, there seems to be no cure, except to raise the entire building. The foundation-walls are designed to be constructed of broken stone, laid in coarse mortar, as more particularly described for Design XXI.... First Story, (fig. 101.)—Hight of ceilings, 10 ft. Entire floor measurement, 1,206 square feet, affording ample space for good-sized apartments. The several divisions have especial regard to comfort and convenience. The front hall, or reception room, is nearly square, of good dimensions, is entered from the front porch through double or folding doors, and adjoins the parlor and living-room, and contains the principal stairs. The Parlor is unusually large, is provided with windows in its sides, and has stucco cornices and centers in its ceilings, with an arched finish in the bay-window. The Living, or Dining-room, is commodious, pleasantly situated, with outlooks front and rear, and is easily accessible all around. The Family-room is large, connects with the dining-room and parlor, and is intended as a sitting or sewing-room. If occasion require, this room might be used as the bed-room of an invalid. The Work-room, or Kitchen, is conveniently arranged to have a range, boiler, pump, sink, wash-tubs, and pipes for cold and hot water, and adjoins the dining-room, a large pantry, and a rear entrance door, and has a private stairway leading to the second story, with a closet underneath. The Pantry is of ample dimensions, is conveniently arranged with shelving, and has a zinc wash-tray, with cold and hot water-pipes, and adjoins the kitchen, dining-room, and a china closet. The latter is useful for storing wares not required daily. The rear shed is paved, and the cellar doors are constructed as described for Design XXI.... Second Story, (fig. 102.)—Hight of ceiling, 9 feet in main building, and 8 feet in wing. Floor measurement, 1,276 feet, divided into 8 good-sized rooms, besides halls, closets, and stairways. The principal hall connects with each chamber in main building, and one room and passage in wing. The door between the principal hall and wing-passage may be closed at any time, cutting off communication at pleasure. The side, or “breast” walls, in the wing, are vertical 3 feet, and are continued upward at an angle of 45° to the ceiling, thus securing sufficient head-room. The bath-room is exactly above the kitchen, and contains a tank, bath-tub, and seat-closet, with pipes for cold and hot water.... Attic.—The stairs to this are over the first flight, and are designed to be neatly ceiled in with 4½-inch beaded ceiling-boards, with a door at the foot. Double windows in each gable admit sufficient light, and afford ventilation.... Remarks on Construction.—An insight into the character of this plan, is best had by carefully considering the materials and cost in the estimate added. We would urge the importance of good methods and workmanship in construction, without which all materials, however good or sufficient, can never produce good results. The old maxim, “whatever is worth doing at all, is worth doing well,” especially applies to building a home in which one is to spend a lifetime. This does not imply extravagance in any sense, only demanding such careful and intelligent application of the ordinary rules of construction, as shall insure substantial work, that will not be a continuous source of anxiety and expense. Any one of ordinary intelligence should be able to generally superintend the operations of the mechanics employed in constructing a farm-house. The following points are of the greatest importance. Carefully watch that the foundation-walls are substantially laid, and accurately leveled on their upper surfaces, so that the doors shall not strike the floor or carpets in opening, nor the tables, chairs, or other furniture be obliged to stand on three legs. The frame-work, when raised, should be plumb, so that all work on or in the building can be cut square, and applied without tedious fitting. The siding should be thoroughly “seasoned” in the open air before using, and carefully applied with close joints, and well nailed. The edges of all water-tables, corner-boards, and window-frames should be painted before setting. The shingles should be carefully laid, breaking their joints at one-third of their width, and double nailed. The flooring should be dry, close laid, and nailed with two nails to each beam. The partitions should be set with studding of selected widths; and their angles or corners should be anchored firmly together, to prevent the walls from cracking in those parts when finished. The chimneys should be carefully constructed; all joints between the brick-work should be surely filled with mortar, to prevent sparks from passing through to the frame-work. All mortar for plastering should be properly mixed, and allowed sufficient time (at least one week), for the thorough slaking of the lime, and a complete permeation of its caustic properties. Thin coats of plastering are better than heavy ones. A mortar that does not crack in setting or drying is sure to be good. The interior wood finish should not be commenced until the plastering is completely dried out, and all loose mortar is removed from the building. All wood-work usually painted should be primed as soon as in position. For more explicit remarks and sundry suggestions on painting, see Design XIII.

Estimate of Materials and Cost:

110 | yards excavation, at 20c. per yard. | $22.00
1,371 | ft. stone foundation, at 15c. per ft. | 205.65
3,000 | brick, furnished and laid, at $12 per M. | 36.00
46 | ft. stone steps, sills, and coping, at 30c. per ft. | 13.80
1,030 | yards plastering, complete, at 28c. per yard. | 288.40
5,713 | ft. timber, at $15 per M. | 85.69
| 1 | sill, 4 × 8 in. 186 ft. long. |
| 6 | posts, 4 × 7 in. 21 ft. long. |
| 3 | posts, 4 × 7 in. 14 ft. long. |
| 1 | tie, 4 × 6 in. 256 ft. long. |
| 1 | plate, 4 × 6 in. 186 ft. long. |
| 2 | girts, 4 × 8 in. 25 ft. long. |
| 57 | beams, 3 × 8 in. 25 ft. long. |
| 36 | beams, 3 × 8 in. 13 ft. long. |
| 24 | beams, 3 × 8 in. 11 ft. long. |
| 3 | valleys, 3 × 8 in. 20 ft. long. |
| 24 | rafters, 3 × 5 in. 16 ft. long. |
100 | joist, 3 × 4 in. 13 ft. long, at 16c. each. | 16.00
300 | wall-strips, 2 × 4 in. 13 ft., at 11c. each. | 33.00
| Materials in water-table and cornices. | 50.00
300 | novelty siding-boards, 9½ in., at 28c. each. | 84.00
400 | shingling-lath, at 6c. each. | 24.00
69 | bunches shingles, at $1.50 per bunch. | 103.50
84 | ft. gutters, 132 ft. leaders, and 134 ft. porch roofs, 10c. per ft. | 35.00
355 | flooring, 9½ × 13, at 28c. each. | 99.40
| Porch and hood, complete. | 75.00
| Stairs, complete. | 90.00
| Bay-window, complete. | 60.00
20 | windows, complete, at $10 each. | 200.00
6 | cellar windows, complete, at $6 each. | 36.00
4 | dormer windows, complete, at $20 each. | 80.00
32 | doors, complete, at $10 each. | 320.00
1 | cellar door and hatchway doors. | 20.00
| Shelving and hooks in closets. | 20.00
2 | marble mantles and 4 shelves with trusses. | 75.00
| Range and plumbing, complete. | 215.00
| Nails. | 25.00
| Bells and speaking-tubes. | 20.00
| Painting. | 150.00
| Cartage, 1 mile. | 35.00
| Carpenter’s labor, not included above. | 250.00
| Incidentals. | 32.56
| Total cost, complete. | $2,800.00

Fig. 99.—ELEVATION OF FARM-HOUSE.

Fig. 100.—PLAN OF CELLAR.

Fig. 101.—PLAN OF FIRST FLOOR.

Fig. 102.—PLAN OF SECOND FLOOR.

DESIGN XXV.
A “HALF STONE” HOUSE FOR $2,800.

This plan is designed for a substantial, convenient, and inexpensive country house. It has two full finished stories, with well-lighted apartments of good size, and a large cellar and attic. It has also the merit of architectural beauty, well adapted to a commanding location.... Exterior, (fig. 103.)—The “half-stone” composition of the side walls, and the strong outlines and slating of the main roof, give to this structure a rustic, yet substantial appearance, affording both diversity and picturesqueness, as shown in the variety of the openings and irregularity of the several parts. The front and rear elevations are similar; by changing the entrance doors and stairs, either side may front the road. The details of exterior finish are so simple, and easy of execution, that any “modification for the rear” is undesirable. Inharmonious and unsightly curtailments in the rear finish have a depressing influence on those obliged to face them daily, which can never be overcome by knowing there is a good front.... Cellar, (fig. 104.)—Hight, 6½ feet, of which 4½ feet is below the ground surface, and therefore (with its thick walls), frost proof. It is always important to provide for carrying off the poisonous vapors apt to be generated in cellars. For this purpose side openings are made near the ceiling into one of the flues of each chimney. These flues, extending to the top, and warmed by contact with the fires of the upper stories, have sufficient draft to constantly change the cellar air, and prevent its ascent through the living-rooms.... First Story, (fig. 105.)—Hight of ceilings, 10 feet. Here are conveniently placed three large rooms, a hall, china closet, and large pantry. Each large room has commodious windows with views in two directions. The pleasant piazzas at both the front and rear of the parlor, extend over and protect the entrance doors.... Second Story, (fig. 106.)—Hight of ceilings, 8 feet. The divisions are very simple, a hall, four chambers, four closets, and a bath-room. Light railings may be put on the roofs of the wings and piazzas to form pleasant balconies to the windows of this story. One such balcony is shown over the wing-roof (fig. 103); the others may be similar. The small cost of these devices is fully repaid in their usefulness for airing purposes, besides imparting a cheerful appearance.... Garret or Attic.—This story is thoroughly floored, but otherwise unfinished. Should additional chambers be required, partitions may be set over those or the second story, duplicating that plan, with rooms having the same hight of ceilings. The stairs are placed immediately above those of the lower stories, are ceiled in, and have a door at the foot.... Construction.—The durability, general abundance, and substantial appearance of stone, make it the most desirable and appropriate material known for the exterior walls of any building. The cost of cutting and dressing such material ready for use is the principle barrier to its general adoption. By using bricks for corners and for the finish around the openings, the most expensive item of stone-work is saved. They need only to be “random dressed,” and laid nearly in the shape in which they are quarried, as more particularly described for Design XXVII. When such walls are carried beyond the hight that is convenient for the handling of the materials, the expense of their construction is largely increased. It is for this reason that the “half-stone” method is particularly valuable. In this plan, the stone-work extends only to the hight of the ceiling of the first story; to this hight the materials may be readily wheeled on trestled scaffolding, while to double this hight would require the use of the tedious derrick, and additional help. The upper stories are framed of the usual sized timber, and raised on the stone walls, which in this case become their foundation. The main roof is constructed as shown in Design XXII. The hight requiring siding is 4½ feet, or including water-table and cornice, 6½ feet from the stone-work of the first story to the slating of the roof. The main roof covering is of dark slate laid on tarred felt. At or near the floor-line dividing the upper stories, it is appropriate to indicate the division by the use of tinted slate, which may be laid in close courses or in simple figures, as shown on the elevation. The roofs of the hooded and dormer windows are also slated. The deck of the main roof, and the roofs of the piazza, are covered with IC. charcoal tin. The wood-finish is made of simple design, devoid of all efforts at pretentious display, each part being chosen with especial regard for its utility and appropriateness. The trusses, piazza-columns, and soffits are worked of timber neatly stop-chamfered, imparting a rustic appearance to them, in keeping with the stone-work. The water-tank is placed in the attic, directly above and in line with the bath-tub and kitchen-range, favoring the most practical plumbing. The soil-pipe leading from the bath-room floor passes down through the closet adjoining the kitchen chimney to the sewer-pipe, which is laid below the cellar bottom. The bad smells and gases arising from confined sewage may be easily disposed of by the insertion of a 2-inch pipe into the closet-trap (at its highest point), and connecting it with a flue of the adjoining chimney. All inside plastering is of three-coat work. The casing of the bath-room and around all plumbing is in hard-wood; all other trimming of clear pine. The Newel rail and baluster on the first-story flight of stairs are of black-walnut. All work usually painted has two coats of best lead and linseed-oil, with stainers to give the body (outside), a light gray, and trimmings in imitation of “Nova Scotia stone.” Inside, parlor and hall, in grays, dining-room in grays and drabs, kitchen in drabs, chambers white.... Cost.—Prices of building materials are quite as low as they were before the war; many kinds are really selling for the cost of their production or manufacture. Labor is also very cheap, nearly at old figures. Those contemplating building, and having the means at hand to do so, need not wait for a more favorable time. As soon as general business improves, there must be a “rise” in materials, especially such as require to be manufactured. The estimate appended includes the cost of all materials and labor for good work at the prices now ruling near New York city.—Estimate of the Cost:

126 | yards excavation, at 20c. per yard. | $25.20
158 | perches stone-work, at $2.75 per perch. | 434.50
91 | ft. stone sills and steps, at 30c. per ft. | 27.90
7,000 | bricks in angles and chimneys, at $12 per M, laid. | 84.00
750 | yards plastering, at 28c. per yard. | 210.00
4,262 | ft. of timber, at $15 per M. | 63.93
| 2 | girders, 4 × 8 in. 18 ft. long. |
| 3 | girders, 4 × 8 in. 10 ft. long. |
| 16 | beams, 3 × 8 in. 16 ft. long. |
| 32 | beams, 3 × 8 in. 18 ft. long. |
| 12 | beams, 3 × 8 in. 22 ft. long. |
| 1 | sill, 3 × 8 in. 175 ft. long. |
| 1 | plate, 4 × 6 in. 175 ft. long. |
| 1 | deck, 3 × 7 in. 150 ft. long. |
| 5 | beams, 3 × 8 in. 9 ft. long. |
| 4 | beams, 3 × 5 in. 20 ft. long. |
| 16 | beams, 3 × 8 in. 24 ft. long. |
340 | wall strips, at 11c. each. | 37.40
100 | furring strips, at 6c. each. | 6.00
| Cornice materials. | 40.00
75 | siding-boards, at 26c. each. | 19.50
357 | hemlock boards, at 16c. each. | 57.12
18 | squares of slate, complete, at $9 per square. | 162.00
14½ | squares of tin, complete, at $7 per square. | 101.50
350 | flooring plank, 8 inch, at 25c. each. | 87.50
2 | piazzas, complete, at $70 each. | 140.00
7 | cellar windows, complete, at $5 each. | 35.00
14 | plain windows, complete, at $8 each. | 112.00
11 | hooded windows, complete, at $15 each. | 165.00
8 | dormer windows, complete, at $8 each. | 64.00
| Stairs, complete. | 80.00
23 | doors, complete, at $9 each. | 207.00
3 | mantles, complete, at $25 each. | 75.00
| Closet finish, complete. | 20.00
| Range and plumbing. | 175.00
| Nails, $25; painting, $70; cartage, $20. | 115.00
| Carpenter’s labor, not included above. | 150.00
| Incidentals, attic and elsewhere. | 106.05
| Total cost, complete. | $2,800.00

Fig. 103.—FRONT VIEW OF HOUSE.

Fig. 104.—PLAN OF CELLAR.

Fig. 105.—PLAN OF FIRST FLOOR.

Fig. 106.—PLAN OF SECOND FLOOR.

DESIGN XXVI.
A FARM-HOUSE COSTING $2,900.

This plan of a farm-house embraces a commodious and convenient interior, with such external features as to clearly express its purpose. It will be recognized as at once adapted to rural situations and domestic life, providing much valuable space, and affording a variety of pleasing and symmetrical outlines, with due economy in expense of construction. Perhaps the most striking feature is the breadth of the front, which is 51 feet. (The average depth is 22 feet 7 inches.) As far as practicable, all prolonged vertical lines are avoided, leaving horizontal ones to prevail, as of more practical utility and value. Where opportunities abound for “spreading out,” as in the country, it would be obviously incompatible to build tall, or stilted houses, that would not comport with their surroundings, nor provide the conveniences desirable in all rural habitations.... Elevation, (fig. 107.)—The general details of the elevation are made up of simple parts so appropriated and balanced, that they harmonize with each other, and secure a graceful outline. The principal, or main portions of this building will be observed to be the central one, while the wings at either side are collaterals, that give equipoise and rest to the whole structure. The steep roofs, with their subdued pediments, and spreading cornices and dormers, the bay and other windows, the wide entrance, and open piazza, are all arranged so as to correspond with each other, producing an effective and picturesque appearance. There are no efforts at scientific or elaborate display of outside ornamentation, but has sufficient architectural completeness to denote social cultivation and refinement. The farm-house in XXI. was designed more especially for an eastern frontage. These plans are particularly adapted for a southern frontage.... The Cellar, (fig. 108), extends under the whole house, and is 6½ feet deep. An outside entrance and area are to be built and inclosed under the stoop at the rear. Eleven small windows are provided for both light and ventilation.... The First Story, (fig. 109), has ample apartments adapted to the uses of a large family, embracing a good-sized hall, parlor, living-room, kitchen, pantries, closets, and corridor. The principal entrance is from the piazza, through large double doors to the hall. Similar double doors on each side of the hall lead to the parlor and dining-room. These inside double doors enable one to throw the whole together for large family and other gatherings, and are manifestly appropriate in dwellings of this character. The principal stairs are semi-circular, so arranged as to occupy but little room in the principal hall. The Parlor is situated by itself, remote from the machinery of daily housework. The Living-room is the most central, and most convenient and comfortable room in the house. It is so surrounded by other apartments that summer’s heat, nor winter’s cold, can have direct access to its sides. The large Bay-window affords an ample supply of light, and adds to the area of the room. It adjoins and opens into the principal hall, corridor, kitchen, and large pantry. The Kitchen is conveniently situated, and adjoins the dining-room, corridor, pantry, store-room, cellar, and private stairway. It is provided with a range, sink, wash-tubs, and pipes for cold and hot water. By this arrangement, the principal work of the family can be done with such thoroughness and facility as to make such employment interesting and pleasant, devoid of any sense of drudgery. The corridor is adapted to all the uses of a rear hall, and communicates with each of the other principal rooms of the first story. It is also an auxiliary apartment, and may be used in connection with either of the other apartments, and affords valuable room for many in-door occupations for both old and young.... Second Story, (fig. 110.)—The engraving is sufficiently plain to require but little explanation. It will be seen that there are seven rooms, besides halls and closets. The Bath-room is situated in this story over the kitchen, and contains the bath-tub, seat-closet, and water-tank, and is accessible from the principal building through the passage leading from the principal hall. An opening through the ceiling of the kitchen, with a register, would probably let warm air enough up into the bath-room to keep frost out in winter, especially if some fire remained in the range or stove most of the night. In all arrangements of water-tanks and pipes, care must be taken to keep them from being frozen in the coldest nights.... The Attic is completely floored over, but is otherwise unfinished. Several bed-rooms might be finished in this story if desirable. An open attic is always valuable for storage, drying clothes in stormy weather, etc., and as a play-room for children in rainy weather.... Construction.—Any one at all familiar with building would see at a glance that the form and arrangements of this plan admit of its execution in section. There are conditions that would justify the building of the central part of this house, to be used as the residence of a small family, and add the wings at any future time, as circumstances might indicate.... The excavations for the cellar are made 3½ feet deep. The foundations are 18 inches thick, and 6½ feet high, of broken stone, laid in mortar, with the joints neatly pointed on all surfaces exposed to sight. The earth thrown out of the cellar should be left on the ground, and graded around the foundation, leaving but two feet to show above the final grade. The chimneys should be started with the principal foundation, and the materials interlaced to insure solidity. Three fire-places are constructed in the first story; those in the kitchen and dining-room are in one stack built “square up” to the ceiling of the first story. Two separate flues are then continued through the second story, on either side of the passage-way, and are afterwards joined over an arch, and pass through the roof in one solid shaft. The estimate indicates the general character of the work. In these rural dwellings, the siding may be worked without the central groove shown in Design XI. This, though less pleasing to many, would give an expression of less artifice, and more strength.... Estimate.—The following estimate will be found correct as to quantity, and ample as to cost. Most farmers have materials and facilities that would enable them to greatly reduce the cost of building by this plan. The items of excavation, foundation, carting, and painting, amount to nearly $500. Some, or each of these parts, might be satisfactorily done by those engaged on the place:

210 | yards excavation, at 20c. per yard. | $42.00
1,750 | ft. stone foundation, at 15c. per ft. | 262.50
4,000 | brick, furnished and laid, at $12 per M. | 48.00
50 | ft. stone steps and coping, at 30c. per ft. | 15.00
850 | yards lath and plastering, at 28c. per yard. | 238.00
4,722 | ft. timber, at $15 per M. | 70.83
| 2 | sills, 4 × 8 in. 26 ft. long. |
| 2 | sills, 4 × 8 in. 22 ft. long. |
| 4 | sills, 4 × 8 in. 15 ft. long. |
| 2 | sills, 4 × 8 in. 20 ft. long. |
| 5 | ties, 4 × 6 in. 26 ft. long. |
| 5 | ties, 4 × 6 in. 22 ft. long. |
| 4 | ties, 4 × 6 in. 15 ft. long. |
| 2 | ties, 4 × 6 in. 20 ft. long. |
| 4 | posts, 4 × 7 in. 22 ft. long. |
| 8 | posts, 4 × 6 in. 13 ft. long. |
| 2 | plates, 4 × 6 in. 26 ft. long. |
| 4 | plates, 4 × 6 in. 15 ft. long. |
| 1 | girt, 4 × 10 in. 26 ft. long. |
| 4 | valleys, 3 × 8 in. 14 ft. long. |
| 42 | beams, 3 × 8 in. 22 ft. long. |
| 36 | beams, 3 × 8 in. 15 ft. long. |
100 | joist, 3 × 4 in. 13 ft. long, at 22c. each. | 22.00
320 | wall-strips, at 11c. each. | 35.20
150 | lbs. tarred paper, at 5c. per lb. | 7.50
325 | novelty siding-boards, at 28c. each. | 91.00
| Materials in cornices and outside casings. | 50.00
375 | spruce shingling lath, at 6c. each. | 22.50
65 | bunches shingles, at $1.50 per bunch. | 97.50
200 | ft. gutters and leaders, at 10c. per ft. | 20.00
| Piazza and stoops, complete. | 120.00
324 | mill-worked flooring boards, at 35c. each. | 113.40
4 | flights of stairs, complete. | 90.00
1 | bay-window, complete. | 50.00
22 | plain windows, complete, at $12 each. | 264.00
4 | dormer windows, complete, at $20 each. | 80.00
11 | cellar windows, complete, at $6 each. | 66.00
35 | doors, complete, at $10 each. | 350.00
2 | mantles, complete, at $20 each. | 40.00
| Closets, shelving, etc., complete. | 20.00
| Range and plumbing, complete. | 248.50
| Painting, $150; nails, $20; cartage, $30. | 200.00
| Carpenter’s labor, not included above. | 218.00
| Incidentals. | 18.07
| Total cost, complete. | $2,900.00

Fig. 107.—ELEVATION OF FARM-HOUSE.

Fig. 108.—PLAN OF CELLAR.

Fig. 109.—PLAN OF FIRST FLOOR.

Fig. 110.—PLAN OF SECOND FLOOR.

DESIGN XXVII.
A STONE-HOUSE COSTING $2,900.

These plans were designed for the substantial dwelling of a farmer in easy circumstances. The outside appearance truthfully expresses its rural and its domestic purpose. The interior accommodations are carefully arranged for comfort and convenience. The materials and method of construction insure permanency; with little care, this building would last for many generations.... Exterior, (fig. 111.)—The elevation shows that this house was intended for the country—it looks like a farm-house—in fact it would be out of place anywhere else. Its peculiar solid, independent, and home-like character is due to the massive stone walls, large door and window openings, broad and steep slated roof, truncated gables, substantial chimneys, and heavy sheltering eaves, all arranged in simple, expressive, and harmonious combination. All superfluous ornamentation is avoided, as inconsistent with rural simplicity and truthfulness. Vines and creepers will be suggested by the rough stone walls and piazza posts; and to their delicate tracery may be left the work of “filling in” their more appropriate and agreeable decorations.... The Cellar (fig. 112), is 6½ feet high, extending under the whole building, giving ample space for the storing of articles requiring a cool, moist air for their preservation. Seven windows are arranged to provide light and ventilation to every part. The outside entrance is from the rear under the back stoop; stairs lead directly up to the kitchen. The “safe” is a “locker,” or private cellar for keeping choicer stores.... First Story, (fig. 113.)—Hight of ceilings, 10 feet. The arrangements are somewhat peculiar, and are very convenient and pleasant. Each of the four principal rooms have windows giving views in two different directions. The two halls (front and rear) have stairs in each, and are otherwise arranged for easy communication with all parts of the house. The Parlor is pleasantly situated, adjoins the front hall and dining-room, has a large open fire-place, and is shaded on the front by the piazza. The Dining or living-room is the largest apartment, and communicates directly with every other room and hall on this floor, bringing this entire story under the immediate supervision of the mistress of the household. It has an open fire-place and two closets. The Bedroom is placed in a quiet corner, where the little ones may take their “day naps” without being run over or disturbed by sudden callers, or those engaged in housework. The Kitchen is a good-sized apartment, adjoins the dining-room, rear hall, milk-room, large pantry, two closets, and cellar stairway, and is provided with a large range, sink, wash-tubs, and the necessary pipes for supplies of cold and hot water.... Second Story, (fig. 114.)—Hight of ceiling, 8 feet. This contains five good-sized chambers, a large hall, and nine closets. The three larger chambers have full-sized side-walls and ceilings; the space beyond the side-walls or partitions are devoted to closets, of which there cannot be too many in any house.... Construction.—Unless situated on very high ground, having a thorough natural drainage, the earth taken from the cellar excavations should be left on the grounds and graded around the foundation, to insure the turning away of all surface water. In such cases, care must be taken to allow in the depth of the excavation for the hight it is intended to raise the earth grades. The appended estimate of cost is for excavating 3 feet deep. This will furnish 202 cubic yards of earth to raise the grades 1½ foot immediately around the house (leaving 2 feet of the foundation exposed to sight), and give a gentle slope outwards in every direction to the distance of 40 feet. All the outside walls are solid masonry. The foundations are of the roughest stone, laid in good mortar, 2 feet thick. A “top floating” of hydraulic cement mortar is used in levelling the upper surfaces, to prevent the ground moisture from rising above that line to be absorbed by the main walls. The main walls are of rough stone and hard burned bricks laid in strong mortar, 16 inches thick. The outside corners, and the jambs and heads of the doors and windows, are of brick, as shown in fig. 115. Their use greatly facilitates the work of construction, and obviates the necessity of stone-dressing. The intervening walls are of broken stone “random dressed,” laid in courses to conform to the quoin lines of the brick-work, and may be done by common masons. The window and door sills are of ordinary hammered blue-stone. All outside interstices and joints are filled and pointed with cement mortar. Thin strips of wood (mason’s lath will do) are laid in between the courses on the inside, to which the inside furring is fastened. The chimneys are built of hard brick, and are finished above the roof with large tops, having cross openings at the sides for each flue, and close covers.—The Frame-work is very simple; the central girders are supported by large posts on solid stone footing. The beams are notched over the girders, with their ends resting and anchored in the walls, and are thoroughly bridged. The plates are anchored by bolts that are inlaid while building the walls. The rafters are notched over the plates with their lower ends extending 2½ feet beyond the walls; their centers are supported by purlins and collars. The roof is covered with dark slate. The flooring is of mill-worked 1½-inch plank. The interior of the stone walls is furred off, with unobstructed spaces between the furring to the roof, for the passing off of all dampness. The interior finish is complete throughout. The principal rooms have neatly-moulded architraves, other rooms plain. The kitchen and rear hall are wainscoted. All doors are panelled and moulded, and all windows have inside blinds.—The plastering is three-coat work, with the principal rooms hard-finished, balance white-slipped. The painting, outside, is two coats with the best materials; inside is oil-stained and flat-varnished.—Estimate:

202 | yards excavation, 3 ft. deep, at 20c. per yard. | $40.40
224 | perches stone-work, complete, at $2.75 per perch. | 616.00
150 | running ft. blue-stone sills at 30c. per ft. | 45.00
6,500 | bricks in quoins and chimneys, complete, at $12 per M. | 78.00
1,000 | yards plastering, complete, at 28c. per yard. | 280.00
5,208 | ft. of timber, at $15 per M. | 78.12
| 1 | girder, 4 × 8 in. 62 ft. long. |
| 1 | girder, 4 × 6 in. 38 ft. long. |
| 2 | purlins, 4 × 8 in. 38 ft. long. |
| 2 | purlins, 4 × 8 in. 18 ft. long. |
| 45 | rafters, 3 × 4 in. 21 ft. long. |
| 8 | rafters, 3 × 4 in. 17 ft. long. |
| 38 | beams, 3 × 8 in. 15 ft. long. |
| 35 | beams, 3 × 8 in. 21 ft. long. |
| 12 | beams, 3 × 8 in. 10 ft. long. |
| 40 | collars, 1¼ × 5 in. 13 ft. long. |
| 1 | valley, 3 × 8 in. 80 ft. long. |
| 1 | plate, 3 × 8 in. 200 ft. long. |
250 | wall-strips, at 11c. each. | 27.50
300 | furring strips, at 4c. each. | 12.00
| Anchors to beams and plates. | 5.00
| Cornice materials. | 30.00
420 | shingling-lath, at 6c. each. | 25.20
26½ | squares of slating, complete, at $9 per square. | 238.50
25 | hemlock boards, piazza roof, at 16c. each. | 4.00
2½ | squares tin, roofing and leaders, at $8 per square. | 20.00
296 | flooring, 8 in., at 25c. each. | 74.00
| Stairs, complete, $90; piazza and stoop, $80. | 170.00
7 | cellar windows, complete, at $5. | 35.00
22 | plain windows, complete, at $10 each. | 220.00
4 | dormer windows, complete, at $18 each. | 72.00
34 | doors, complete, at $9 each. | 306.00
2 | mantles, 3 shelves, complete. | 68.00
| Closet finish, complete. | 39.28
| Range and plumbing, complete. | 175.00
| Nails, $16; painting, $60: cartage, $15. | 91.00
| Carpenter’s labor, not included above. | 150.00
| Total cost, complete. | $2,900.00

Fig. 111.—FRONT ELEVATION.

Fig. 112.—PLAN OF CELLAR.

Fig. 113.—PLAN OF FIRST FLOOR.

Fig. 114.—PLAN OF SECOND FLOOR.

Fig. 115.—MANNER OF BUILDING CORNERS.

DESIGN XXVIII.
A HOUSE COSTING $3,000.

These plans were designed for a suburban cottage, having a cheerful outside appearance, and containing ample interior apartments conveniently arranged, with such modern improvements as are desirable for the use of an ordinary sized family.... Exterior, (fig. 116.)—The general outlines are made up of simple parts, embracing features of pleasing variety and elegance. The foundation walls, showing four feet above ground, insure against moisture from the earth, and add to the superficial dimensions of the structure. Such high foundations for houses of this character afford a proper background for the grasses and shrubbery usually surrounding them. The irregularities of the principal building, the steep, dark-slated roofs, with their heavy projecting cornices, truncated or hooded gables, and enriched barge-boards, together with the stoops and bay-windows, are proportioned and arranged to assimilate with each other, and contribute to gracefulness and harmony.... Cellar, (fig. 117.)—Hight, 7 feet. Seven good-sized windows admit an abundance of light, and afford thorough ventilation.... First Story, (fig. 118.)—Hight of ceiling, 10½ feet. The rooms are unusually large, and arranged to be pleasant, comfortable, and convenient. The front entrance has large double doors. This hall contains the principal stairs, which are of “platform” construction. We prefer this form whenever the general plan allows it, as such stairs are much easier, less dangerous, and appear better than the usual long, straight flights. The hall connects with each principal room, obviating the too frequent necessity of passing through one room to reach another. The Parlor has a fire-place, adapted to either a grate or fire-place heater (we should prefer the latter in this case, supplied with heating-pipes for warming the chamber above,) and is provided with a marble mantle. A large bay-window admits sufficient light, and affords a pleasant outlook. The remaining sides of this room are unbroken, leaving ample space for furniture, pictures, etc. The Dining, or living-room, is intended as the most agreeable and pleasant room in the house; it has a fire-place with hearth openings, adapted to a “low-down” grate, which is a good substitute for the old home-like fire-place, and affords an opportunity for a generous and cheerful fire, and insures the most perfect ventilation. The ashes from these hearth fires fall into the ash-pit below them, thus obviating the necessity and dust of their daily removal. A marble mantle with a large hearth, one bay and three plain windows, and a closet, are provided for this room. The windows afford plentiful light, and views from front, side, and rear, thus assuring a home-like, cheerful apartment. The Kitchen is pleasantly situated, has four windows for light and ventilation, and is planned with especial regard for convenience. It is in proximity with the principal hall, rear entry, and cellar stairway, has a large pantry, and two closets, and contains a large fire-place, with a range, boiler, sink, and wash-tubs having pipe attachments for hot and cold water. The dimensions of the fire-place are 2 feet 10 inches wide, 5 feet 6½ inches high, and 1 foot 9 inches deep, with a hearth-stone 2 feet wide, and 4 feet long. The range is fitted into the fire-place, and has a water-back, elevated oven, and warm-closet, and is connected by pipes with the boiler. The dumb-waiter, shown on the plan at the right of the fire-place, is intended as a “coal-lift,” which will save many steps and much hard labor running for coal. This is simply a box, holding three bushels (twelve scuttles), constructed of 1¼-inch floor planks, with wood runners 3 feet long, on two opposite sides, conforming to grooves made in stationary planking in the cellar, and is suspended by weights, with strong ropes, passing over pulleys fastened to the underside of the floor-beams. The upper portions of this closet may be fitted with shelving and hooks, as desired. The large Kitchen Pantry, thoroughly shelved, is in the “addition” that adjoins the kitchen, and is built in combination with the rear stoop. The entry, conveniently situated, communicates between the kitchen and dining-room, and with the back stoop through the rear door.... Second Story, (fig. 119.)—Hight of ceiling, 9 feet. This story is divided in the simplest manner, has a hall, three large chambers, with closets for each, and a bath-room, all with sufficient windows for light and ventilation. Each principal chamber has an open fire-place, adapted to grates. Chimneys, centrally situated, radiate most of their heat into the rooms, thus saving fuel. The Bath-room has a French bath-tub, with cold and hot water, and a seat-closet. The stairway to the attic story is ceiled in over the principal stairs, with a door at the foot. The Attic has three apartments, two intended to be plastered and finished as chambers; the third, or larger one, is unfinished for an open garret.... General Construction.—The excavations are 2½ feet deep, and the loose earth is graded around the building at completion, leaving 4 feet of the foundation exposed to sight. The foundation-walls are built as described for Design XXXII. The sub-sills of the windows, and the steps and coping of the area, are of blue-stone. The chimneys being near the center, are not connected with the foundation walls. The rear one is constructed in box form, below the first floor, as a receptacle for ashes, and has a small iron door near the bottom for removing the ashes. The principal frame-work is of sound pine or spruce timber, of the sizes mentioned in the estimate below. When practicable, we would use pine timber for all sills and posts, as the least liable to decay, and spruce for the girts and beams, on account of its quality for stiffness. The siding is of two thicknesses of boarding, as described for Design XXXII. The principal roof is constructed at the angles of 45°, securing valuable space for attic rooms, and is covered with dark slate laid on hemlock, with tarred paper between. The roofs of the stoops and bay-windows, and all gutters and valleys, are of IC. charcoal tin, laid on hemlock boards. The method of constructing the cornice, gutters, and barge boards of the principal roof, is shown in detail in fig. 120. A, rafter of 3 × 4; B, plate of 4 × 6, placed 14 inches above the attic floor; C, post of 4 × 7 timber; D, gutter, having no abrupt angles to bother the tinsmith, or impair his work, but is of circular form, and stayed with 2-inch furring lath, on which the tin is smoothly and easily laid. E, bracket constructed of 2 × 4, with simple scroll, sawed from 4 × 6 timber. F, crown moulding of 1¼ × 3¼, worked solid; G, barge-board with the crown-moulding attached; this closes the ends of the gutters to the hight of the dotted line at D. The stairs, interior trimmings, and the general painting, are intended to be similar to those described for Design XVII. In the estimate appended will be found a full schedule of the materials required to construct, and fully develope a house by these plans. The quantities given may be relied on as correct, and their cost is compiled from the prices now ruling in this vicinity.—Estimate:

69 | yards excavation, at 20c. per yard. | $13.80
18,500 | brick, furnished and laid, at $12 per M. | 222.00
53 | ft. stone steps, and coping, at 30c. per ft. | 15.90
841 | yards plastering, complete, at 28c. per yard. | 235.48
250 | yards stucco cornices, at 25c. per yard. | 62.50
4,903 | ft. timber, at $15 per M. | 73.54
| 2 | sills, 4 × 8 in. 30 ft. long. |
| 2 | sills, 4 × 8 in. 22 ft. long. |
| 3 | sills, 4 × 8 in. 18 ft. long. |
| 8 | posts, 4 × 7 in. 22 ft. long. |
| | Ties, 4 × 6 in. 302 ft. long. |
| | Plate, 4 × 6 in. 151 ft. long. |
| 75 | beams, 3 × 8 in. 18 ft. long. |
| 54 | rafters, 3 × 4 in. 13 ft. long. |
500 | wall-strips, 2 × 4 in. 13 ft. at 11c. each. | 55.00
320 | sheathing, 9½ in., at 25c. each. | 80.00
170 | lbs. tarred paper, at 3c. per lb. | 5.10
320 | siding-boards, 9½-inch, at 28c. each. | 89.60
| Materials in outside dressing and cornices. | 80.00
161 | hemlock boards, principal roof, 10 in., at 16c. each. | 25.76
14½ | squares of slate, at $9 per square. | 130.50
306 | flooring, 9½ in., at 28c. each. | 85.68
2 | stoops, complete, at $50 each. | 100.00
2 | bay-windows, complete. | 120.00
| Stairs, complete. | 75.00
21 | plain windows, complete, at $12 each. | 252.00
7 | cellar windows, complete, at $6 each. | 42.00
22 | doors, with base and trimming, complete, at $10 each. | 220.00
2 | marble mantles and 3 shelves, complete. | 68.00
1 | range, with elevated oven and warm closet, complete. | 80.00
| Plumbing and gas pipes, complete. | 175.00
| Coal-lift and shelving, complete. | 25.00
2 | rooms in attic, finished, complete. | 60.00
| Nails, $20; bells and speaking-tubes, complete, $15. | 35.00
| Painting, $240; cartage, $40. | 280.00
| Carpenter’s labor, not included above. | 250.00
| Extra for incidentals. | 43.14
| Total cost, complete. | $3,000.00

Should it be desirable to reduce the cost of building by this plan, it may be done without changing the principal outlines or arrangements, by the following deductions and omissions, viz.:

| Saving.
Foundations reduced in hight from 7 ft. to 6½ ft. | $20.00
5 cellar windows, instead of 7. | 12.00
Inclosing with single thickness siding. | 80.00
Roof of shingles, instead of slate. | 60.00
4 plain windows, instead of the 2 bays. | 72.00
Deduct 1 window in each: dining-room, kitchen, bath-room. | 36.00
Reduce the cost of windows and doors, each $1.50. | 64.50
An ordinary range, instead of one with an elevated oven. | 40.00
Omit the finish in attic. | 60.00
Omit plumbing and gas-pipes. | 175.00
Omit coal-lift, bells, and tubes. | 30.00
Total reductions. | 649.50
Making the cost | $2,350.50

Fig. 116.—ELEVATION OF HOUSE.

Fig. 117.—PLAN OF CELLAR.

Fig. 118.—PLAN OF FIRST FLOOR.

Fig. 119.—PLAN OF SECOND FLOOR.

Fig. 120.—CORNICE, GUTTER, AND BARGE-BOARDS.

DESIGN XXIX.
A HOUSE COSTING $3,100.

These plans were designed for a summer residence near Toms River, N. J. They are especially adapted to situations where the more pleasant views are to the rear, making it desirable to have the principal rooms on that side of the house.... Exterior, (fig. 121.)—The Swiss-like style is due to its bold roofs, wide projections, and rustic details of finish, there being no attempt at architectural display.... First Story, (fig. 122.)—The Hall, which is unusually large, is entered from the front porch through double doors, contains the main stairs, and communicates with the library, parlor, dining-room, and a passage leading to the kitchen. A Closet is finished under the stairs opening from the passage. The Library is nearly square, with openings in the center of each of its four sides, and is divided from the parlor by large folding-doors. The Parlor is of good dimensions, has large windows opening to the floor, and leading to the piazza. The Piazza is 12 feet wide, affording shade and ample protection from storms, and may be used in pleasant weather to enlarge the capacity of the parlor. The Dining-room is entered from the main hall, and communicates through the pantry with the kitchen. The Kitchen has windows front and rear, giving a good circulation of air, and is furnished with a range, boiler, sink, and pump, connected with the necessary piping, with supply from the cistern. Private stairways lead to the second story, and to the cellar; the necessary pantries are provided. The one-story Addition is divided into three parts, making a work-room or shed, inclosing the well, a servant’s bed-room, and a store-pantry.... Second Story, (fig. 123.)—This story contains a hall, five good-sized chambers, seven closets, and a bath-room. The hall has nine doors leading to the several apartments, two stair landings, and a window, while it occupies but little space. The Bath-room has a bath-tub, seat-closet, and pipes for cold and hot water.... Attic, (fig. 124.)—A hall and two chambers are finished in this story. The stairs leading to it are inclosed, and have a door at the foot. The hall is lighted by a dormer window in one end. At the opposite end a door leads to the space under the wing-roof, where the tank is placed, immediately above the bath-room.... Construction.—The hight of the cellar is 6½ feet, of the first story 10½ feet, of the second story 8 feet, of the attic 7 feet. The foundations are of brick-work, and show two feet above the final grades. The chimneys are of brick-work, and have six open fire-places, with hearths to each, adapted to the use of either wood or coal fuel. The plastering is “hard-finish” on two coats of brown mortar. Stucco cornices and centers, of simple design, are put in the first story of the main house. Marble shelves with stucco truss-supports are put above each fire-place. A well and cistern are included in the estimate. The depth of the former is put at 30 feet, as the average. To avoid the danger of the caving in of the sides while digging, it is best to make the excavation 4½ ft. square (not circular, as is usually really done.) Rough planks, 4½ feet long, with their ends notched half way across, are slid in to lock with each other closely against the banks, as the excavation proceeds, making this part of the work perfectly safe in any kind of earth. The depth of the well should be sufficient to secure at least four feet of spring water. Of course it would be impracticable to lay the brick-work under water that depth, and therefore a circular curb 3 feet 3 inches in diameter, and 6 feet long (inside measure) must be made of ordinary boards, with an interior 4-inch timber rim at the bottom, and let down into the well as soon as water is reached. The rim forms the foundation of the brick-work. After laying a few courses around, say to the hight of one or two feet, their added weight will force them (curb and all) downwards under the water as fast as the depth is increased. The clear inside diameter, when finished, is 2 feet 10 inches; the top courses of brick, to the depth of 3 feet, should be laid in cement mortar; all others laid “dry.” The Cistern is constructed entirely of brick and cement mortar, in the earth; 7 feet across, and 8 feet deep in the clear. The frame of the house is of spruce timber, siding of clear pine, beveled clapboards, laid on sheathing-felt. Roofing of cedar shingles, laid “three thick” on spruce lath. The cornices have projections of two inches for each foot of their hight from the ground, which is appropriate for buildings of this character, and is double that of the usual styles. These projections are ceiled underneath with tongued and grooved boards, and bracketed with chamfered timber trusses. Openings are made through the gable cornices to allow for the escape of heated air from under the roof. The flooring is of 9-inch tongued and grooved spruce plank. All windows above the cellar have 1½-inch sash, and outside blinds. Doors are panelled and moulded. The inside trimmings are quite plain, single moulded, with bold members. The upper frame-work of the piazza is left exposed on the underside, and is neatly dressed and chamfered. The first-story stairs are strongly constructed of pine, with newel, rail, and balusters of black walnut.

Estimate of materials and labor:

93 | yards excavation, at 20c. per yard. | $18.60
30 | ft. digging well, at $1 per ft. | 30.00
19,000 | bricks (cellar foundation, chimneys, cistern, and well,) furnished and laid, at $12 per M. | 228.00
4 | barrels cement, at $2.50 per barrel. | 10.00
1,200 | yards plastering, at 28c. per yard. | 336.00
5,974 | ft. of timber, at $15 per M. | 89.61
| 1 | girt, 4 × 8 in. 32 ft. long. |
| 8 | posts, 4 × 7 in. 20 ft. long. |
| 45 | beams, 2 × 8 in. 12 ft. long. |
| 30 | beams, 2 × 8 in. 17 ft. long. |
| 35 | beams, 2 × 8 in. 11 ft. long. |
| 1 | sill, 4 × 8 in. 313 ft. long. |
| 1 | plate, 4 × 6 in. 313 ft. long. |
| 61 | beams, 2 × 8 in. 20 ft. long. |
| 20 | beams, 2 × 8 in. 13 ft. long. |
| 2 | girts, 4 × 6 in. 30 ft. long. |
700 | wall-strips, at 11c. each. | 77.00
500 | clapboards, at 14c. each. | 70.00
350 | shingling-lath, at 6c., $21; 9,650 shingles, at 2c., $193. | 214.00
150 | ft. gutters, valleys, and leaders, at 10c. per ft. | 15.00
1,500 | ft. dressed lumber in cornices, at 4c. | 60.00
513 | flooring, at 27c., $138.51; 30 windows, at $12, $360. | 498.51
250 | lbs. felt, at 5c., $12.50; 35 doors, at $10, $350. | 362.50
5 | marble shelves, at $6, $30; stairs, $100. | 130.00
| Closet finished, $50; well-curb, $12. | 62.00
| Range and plumbing, $280; nails, $20. | 300.00
| Carting, average 1 mile, $40; painting, $230. | 270.00
| Carpenter’s labor, $250; incidentals, $78.78. | 328.78
| Total cost, complete. | $3,100.00

Fig. 121.—ELEVATION OF FRONT OF HOUSE.

Fig. 122.—PLAN OF FIRST FLOOR.

Fig. 123.—PLAN OF SECOND FLOOR.

Fig. 124.—PLAN OF ATTIC.

DESIGN XXX.
A FRAME AND BRICK FARM-HOUSE COSTING $3,300.

These designs represent a farm-house having an air of substantial comfort and refinement, and affording ample space and convenience for a large family.... Exterior, (fig. 125.)—This style admits of the simplest and most economical finish, is susceptible of almost any degree of irregularity, and is therefore suitable for the greater number of rural buildings. The indestructible covering of the side-walls and roofs has the merit and appearance of permanency.... Cellar, (fig. 126.)—The central division is 7 feet high, has five windows, and outside door, and a stairway leading up to the kitchen. The girders under the first floor beams are supported on large posts, standing on firmly-imbedded flat stones.... First Story, (fig. 127.)—Hight of the ceilings, 11 feet in main house, and 9 feet in the one-story wings at the side and rear. The parlor, sitting-rooms, kitchen, and front hall, are in the main house. The rear wing contains a summer kitchen, bath-room, and a large kitchen pantry. The side wing is divided into a bed-room, clothes-press, and pantry. The Parlor, Sitting-room, and Bed-room face the front. The Kitchen is the largest apartment, and is arranged to be used as the Living-room. It has windows in each end, an outside door leading to a pleasant veranda, is in direct communication with the front hall, sitting-room, summer kitchen, two pantries, and the cellar stairs. The Summer Kitchen, intended to relieve the larger room of the heavier work, is furnished with a range, boiler, sink, pump, and wash-tubs, and has an outside door. The Bath-room is situated at the side of the summer kitchen, and contains a bath-tub and a seat-closet. A tank 3 × 3 × 6 feet, is placed between the ceiling and roof of this wing, and arranged to receive rain-water from the main roof. A force-pump is set near the iron sink, and arranged to supply water from the cistern to the tank, when the rain supply is exhausted. It will be observed that all the plumbing apparatus is placed in close proximity, thus insuring economy in the cost of their introduction, and also that their location prevents any serious injury that might arise from a chance bursting, or through carelessness. No windows are shown at the rear of the summer kitchen, or bath-room, this space being reserved for any additions that may be desired for fuel, etc.... Second Story, (fig. 128.)—Hight of ceilings, 9 feet. There are five chambers, a hall, and two closets in this story. Each chamber is of good dimensions, well lighted (twelve windows in this story,) and may be warmed if required, either by stoves placed in them or through pipes inserted in the flues for the introduction of hot air from heaters in the first story, as described for Design XXXII.... Attic.—A flight of stairs, located above those of the first story, and inclosed with narrow ceiling, with a door at the foot, leads to the garret or attic. This story is thoroughly timbered and floored, but otherwise unfinished.... Construction.—The foundation walls are of broken stone, laid in good mortar, 18 inches thick, and show 2 feet above the final grade of the surrounding earth. The materials of the frame are indicated in the estimate below, and are framed together, and raised in the usual manner, except that the sills are placed 4 inches back from the face of the foundation, to provide a footing for the water-table and brick inclosing. The inside of the exterior frame is roughly ceiled around with hemlock boards, which are thoroughly nailed to the studding, bringing them “into line,” and making them firm. The method of inclosing the sides of the building is shown in fig. 129. A is the foundation; B the water-table; C the brick wall; D, inside boarding; E, E, E, timber of the frame. The water-table, of dressed stone, is laid on the foundation in cement mortar. The brick are laid in “stretchers,” in good lime and sand-mortar, with close joints. Anchor nails (fig. 130) are driven in each stud in contact with the upper surfaces of every fifth course of brick, as shown in the sketch. The window sills are of smoothly dressed stone, set in the regular manner. The window and door frames are made as for 8-inch brick-work. The heads are arched over with brick projecting half an inch beyond the face of the walls, forming a coping to the windows. The anchor nails are made of ordinary galvanized ⅛-inch fence-wire; 6 inches long is required for each nail, 1 inch of both ends being bent at a right angle, and one end is flattened to be easily driven into the studding, and the opposite end is imbedded in the joints of the brick-work. These nails are best applied by a carpenter employed to accompany the masons in their work. This mode of building exterior walls may be new to many persons, but it has been demonstrated and proved to be thoroughly practical, and for many reasons preferable to the usual “solid brick” wall; it is less expensive, does not retain moisture, requires no “furring off,” or “filling in,” and attachments of cornices, stoops, or balconies, are easily made to connect with the inside frame work.... The main and wing roofs are covered with dark 8 × 16-inch slate, laid 7 inches to the weather. Mason’s lath are put on the inside boarding in a vertical manner, 16 inches apart, and the interior of the two full stories is lathed, plastered, and otherwise fully completed.

Estimate of Cost:

157 | yards excavation, 4 feet deep, at 20c. per yard. | $31.40
60 | perches stone foundation, at $2.75 per yard. | 165.00
44 | ft. stone steps and cellar window-sills, at 30c. per ft. | 13.20
278 | feet dressed stone-sills and water-table, at 75c. per ft. | 208.50
31,000 | brick furnished and laid, at $12 per M. | 372.00
925 | yards plastering, at 28c. per yard. | 259.00
| Stucco cornices. | 30.00
6,707 | ft. timber, at $15 per M. | 100.60
| | Sills 4 × 8 in. 252 ft. long. |
| | Plates, 4 × 6 in. 252 ft. long. |
| | Ties, 4 × 6 in. 324 ft. long. |
| | Girders, 4 × 8 in. 46 ft. long. |
| 10 | posts, 4 × 7 in. 23 ft. long. |
| 70 | beams, 3 × 8 in. 22 ft. long. |
| 21 | beams, 3 × 8 in. 15 ft. long. |
| 8 | beams, 3 × 8 in. 13 ft. long. |
| 1 | piazza, 3 × 7 in. 122 ft. long. |
| 1 | piazza, 3 × 5 in. 70 ft. long. |
100 | joist, 3 × 4 in. 13 ft. long, at 16c. each. | 16.00
400 | wall-strips, at 11c. each. | 44.00
600 | hemlock boards, for sheathing and roofing, at 16c. each. | 96.00
| Cornice materials, $70; 21 squares slate, at $9, $189. | 259.00
436 | ft. tinning, gutters, and leaders, at 8c. per ft. | 34.88
500 | flooring, 9-inch spruce, at 26c. each. | 130.00
| Stairs, complete, $90; piazzas, $130. | 220.00
5 | cellar windows, complete, at $6 each. | 30.00
33 | windows, above cellar, complete, at $10. | 330.00
25 | doors, at $10, $250; range and plumbing, $250. | 500.00
3 | mantles, $75; closet finish, $25. | 100.00
| Painting, $113.66; cartage, $30. | 143.66
| Carpenter’s labor, not included above. | 200.00
| Incidentals. | 16.76
| Total cost, complete. | $3,300.00

Fig. 125.—ELEVATION OF HOUSE.

Fig. 126.—PLAN OF CELLAR.

Fig. 127.—PLAN OF FIRST FLOOR.

Fig. 128.—PLAN OF SECOND FLOOR.

Fig. 129.—MANNER OF BUILDING.

Fig. 130.—ANCHOR NAIL.

DESIGN XXXI.
A HOUSE COSTING $3,700.

The plans here given are somewhat peculiar in arrangement, intended for a compact and economical residence or parsonage, containing thirteen rooms, ample halls, eleven closets, large cellar, heater, range, cold and hot water, and, in fact, all the necessary modern improvements suitable for the uses of a good-sized family.... Exterior.—The general outline is nearly square, 26 × 30 feet, affording the most simple and economical form of construction, and embraces a much better opportunity for the most desirable distribution of rooms. The porch, bay-window, and lobby, provide projections that serve to break up and relieve the monotony usually observed in square buildings. Three elevations (figs. 131, 132, 133,) are given, from which choice can be made, according to the situation of the building.... Interior.—It will be observed that the arrangements of the interior partake very much of the character of a “double house,” particularly in the upper stories.... Cellar, (fig. 134.)—The Cellar extends under the whole house, and contains the heater and bins for coal, etc. The Heater (“portable”) is arranged to provide warm air to each room in the two principal stories, except the kitchen.... First Story, (fig. 135.)—The Entrance, or Reception Hall, is large, and contains the principal stairway of the house, so arranged that the quarter-circle is about midway of their hight, placing the niche down, where it adds greatly to the good appearance of the hall. The principal rooms, Parlor and Dining-room, where it is usual for the family to congregate, are large and accessible. Each has a large bay-window, adding to its area, and supplying a pleasant outlook. The Kitchen adjoins the dining-room and the rear entrance, or lobby, and has direct communication with the cellar-stairway through a door. It is provided with a range, boiler, sink, pump, and wash-tubs, complete. The Lobby, or rear entrance, is arranged to connect by doors with the dining-room, kitchen, and private stairway leading to the second floor.... Second Story, (fig. 136.)—The method of erecting the stairs make them “land” nearly in the center of the second story. Very little space is required for the second-story hall, leaving almost this entire floor to be “laid off” in rooms. These rooms may all be used as chambers, or either of them may be used as a study. Doubtless the room directly above the front entrance would be best adapted for that purpose. The door leading to this room should have ground-glass upper panels to supply light to the hall of this story.... Attic, (fig. 137.)—The Attic story is reached by the stairway shown at the front end of the second-story hall, which has a door at the foot of them to shut off all communication at pleasure. This story is divided into four rooms, four closets, and hall. The Hall is lighted through an opening, or skylight, in the roof, which also serves as a ventilator. The School, or Play-room, is put in this part of the house, where noise is less likely to disturb the older members of the household. A Work-shop, having ample space for a work-bench, wood-lathe, and other tools, is provided for in our plan on the third floor.... The estimate appended indicates the general character of the work to be good and substantial. Provision is made for brick foundations, a regular timber frame, double siding, slate and tin roofs, outside blinds, panelled doors, simple and appropriate trimmings throughout, with marble mantles and stucco cornices in the principal rooms of the first story. The figures set down for the cost of windows, bays, porch, lobby, and doors, include materials and labor. The figures for carpenters’ labor are for the balance of such work.

Estimate for house with Mansard roof:

75 | yards excavation, at 20c. per yard. | $15.00
13,000 | brick, furnished and laid, at $12 per M. | 156.00
48 | ft. stone sills, steps, and coping, at 40c. per ft. | 19.20
1,000 | yards three-coat plastering, at 28c. per yard. | 280.00
250 | ft. stucco cornices, with centers. | 75.00
4,181 | ft. of timber, at $15 per M. | 62.71
| 2 | sills, 4 × 8 in. 26 ft. long. |
| 2 | sills, 4 × 8 in. 30 ft. long. |
| 6 | posts, 4 × 7 in. 23 ft. long. |
| 1 | girt, 4 × 8 in. 38 ft. long. |
| 4 | ties, 4 × 6 in. 26 ft. long. |
| 4 | ties, 4 × 6 in. 30 ft. long. |
| 4 | hips, 3 × 7 in. 16 ft. long. |
| 2 | plates, 4 × 6 in. 26 ft. long. |
| 2 | plates, 4 × 6 in. 30 ft. long. |
| 4 | deck plates, 3 × 8 in. 22 ft. long. |
| 2 | deck plates, 3 × 8 in. 30 ft. long. |
| 8 | beams, 3 × 8 in. 15 ft. long. |
| 66 | beams, 2 × 8 in. 15 ft. long. |
| 66 | beams, 2 × 8 in. 12 ft. long. |
100 | joists, 3 × 4 in. 13 ft., at 22c. each. | 22.00
500 | wall-strips, 2 × 4 in. 13 ft., at 11c. each. | 55.00
483 | sheathing for sides and roofs, at 25c. each. | 120.75
300 | lbs. tarred felt, at 5c. per lb. | 15.00
381 | novelty siding, 6-inch, at 30c. each. | 114.30
112 | ft. main cornice, at 60c. per ft. | 67.20
10 | squares of slate, at 10c. per ft. | 100.00
12½ | squares of tin, at 10c. per ft. | 125.00
8 | cellar windows, complete, at $8 each. | 64.00
12 | plain windows, complete, at $12 each. | 144.00
8 | dormer windows, complete, at $20 each. | 160.00
2 | bay-windows, complete, at $60 each. | 120.00
1 | porch, complete. | 75.00
1 | lobby, complete. | 50.00
390 | tongued and grooved flooring, complete, at 28c. each. | 109.20
46 | doors, complete, at $10 each. | 460.00
11 | closets, complete, at $6 each. | 66.00
2 | marble mantles, complete, at $25 each. | 50.00
1 | heater, complete. | 200.00
| Gas-pipes. | 35.71
| Plumbing, including range, etc. | 300.00
| Painting. | 188.93
| Carting. | 75.00
| Extras for hardware, etc. | 75.00
| Carpenters’ labor. | 300.00
| Total amount. | $3,700.00

Fig. 131.—MANSARD ROOF.

Fig. 132.—POINTED ROOF.

Fig. 133.—COTTAGE ROOF.

Fig. 134.—PLAN OF CELLAR.

Fig. 135.—PLAN OF FIRST FLOOR.

Fig. 136.—PLAN OF SECOND FLOOR.

Fig. 137.—PLAN OF ATTIC.

DESIGN XXXII.
A HOUSE COSTING $4,000.

This plan of a large house provides ample and conveniently-arranged apartments, containing the most requisite of modern improvements, suitable to the requirements of a good-sized family. The general outline of the ground plan is nearly square—30 × 36 feet—securing the greatest economy in expense of construction, and embracing a liberal provision for comfort, and a suitable regard for appearances, without sacrificing one for the other. There is always a certain boldness in the exterior, or elevation, of a square double front, which no other style affords, expressive of substantial dignity. The two Bay-windows and Porch are united in construction, the porch having its ends partly sheltered by the projecting bay-windows, is a pleasant feature. The second story, attic, and cupola windows, have circular heads, with heavy dressing. The main Cornice is heavily trussed; the Cupola is large and roomy, and all are proportioned to make this house worthy of almost any situation.... The Cellar extends under the whole house, with walls of hard brick and mortar 8 inches thick, and 7 feet high, and should extend 1½ inches outside of the frame-work of the house, so as to be “flush” with the sheathing. The cross-walls, as shown on the plan, are of the same materials; all such walls should have “heading-courses” every 20 inches, and if in sandy bottom, a suitable bedding should be provided, as described for Design XII., which will insure a perfectly safe and satisfactory foundation. The Area walls should be made of hard brick, with stone coping and steps, laid in cement mortar. All chimneys should be started and laid up with the foundation, and the materials interlaced to bind them together; this will insure additional strength to both foundation and chimney. We recommend plastering, or “laying off” the ceiling of the cellar, with one coat of brown mortar, at a cost of $25, which would be a permanent benefit to the whole house, in preventing the damp cellar air from rising up through the floors and frame-work of the house. Such air is almost sure to be vitiated by decaying vegetable matter, and is the undoubted source of much disease. Another advantage derived from such plastering is the shutting out of rats and mice from the frame-work of the house, and lastly, it affords an opportunity of purifying and sweetening the cellar easily by (the simplest of all means) a coat of white-wash.... The materials used in the Frame are indicated in the estimate appended below. Sills should be framed for each cross and outside wall, so as to secure equal bearings, and allow for even shrinkages; and when put in position, they should be bedded in mortar, to prevent any inequalities in the bearings of the frame-work, to strengthen the foundation, and also to effectually shut out cold air from getting between the cellar ceiling and the first floor. All beams and studding are placed 16 inches from centers. The first tier of beams should be framed into the sills, and their tenons wedged from the outside, to “draw them home.” They should also bear upon the wall equally with the sill. All beams having a span of 12 feet and over, should have at least one row of cross-bridging of 1¼ × 3-inch “fencing.” The second and third story beams are notched over the ties, and spiked fast. The cupola posts rest directly on the center girts, and the principal roof-timbers are framed and secured to these posts. In this frame there need be no tendency to self-destruction, so common in large buildings, such as oblique or outward thrusts, or irregularity of bearings, but a perfect “repose” is secured to every piece of timber in the house.... The Bay-window frame-work (see fig. 140) is 1 inch less in depth than the principal sills of the house, to allow for the thickness of the boarding beneath them, so that the water-table, when put around the house may be in line. The distances given on the diagram of the bay frame may be relied upon as correct. “Bay-windows are apt to be cold,” is often said, but a sure preventive of such “cold” is easily secured by filling in between the beams and panels with dry sand, which will make them as tight as any other part of a house.—The character and quality of a house depends greatly upon the material and manner of SIDING. In our estimate we have provided for mill-worked sheathing, which should be put on diagonally, and thoroughly nailed to the frame, which will serve the double purpose of securing more warmth and strength than any “filling in” of brick, and is less expensive. A strip of the same thickness as the sheathing, and 2 inches wide, should be first nailed to the sill, close down to the masonry, to prevent the air from entering the joints of the sheathing, and following them upwards into the house. Tarred paper is next stretched over the sheathing, when the window-frames, water-table, and corner-boards should be set, and lastly, the novelty-siding put on, and double-nailed to each stud. The Windows are arranged for each sash to be hung, and all to have blinds. All windows above the first story have “circular heads,” with caps turned of 4-inch timber. The Keys shown on the elevation are sawed out at the back, so as to fit over the caps (not cut through them). This is much simpler, more ornamental, and does not impair or affect the solid head.—The roof projects 27 inches beyond the frame of the building, and is covered with IC. charcoal tin, laid and soldered in the best manner, on sound hemlock boards. The gutters of the main house are made as described for Design V.... The First Story plan (fig. 141) shows the general division of four rooms and three halls. The Entrance Hall, or Reception Room, is 7 × 12 feet. The Stairway Hall is also 7 × 12 feet. The Rear Hall is 7 × 7 feet. These halls are divided from each other by sash doors. The entrance hall is divided from the parlor and dining-room by large double doors. The advantages of dividing the halls in the manner shown will be obvious to any one when they consider how cold, windy, and cheerless most halls are. By this arrangement all drafts are prevented, either when opening the entrance door, or when passing from one room to another. The inside double doors may be swung open altogether, throwing the principal rooms of the lower floor into one spacious apartment, if occasion should require, for a large company, without altering to any material degree the temperature of these rooms. The stairway hall contains the principal stairs, which are of the easiest “platform” construction, so arranged that a more private stairway is entirely unnecessary. The rear hall is the common hall of the house, and is easily reached from every part. The Parlor is the largest room, has a bay-window, marble mantle, and fire-place heater, and is separated from the library by sliding doors. The Dining-room has also a bay-window, marble mantle, and fire-place heater, and is intended as the Living-room. It is conveniently connected with the kitchen, stairway hall, entrance hall, and has a good pantry (c). The Kitchen is separated from the dining-room by a single door, and in close proximity to the rear entrance and cellar stairway doors. It contains one large closet, range with elevated oven, warm-closet, and water-back, boiler, sink, and wash-tubs. The Kitchen should be wainscoted 3 feet high, with ⅝ × 3-inch ceiling-boards. The clock and lamp-shelf should be put between the closet and hall doors, and not over the range. The advantage of having the kitchen on the same floor with the dining-room must be apparent to every one.... The Second Story plan (fig. 142) is divided into four large chambers, a child’s bedroom, a bath-room, five closets, with a good-sized hall. The two Front Chambers are heated by hot air from the “fire-place” heaters of the first story, so that they are always comfortable in the coldest weather. For many reasons we prefer the fire-place heaters over any other. They take little room, are cheerful in appearance, easy of management, and economical, requiring attention but twice in twenty-four hours, if hard coal is used. Each heater will keep two ordinary sized rooms comfortable in winter, and are not unsightly in summer. Like any other device for heating, the perfect and satisfactory results depend altogether on the manner of setting them. In no case should a heater be expected to develop its full power when placed in a fire-place in so close proximity with the brick as to allow the hot air to strike against and be absorbed by them. The heater should be enclosed in a jacket of sheet-iron, having an 8-inch opening, and a collar at the top. Attached to the collar, and “built in” the chimney, should be an 8-inch tin pipe, connecting with the register-box in the second story. Above this box this flue should be entirely closed. The smoke-pipe should be 4-inch, and pass up through the 8-inch tin pipe to the register-box, where an elbow should be put on, turning the smoke into the side flue adjoining. The side flue should have no other side openings. The Bath-room has bath-tub, seat-closet, wash-basin, with cold and hot water faucets. Each chamber to the right of the hall to have wash-basins. These Chambers have marble mantle shelves, resting on plaster trusses, at an expense of $6 each, which answer the purpose that a $20 mantle would, and are really more cheerful and appropriate for such rooms.... The Attic is reached by the enclosed stairway, and is arranged so that two or four bedrooms may be “finished off” as required. The Tank is placed on the floor over the bath-rooms, and is supplied partly from the roof, and partly by the force-pump in the kitchen. All the remaining space in the attic may be used for storage, etc.... The Cupola-room is 7 × 7 feet, reached by a light stairway. The head-room is made to subserve the purpose of a stand or table, so that really very little room is taken away by the stairs.... Very few people have any definite idea of the expense of the separate items that are comprehended under the head of Plumbers’ Work. The following estimate in detail of plumbing, required in this house, gives facts and figures enough to enable any one to decide just how much plumbing can be done for any given sum, viz.:

Sheet-lead, 3½ lbs. to square ft., for tank, 2 × 4 × 6 ft., with stop-cock. | $21.00
Bath-tub, 10 oz., $15; plated flange and thimble-cock, $6; plated plug and chain. | 22.50
Pan-closet, $12.25; plated cup and pull, $1.50; French bowl, $2.20; trap, 4 in., $3.75. | 19.70

3 wash-basins, $1.70 each; marble slabs, $5 each; plug, stud, and chain, $1.50 each; 2 cocks, trap, screw, plug, $3 each.

36.60

1 iron sink, 18 × 24 inches, $2; 2 cocks, $3.50; trap and screw, $1. | 6.50
35-gallon copper boiler, $27; with stand, $2. | 29.00
Force-pump, with brass cylinder. | 17.00
20 ft. 4-in. iron soil-pipe, at 50c. per ft. | 10.00
372 lbs. supply and circulation pipe, at 8½c. per lb. | 31.62
125 lbs. waste-pipe, at 8½c. per lb. | 10.63
Solder, tacks, and charcoal for this job. | 3.00
5 days’ time, plumber and helper, $6 per day. | 30.00
Total amount of cost. | $237.55
10 per cent added by plumbers in estimating. | 23.75
Total Plumber’s charges for the job. | $261.30

To the bill for plumbing we add the cost of:

Range, with elevated oven, warm-closet, water-back, set complete. | $80.00
Heaters, 2 “fire-place,” with registers and heating pipes, $45 each. | 90.00

Cost.—Estimate of cost of building by this plan. It will be noticed that the prices given for bay-windows, porch, lobby, stairs, windows, cupola, and doors, include materials and labor complete, and that the amount of carpenters’ work is for the balance of such labor required on the job:

100 | yards excavation, at 20c. per yard. | $20.00
24,000 | brick, furnished and laid, at $12 per M. | 288.00
950 | yards plastering, 3-coat, at 28c. per yard. | 266.00
6,578 | ft. timber, at $15 per M. | 98.67
| 4 | sills, 4 × 8 in. 30 ft. long. |
| 2 | sills, 4 × 8 in. 36 ft. long. |
| 10 | posts, 4 × 7 in. 24 ft. long. |
| | Ties, 4 × 6 in. 390 ft. long. |
| 4 | cupola posts, 4 × 6 in. 15 ft. long. |
| | Plates, 4 × 6 in. 132 ft. long. |
| 70 | beams, 2 × 8 in. 15 ft. long. |
| 60 | beams, 2 × 8 in. 22 ft. long. |
| 15 | beams, 3 × 8 in. 22 ft. long. |
| 4 | hips, 3 × 8 in. 18 ft. long. |
| 4 | valleys, 3 × 8 in. 18 ft. long. |
| 14 | rafters, 3 × 5 in. 17 ft. long. |
100 | joist, 3 × 4 in. 13 ft. long, at 22c. each. | 22.00
400 | wall-strips, 2 × 4 in. 13 ft. at 11c. each. | 44.00
320 | sheathing, ⅞ × 10 in. 13 ft. long, at 25c. | 80.00
200 | lbs. tarred paper, at 5c. per lb. | 10.00
320 | novelty siding-boards, 9½ inch, at 38c. each. | 121.60
195 | hemlock roof boards, at 22c. each. | 42.90
240 | tongued and grooved flooring, at 35c. each. | 84.00
168 | ft. cornice, at 70c. per ft. | 117.60
17½ | squares of tin roofing, at $10 per square. | 175.00
190 | ft. gutters and leaders, at 10c. per foot. | 19.00
| Cupola, complete, except tin (included above). | 100.00
2 | bay-windows, complete, at $75 each. | 150.00
1 | porch, complete, $75; lobby, complete, $50. | 125.00
4 | stairs, complete, $100; 17 windows, complete, $15. | 355.00
5 | cellar windows, at $6 each. | 30.00
34 | doors, at $12 each. | 408.00
2 | marble mantles, at $30 each. | 60.00
4 | marble shelves, at $6 each. | 24.00
5 | kegs nails, at $5 each. | 25.00
| Painting. | 250.00
| Cartage, average 1 mile. | 56.40
| Shelving, base, bell-hanging, etc. | 73.70
| Carpenter’s labor. | 360.00
| Plumbing, as detailed above. | 261.80
| Range, $80; Incidentals, $162.83; 2 heaters, at $45, $90. | 296.33
| Total cost of house. | $4,000.00

Fig. 138.—ELEVATION OF FRONT OF HOUSE.

Fig. 139.—PLAN OF CELLAR.

Fig. 140.—FRAMING OF BAY-WINDOW.

Fig. 141.—PLAN OF FIRST FLOOR.

Fig. 142.—PLAN OF SECOND FLOOR.

DESIGN XXXIII.
A BRICK HOUSE COSTING $4,000.

This plan was designed for the residence of Dr. Samuel McClure, of Olney, Ill. The style and general characteristics are significant of elegance and comfort, and suggest its adaptation to suburban, rather than the more rural situations.... Elevation, (fig. 143.)—There is a peculiar compactness in the outlines of the principal building, while the piazza and tower contribute largely to the symmetry and gracefulness of the entire structure. The general details of the exterior are quite simple in themselves, and are so proportioned and arranged as to adapt them to each other with artistic effect, and to produce marked features of unity and completeness.... First Story, (fig. 144.)—Hight of ceiling, 11 feet. The general divisions and arrangements are simple and practical. The principal entrance from the piazza is through outside and vestibule doors. The outside doors are made in pairs, with solid panels heavily moulded on the face. The vestibule doors are of similar construction, except that their upper panels are of glass. There is a seeming extravagance in such “vestibules,” or duplication of doors, at the entrance of any dwelling, and they may be regarded as a luxury rather than a necessity, and would be superfluous and inappropriate in the ordinary cottage or farm-house; but in residences of this character, where there is abundant space, such vestibules are manifestly proper, adding a feature of elaborateness, and providing for many contingencies of times and seasons. The outside, or storm-doors, afford protection against extreme cold and severe storms, and furnish additional security. The vestibule, or “glass” doors, admit an abundance of cheerful light to the hall. The Main Hall is roomy, and contains the principal stairs, which are of platform construction, are wide, and have hard-wood rail, balusters, and newel. The Parlor and Dining-room adjoin the hall through large double doors. The parlor and bed-room are separated by sliding doors. The Bed-room has doors leading to the principal hall and to the bath-room, which has a wash-basin and water-closet. The Kitchen is supplied with a range, with elevated oven and a water-back; a 30-gallon copper boiler, a sink with closet underneath, a pump, and stationary wash-tubs in three divisions, and it connects through doors with the dining-room, rear lobby, cellar-stairway, a large pantry, and a dish-closet. The Rear Lobby is arranged to connect with the rear entrance, kitchen, bath-room, and principal hall. The Bath-room contains a tank, with a capacity for four hogsheads of water (placed near the ceiling), bath-tub, washstand, and seat-closet. Lead pipes necessary for the supply and distribution of cold and hot water, are provided in the kitchen and bath-room. Marble mantles are provided for the principal rooms of this story, at an average cost of $25 each. Double architraves are intended for the trimmings of the windows and doors in the principal apartments, and neat chair-backs are provided for the dining-room and kitchen.... Second Story (fig. 145.)—By the peculiar method of constructing the roof and frame-work, it will be found that the inside walls of this story are vertical or plumb, instead of angling as in the usual Mansard roof. The ceiling is 9 feet high. This story has a hall, four large and one small rooms, five closets, and a stairway to the tower. Each of the four large chambers have marble shelves resting on plaster trusses, as described in Design XXXII. Single architraves are intended for the trimming of this story.... Construction of the Walls and Roof.—The excavations are made 1½ foot deep, and the earth thrown out is used in grading around the house at completion, raising the surrounding surface 1 foot. The foundation and cross-walls (fig. 146) are 6½ feet high. The principal walls resting on the foundation are 14 feet 3 inches high, and the walls of the tower extend 11 feet 6 inches above the principal walls. The walls inclosing the wing in the rear are 10 feet high; all of hard burned brick and good mortar. The exterior walls of the foundation are 12 inches thick, and all other walls are 8 inches thick, and have heading courses every 2 feet. The bottom courses of the exterior foundation, to the hight of 2½ feet, are laid in mortar composed of hydraulic cement and sharp sand, to prevent the absorption of dampness from the earth; all other mortar is composed of lime and sand. All exterior surfaces of brick-work that are exposed to view have “flush-joints,” and those intended for painting should be rubbed smooth. All windows for the cellar and first story have sills of dressed stone, and have heads neatly arched of brick-work. The window-caps for the first story windows are laid of brick, as shown in sketch, (fig. 147). These caps are easily executed while constructing the walls, and are quite ornamental; the figures on the sketch denote the distances or projections of the several parts beyond the face of the wall.... Plates of 3 × 8 timber are laid flatwise on top of the brick walls, and the upper or roof framework is added as shown in section, (fig. 148): A, foundation, 12 inches thick; B, principal wall, 8 inches thick; C, C, tower walls; D, D, tower posts, 4 × 6 inches, adjoining the upper portion of tower walls, and forming a part of the tower; E, E, principal plates, 3 × 8 laid on brick work; F, tie, 3 × 8, resting on 2 × 4 studding, placed inside the wall, and nailed to the principal plates; G, G, rafters sawed to pattern, the lower end projects one inch beyond the face of the wall. H, ceiling timbers resting on the ties. The remaining framework will be readily understood. The roofs are inclosed with rough hemlock boards of even thickness, and thoroughly nailed to the rafters—and lastly covered with IC. charcoal tin. The method of laying the tin on the upright or Mansard part of the roof, is known in the trade as the “raised groove” plan, in which all the vertical joints of the tin are raised and folded, leaving an elevated seam or ridge, which stiffens the general surface, and adds to the picturesqueness of this form of roof, without increasing its cost. The balance of the tinning is laid with the ordinary lock-joint and soldered. Gas pipes are inserted in the framework so as to be concealed, except where they appear for attachments for 4 ceiling lights, and 4 side lights in the first story; for 8 side lights in the second story; for 1 ceiling light in the tower, and for 1 side light in the cellar. Ample opportunities for a thorough Ventilation are provided for in this plan. It will be seen that the four large rooms have windows in two of their sides, affording the most certain and satisfactory means of ventilation known.—Flues are also provided adjoining each room in which registers are put, for use in the more severe weather. Provision is made for the escape of the air from between the ceiling of the second story and the roof.—Five strong tin 4-inch tubes, with funnel covers, are inserted in the deck of the principal roof; four of them are placed 3 feet behind the chimneys, and one near the rear, connecting with a flattened tube leading directly from the bath-room.... The following ESTIMATE of the quantities of materials and labor, of their several kinds, and their cost, embraces everything necessary to the completion of the house, excepting the appliances for heating, which may consist of a furnace, fire-place heaters, or open grates, as shall be best adapted to the location. In this vicinity, where hard coal is the chief fuel, we would suggest a furnace, placed in the cellar, with large pipes arranged to convey warm air to the different parts of the house. In localities where bituminous coal is used, the open grate gives good results, and is exceedingly cheerful in appearance. There are ranges and parlor stoves constructed to burn soft coal successfully, and it is undoubtedly possible that heating furnaces may be adapted to the use of the same fuel.

Estimate of Cost:

80 | yards excavation, at 20c. per yard. | $16.00
60,000 | brick, complete, at $10 per M. | 600.00
120 | ft. stone sills and coping, at 30c. per ft. | 36.00
1,000 | yards plastering principal, complete, at 28c. per yard. | 280.00
120 | yards plastering ceiling of cellar, complete, at 15c. | 18.00
4,763 | ft. of timber, at $15 per M. | 71.44
| 2 | sills, 4 × 8 in. 28 ft. long. |
| 68 | beams, 3 × 8 in. 15 ft. long. |
| 34 | beams, 3 × 8 in. 8 ft. long. |
| 4 | beams, 3 × 7 in. 16 ft. long. |
| 9 | beams, 3 × 7 in. 19 ft. long. |
| 4 | girts, 4 × 6 in. 28 ft. long. |
| 1 | brace, 3 × 5 in. 30 ft. long. |
| 4 | hips, 3 × 6 in. 14 ft. long. |
| 1 | deck tie, 3 × 8 in. 138 ft. long. |
| 1 | deck plate, 3 × 6 in. 188 ft. long. |
| 1 | main plate, 3 × 8 in. 139 ft. long. |
| 1 | tower plate, 3 × 8 in. 34 ft. long. |
| 4 | tower posts, 4 × 6 in. 14 ft. long. |
| 1 | piazza, 3 × 7 in. 220 ft. long. |
100 | rough plank rafters, at 25c. each. | 25.00
360 | wall strips, 2 × 4 in., 12 ft., at 11c. each. | 39.60
308 | hemlock boards, 10 in. × 13 ft., at 18c. each. | 55.44
250 | mill-worked flooring boards, 9-in., at 30c. each. | 75.00
130 | furring strips, 1 × 2 in., 13 ft., at 5c. each. | 6.50
31 | squares of tin, at $8.50 per square. | 263.50
16 | windows, 1st story and tower, complete, at $16 each. | 256.00
12 | cellar windows, complete, at $8 each. | 96.00
13 | dormer windows, complete, at $20 each. | 260.00
| Cornices, principal and deck. | 130.00
| Piazza stoop and wing finish (except tin), complete. | 300.00
| Finial on tower. | 8.00
| Stairs, complete, $100.00; 38 doors, at $10 each, complete, $380. | 480.00
| Finish in closets. | 25.00
| Mantels and shelves (of marble). | 100.00
| Range (with elevated oven and water back). | 80.00
| Plumbing and gas-pipes. | 220.00
| Nails and anchors. | 27.10
| Painting, $200; Cartage, $30. | 230.00
| Carpenter’s labor not included in the completed works. | 250.00
| Incidentals. | 51.42
| Total cost, complete. | $4,000.00

Fig. 143.—ELEVATION OF HOUSE.

Fig. 144.—PLAN OF FIRST FLOOR.

Fig. 145.—PLAN OF SECOND FLOOR.

Fig. 146.—PLAN OF CELLAR.

Fig. 147.—WINDOW-CAPS.

Fig. 148.—SECTION OF FRAME.

Fig. 149.—ELEVATION OF COUNTRY RESIDENCE.

DESIGN XXXIV.
COUNTRY RESIDENCE COSTING $4,750.

On the next page is a perspective view of a residence built for Dr. B. Clark, of Washington, Pa., from special designs made by me in 1876. The style and general arrangements are similar to the one built for Dr. McClure, last described, with the addition of a side extension or office, and the completion of rooms in the basement for laundry purposes, and a laboratory. This Building is substantially constructed, and tastefully finished throughout. The hight of the ceilings in the first story are 12 feet, in the second 10 feet, and for the basement 8 feet. It has two heaters, four open grates, a range, complete apparatus in bath rooms, and distributing pipes for cold and hot water. The principal rooms are frescoed, all others are kalsomined. A Reservoir constructed in the rear part of the cellar, and provided with running spring water, is arranged as a receptacle for milk cans, and supplies the Fountain shown in the front lawn (this fountain, owing to the sloping surface of the grounds, is several feet below the foundations of the house).... Dr. Clark moved into his new house during the first week in February last, and writes with reference to it, that “all in all it is the most tasteful in outside appearance, convenient, and economically constructed building in this section, and attracts a great deal of attention.”

The cost of this building, everything complete, was $4,750.

DESIGN XXXV.
A HOUSE COSTING $4,000.

These plans were designed for a suburban residence, to take the place of one recently destroyed by fire. The original structure was cubiform in outline, resembling a huge box; with unbroken facades, and flat roof, destitute of beauty, and in strange contrast with the tasteful surroundings. The owner desired to use the old foundations, still in fair condition, without disturbing the grounds, underlying pipes, etc., and thus retain the nearly square ground plan, but a building with an exterior agreeing with the surroundings. While the main object in presenting this design is to show that the ground plans do not necessarily determine the style of exterior dress, its general arrangement and character will be found to deserve favorable consideration.... Elevation, (fig. 150.)—There is a constant demand for “Mansard Roofs,” arising from an aspiration for structures signifying originality and progressiveness. The animated features of this style accord with activity, rather than of retirement, and adapt it to prominent situations, skirting the more public thoroughfares. The objections to such roofs result from their frequent misapplication. They are manifestly inappropriate for retired or secluded situations, or for persons of purely domestic tastes. They also lose their identity and expressiveness when duplicated in close and continuous proximity, as is often done in towns. But this is true of any other style. Variety is the spice of architecture.... Cellar, (fig. 151.)—Hight of 8 feet in clear. It has an outside rear entrance, is well lighted, and contains ample space for the furnace, and divisions for coal, vegetables, etc.... First Story, (fig. 152.)—Hight of ceilings, 10 feet. The accommodations are conveniently arranged, and sufficient for a large family. The main entrance from the piazza is through large double doors and a vestibule. The Hall is central and spacious, communicating with the principal rooms, and rear entry, and contains the main stairs, which are unusually wide and easy. The Parlor and Library, divided by large sliding doors, can be used separately, or together as one spacious room when desired. The Dining-room and Kitchen adjoin, and have the necessary pantries, range, pump, sink, and stationary wash-tubs, with cold and hot water. A Conservatory is entered from the dining-room through double sash doors, adding a cheerful feature to this apartment, where the family spend much of their time. The rear may be reached from the dining-room in three ways—by the main hall and rear entry, or through the kitchen, or most pleasantly through the conservatory.... Second Story, (fig. 153.)—Hight of ceilings 9 feet. The divisions include a hall, four large chambers with closets to each, a front hall bed-room, and a bath-room. Each of the chambers has windows in two sides, giving opportunity for plentiful light and fresh air. The clear width of the room sections, (5 yards each), favors the economical cutting of carpets. The main stairs are made continuous to the attic story. The Bath-room is furnished with a bath-tub, wash-bowl, and seat-closet, and with cold and hot water.... Construction.—The foundations, stone-sills, area stoops, framing, inclosing, flooring, plastering, and painting, are similar to those described for Design XIII. Care should be taken in covering the roofs, as the materials used (wood, tin, and slate), are entirely foreign to each other, and can only be placed in contact, and indirectly united. The wood should be thoroughly seasoned, to prevent a future disturbance of the exterior covering. All flashings along the sides of the dormers and other uprights should be 10 inches wide, and double painted before being used. The conservatory is not floored, but is filled in with earth level with the foundation walls. A walk is laid through the center, of 1⅛ × 4-inch slats, and the remaining space is devoted to plants. A furnace is placed in the cellar, with pipes to convey warm air to the principal rooms and halls of both stories, and to the conservatory. The pipes and register boxes for conveying warm air to the second story, are placed in the chimneys while building them. There are open fire-places in the principal rooms, with marble mantles in the first story, and marble shelves in the chambers. Stucco cornices and centers, of appropriate patterns, are put in the principal rooms and hall of the first story. A hall and stairway leading to the tower, is completed in the Attic, the other portions of the third story are unfinished, but may be converted into pleasant rooms for school purposes, or chambers, as desired.

Estimate, Cost of materials and labor:

114 | yards excavation, at 20c. per yard. | $22.80
84 | perches stone-foundation, at $2.75 per perch. | 231.00
60 | ft. blue-stone sills, steps, and coping, at 28c. per ft. | 16.80
8,000 | brick, furnished and laid, at $12 per M. | 96.00
1,000 | yards plastering, at 28c. per yard. | 280.00
230 | feet stucco cornices and centers, at 25c. per ft. | 57.50
8,305 | ft. of timber, at $15 per M. | 124.57
| 2 | girders, 4 × 8 in. 30 ft. long. |
| 2 | sills, 4 × 8 in. 30 ft. long. |
| 2 | sills, 4 × 8 in. 40 ft. long. |
| 2 | sills, 4 × 8 in. 23 ft. long. |
| 2 | sills, 4 × 8 in. 11 ft. long. |
| 9 | posts, 4 × 7 in. 23 ft. long. |
| 2 | posts, 4 × 7 in. 32 ft. long. |
| 2 | posts, 4 × 7 in. 12 ft. long. |
| 2 | posts, 4 × 6 in. 11 ft. long. |
| | Ties, 4 × 6 in. 350 ft. long. |
| | Plates, 4 × 6 in. 247 ft. long. |
| | Perlines, 3 × 8 in. 215 ft. long. |
| 51 | beams, 3 × 8 in. 25 ft. long. |
| 15 | beams, 3 × 8 in. 21 ft. long. |
| 50 | beams, 3 × 8 in. 16 ft. long. |
| 4 | hips, 3 × 7 in. 14 ft. long. |
| | Piazza, 3 × 7 in. 176 ft. long. |
| | Piazza, 3 × 5 in. 86 ft. long. |
6 | locust posts at 30c, $1.80; 150 joists, at 16c., $24. | 25.80
150 | wall-strips, at 11c. each. | 16.50
220 | sheathing, at 18c., $39.60; 500 lbs. tarred felting, $20. | 59.60
400 | clapboards, at 12c. each. | 48.00
870 | hemlock boards for roof, at 16c. each. | 59.20
14 | squares slate, at $8½ per square. | 119.00
20 | squares tin, at $7½ per square. | 150.00
| Cornice materials. | 89.62
335 | pieces flooring (9-inch), at 18c. each. | 60.30
| Piazzas and porches, complete. | 160.00
9 | cellar windows, complete, at $5 each. | 45.00
24 | plain windows, complete, at $12 each. | 288.00
18 | dormer windows, complete, at $16 each. | 288.00
| Stairs, complete, $100; 45 doors, complete, at $10, $450. | 550.00
| Closets, $30; nails, $20. | 50.00
3 | marble mantles, $75; 4 marble shelves, $25. | 100.00
| Range and plumbing. | 260.00
| Sky-light in conservatory. | 12.00
| Furnace and pipes. | 150.00
| Carting, average 1 mile. | 40.00
| Carpenter’s labor, not included above. | 300.00
| Painting, $220; incidentals, $80.31. | 300.31
| Total cost, complete. | $4,000.00

Fig. 150.—ELEVATION OF FRONT OF HOUSE.

Fig. 151.—PLAN OF CELLAR.

Fig. 152.—PLAN OF FIRST FLOOR.

Fig. 153.—PLAN OF SECOND FLOOR.

DESIGN XXXVI.
A FARM HOUSE COSTING $5,000.

The plans here given were originally designed for the residence of Mr. F. H. Johnston, Easton, Md. They will interest those desiring a good-sized, comfortable farm-house.... Exterior, (fig. 154).—The site in this case being midway between the highway and a water front, (facing a tributary of the Chesapeake,) made it desirable to have two main entrances, adapted to either approach, and indicated the position of the kitchen wing at the side. The Conservatory is in an angle facing the southeast. The Piazza and Roof Projections are of ample breadth to give abundant shade, and proper effect. As a whole, the outlines are rounded and compact, indicating completeness and strength—always desirable features in buildings of this class.... Cellar, (fig. 155).—Hight of ceiling 8 feet. It has 13 windows, and outside and hatchway doors. Openings in the chimneys provide ventilation. The ceilings are plastered, to prevent the ascent of damp and unwholesome vapors through the frame-work of the house.... First Story, (fig. 156).—Hight of the ceilings in the main house, 11 ft. 4 in., and in the wing 9 ft. The main entrances lead from the piazzas, through large double doors, to the principal Hall, which is wide, and extends, unobstructed, through the house. The main stairs occupy the space at the right, which is separated by an arch that preserves the continuity of the hall ceiling. The ordinary or family entrance is by way of the passage, and is convenient to all the parts of the house in daily use. A private stairway leads from the passage to the second story. The Parlor and Library are separated by sliding doors, and each has a bay and other windows. The Dining-room at the right is pleasantly arranged; it may be entered from the main hall, or through the conservatory, or by the passage, or through the butler’s pantry. Wide double sash-doors lead to the conservatory, and single sash-doors open to the piazza through the passage. The Kitchen has doors leading to the passage, butler’s pantry, cellar, and yard, and has three windows. It is provided with a range, pump, boiler, wash-tubs, and sink. The Butler’s Pantry is spacious; one end is dresser finished, with counter-shelf and doors above and below. A counter-shelf is also placed at the opposite end, with wash-tray and closet. The sides are shelved around, and have cleats and hooks.... Second Story, (fig. 157).—Hight of ceilings in the main house 10 feet; in the wing 9 feet. The divisions embrace six rooms, six closets, and the required halls. The platform of the main stairs is level with the second floor of the wing, and from it a door leads to the wing passage. The Bath-room has a bath-tub, wash-stand, and seat-closet, and a good-sized closet for towelling, etc. All closets have the usual shelving and hooks. Each chamber has marble shelves and stucco trusses.... Attic.—The stairs leading to this story are above the main flight, inclosed with narrow ceiling, and have a door at the foot. There are two circular windows in each end gable, and one in each front. The whole is floored, but otherwise unfinished, to be used as an open garret.... Construction.—The excavations are 4 feet deep, and the loose earth thrown out is neatly graded around, leaving three feet of the foundations exposed to sight. The foundations are of hard burned brick, 12 inches thick for the main house, and 8 inches for the wing and conservatory. Brick piers, 12 inches square, are built for the piazza supports. The first story frame-work is beam-filled with bricks, where they rest on the foundation. This prevents draughts of air from entering the house between the foundation and the frame, and also keeps mice out of the frame at this point—the latter is especially necessary along the lines of the main partitions. The chimneys are of hard brick, arranged with continuous flues from each fire-place to the top. Tin 8-inch pipes, with the necessary elbows and register boxes, are inserted while building, to convey warm air from the cellar to the large chambers in the second story. The frame-work is constructed in the most thorough manner, of sound pine or spruce timber. The siding is of clear pine clapboard, laid on sheathing felt. Cornices of dressed pine. Principal roofing of cedar shingles. Piazza and bay window roofs of tin. Flooring of narrow yellow pine. The first and second stories are completed in every respect, ready for occupation. Each of the principal rooms and the main hall have stucco cornices and centers. Arches with neat ornamental corbels are built across each bay window, over the L adjoining the main hall, and at the entrance of the passage leading to the bed-room in the second story. All sashes are 1½-inch thick, and glazed with four lights in each pair. Blinds (outside) are properly hung and fastened to each window above the cellar. The conservatory is substantially constructed of light frame-work, with no superfluous dressing to obstruct the light, and glazed with plain, single-thick glass at the sides, and ribbed glass for the roof, has a narrow walk of slat-work leading from the dining-room door, and is arranged to be heated in winter from a furnace in the cellar. All parts usually painted, have two coats of best paint, of color and materials selected by the owner.

Estimate, cost of materials and labor:

268 | yards excavation, at 20c. per yard. | $53.60
50,000 | bricks, (furnished and laid,) at $12 per M. | 600.00
88 | ft. blue-stone sills, at 30c. per ft. | 26.40
1,300 | yards plastering, at 28c. per yard. | 364.00
175 | ” ” cellar ceiling, at 16c. per yard. | 28.00
330 | ft. cornices, complete, at 20c. per foot. | 66.00
4 | centers, complete, at $4 each. | 16.00
14,300 | ft. of timber, at $14 per M. | 200.20
| | Sills, 4 × 10 in. 276 ft. long. |
| | Ties, 4 × 6 in. 490 ft. long. |
| | Plates, 4 × 8 in. 138 ft. long. |
| | Perlines, 4 × 9 in. 214 ft. long. |
| | Ridges, 3 × 9 in. 67 ft. long. |
| | Ridges, 3 × 7 in. 20 ft. long. |
| | Gables, 4 × 6 in. 200 ft. long. |
| 4 | posts, 4 × 8 in. 26 ft. long. |
| 8 | posts, 4 × 8 in. 23 ft. long. |
| 4 | posts, 4 × 7 in. 13½ ft. long. |
| 2 | posts, 4 × 7 in. 12 ft. long. |
| 50 | beams, 3 × 10 in. 19 ft. long. |
| 8 | beams, 4 × 10 in. 19 ft. long. |
| 10 | beams, 3 × 10 in. 18 ft. long. |
| 1 | beam, 4 × 10 in. 18 ft. long. |
| 11 | beams, 3 × 9 in. 18 ft. long. |
| 28 | beams, 3 × 9 in. 19 ft. long. |
| 28 | beams, 3 × 10 in. 10 ft. long. |
| 14 | beams, 3 × 9 in. 10 ft. long. |
| 78 | rafters, 3 × 6 in. 25 ft. long. |
| 34 | rafters, 3 × 5 in. 15 ft. long. |
| | Braces, 3 × 5 in. 240 ft. long. |
175 | joists, at 13c., $22.75; 400 wall strips, at 10c., $40. | 62.75
800 | lbs. felt, at 4c., $32; 800 siding, clapboards, 10c., $80. | 112.00
| Cornice materials. | 120.00
500 | rough roofing, at 14c. each. | 70.00
12,000 | singles, at $10 per M. | 120.00
11 | squares tin, at $9 per square. | 99.00
450 | ft. valleys, gutters, and leaders, at 10c. | 45.00
5,366 | ft. flooring, at 3c. per foot. | 160.98
13 | cellar windows, complete, at $6 each. | 78.00
30 | plain windows, complete, at $12 each. | 360.00
2 | bay windows, complete, at $60 each. | 120.00
2 | dormer windows, complete, at $20 each. | 40.00
4 | stairs, complete. | 150.00
38 | doors, complete, at $12. | 456.00
| Piazza and stoops, exclusive of floors and roofing. | 250.00
| Conservatory, complete. | 150.00
| Mantles, complete. | 102.00
| Pantry and closets, complete. | 75.00
| Nails, $24; Carting, average 1 mile, $50. | 74.00
| Range and plumbing, complete. | 250.00
| Carpenter’s labor, not included above. | 450.00
| Painting. | 272.00
| Incidentals. | 29.07
| Total cost, complete. | $5,000.00

Fig. 154.—ELEVATION OF FRONT OF HOUSE.

Fig. 155.—PLAN OF CELLAR.

Fig. 156.—PLAN OF FIRST FLOOR.

Fig. 157.—PLAN OF SECOND FLOOR.

DESIGN XXXVII.
A HOUSE COSTING $7,000.

The accompanying plans were designed for a suburban residence erected during the past year by Mr. Bernhard Greeff, at College Point, Long Island, N. Y. The general outlines were determined with especial reference to the location—which is elevated, overlooking the East River to the north and west, Flushing bay, and the village to the south, and with an eastward frontage to the street, giving pleasant views in all directions. With these points fixed, it is easy to see the propriety of placing a broad side to the bleak or northern exposure, and putting such breaks or angles as are required in the more sheltered directions.... Exterior, (fig. 158.)—The style of this example is homelike, and shows to the best advantage when placed in comparison with those of more fanciful design. Sufficient irregularities are made in angles and projections to give variety. The details shown in the front finish are continued around the sides and rear. The hight of the rear wing is one story less than the main house. While the appearance of this house is agreeable on every side, the most pleasing is from the southerly direction.... Cellar, (fig. 159.)—Hight of ceiling 7 feet, of which 4 feet are above ground. All parts are well lighted with windows, except the hall, which has a sash-door with iron guard. The Laundry has an open stairway to the kitchen, and is provided with wash-tubs. A water-closet is placed under the stair. A furnace is placed in the northern division of the cellar, with pipes for conducting warm air to each room and hall in the two stories of the main house, and to the bath-room.... First Story, (fig. 160.)—Hight of ceilings in main house 11 feet; in rear wing 8 feet 5 inches. The Front Entrance is through a vestibule leading to the main hall. The Hall is large, contains the principal stairs, with a closet under them, and communicates with the parlor, sitting-room, and rear entry. The Sitting or Family-room is arranged to be the pleasantest apartment, has double windows front and rear, (the rear ones opening to the floor), and a large bay-window giving an outlook in three directions. Each of the principal rooms has grates for open fires, side registers leading from the furnace, and marble mantles. The Rear Entry communicates with the several apartments, and the rear piazza. The Kitchen has an elevated range, boiler, sink, drain-board, two closets, and enclosed stairways leading down to the laundry, and up to the second story; it communicates with the dining-room through the butler’s pantry, the latter is “dresser-finished” with sash-doors, copper wash-trays, etc.... Second Story, (fig. 161.)—Hight of ceiling in main house 10 feet, in wing 9 feet, with side breasts 5 feet. The floor of the wing is level with the platform of the main stairs. The full ceiling above this platform is arched over, and conceals the roof angle of the wing. An inside and smaller arch leads to the passage beyond. Both of these arches may be seen from the lower hall, and are pleasing features. An arch between the closets at the opposite end of the hall makes an alcove to the hall window. The room divisions are similar to those of the first story. Closets are provided for each chamber. The Bath-room is conveniently arranged and furnished.... Attic.—Hight of ceiling 9 feet, with breast-walls 3 feet. There are 3 good-sized chambers, a hall, and 7 closets in this story. Four dormer and three gable windows are provided.... Construction.—The time allowed for the erection of most buildings is too limited. Although this house was built by contract, no haste was enjoined, six months being allowed for its completion, giving the builder an opportunity of selecting the materials and workmen, and of applying the parts in their proper time and order. The exterior foundation walls, to the level of the ground, are of broken stone, 18 inches thick; the balance of hard brick, 12 inches thick. The frame is of full-sized timber; all beams and studding are placed 16 inches from centers. The siding-boards are 6 inches wide, rabbeted, and laid 5 inches to the weather, on stiff tarred “sheathing-board,” weighing 1½ pound to the square yard. The exterior frame is “filled in” with pale brick. The main and wing roofs are covered with Keystone slate on tarred felt over hemlock boards. The main gutters are of double cross tin, laid in with the slate as shown in Design V. The roofs of the piazzas, and bay-window, are of single cross tin. The cellar bottom is concreted with hydraulic cement and gravel, 3 in. thick. The laundry and cellar hall have the usual wide flooring, and are thoroughly plastered and finished. The partitions in the cellar, and the coal-bins are of dressed plank. All the floors in the two principal stories are double, the first being of ordinary dressed flooring—the second is “parquet” flooring laid of ¾ × 2½-inch yellow pine, and black walnut. The black walnut is used only in the borders and centers. These borders are made by laying from five to eight courses of alternate woods all around the rooms, ending at the hearths. The widths and arrangements are changed slightly in the different apartments, to give variety. These floors are intended to dispense with the use of carpets; rugs, covering the central portions of the floor, being adopted in their place. Unlike the stationary carpet, these may be easily removed for airing, and the floors cleaned daily if desirable. The three upper stories are hard-finished, on two coats of brown mortar. Each room and hall in the first and second stories of the main house have suitable stucco cornices and centers. The interior wood-finish is complete, all of clear and seasoned materials. Bronzed hardware is used in the first story, and porcelain in the balance of the building. Gas-pipes are inserted for thirty lights, properly distributed through the house. Five bells are included in the fittings. All wood, tin, and exterior brick work has two coats of best paint. The outside doors, and the halls, are grained in imitation of hard woods. The stair rails, door saddles, and the hard-wood flooring, are rubbed with linseed oil. The following are the estimates of the cost, as per contracts:

Mason work, | completed. | $1,650.00
Roofer’s work, | ” | 337.00
Carpenter’s work, | ” | 3,573.00
Plumber’s work, | ” | 590.00
Furnaces, | ” | 200.00
Mantles, | ” | 300.00
Painter’s work, | ” | 350.00
Total. | $7,000.00

Fig. 158.—ELEVATION OF FRONT OF HOUSE.

Fig. 159.—PLAN OF CELLAR.

Fig. 160.—PLAN OF FIRST FLOOR.

Fig. 161.—PLAN OF SECOND FLOOR.

DESIGN XXXVIII.
A HOUSE COSTING $8,000.

These plans were designed for a large and convenient house, arranged to embrace nearly all of the modern improvements. Figure 162 is the perspective view of a house recently built from these plans, for Mr. J. M. Peck, at Flushing, L. I. The general characteristics of the exterior are expressive of refinement and cheerfulness. There is considerable novelty in some of the outlines and details of construction. It will be seen that the Tower is five stories high, or two stories above the attic of the main house, affording a lofty outlook. All the long horizontal lines of cornice are broken up by truss-heads, which are ornamental in themselves, and give relief from the depressing appearance of such long lines. The Dormer Windows of the main house have projecting pediments, with turned columns resting on the outer edge of the main cornice. The Inclosing of this house is the same as that described for Design XXXII. The Mansard part of the main roof and tower is covered with dark slate, laid on sound boards, covered with felt. All other roofs are tinned in the best manner.... The Cellar extends under the whole house, and has outside and cross-walls of hard brick, which, with the chimneys and area, are built as described in XXXII. A Furnace is put in at F, and enclosed with brick, and 10-inch tin pipes are provided to convey hot air to the parlors, library, dining-room, and hall of the first story, to five rooms in the second story, and to the tank-room in the attic story.... The First Story contains a large Hall, Parlor, Library, Dining-room to be used as a Living-room, Kitchen, Butler’s and other Pantries, Wash-room, two flights of Stairs, the principal one in the main hall, and a private one adjoining the wash-room. The Main Hall is 7 feet wide, and is entered from the piazza through heavy front and vestibule double doors. The front doors are full hight, and have quarter-circle plate glass “skylights” in them. The vestibule doors have plate glass upper panels, with transom, and half-circle head-light. Double doors open from the hall to the parlor and to the dining-room, and large sliding doors separate the parlor from the library. The Dining-room has a large bay-window, marble mantel, china closet, and adjoins the butler’s pantry. The Kitchen is arranged with such conveniences as would delight the most enthusiastic housekeeper; has large closets, range, sink, cold and hot water, adjoins the wash-room, cellar stairway, and private passage, and communicates with the dining-room through the butler’s pantry. The Range has an elevated oven, warm closet, and water-back. To secure a perfect ventilation, a large register is placed in the flue of the chimney, which creates so strong a draft that the air in this room can all be changed in a few minutes. The left-hand flue of the kitchen chimney contains the pipes that convey warm air from the furnace to the bath and tank rooms. The wash-room contains the copper boiler and wash-tubs, and has a closet under the private stairs. The sink is large, and is provided with large drain-boards at each side, and a row of closets underneath. The Butler’s Pantry has complete fittings of drawers, shelving, oval copper wash-tray, and washstand with marble top, and is provided with cold and hot water. A Passage or private hall is arranged to connect with the principal hall, kitchen, private stairway, and rear entrance; by this plan the principal housework can be done without intruding in any way on the main hall or principal rooms of the house.... Second Story. This story contains a good-sized hall, 4 large chambers, a private study, bath-room, store-room, six large closets, and private stairway. The principal flight of stairs is made continuous from the first floor to the attic; an arch is placed across the narrow part of the hall in this story, near the first landing of the principal stairs, and is in full sight from the hall below, imparting a cheerful and finished appearance.... Attic, or Third Story—This story is finished throughout, and is divided into a hall, two large chambers, with closets to each, tank-room, and large attic. The stairs to the tower are closed in, and have a door at the foot. The hall is lighted through a sash-door from the tank-room. The large attic-room at the right has two doors opening from the hall, and may be divided into two rooms if required. A large upper room, where noise will not disturb the occupants of the lower parts of the house, will always be found valuable for school and play-room purposes, especially in cold or stormy weather, and when supplied with a table, benches, maps, books, and apparatus for instruction and entertainment, will afford the younger members of the family opportunity for development and exercise.... General Remarks.—Many people, who would adopt this general plan, might conclude that the style of the exterior is too elaborate and costly. It must be obvious to any one that the internal arrangements, and ground plan of houses, should be made to conform to the necessities and requirements of those who are to occupy them; and these parts being of the first importance, should receive the first consideration. Such ground plans, however, do not decide, or even indicate, the style, character, or expense, of the outside dress that may be put upon them. Different people have entirely different characters, tastes, and resources, and the external appearance of their homes should signify those general qualities and characteristics, and also accord with, and conform to, all the circumstances of location, and relation.... The Estimate in detail provides for all work to be done in a substantial manner, of the usual materials. The exterior and interior wood finish is of clear pine lumber. The Plastering is hard-finished, on two coats of brown mortar. Appropriate Cornices, Centers, and Panels, in stucco, are intended for the hall, parlor, library, dining-room, and the two front chambers in the second story. Gas-pipes are inserted in the frame-work of the house, with connections arranged for 37 attachments. These are easily put in during construction, and even when the house is located far from any city or village having gas, there is strong probability that ere long we shall have convenient apparatus for making and supplying gas to isolated dwellings.... Plumbing is provided as described in Design XXXII., except that the plumbing required for the butler’s pantry, is here added. Bells are put in, with their wires running through zinc tubes concealed in the walls. The front-door pull leads to a gong in the kitchen. The dining-room has a bell leading to the school-room in the attic. Each chamber in the second story, and the bath-room, has a bell leading to the kitchen, and the largest chamber has a bell leading to the attic. Speaking-tubes are provided for communication between the second story, hall, and bath-room, with the kitchen.... Painting.—The body of the outside is in warm-gray; the principal outside trimming in pure white, with thin separating lines in light drab, and blinds in dark-bronze color. All wood, tin, and brick work, usually painted, both inside and outside, has two coats of the best lead and oil. All doors are grained—and all hard-wood, such as stair-rail, balusters, and door-saddles, are rubbed in oil.

Estimate:

216 | yards excavation, at 20c. per yard. | $43.20
32,000 | hard brick, at $9 per 1000. | 288.00
6,000 | pale brick, at $5½ per 1,000. | 33.00
| Materials for plastering, and lath. | 300.00
70 | ft. stone steps and coping, at 30c. | 21.00
| Labor for all the mason work. | 600.00
13,258 | ft. timber, at $15 per M. | 198.87
| 1 | sill, 4 × 8 in. 242 ft. long. |
| 1 | tie, 4 × 6 in. 484 ft. long. |
| 2 | posts, 4 × 8 in. 42 ft. long. |
| 2 | posts, 4 × 8 in. 19 ft. long. |
| 1 | deck plate, 3 × 8 in. 156 ft. long. |
| 6 | hips, 3 × 10 in. 22 ft. long. |
| 1 | sill (piazza) 4 × 7 in. 114 ft. long. |
| 1 | plate ” 3 × 8 in. 90 ft. long. |
| 1 | beam ” 3 × 6 in. 60 ft. long. |
| 12 | posts, 4 × 8 in. 36 ft. long. |
| 1 | plate, 4 × 6 in. 360 ft. long. |
| 112 | beams, 3 × 8 in. 16 ft. long. |
| 56 | ” 3 × 8 in. 22 ft. long. |
| 32 | ” 3 × 8 in. 12 ft. long. |
| 28 | ” 3 × 8 in. 8 ft. long. |
| 8 | ” 3 × 8 in. 18 ft. long. |
| 52 | ” 2 × 6 in. 13 ft. long. |
| 1 | ” 2 × 7 in. 28 ft. long. |
300 | joist, 3 × 4 in. 13 ft. long, at 22c. each. | 66.00
350 | wall strips, 2 × 4 in. 13 ft. long, at 11c. each. | 38.50
928 | tongued and grooved sheathing boards for sides and roofs, at 25c. each. | 232.00
300 | lbs. tarred paper, at 5c. per lb. | 15.00
663 | novelty clear siding-boards, at 30c. each. | 198.90
416 | ft. main cornices, water table, corner boards. | 416.00
29½ | squares of tin roofing, at $8 per square. | 236.00
17 | squares of slate, (no openings allowed) at $10 per square. | 170.00
13 | cellar windows, complete, at $12 each. | 156.00
1 | bay-window, complete. | 100.00
30 | windows, first and second story, and tower, complete, at $17 each. | 510.00
13 | dormer windows, complete, at $23 each. | 299.00
3 | piazzas, (except tinning), complete. | 400.00
1 | balcony, (except tinning), complete. | 35.00
1 | hood, (except tinning), complete. | 50.00
480 | flooring-boards, 6-inch, at 25c. each. | 120.00
160 | flooring boards, 9-inch. | 46.00
| Stairs, complete. | 200.00
14 | closets and pantries, complete. | 130.00
50 | doors, complete, at $15.20 each. | 760.00
4 | marble mantles, complete. | 125.00
| Furnace and range, (set and piped), complete. | 400.00
| Plumbing, complete. | 300.00
| Painting. | 400.00
| Carpenter’s labor, not included above. | 800.00
| Cartage, average 1 mile. | 115.00
| Incidentals. | 197.53
| Total cost of materials and construction. | $8,000.00

Fig. 162.—PERSPECTIVE VIEW OF HOUSE.

Fig. 163.—PLAN OF CELLAR.

Fig. 164.—PLAN OF MAIN FLOOR.

Fig. 165.—PLAN OF SECOND STORY.

Fig. 166.—PLAN OF ATTIC.

DESIGN XXXIX.
CONTIGUOUS HOUSES, COSTING $1,000 EACH.

These plans were originally prepared for six connected cottages, just completed, for Mr. Fred. Storms, (manufacturer), at Bayside, L. I. They were designed to give the largest amount of accommodation, convenience, and finish, possible, for one thousand dollars each, and are especially adapted to rapidly filling localities, or manufacturing districts. By this system of building in blocks, a very large saving is made in materials and labor, at first, and little expense is required to keep them in order afterwards. Where desired, the introduction of gas, or water-pipes, may be made, from one to the other direct, at small cost. Such connected houses are really more comfortable than separate ones, as they protect each other at their sides from the extreme changes of the outward temperature; and are therefore warmer in winter, and cooler in summer. The site chosen in this case is elevated, and has a westward frontage, securing the important advantages of good drainage, and the admission of direct sunlight to every room.... Exterior, (fig. 167).—Building in blocks is a favorite mode with many large owners of village property. The chief objection to a majority of such erections is their formal and stiff appearance, arising from a monotonous uniformity, a repetition of parts, and the overpowering predominance of horizontal lines—partaking too much of the city-street style. To overcome such objections in this design, simple but effective irregularities were introduced, so that really no two dwellings are alike. The sky-lines are broken and varied; the main roofs have pedimented projections—with Mansard sections intervening; all horizontal lines are either shortened or omitted, leaving vertical ones to prevail, and the window openings are varied in their form and distribution. While these several features are essential to the good appearance of such buildings, giving them the pleasing elements of variety and picturesqueness, they do not add very materially to the cost. Cottages designed for simple dwellings, whether built apart or connected, should, as far as possible, preserve their identity as cottages, and if destined for undulating and picturesque situations, should be outlined to accord with their surroundings.... Interior.—The following description of rooms has reference to the house at the extreme left; its relation with the adjoining one is shown by the dotted sketch at the side. All have equal accommodations; this and two others are similarly arranged, the remaining three have their sides reversed.... Cellar, (fig. 168.)—Hight of ceilings 6½ feet. It is thoroughly floored, has outside entrances front and rear, and being well out of ground, is light and airy, and is adapted to general use for the coarser work. Bins for coal are placed where they may be readily filled from the front window. One corner is partitioned off for a bath-room and water-closet. The window to the latter is shielded by a latticed inclosure beneath the rear lobby, adding to its privacy. The rear area not being protected by the rear stoop, has hatchway doors to be used in stormy weather. The Stairs lead from near the front door, to the main hall of the first story.... First Story, (fig. 169.)—Hight of ceilings 10 feet. A hall, parlor, and living-room are embraced in the divisions. The Hall is entered from a neat porch, contains the main stairs, and leads to the parlor, living-room, and the cellar stairs. The Parlor is pleasantly arranged, with double windows in front, has neat stucco cornices and centers, and a marble mantle. The chimney-breast is placed to allow sufficient space between it and the central partition, for a piano, or other large piece of furniture. The Living-room is of good dimensions and shape, has two windows, a closet, a large fire-place, and a sink. The door leading to the rear lobby has glass upper panels, admitting additional light in the room in pleasant weather, when the lobby door will be likely to stand open, and through it the lobby will be lighted at night from within. The Main Stairs, leading to the second story, are of the “quarter-circle” pattern, and are neatly finished with hard-wood railing, with a niche above.... Second Story, (fig. 170.)—Hight of ceiling 9 feet. This story is divided into a small hall, two chambers, two bed-rooms, and three closets. Each of the rooms is well lighted, and chimney-breasts, with marble shelves, and stucco trusses are finished in each chamber.... Construction.—The average depth of the excavations below the surface is three feet. The Foundation walls are of brick work, 8 inches thick, those for the exterior are 7 ft. 4 in. high, showing an average of 4 ft. above the final grades. (In this particular case, the site being elevated, only 4 inches of additional filling was required in the grades, the balance of the loose earth being used to fill more depressed grounds). All interior cross-walls of brick are omitted, their places being supplied with brick “footings” and frame-work. These brick footings are laid in trenches 4 inches below the cellar bottom, and are 8 inches high and wide. Sills of 4 × 6 timber are laid on the center of these footings (edgewise), leaving a margin of 2 inches on each side for the support of the ends of the cellar-floor beams. Girts are put above the sills (also of 4 × 6 timber), anchored to, and level with the outer foundation walls, and are supported by studding and braces, thus forming an inexpensive and substantial division and bearing between the cellars. The principal frame is of regular-sized sawed timber, thoroughly framed and braced. The sidings are of clear pine clapboards, laid on hard-rolled sheathing-felt. The upper roofs are covered with IC. charcoal tin, “tern-plate,” and the Mansard sections are slated on hemlock boards. The interior flooring is of 7-inch milled spruce; outside flooring of 4½-inch milled pine. To prevent the transmission of sound, all the main divisions of frame-work between the houses are deafened by a filling of pale brick and mortar. The cellar ceilings and side walls are white-finished on one coat of brown mortar. All other plastering is hard-finished on two coats of brown mortar. Circular ventilators are placed in each gable, and two ventilators made to resemble the chimney tops are placed on the higher or central ridge of the roof, to allow for the escape of heated air from beneath the roofing. All windows have 1½-inch sash, of four lights each; those in the cellar are hung with butts; all above are balanced with iron weights, and have outside blinds. The doors are first quality, four-panelled. The interior casings are of clear pine, and are neatly moulded, and the parlor windows have panelled backs. The Painting is done as described in Design XIII., except that the blinds are of a chocolate color.

Estimated cost of materials and labor:

Mason’s materials and labor. | $1,350.00
Lumber of all kinds. | 1,150.00
Tinning and slating, (complete). | 300.00
Rolled lining, $30; porches and lobbies, $275. | 305.00
Cornice materials, (prepared at mill). | 120.00
Sash, doors, and blinds. | 400.00
Stairs, with outside steps, with railings. | 500.00
Shelving and sundries. | 325.00
Nails, $65; hardware, $300. | 365.00
Painting, $300; cartage, $85. | 385.00
Carpenter’s labor, not included above. | 800.00
Total cost of six Dwellings. | $6,000.00

Mr. Storms added about $1,000 to the total cost of six buildings in plumbing, sewers, gas-pipes, and in fencing separate front and rear yards, to each house. As these improvements are not generally required, they are omitted in the estimate.

Fig. 167.—FRONT ELEVATION OF ROW OF SIX HOUSES.

Fig. 168.—PLAN OF CELLAR.

Fig. 169.—PLAN OF FIRST FLOOR.

Fig. 170.—PLAN OF SECOND FLOOR.

DESIGN XL.
CONTIGUOUS HOUSES, COSTING $2,000 EACH.

These designs were prepared for a block of five houses erected last year for Mr. Geo. Storms, facing one of the principal avenues at Bayside, L. I. The entire structure is 90 feet long, running north and south, and occupies half the avenue end of a village ground plot. One end section being a “corner,” has a portion devoted to business purposes, the balance of the building is used exclusively as residences. They are thoroughly furnished with ranges, heaters, pipes for cold and hot water, and gas, and complete sewerage. The desirability of these buildings is proved by the fact that all of them were engaged, and several occupied, before they were fully completed.... Cellars, (fig. 172.)—Hight of ceilings, 7 feet. Each is well lighted, and has outside entrances from the street and from rear yards. A hall, laundry, and water-closet are floored and otherwise finished off; the balance is unfinished, to be used as a cellar for fuel and vegetables. The Laundry has a set of stationary wash-tubs, with cold and hot water. The Water-closet has an outside door leading from the rear yard, (this is designed to obviate the necessity and unsightliness of the usual out-buildings). The Fire-places shown are left open, and have continuous flues the whole hight of the chimneys. These flues being heated through contact with the upper fires, insures a thorough ventilation of this story.... Elevation (fig. 171.)—This building appears well from all directions, is imposing in outline, animated in details, and nicely proportioned—the hight agreeing with its breadth; the openings and dressings are changed in each story, to give diversity, the whole being well suited to its very public and prominent situation. The “corner” building has an observatory extending above the main roofs, indicating its terminal position, and adding an agreeable feature of irregularity in the sky-lines. The street end at the rear of the tower has a Mansard roof with two dormers; the opposite end shows a full pediment.... First Story, (fig. 173.)—Hight of ceilings in four houses, 10 feet. The floor in the corner building is lowered 2½ feet, making that part 12½ feet in the clear. A hall, parlor, dining-room, and kitchen, are finished in each of the four houses, and a store, kitchen, and entry, in the corner building. Each of the parlors has a large bay-window, and is divided from the dining-room by sliding-doors. The Dining-rooms have two closets each. The Kitchens are conveniently arranged with closets, ranges, boilers, and sinks. The Store is fair-sized, has a double door entrance from the avenue, and has a wide stairway leading directly from it to the cellar. The Kitchen at the rear is for the use of the parties doing business in the store. The Family Entrance to the corner building is from the street at the side.... Second Story, (fig. 174.)—Hight of ceilings, 9 feet. The divisions in this story are similar in each of the five buildings, and consist of a hall, two large and two small rooms, and the necessary closets. The room over the store is used as a parlor. One of the small rooms in each house is fitted as a bath-room. The Stairs leading to the attics are placed above the main flights, with a door at the foot of each.... Attic, (fig. 175.)—The Attic of the corner building is partitioned off, and finished as shown, with ceilings 9 feet high, and has an inclosed stairway leading to the observatory. The latter is 7 feet square in the clear, and is also finished. Each of the four adjoining attics are plastered on their sides, but have no partitions.... Construction.—The Excavations are made in the earth for the corner building, to the depth of 5½ feet—and for the others, 3 feet. The foundations are of 8-inch brick work. The frame is of sawed, seasoned timber. The main division walls between the houses are deafened, by filling with pale brick and mortar, “laid flat.” The sidings are of clear pine clap-boards, laid on rolled sheathing. The Mansard Roofs for front, one end, rear, and the tower, are slated; all other roofs are tinned. The interior walls and ceilings of the two full stories are hard-finished on two coats of brown mortar; the balance is white-finished on one coat of “laid off” brown mortar. The halls, parlors, dining-rooms, and store, have stucco cornices and centers in each, and the openings to the bay windows are arched and moulded. Marble mantles are put in the principal rooms, and marble shelves and stucco trusses are put in the large bed-rooms. Fire-place heaters are put in the parlors, with pipes connecting them with registers in the second story. The bath-tubs and water-closets are cased with black walnut.... To give an exact idea of the plumber’s work, the specification used as a guide in its introduction is herewith given.—Plumbing:

There must be a hopper water-closet and a wash-tub with three apartments put in each basement. A No. 2 range, with elevated oven, and water-back; a 30-gallon oval-topped copper boiler of Croton pressure strength, resting on an iron Lockwood Stand, and an 18 × 30-inch iron sink in each kitchen; a bath-tub, 5 feet long, lined with planished copper; a wash-stand, with 14-inch bowl, marble-top and wall plates; a pan water-closet, with bowl, pull, and crank attachments; and a tank, 1½ × 1½ × 3 feet, lined with sheet lead, in each bath-room. All supply pipes to be of galvanized iron, of the following sizes: The main of 1½-inch, 93 feet long, laid in the cellar bottom below the foundation walls, near the rear chimneys, one end to extend outside the building for street connections. Branches of ¾-inch leading from the main supply to the tank, with secondary branches leading to the hopper-closet, wash-tubs, and sink. All other water-pipes to be of lead, as follows: For cold water leading from the tank, to the bath-tub, water-closet, and boiler; and for hot water leading from the boiler, to the sink, wash-tubs, and bath-tubs, of A ⅝-inch; for connections between the water-back and boiler of AA ¾-inch; and for wash-stands of A ½-inch. The water and hopper closets are to have traps of 4-inch, lead, connecting them with the soil pipe. Ventilating pipes of 2-inch tin, to lead from the 4-inch traps to above the roof, and have cone-shaped covers set 2 inches above their openings. The soil pipes to be of 4-inch iron, and lead from the second floor to the tile drains at the rear and below the cellar bottom. Waste pipes to be of 1½-inch, with traps, all of lead, leading from the bath-tub, wash-bowl, sink, and wash-tubs, to the soil pipe. Brass lever “stop and waste” cocks must be put in the branch supply pipes near the basement floors, and in the pipes leading from the tank to the boiler. A “Fuller’s” Tank Regulator to be connected with the supply pipe leading to the tank. A “Sediment” cock must be attached to empty the boilers, with pipes leading to the waste pipes of the sinks. Finished brass ⅝ “compression” cocks, with flanges, and thimbles, must be provided for the sinks and wash-tubs, and similar cocks, silver-plated, for the bath-tubs; plated swing cocks for the wash-stands. Self-acting compression cocks must be put in the connections with the hopper closets. Plugs, with chains, must be put in each wash-tub and bowl, and trap-screws put in all traps. Finally, all to be properly connected, in a substantial and workman-like manner, and warranted one year, with ordinary use.

Estimate for cost of materials and labor:

Mason’s materials. | $2,200.00
Lumber of all kinds. | 1,950.00
Slate and tin. | 450.00
Rolled sheathing. | 50.00
Cornices, etc., from mill. | 250.00
Porches and stairs, with railings. | 800.00
Hardware and nails. | 400.00
Mantles. | 360.00
Plumbing, gas-pipes, and sewers. | 940.00
Doors, sash, and blinds. | 725.00
Cartage. | 100.00
Carpenter’s labor, not included above. | 1,300.00
Painting. | 475.00
Total cost, of five Houses. | $10,000.00
Average cost, $2,000 each.

Fig. 171.—ELEVATION OF CONTIGUOUS HOUSES AT BAYSIDE, L. I.

Fig. 172.—PLAN OF CELLARS OF CONTIGUOUS HOUSES.

Fig. 173.—PLAN OF FIRST FLOORS.

Fig. 174.—PLAN OF SECOND FLOORS.

Fig. 175.—PLAN OF ATTICS.

INDEX.

A.

Accommodations for Beginners in Housekeeping, 9

Air-chambers in Outer Walls, 67
Alcove to Window, 89
Arch at Head of Stairs, Good Effect, 224
Arched Ceilings, 217
Arches with Corbels, 213
Architect Fulfilling His Mission, 104
Area-walls, 189
A Regular versus Balloon-frame, 73
Ash-pit, 166
B.
Balconies with Roofs, 130
Balcony-railing on Roofs, 149
Balloon-frames and Makeshifts, 74
Bay-window, Adding Room, 78
Bay-window, Cold Prevented, 191
Bay-window Frame, 194
Bay-window, Square Form, 142
Bells, 225
Better Half Consulted, the, 67
Blank Side of House in Villages, 58
Blinds Recommended, 29
Boldness in Exterior, 188
Brick, Beam-filling, 212
Brick Caps, 201
Brick-heading Courses, 189
Brick-inclosing, for Frame Buildings, 178
Brick Walls for Painting, 200
Bridging Beams, 102
Bronzed Hardware, 219
Building a Part First, 10
Building in Blocks, Advantages, 227
Building on a Declivity, 82
Building Upwards, 76
Butler’s Pantry, Dresser-finished, 217
C.
Carpenter’s Labor in Estimating, 185
Cellars Never too Large, 124
Chimneys, Separate, Joined at Top, 157
Circular Heads for Windows, 48
Closets, 113
Coal-lift, 166
Common Fault, too Near the Street, 50
Communication Cut Off, 144
Compact Outlines, 197
Concrete for Cellar Bottom, 218
Construction of Rear Lobby, 71
Contents, 4
Contiguous Houses, 233
Conventional Requirements in Dwellings, 63
Corner Store, 233
Corridor for General Use, 156
Cost in Detail of Windows and Doors, 119
Cupola, 194
D.
Deafening Division Walls, 231
Decay Caused by Moisture, 122
Depressing Effect of Horizontal Lines, 128
Designing, Difficulties in, 63
Developed Homestead, 40
Disconnected Verandas, 105
Dispensing with Carpets, 219
Distance from Street to Build, 142
Dormer-windows, Hooded, 129
Dormer-windows, Triangular, 129

Dormer-windows with Pediments and Columns, 221

Double Doors, 222
Double Front House, 115
Drudgery of Housework, 113
Durable Wash for Rough Work, 21

Dwelling may express Progressive Character, 10

E.
Earth-finish Against Foundations, 92
Economical Form of House, 98
Effect of Angles in Exterior, 17

Entire Story Under Supervision of Mistress, 160

Errors in Bracing, Reliable Angles, 79
Exterior Plastering, 25
F.
Facing Two Approaches, 209
Family Entrance with Private Stairs, 210
Fancied Necessity for Cornice Supports, 77
Farmers May Reduce Cost of Building, 158
Faults of Wood and Paper Linings, 16
Finishing the Rear, 148
Fireplace-heaters, 27
Five Houses on Four Lots, 64
Formula for Making Stearate of Lime, 42
Foundations in Sandy Ground, 69
Fountain, 204
Frame and Brick Sections, 201
Frame Cross-walls and Foundation, 231
Framing-in of Braces, 79
French-roof Style, 83
Frontage Eastward, 122
Frontage Southward, 154
Frontage Westward, 141
Front and Vestibule Doors, 222
Front Hall Dispensed with, 129
Furnace, 221
Furring-off Walls for Plastering, 114
G.
Gas in Isolated Dwellings, 225
Gas-pipes, 202
Good Taste in Building, 135
Grading, 132
Graining, 226
Grates and Registers, 216
Ground-plans Affecting Outside Dress, 225
Gutters, Old and New Methods, 31
H.
Half Stone Walls, 147
Hall, Contents not Exposed to St., 84
Halls, Windy and Cheerless, 192
Hard-wood Oiled, 219
Head-room Over Stairs Utilized, 66
Heater, Portable, 185
Heaters, Fireplace, How to Set, 194
High Foundations, 99
Hooded Compared with Mansard Style, 50

Houses Cheap as Lumber and Nails Can Make Them, 12

House for Dwelling, with Office, 134
Houses Set too Low, No Cure, 142
House-work Without Intrusion, 223
I.
Imitations, Objections to, 74
Importance of Good Roof, 13
Imposing Outlines, 233
Indestructible Covering, 175
J.
Jarring Prevented, 42
Job, Who Gets, 104
Joined, Separate Chimneys Over Arch, 157
Justice, in Painting, Last Opportunity, 74
K.
Keys to Circular Heads, 192
Kitchen, Isolated, 130
Kitchen, Pleasant, 94
Knot, Shellacked, 67
L.
Lamp-shelf, and Location of, 125
Lighting Lobby, 230
Lining-off Exterior Plastering, 25
Little Required to Build, 26
Location, Questions Involved, 141
Locker or Private Cellar, 160
Looking Like a Farm-house, 159
Low-down Grates, 165
Low-priced Plans, 22
M.
Mansard Roof, Significance, 206
Marble Mantels, 180
Marble Shelves, 194
Modern Buildings on Old Foundations, 205
Mortar for Plastering, 145
Mortar for Stone-work, 114
N.
New Modification of Mansard Roof, 128
Nine Doors in Small Hall, 172
Novelty Siding, 30
O.
Observatory, 233
Omissions, Reducing Cost, 170

One’s Dwelling an Indication of His Character, 10

Outside Plastering, 42
Overloaded Cornices, 77
P.
Painting; Object, When and How, 74
Parquet-flooring, 218
Parsonage, 180
Partitions in Cellar, 218
Paving Shed-floors, 126
Piazza, Change to Conservatory, 126
Piece-lumber Used Without Waste, 59
Plan Resembling a Double House, 101
Plant-windows, 112
Plastering, a Non-conductor of Sound, 16
Plastering Cellar Ceilings, 189
Plastering, Different Modes, 53
Plastering, Estimate in Detail, 139
Plumbing, Economical, 177
Plumbing, Estimate in Detail, 195
Plumbing, Specifications for, 237
Pointed Style for Rural Surroundings, 92
Porch Instead of Lobby, 18
Preface, 3
Providing Against Changing Vicissitudes, 10
Providing for Future Enlargements, 34
Q.
Qualified to Estimate, Who Should Be, 104
Quarried Stone, Used as Found, 149
Quarter-circle Stairs, 48
Quiet Corner, 160
R.
Radiator Utilizing Heat from Kitchen Fire, 19
Rafters Extending Downward, 133
Rake of Roof, 60
Rats and Mice Shut Out, 190
Reversing Plans, 23
Ribbed Glass, 213
Rolled Sheathing, 237

Roofing Materials foreign from Each Other, 207

Roof Ventilation, 85
Room for an Invalid Mother, 143
Rough Boards for Siding, 20
Rule for Projections, 139
S.
Satisfaction of Hanging Sash, and Cost, 28
Saving in Foundation, New Method, 35
Saving Time and Trouble, 27
School and Play-room, 224
Seeming Growth of the Earth, 143
Semi-dressed Stone, 78
Setting a Girder, 41
Shaky and Doubtful Foundations, 37
Sheathing and Felting, 192
Shingling, How Done, 30
Side Alley-way, 54
Side Openings in Chimney-tops, Solid Caps, 53
Siding on Sheathing-Boards, 218
Siding Upright with Battens, 96
Siding with Bevelled Clap-boards, 85
Sills Bedded in Mortar, 190
Simplicity of Cottage Life, 23
Size and Shape of Houses, 120

Sky-light, Scuttle, and Ventilator, combined, 60

Slate, best material for Roofing, 138
Slate, clipping corners of, 114
Sliding Doors, 198
Small Beginnings, 10
Southern House Requirements, 88
Space for Furniture and Wall Ornaments, 51
Space for Piano, 230
Speaking-tubes Saving Steps, 68
Spreading, in place of Stilted, Houses, 152
Squeaky Stairs, Effect, 103
Stairs Continuous to Attic, 224
Stair-Landing, near Center of House, 183
Stairs, Platform, 165
Stairs, Quarter Circle at Top, 48

Stairs, Quarter Circle, Midway their Hight, 182

Stairs to Tower, 224
Stearate of Lime, 25
Stone, Convenient Hight to Build, 150
Stone for Building, Random Dressed, 149
Stone Walls with Brick Angles, 162
Storm Doors, 41
Stucco Cornices and Centers, 219
Style determined by Roof, 49
Suggestions as to Balloon Framing, 73
Superintend’g Construction, Points, 145
Sweetening Cellars, 190
T.
Tanks secured from Frost, 95
Taste in Painting, 81
Temporary Cellar, 11

Tendency to Self-Destruction in Buildings, 191

Time allowed for Building, 217
Tinning, Raised Groove and Lock-Joint, 201
Tin, Single and Double Cross, 218
Tower and Attic, 108
Tower, Five Stories High, 221
Truss Heads for Cornices, 221
U.
Underpinning, 108
Unity in Design, 128
Unobstructed Hall, Stair Space, 210
Unsightly Out-buildings Obviated, 233
Unwholesome Vapors, 122
V.
Valleys and Gutters, 169
Ventilating Cellars, 125
Ventilation, 109
Ventilation Sewage, 151
Vertical Side Walls in Mansard Roof, 200
Vestibules, 198
Views and Principal Rooms—Rear, 171
Vines and Creepers for Decoration, 159
W.
Walks in Conservatories, 208
Walls and Chimneys interlaced, 139
Weight of Slate and Tin, 83
Well, How Constructed, 173
What Color to Paint, 75
Why Contractors Differ in Estimating, 104
Y.
Yards, Front and Rear, Fenced, 232
Yards of Carpet, 207
Year, Plumbing Warranted for a, 239
Z.
Zinc Ridge Plates, and Flashings, 138

Commended by the Greatest Educators of Germany, England and the United States. Endorsed by Officials, and adopted in many Schools

New Methods in Education

Art, Real Manual Training, Nature Study. Explaining: Processes whereby Hand, Eye and Mind are Educated by Means that Conserve Vitality and Develop a Union of Thought and Action

By J. Liberty Tadd

Director of the Public School of Industrial Art, of Manual Training and Art in the R. C. High School, and in several Night Schools, Member of the Art Club, Sketch Club, and Educational Club, and of the Academy of Natural Sciences, Philadelphia

Based on twenty-two years’ experience with thousands of children and hundreds of teachers. “A method reasonable, feasible and without great cost, adapted to all grades, from child to adult; a plan that can be applied without friction to every kind of educational institution or to the family, and limited only by the capacity of the individual; a method covered by natural law, working with the absolute precision of nature itself; a process that unfolds the capacities of children as unfold the leaves and flowers; a system that teaches the pupils that they are in the plan and part of life, and enables them to work out their own salvation on the true lines of design and work as illustrated in every natural thing.”

A Wealth of Illustration—478 Pictures and 44 Full-Page Plates
showing children and teachers practicing these new methods or their work. A revelation to all interested in developing the wonderful capabilities of young or old. The pictures instantly fascinate every child, imbuing it with a desire to do likewise. Teachers and parents at once become enthusiastic and delighted over the Tadd methods which this book enables them to put into practice. Not a hackneyed thought nor a stale picture. Fresh, new, practical, scientific, inspiring

AMONG THOSE WHO ENDORSE THE WORK ARE

HERBERT SPENCER, DR. W. W. KEENE, PRESIDENT HUEY—Of the Philadelphia board of education.

SECRETARY GOTZE—Of the leading pedagogical society of Germany (by which the book is being translated into German for publication at Berlin).

CHARLES H. THURBER—Professor of Pedagogy, University of Chicago.

TALCOTT WILLIAMS—Editor Philadelphia Press, Book News, etc.

R. H. WEBSTER—Superintendent of Schools, San Francisco.

DR. A. E. WINSHIP—Editor Journal of Education.

W. F. SLOCUM—President Colorado College.

FREDERICK WINSOR—Head master The Country School for Boys of Baltimore City, under the auspices of Johns Hopkins University.

G. B. MORRISON—Principal Manual Training High School, Kansas City.

DR. EDWARD KIRK—Dean University of Penn.

G. E. DAWSON—(Clark University), Professor of Psychology, Bible Normal College.

ROMAN STEINER—Baltimore.

SPECIFICATIONS: Size, 7½ × 10½ inches, almost a quarto; 456 pages, fine plate paper, beautifully bound in cloth and boards, cover illuminated in gold; weight, 4½ lbs. Boxed, price $3.00 net, postpaid to any part of the world.

Orange Judd Company

New York, N. Y., 52-54 Lafayette Place. Springfield, Mass., Homestead Bdg. Chicago, Ill., Marquette Building.

SENT FREE ON APPLICATION

Descriptive
Catalog of—
RURAL
BOOKS

Containing 100 8vo. pages, profusely illustrated, and giving full descriptions of the best works on the following subjects:

- Farm and Garden
- Fruits, Flowers, Etc.
- Cattle, Sheep and Swine
- Dogs, Horses, Riding, Etc.
- Poultry, Pigeons and Bees
- Angling and Fishing
- Boating, Canoeing and Sailing
- Field Sports and Natural History
- Hunting, Shooting, Etc.
- Architecture and Building
- Landscape Gardening
- Household and Miscellaneous

Publishers and Importers

Orange Judd Company

52 and 54 Lafayette Place
NEW YORK

BOOKS WILL BE FORWARDED, POSTPAID, ON
RECEIPT OF PRICE

Greenhouse Construction.

By Prof. L. R. Taft. A complete treatise on greenhouse structures and arrangements of the various forms and styles of plant houses for professional florists as well as amateurs. All the best and most approved structures are so fully and clearly described that anyone who desires to build a greenhouse will have no difficulty in determining the kind best suited to his purpose. The modern and most successful methods of heating and ventilating are fully treated upon. Special chapters are devoted to houses used for the growing of one kind of plants exclusively. The construction of hotbeds and frames receives appropriate attention. Over one hundred excellent illustrations, specially engraved for this work, make every point clear to the reader and add considerably to the artistic appearance of the book. Cloth, 12mo.

$1.50

Greenhouse Management.

By L. R. Taft. This book forms an almost indispensable companion volume to Greenhouse Construction. In it the author gives the results of his many years’ experience, together with that of the most successful florists and gardeners, in the management of growing plants under glass. So minute and practical are the various systems and methods of growing and forcing roses, violets, carnations, and all the most important florists’ plants, as well as fruits and vegetables described, that by a careful study of this work and the following of its teachings, failure is almost impossible. Illustrated. Cloth, 12mo.

$1.50

Bulbs and Tuberous-Rooted Plants.

By C. L. Allen. A complete treatise on the history, description, methods of propagation and full directions for the successful culture of bulbs in the garden, dwelling and greenhouse. As generally treated, bulbs are an expensive luxury, while when properly managed, they afford the greatest amount of pleasure at the least cost. The author of this book has for many years made bulb growing a specialty, and is a recognized authority on their cultivation and management. The illustrations which embellish this work have been drawn from nature, and have been engraved especially for this book. The cultural directions are plainly stated, practical and to the point. Cloth, 12mo.

$1.50

Irrigation Farming.

By Lute Wilcox. A handbook for the practical application of water in the production of crops. A complete treatise on water supply, canal construction, reservoirs and ponds, pipes for irrigation purposes, flumes and their structure, methods of applying water, irrigation of field crops, the garden, the orchard and vineyard; windmills and pumps, appliances and contrivances. Profusely, handsomely illustrated. Cloth, 12mo.

$1.50

Landscape Gardening.

By F. A. Waugh, professor of horticulture, University of Vermont. A treatise on the general principles governing outdoor art; with sundry suggestions for their application in the commoner problems of gardening. Every paragraph is short, terse and to the point, giving perfect clearness to the discussions at all points. In spite of the natural difficulty of presenting abstract principles the whole matter is made entirely plain even to the inexperienced reader. Illustrated, 12mo. Cloth.

$ .50

Fungi and Fungicides.

By Prof. Clarence M. Weed. A practical manual concerning the fungous diseases of cultivated plants and the means of preventing their ravages. The author has endeavored to give such a concise account of the most important facts relating to these as will enable the cultivator to combat them intelligently. 222 pp., 90 ill., 12mo. Paper, 50 cents; cloth.

$1.00

Talks on Manure.

By Joseph Harris, M. S. A series of familiar and practical talks between the author and the deacon, the doctor, and other neighbors, on the whole subject of manures and fertilizers; including a chapter especially written for it by Sir John Bennet Lawes of Rothamsted, England. Cloth, 12mo.

$1.50

Insects and Insecticides.

By Clarence M. Weed, D. Sc., Prof. of entomology and zoology, New Hampshire college of agriculture. A practical manual concerning noxious insects, and methods of preventing their injuries. 334 pages, with many illustrations. Cloth, 12mo.

$1.50

Mushrooms. How to Grow Them.

By Wm. Falconer. This is the most practical work on the subject ever written, and the only book on growing mushrooms published in America. The author describes how he grows mushrooms, and how they are grown for profit by the leading market gardeners, and for home use by the most successful private growers. Engravings drawn from nature expressly for this work. Cloth.

$1.00

Handbook of Plants and General Horticulture.

By Peter Henderson. This new edition comprises about 50 per cent. more genera than the former one, and embraces the botanical name, derivation, natural order, etc., together with a short history of the different genera, concise instructions for their propagation and culture, and all the leading local or common English names, together with a comprehensive glossary of botanical and technical terms. Plain instructions are also given for the cultivation of the principal vegetables, fruits and flowers. Cloth, large 8vo.

$3.00

Ginseng, Its Cultivation, Harvesting, Marketing and Market Value.

By Maurice G. Kains, with a short account of its history and botany. It discusses in a practical way how to begin with either seed or roots, soil, climate and location, preparation, planting and maintenance of the beds, artificial propagation, manures, enemies, selection for market and for improvement, preparation for sale, and the profits that may be expected. This booklet is concisely written, well and profusely illustrated, and should be in the hands of all who expect to grow this drug to supply the export trade, and to add a new and profitable industry to their farms and gardens, without interfering with the regular work. 12mo.

$ .35

Land Draining.

A handbook for farmers on the principles and practice of draining, by Manly Miles, giving the results of his extended experience in laying tile drains. The directions for the laying out and the construction of tile drains will enable the farmer to avoid the errors of imperfect construction, and the disappointment that must necessarily follow. This manual for practical farmers will also be found convenient for references in regard to many questions that may arise in crop growing, aside from the special subjects of drainage of which it treats. Cloth, 12mo.

$1.00

Henderson’s Practical Floriculture.

By Peter Henderson. A guide to the successful propagation and cultivation of florists’ plants. The work is not one for florists and gardeners only, but the amateur’s wants are constantly kept in mind, and we have a very complete treatise on the cultivation of flowers under glass, or in the open air, suited to those who grow flowers for pleasure as well as those who make them a matter of trade. Beautifully illustrated. New and enlarged edition. Cloth, 12mo.

$1.50

Tobacco Leaf.

By J. B. Killebrew and Herbert Myrick. Its Culture and Cure, Marketing and Manufacture. A practical handbook on the most approved methods in growing, harvesting, curing, packing, and selling tobacco, with an account of the operations in every department of tobacco manufacture. The contents of this book are based on actual experiments in field, curing barn, packing house, factory and laboratory. It is the only work of the kind in existence, and is destined to be the standard practical and scientific authority on the whole subject of tobacco for many years. Upwards of 500 pages and 150 original engravings.

$2.00

Play and Profit in My Garden.

By E. P. Roe. The author takes us to his garden on the rocky hillsides in the vicinity of West Point, and shows us how out of it, after four years’ experience, he evoked a profit of $1,000, and this while carrying on pastoral and literary labor. It is very rarely that so much literary taste and skill are mated to so much agricultural experience and good sense. Cloth, 12mo.

$1.00

Forest Planting.

By H. Nicholas Jarchow, LL. D. A treatise on the care of woodlands and the restoration of the denuded timber-lands on plains and mountains. The author has fully described those European methods which have proved to be most useful in maintaining the superb forests of the old world. This experience has been adapted to the different climates and trees of America, full instructions being given for forest planting of our various kinds of soil and subsoil, whether on mountain or valley. Illustrated, 12mo.

$1.50

Soils and Crops of the Farm.

By George E. Morrow, M. A., and Thomas F. Hunt. The methods of making available the plant food in the soil are described in popular language. A short history of each of the farm crops is accompanied by a discussion of its culture. The useful discoveries of science are explained as applied in the most approved methods of culture. Illustrated. Cloth, 12mo.

$1.00

American Fruit Culturist.

By John J. Thomas. Containing practical directions for the propagation and culture of all the fruits adapted to the United States. Twentieth thoroughly revised and greatly enlarged edition by Wm. H. S. Wood. This new edition makes the work practically almost a new book, containing everything pertaining to large and small fruits as well as sub-tropical and tropical fruits. Richly Illustrated by nearly 800 engravings. 758 pp., 12mo.

$2.50

Fertilizers.

By Edward B. Voorhees, director of the New Jersey Agricultural Experiment Station. It has been the aim of the author to point out the underlying principles and to discuss the important subjects connected with the use of fertilizer materials. The natural fertility of the soil, the functions of manures and fertilizers, and the need of artificial fertilizers are exhaustively discussed. Separate chapters are devoted to the various fertilizing elements, to the purchase, chemical analyses, methods of using fertilizers, and the best fertilizers for each of the most important field, garden and orchard crops. 335 pp.

$1.00

Gardening for Profit.

By Peter Henderson. The standard work on market and family gardening. The successful experience of the author for more than thirty years, and his willingness to tell, as he does in this work, the secret of his success for the benefit of others, enables him to give most valuable information. The book is profusely illustrated. Cloth, 12mo.

$1.50

Herbert’s Hints to Horse Keepers.

By the late Henry William Herbert (Frank Forester). This is one of the best and most popular works on the horse prepared in this country. A complete manual for horsemen, embracing: How to breed a horse; how to buy a horse; how to break a horse; how to use a horse; how to feed a horse; how to physic a horse (allopathy or homoeopathy); how to groom a horse; how to drive a horse; how to ride a horse, etc. Beautifully illustrated. Cloth, 12mo.

$1.50

Barn Plans and Outbuildings.

Two hundred and fifty-seven illustrations. A most valuable work, full of ideas, hints, suggestions, plans, etc., for the construction of barns and outbuildings, by practical writers. Chapters are devoted to the economic erection and use of barns, grain barns, house barns, cattle barns, sheep barns, corn houses, smoke houses, ice houses, pig pens, granaries, etc. There are likewise chapters on bird houses, dog houses, tool sheds, ventilators, roofs and roofing, doors and fastenings, workshops, poultry houses, manure sheds, barnyards, root pits, etc. Cloth, 12mo.

$1.00

Cranberry Culture.

By Joseph J. White. Contents: Natural history, history of cultivation, choice of location, preparing the ground, planting the vines, management of meadows, flooding, enemies and difficulties overcome, picking, keeping, profit and loss. Cloth, 12mo.

$1.00

Ornamental Gardening for Americans.

By Elias A. Long, landscape architect. A treatise on beautifying homes, rural districts and cemeteries. A plain and practical work with numerous illustrations and instructions so plain that they may be readily followed. Illustrated. Cloth, 12mo.

$1.50

Grape Culturist.

By A. S. Fuller. This is one of the very best of works on the culture of the hardy grapes, with full directions for all departments of propagation, culture, etc., with 150 excellent engravings, illustrating planting, training, grafting, etc. Cloth, 12mo.

$1.50

Turkeys and How to Grow Them.

Edited by Herbert Myrick. A treatise on the natural history and origin of the name of turkeys; the various breeds, the best methods to insure success in the business of turkey growing. With essays from practical turkey growers in different parts of the United States and Canada. Copiously illustrated. Cloth, 12mo.

$1.00

Profits in Poultry.

Useful and ornamental breeds and their profitable management. This excellent work contains the combined experience of a number of practical men in all departments of poultry raising. It is profusely illustrated and forms a unique and important addition to our poultry literature. Cloth, 12mo.

$1.00

How Crops Grow.

By Prof. Samuel W. Johnson of Yale College. New and revised edition. A treatise on the chemical composition, structure and life of the plant. This book is a guide to the knowledge of agricultural plants, their composition, their structure and modes of development and growth; of the complex organization of plants, and the use of the parts; the germination of seeds, and the food of plants obtained both from the air and the soil. The book is indispensable to all real students of agriculture. With numerous illustrations and tables of analysis. Cloth, 12mo.

$1.50

Coburn’s Swine Husbandry.

By F. D. Coburn. New, revised and enlarged edition. The breeding, rearing, and management of swine, and the prevention and treatment of their diseases. It is the fullest and freshest compendium relating to swine breeding yet offered. Cloth, 12mo.

$1.50

Stewart’s Shepherd’s Manual.

By Henry Stewart. A valuable practical treatise on the sheep for American farmers and sheep growers. It is so plain that a farmer or a farmer’s son who has never kept a sheep, may learn from its pages how to manage a flock successfully, and yet so complete that even the experienced shepherd may gather many suggestions from it. The results of personal experience of some years with the characters of the various modern breeds of sheep, and the sheep raising capabilities of many portions of our extensive territory and that of Canada—and the careful study of the diseases to which our sheep are chiefly subject, with those by which they may eventually be afflicted through unforeseen accidents—as well as the methods of management called for under our circumstances, are carefully described. Illustrated. Cloth, 12mo.

$1.00

Feeds and Feeding.

By W. A. Henry. This handbook for students and stock men constitutes a compendium of practical and useful knowledge on plant growth and animal nutrition, feeding stuffs, feeding animals and every detail pertaining to this important subject. It is thorough, accurate and reliable, and is the most valuable contribution to live stock literature in many years. All the latest and best information is clearly and systematically presented, making the work indispensable to every owner of live stock. 658 pages, 8vo. Cloth.

$2.00

Hunter and Trapper.

By Halsey Thrasher, an old and experienced sportsman. The best modes of hunting and trapping are fully explained, and foxes, deer, bears, etc., fall into his traps readily by following his directions. Cloth, 12mo.

$ .50

The Ice Crop.

By Theron L. Hiles. How to harvest, ship and use ice. A complete, practical treatise for farmers, dairymen, ice dealers, produce shippers, meat packers, cold storers, and all interested in ice houses, cold storage, and the handling or use of ice in any way. Including many recipes for iced dishes and beverages. The book is illustrated by cuts of the tools and machinery used in cutting and storing ice, and the different forms of ice houses and cold storage buildings. 122 pp., ill., 16mo. Cloth.

$1.00

Practical Forestry.

By Andrew S. Fuller. A treatise on the propagation, planting and cultivation, with descriptions and the botanical and popular names of all the indigenous trees of the United States, and notes on a large number of the most valuable exotic species.

$1.50

Irrigation for the Farm, Garden and Orchard.

By Henry Stewart. This work is offered to those American farmers and other cultivators of the soil who, from painful experience, can readily appreciate the losses which result from the scarcity of water at critical periods. Fully illustrated. Cloth, 12mo.

$1.00

Market Gardening and Farm Notes.

By Burnett Landreth. Experiences and observation for both North and South, of interest to the amateur gardener, trucker and farmer. A novel feature of the book is the calendar of farm and garden operations for each month of the year; the chapters on fertilizers, transplanting, succession and rotation of crops, the packing, shipping and marketing of vegetables will be especially useful to market gardeners. Cloth, 12mo.

$1.00

The Fruit Garden.

By P. Barry. A standard work on fruit and fruit trees, the author having had over thirty years’ practical experience at the head of one of the largest nurseries in this country. Invaluable to all fruit growers. Illustrated. Cloth, 12mo.

$1.50

The Nut Culturist.

By Andrew S. Fuller. A treatise on the propagation, planting and cultivation of nut-bearing trees and shrubs adapted to the climate of the United States, with the scientific and common names of the fruits known in commerce as edible or otherwise useful nuts. Intended to aid the farmer to increase his income without adding to his expenses or labor. 12mo. Cloth.

$1.50

American Grape Growing and Wine Making.

By George Husmann of California. New and enlarged edition. With contributions from well-known grape growers, giving wide range of experience. The author of this book is a recognized authority on the subject. Cloth, 12mo.

$1.50

Treat’s Injurious Insects of the Farm and Garden.

By Mrs. Mary Treat. An original investigator who has added much to our knowledge of both plants and insects, and those who are familiar with Darwin’s works are aware that he gives her credit for important observation and discoveries. New and enlarged edition. With an illustrated chapter on beneficial insects. Fully illustrated. Cloth, 12mo.

$1.50

The Dogs of Great Britain, America and Other Countries.

New, enlarged and revised edition. Their breeding, training and management, in health and disease; comprising all the essential parts of the two standard works on dogs by “Stonehenge.” It describes the best game and hunting grounds in America. Contains over one hundred beautiful engravings, embracing most noted dogs in both continents, making, together with chapters by American writers, the most complete dog book ever published. Cloth, 12mo.

$1.50

Harris on the Pig.

By Joseph Harris. New edition. Revised and enlarged by the author. The points of the various English and American breeds are thoroughly discussed, and the great advantage of using thoroughbred males clearly shown. The work is equally valuable to the farmer who keeps but few pigs, and to the breeder on an extensive scale. Illustrated. Cloth, 12mo.

$1.00

Pear Culture for Profit.

By P. T. Quinn, practical horticulturist. Teaching how to raise pears intelligently, and with the best results, how to find out the character of the soil, the best methods of preparing it, the best varieties to select under existing conditions, the best modes of planting, pruning, fertilizing, grafting, and utilizing the ground before the trees come into bearing, and, finally, of gathering and packing for market. Illustrated. Cloth, 12mo.

$1.00

The Secrets of Health, or How Not to Be Sick, and How to Get Well from Sickness.

By S. H. Platt, A. M., M. D., late member of the Connecticut Eclectic Medical Society, the National Eclectic Medical Association, and honorary member of the National Bacteriological Society of America; our medical editor and author of “Talks With Our Doctor” and “Our Health Adviser.” Nearly 600 pages. Profusely illustrated. An index of 20 pages, so that any topic may be instantly consulted. A new departure in medical knowledge for the people—the latest progress, secrets and practices of all schools of healing made available for the common people—health without medicine, nature without humbug, common sense without folly, science without fraud. 12mo. 576 pp., 81 illustrations. Cloth.

$1.50

Gardening for Young and Old.

By Joseph Harris. A work intended to interest farmers’ boys in farm gardening, which means a better and more profitable form of agriculture. The teachings are given in the familiar manner so well known in the author’s “Walks and Talks on the Farm.” Illustrated. Cloth, 12mo.

$1.00

Money in the Garden.

By P. T. Quinn. The author gives in a plain, practical style, instructions on three distinct although closely connected branches of gardening—the kitchen garden, market garden and field culture, from successful practical experience for a term of years. Illustrated. Cloth, 12mo.

$1.00

The Pruning Book.

By L. H. Bailey. This is the first American work exclusively devoted to pruning. It differs from most other treatises on this subject in that the author takes particular pains to explain the principles of each operation in every detail. Specific advice is given on the pruning of the various kinds of fruits and ornamental trees, shrubs and hedges. Considerable space is devoted to the pruning and training of grapevines, both American and foreign. Every part of the subject is made so clear and plain that it can be readily understood by even the merest beginner. Cloth, 8vo, 530 pages. Illustrated.

$1.50

The Dairyman’s Manual.

By Henry Stewart, author of “The Shepherd’s Manual,” “Irrigation,” etc. A useful and practical work, by a writer who is well known as thoroughly familiar with the subject of which he writes. Cloth, 12mo.

$1.50

Truck Farming at the South.

By A. Oemler. A work giving the experience of a successful grower of vegetables or “garden truck” for northern markets. Essential to anyone who contemplates entering this profitable field of agriculture. Illustrated. Cloth, 12mo.

$1.00

The Propagation of Plants.

By Andrew S. Fuller. Illustrated with numerous engravings. An eminently practical and useful work. Describing the process of hybridizing and crossing species and varieties, and also the many different modes by which cultivated plants may be propagated and multiplied. Cloth, 12mo.

$1.50

Gardening for Pleasure.

By Peter Henderson. A guide to the amateur in the fruit, vegetable and flower garden, with full descriptions for the greenhouse, conservatory and window garden. It meets the wants of all classes in country, city and village, who keep a garden for their own enjoyment rather than for the sale of products. Finely illustrated. Cloth, 12mo.

$1.50

The Window Flower Garden.

By Julius J. Heinrich. The author is a practical florist, and this enterprising volume embodies his personal experience in window gardening during a long period. New and enlarged edition. Illustrated. Cloth, 12mo.

$ .50

Diseases of Horses and Cattle.

By Dr. D. McIntosh, V. S., professor of veterinary science in the university of Illinois. Written expressly for the farmer, stockman and veterinary student. A new work on the treatment of animal diseases, according to the modern status of veterinary science, has become a necessity. Such an one is this volume of nearly 400 pages, written by one of the most eminent veterinarians of our country. Illustrated. Cloth, 12mo.

$1.75

Batty’s Practical Taxidermy and Home Decoration.

By Joseph H. Batty, taxidermist for the government surveys and many colleges and museums in the United States. An entirely new and complete as well as authentic work on taxidermy—giving in detail full directions for collecting and mounting animals, birds, reptiles, fish, insects, and general objects of natural history. 125 illustrations. Cloth, 12mo.

$1.00

*** END OF THE PROJECT GUTENBERG EBOOK MODERN HOUSE-PLANS FOR EVERYBODY ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG™ LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg electronic works

1.A. By reading or using any part of this Project Gutenberg electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg mission of promoting free access to electronic works by freely sharing Project Gutenberg works in compliance with the terms of this agreement for keeping the Project Gutenberg name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg License must appear prominently whenever any copy of a Project Gutenberg work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg™ License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg work, (b) alteration, modification, or additions or deletions to any Project Gutenberg work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg

Project Gutenberg is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg’s goals and ensuring that the Project Gutenberg collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 41 Watchung Plaza #516, Montclair NJ 07042, USA, +1 (862) 621-9288. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg eBooks with only a loose network of volunteer support.

Project Gutenberg eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- Modern HOUSE-PLANS For Everybody

- PREFACE.

- CONTENTS.

- DESIGN I. A COTTAGE, COSTING $250.

- DESIGN II. COUNTRY COTTAGE, COSTING $450 TO $550.

- DESIGN III. A COUNTRY COTTAGE, COSTING $550.

- DESIGN IV. A COUNTRY HOUSE, COSTING $550 TO $700.

- DESIGN V. A CONVENIENT HOUSE, COSTING $650.

- DESIGN VI. A HOUSE COSTING $700.

- DESIGN VII. COUNTRY HOUSE, COSTING $750 TO $1,050.

- DESIGN VIII. A COTTAGE, COSTING $800 TO $1,050.

- DESIGN IX. COUNTRY OR VILLAGE COTTAGE, COSTING $1,000.

- DESIGN X. A HOUSE COSTING $1,100.

- DESIGN XI. A HOUSE COSTING $1,600.

- DESIGN XII. A HOUSE COSTING $1,700.

- DESIGN XIII. FRENCH-ROOFED COTTAGE, COSTING $2,000.

- DESIGN XIV. A FRENCH-ROOFED COTTAGE COSTING $2,000.

- DESIGN XV. A SOUTHERN HOUSE COSTING $2,000.

- DESIGN XVI. A HOUSE COSTING $2,100.

- DESIGN XVII. A HOUSE COSTING $2,200.

- DESIGN XVIII. A SOUTHERN HOUSE COSTING $2,200.

- DESIGN XIX. A STONE HOUSE, COSTING $2,500.

- DESIGN XX. A COUNTRY HOUSE, COSTING $2,600.

- DESIGN XXI. A FARM-HOUSE COSTING $2,600.

- DESIGN XXII. A HOUSE COSTING $2,800.

- DESIGN XXIII. A COUNTRY OR VILLAGE HOUSE, COSTING $2,800.—FOR PHYSICIANS, LAWYERS, CLERGYMEN, JUSTICES, NOTARIES, EDITORS, ETC.

- DESIGN XXIV. A FARM-HOUSE COSTING $2,800.

- DESIGN XXV. A “HALF STONE” HOUSE FOR $2,800.

- DESIGN XXVI. A FARM-HOUSE COSTING $2,900.

- DESIGN XXVII. A STONE-HOUSE COSTING $2,900.

- DESIGN XXVIII. A HOUSE COSTING $3,000.

- DESIGN XXIX. A HOUSE COSTING $3,100.

- DESIGN XXX. A FRAME AND BRICK FARM-HOUSE COSTING $3,300.

- DESIGN XXXI. A HOUSE COSTING $3,700.

- DESIGN XXXII. A HOUSE COSTING $4,000.

- DESIGN XXXIII. A BRICK HOUSE COSTING $4,000.

- DESIGN XXXIV. COUNTRY RESIDENCE COSTING $4,750.

- DESIGN XXXV. A HOUSE COSTING $4,000.

- DESIGN XXXVI. A FARM HOUSE COSTING $5,000.

- DESIGN XXXVII. A HOUSE COSTING $7,000.

- DESIGN XXXVIII. A HOUSE COSTING $8,000.

- DESIGN XXXIX. CONTIGUOUS HOUSES, COSTING $1,000 EACH.

- DESIGN XL. CONTIGUOUS HOUSES, COSTING $2,000 EACH.

- INDEX.

- THE FULL PROJECT GUTENBERG™ LICENSE